NAME           AddAtom
DESCRIPTION    'Windows 2.03 Function demonstration - AddAtom'
STUB           'WINSTUB.EXE'
CODE           MOVEABLE
DATA           MOVEABLE MULTIPLE
HEAPSIZE       1024
STACKSIZE      4096
EXPORTS        WndProc

