NAME           OFFCLIPR

DESCRIPTION    'Sample Windows function demonstration'

STUB           'WINSTUB.EXE'

CODE           MOVEABLE
DATA           MOVEABLE MULTIPLE

HEAPSIZE       1024
STACKSIZE      4096

EXPORTS        WndProc @1
