NAME    FrameRec

DESCRIPTION 'Sample Microsoft Windows Application'

STUB    'WINSTUB.EXE' ; Generates error message if application
                      ; is run without Windows

CODE    MOVEABLE      ; code can be moved in memory

;DATA must be MULTIPLE if program can be invoked more than once

DATA    MOVEABLE MULTIPLE

HEAPSIZE  1024
STACKSIZE 4096  ; recommended minimum for Windows applications

; All functions that will be called by any Windows routine
; MUST be exported.

EXPORTS
    FrameRectWndProc   @1  ; name of window processing function
