NAME           OpenIcon
DESCRIPTION    'Demonstration for the Windows OpenIcon function'
STUB           'WINSTUB.EXE'
CODE           MOVEABLE
DATA           MOVEABLE MULTIPLE
HEAPSIZE       1024
STACKSIZE      4096
EXPORTS        WndProc1 WndProc2

