NAME    gnearclr

DESCRIPTION 'Microsoft Windows Demonstration Application'

STUB    'WINSTUB.EXE'

CODE    MOVEABLE
DATA    MOVEABLE MULTIPLE

HEAPSIZE  8198
STACKSIZE 4096

EXPORTS
    NearestWndProc @1
    ColorDlg       @2
