NAME    procinst

DESCRIPTION 'Test FreeProcInstance functions.'

STUB    'WINSTUB.EXE'

CODE    MOVEABLE
DATA    MOVEABLE MULTIPLE

HEAPSIZE  4096
STACKSIZE 8096

EXPORTS
  WndProc @1
  TestFarFunc @2
