NAME		gdlgitm

DESCRIPTION	'Windows Sample GetDlgItem function'

STUB		'WINSTUB.EXE'

CODE		MOVEABLE
DATA		MOVEABLE MULTIPLE

HEAPSIZE	 8192
STACKSIZE 4096

EXPORTS
    DlgItmWndProc  @1
    DialogBoxProc  @2
