NAME        CLIPCOUN

DESCRIPTION 'Test CountClipboardFormat function.'

STUB        'WINSTUB.EXE'

CODE        MOVEABLE
DATA        MOVEABLE MULTIPLE

HEAPSIZE    4096
STACKSIZE   8096

EXPORTS 
   WndProc  @1
