NAME    Winfind

DESCRIPTION 'Find where module was started from.'

STUB    'WINSTUB.EXE'

CODE    MOVEABLE
DATA    MOVEABLE MULTIPLE

HEAPSIZE  1024
STACKSIZE 4096

