NAME        ansi

DESCRIPTION 'Demonstration of the ANSI related Windows functions.'

STUB        'WINSTUB.EXE'

CODE        MOVEABLE
DATA        MOVEABLE MULTIPLE

HEAPSIZE    1024
STACKSIZE   4096

EXPORTS
   WndProc  @1
