;**************************************************************************
;*
;*       GENAPP.DEF - Module definition file for GENAPP
;*
;**************************************************************************

NAME    GENAPP
DESCRIPTION 'GENAPP'	; This appears in Title Bar


CODE    PRELOAD MOVEABLE        ; Code is all resident but may be moved.
DATA    PRELOAD FIXED MULTIPLE  ; Data may be partitioned and moved.

HEAPSIZE    2048
STACKSIZE   4096

STUB 'WINSTUB.EXE'      ; This informs an attempted DOS invocation that
                        ; This needs Windows to run.

EXPORTS                 ; These need to made available externally.

    win_MainWndProc		@1
    win_ChildWndProc		@2
    dlg_AboutBoxProc		@3

;    DebugWndProc		@4



