

                   Gear Sub-Menu F1 Detailed Help Notes


        "Coordinate x-y help"
        Produces a graphic display that shows the screen coordinate
        system.   It shows the screen boundaries and the present plot
        boundaries and their coordinates.

        "Top of plot"
        Allows the user to move the top of the plot.

        "Bottom of plot"
        Allows the user to move the bottom of the plot.

        "Vertical axis title"
        Allows the user to change the title on the y-axis (vertical
        or up and down).  Whatever string the user types in will be
        displayed on the plot.  (79 chars max.)

        "X-position of title"
        Allows the user put in the x-coordinate of where the
        title will be displayed on the screen.

        "Y-position of title"
        Allows the user put in the y-coordinate of where the
        title will be displayed on the display.

