M1/M1R 100 Patch Bank.Int/.Ext
------------------------------
- Load a 100 Patch Bank from:
    .Int - Internal
    .Ext - External (card)
- Use with 100 Patch/Comb memory
  as set in Global Menu

- TURN ON SYSTEM EXCLUSIVE
- The M1/R is shipped with SysX
  disabled. To turn it on enter the
  Global menu and Page up (+) to the
  Filter Page, if EXCL reads 'DIS'
  toggle it to 'ENA'

- Match MIDI Channel for reception 
  and transmission (under the Global
  button) to the Driver List CommCh

- Turn off memory protect before
  transmitting to M1/R (under Global
  button)
