A current version of this map in postscript format is available via anonymous ftp from ftp.cic.net in the file /pub/maps/cic-netil-ip.ps

CICNet Inc.Revised 4/13/94 by tko@cic.net

10M 256K

10 MBPS ethernetDS1 (1.536 MBPS)FDS1 (256 KBPS)DS0 (56KBPS)

A list of site abbreviations is available viaanonymous ftp in the file /pub/maps/site-names.ps

CICNet & netILLINOIS

Physical Network Topology

LAN IP Address

FDDI IP Address

Site Router

Terminal Server

CICNet BackboneNetwork131.103.0.0

13.14513.1139.12913.16110.19313.9715.1715.146

UOC 25.6526.65

9.81

FRBC13.146

JMLS13.114 KCL9.130 SBA10.194

CED13.162

AAR15.18 ABN15.146

HTC13.98

25.34UIA26.34

WTI9.145

15.1816.18

WISC

9.144

Downers Grove

10.145IU10.130

10.161OSU10.146

10.33MSU10.18 SJPL15.34

10.3415.33

ND9.98

Frame-Relay192.217.72

STF8

MSI2

MVC3

WRHC4

STX7 NCC6

CHM5

ROS9 LEW10

BC12 COLC13

CLC14 PSC15 ROOS11

ICI15.2 WARD9.194

OAS9.210 15.19.1939.209

10.162

10.17 UM 10M

UIUC

25.5025.5010.499.161

ISU13.210

PARK9.242 9.24110.12913.209

EIU15.66

9.16215.65

CMI 9.115.97

128k

15.1299.177

SPR15.98

SSU9.178

SML15.130

ICC15.50 CAT13.242

USDA15.114

EUR9.226 BRAD10.2

13.18AUG13.33

256K

10.509.2

13.1710.115.4913.24115.1139.225 PIA BHC13.34

25.226.2

UMN 10.65

CFA10.66

38 tail sites

FDI13.2

AMT9.18

LFC13.66

OCC13.50

NSI9.66 13.19.1713.6513.499.65

9.82NWU

26.178

UIC

10.242LUC16.82

FMNH9.50

9.49

10.24125.16226.162

MOT9.114

ECN13.194

9.11313.1939.97

ANLA 1

25.9825.11526.9826.114

ANL 30.1

30.2

35.8.2.3

192.217.129.1

142.226.32.254

136.176.1.1

198.88.35.1

198.88.54.1

137.230.14.2

198.88.63.254

192.102.230.246

139.67.8.1

192.17.2.10

192.17.1.10

198.88.100.100

138.87.1.1

129.79.5.131

129.79.2.131

192.12.205.2

152.160.1.254

198.87.15.1 198.87.11.1

192.217.111.1

129.74.254.254

143.43.39.2

129.188.140.254

192.5.180.23

192.5.186.23

192.217.32.1

192.217.159.1

157.178.2.100

192.217.123.1

192.217.91.1 192.217.193.100

192.160.165.1 192.217.112.1

192.217.35.1 192.101.144.126

198.150.1.15

192.35.86.1 198.174.96.1

128.255.1.4 192.217.88.1

192.207.162.1

192.148.222.5

198.29.253.34

150.195.4.200

192.111.120.128

139.172.55.254 198.88.33.1

192.104.61.12

192.11.51.33 164.68.1.10 192.234.14.2

192.101.184.4

192.107.185.1

147.126.240.3

192.43.252.20

129.105.49.8 128.135.8.1 163.191.183.100

192.5.186.22

192.17.2.222

129.74.254.100

192.35.86.247 192.12.205.20

192.217.239.24

192.175.21.13

192.217.181.1

192.217.72.14

192.217.86.1

198.87.242.2

198.87.242.1

198.150.1.20

128.105.2.9 35.1.1.11 192.203.195.3

137.230.14.3 128.255.1.6 192.43.252.21

192.217.64.252