CBM 93-2

ORTHOTICS, PROSTHETICS,

& MOBILITY AIDS

January 1989 through June 1993

2316 Citations

Prepared by

Ronald L. Gordner, M.L.S., National Library of Medicine

Louis A. Quatrano, M.D., National Center for Medical Rehabilitation Research

Cheryl M. Chanaud, Ph.D., National Center for Medical Rehabilitation Research

U.S. DEPARTMENT OF HEALTH

AND HUMAN SERVICES

Public Health Service

National Institutes of Health

National Library of Medicine

Reference Section

8600 Rockville Pike

Bethesda, Maryland 20894

1993

SERIES NOTE

Current Bibliographies in Medicine (CBM) is a continuation in part of the National Library of Medicine’s Literature

Search Series, which ceased in 1987 with No. 87-15. In 1989 it also subsumed the Specialized Bibliography Series.

Each bibliography in the new series covers a distinct subject area of biomedicine and is intended to fulfill a current

awareness function. Citations are usually derived from searching a variety of online databases. NLM databases

utilized include MEDLINE

�

, AVLINE

�

, BIOETHICSLINE

�

, CANCERLIT

�

, CATLINE

�

, HEALTH, POPLINE

�

and TOXLINE

�

. The only criterion for the inclusion of a particular published work is its relevance to the topic

being presented; the format, ownership, or location of the material is not considered.

Comments and suggestions on this series may be addressed to:

Karen Patrias, Editor

Current Bibliographies in Medicine

Reference Section

National Library of Medicine

Bethesda, MD 20894

Phone: 301-496-6097

Fax: 301-402-1384

Internet: patrias@nlm.nih.gov

Ordering Information:

Current Bibliographies in Medicine is sold by the Superintendent of Documents, U.S. Government Printing Office,

P.O. Box 371954, Pittsburgh, PA 15250-7954. To order the entire CBM series for calendar year 1993

(approximately 7 bibliographies), send $24.00 ($30.00 foreign) to the Superintendent of Documents citing GPO List

ID: CBM93. For your convenience an order blank is given inside the back cover. Orders for individual

bibliographies in the series ($3.50, $4.38 foreign) should be sent to the Superintendent of Documents citing the title,

CBM number, and the GPO List ID given above.

Internet Access:

The Current Bibliographies in Medicine series is also available at no cost to anyone with Internet access through

FTP (File Transfer Protocol). FTP to nlmpubs.nlm.gov and login: as nlmpubs. The index file in the "bibs" directory

provides information on the bibliographies available.

Use of funds for printing this periodical has been approved by the Director

of the Office of Management and Budget through September 30, 1993.

ORTHOTICS, PROSTHETICS, & MOBILITY AIDS

Of the 43 million Americans with disabilities, approximately 38 per cent have mobility limitations. More than 2

million use wheelchairs for mobility. Individuals with health conditions such as mental retardation, spinal cord

injury, stroke, cancer, myocardial infarction, orthopaedic impairments, and arthritis may also have mobility

restrictions. Now and in the future a larger proportion of the population will be candidates for ambulation aids of

various types. Parallel with this increasing demand is the development of new technologies and materials in other

fields that have the potential to contribute to improved mobility devices. As rehabilitation researchers begin to

explore the science of and ways to improve human mobility, a number of new paradigms will emerge advancing

ambulation aids as well as their use.

A conference on "Prosthetic/Orthotic Research for the Twenty-first Century" was held in Bethesda, MD in July

1992. The purpose of the conference was to bring together clinicians, researchers, and consumers to discuss

potential research areas. This bibliography was prepared as a result of discussion at that conference.

The bibliography surveys English and foreign language literature from January 1989 through June 1993 discussing

artificial limbs, orthotic devices, neuroprostheses, wheelchairs, walkers, canes, crutches, and other devices or

technologies such as computers, robotics, functional electrical stimulation, and myoelectric devices to aid in

mobility. Some earlier articles are included in the historical section. Journal articles, books, book chapters,

technical reports, conference proceedings and reports, dissertations, theses, and audiovisuals are included.

Arrangement of the bibliography is by subject and format. Most categories are listed alphabetically by author, and

citations may be indexed to more than one category. The audiovisuals section is arranged alphabetically by title.

Some categories have been further subdivided to highlight areas such as use, design, and clinical effectiveness.

An appendix of national organizations is provided at the end of the bibliography.

The term "prosthetics" as used in this bibliography denotes artificial limbs and does not include what are called

implanted prosthetics such as total knee or total hip replacements, or other devices such as cochlear implants, penile

prostheses, or heart prostheses. This resource document is intended to facilitate research on the topic of ambulation

aids and is not exhaustive in scope.

SEARCH STRATEGY

A variety of online databases are usually searched in preparing bibliographies in the CBM series. To assist you

in updating or otherwise manipulating the material in this search, the strategy used for the NLM’s MEDLINE

database is given below. Please note that the search strategies presented here differ from individual demand

searches in that they are generally broadly formulated and irrelevant citations edited out prior to printing.

SS 1 = ARTIFICIAL LIMBS OR EXP ORTHOTIC DEVICES OR WHEELCHAIRS OR

WALKERS OR CANES OR CRUTCHES

SS 2 = (TW) NEURAL AND ALL PROSTHE: OR ALL NEUROPROSTH:

SS 3 = (TW) ALL PROSTHETIST: OR ALL ORTHOTIST:

SS 4 = EXP PARALYSIS OR EXP SPINAL CORD INJURIES

SS 5 = EXP ELECTRIC STIMULATION

SS 6 = (TW) ALL PROSTHETIST: OR ALL ORTHOTIST:

SS 7 = AMPUTEES OR EXP AMPUTATION OR AMPUTATION STUMPS OR

AMPUTATION, TRAUMATIC

SS 8 = EXP PROSTHESIS OR PROSTHESIS DESIGN OR

PROSTHESIS-RELATED INFECTIONS OR PROSTHESIS FAILURE

SS 9 = EXP CYBERNETICS OR ROBOTICS OR EXP COMPUTERS

SS 10= 4 OR 7

SS 11= 5 AND 10

SS 12= 8 OR 9

SS 13= 10 AND 12

SS 14= 9 AND EXP DISABLED

SS 15= 9 AND REHABILITATION (SH) OR 9 AND EXP REHABILITATION

SS 16= 1 OR 2 OR 3 OR 6 OR 11 OR 13 OR 14 OR 15

GRATEFUL MED

�

To make online searching easier and more efficient, the Library offers GRATEFUL MED, microcomputer-based

software that provides a user-friendly interface to most NLM databases. This software was specifically developed

for health professionals and features multiple choice menus and "fill in the blank" screens for easy search

preparation. GRATEFUL MED runs on an IBM PC (or IBM-compatible) with DOS 2.0 or a Macintosh, and

requires a Hayes (or Hayes-compatible) modem. It may be purchased from the National Technical Information

Service in Springfield, Virginia, for $29.95 (plus $3.00 per order for shipping). For your convenience, an order

blank has been enclosed at the back of this bibliography.

SAMPLE CITATIONS

Citations in this bibliographic series are formatted according to the rules established for Index Medicus

�

*. Sample

journal and monograph citations appear below. For journal articles written in a foreign language, the English

translation of the title is placed in brackets; for monographs, the title is given in the original language. In both

cases the language of publication is shown by a three letter abbreviation appearing at the end of the citation. Note

also that a colon (:) may appear within an author’s name or article title. The NLM computer system automatically

inserts this symbol in the place of a diacritical mark.

Journal Article:

Authors Article Title

Press JM, Wiesner SL. Prevention: conditioning and orthotics.

Hand Clin 1990 Aug;6(3):383-92.

Abbreviated Journal Date Volume Issue Pages

Title

Monograph:

Authors/Editors Title

Shurr DG, Cook TM. Prosthetics & orthotics.

Norwalk (CT): Appleton & Lange; 1990. 225 p.

Place of Publisher Date Total No.

Publication of Pages

Audiovisual:

Place of

Title Media Type Publication

Shake, rattle & roll: wheelchair dancing [videocassette]. Greenville (NC):

East Carolina University, Center for Health Sciences Audiovisual

Communication; 1989. 1 videocassette: sound, color, 1/2 in.

Publisher Date Physical Description

_________________________________

*For details of the formats used for references, see the following publication:

Patrias, Karen. National Library of Medicine recommended formats for bibliographic citation.

Bethesda (MD): The Library; 1991 Apr. Available from: NTIS, Springfield, VA; PB91-182030.

TABLE OF CONTENTS

page

ORTHOTICS, PROSTHETICS, & MOBILITY AIDS

History 1

Standards & Classification 3

Economic Issues 8

Psychosocial Issues 10

Legal & Ethical Issues 14

Patient Education, Compliance, & Satisfaction 15

International Issues 18

Nursing Care 20

Rehabilitation 23

Professional Education, Training, & Organizations 28

ORTHOTIC DEVICES

Overview 29

Specific Devices

Braces 31

Harnesses 40

Splints 41

Shoes 48

Cushions & seating 51

Ankle-foot-orthoses & other devices 53

Design & Materials 63

Uses

Geriatric applications 65

Pediatric applications 66

Sports & recreation

Prevention 68

Rehabilitation 70

Biomechanics & gait 72

Scoliosis 78

Other cervical & lumbar vertebrae disorders 81

Other fractures 84

Myelomeningocele & spinal bifida 88

Arthritis 89

Entrapment syndromes & tendon disorders 91

Cerebral palsy 92

Congenital hip & knee disorders 94

Osteogenesis imperfecta 96

Legg-Calv�-Perthes disease 96

Clubfoot, flatfoot, & other foot disorders 97

Rett syndrome 100

Diabetes 100

Leprosy 101

Burns 101

Multiple sclerosis & other neuromuscular disorders 102 page

Paralysis

General 103

Stroke & hemiplegia 105

Paraplegia 107

Quadriplegia 110

Other uses 112

Clinical Assessment & Effectiveness 113

Adverse Effects 116

PROSTHETIC DEVICES

Overview 117

Design & Materials 120

Uses

Geriatric applications 126

Pediatric applications 127

Sports & recreation 131

Upper extremity amputees

General 132

Arm & elbow 135

Hand 137

Lower extremity amputees

General 140

Knee & above-knee 144

Below-knee 146

Myoelectric Devices 150

Neuroprosthetic Devices 154

Robotic Devices 156

Clinical Assessment & Effectiveness 159

Adverse Effects 161

OTHER MOBILITY AIDS

Wheelchairs & Other Motorized Aids

General 161

Design, Materials, Seating & Equipment Safety 167

Uses

Geriatric applications 174

Pediatric applications 175

Sports & recreation 176

Clinical assessment & effectiveness 182

Adverse effects 184

Walkers 184

Canes 186

Crutches 187

Functional Electrical Stimulation & Devices 189

Computers & Communications Devices 195

AUDIOVISUALS 198

APPENDIX OF ORGANIZATIONS 200

ORTHOTICS, PROSTHETICS,

& MOBILITY AIDS

HISTORY

Ata-Abadi R, Idelberger K. [History of the orthopedic

foot-support (author’s transl)]. Z Orthop 1974 Apr;

112(2):354-61. (Ger).

Bazilevskaia ZV. [E.K. Molodaia and her contribution

to prosthesis]. Ortop Travmatol Protez 1978 Jun;

(6):88-9. (Rus).

Carter AJ. Hugh Owen Thomas: the cripple’s

champion. BMJ 1991 Dec 21-28;303(6817):

1578-81.

Childress DS. Hector Kay, Alan Kay, and the future

of prosthetics and orthotics (Hector Kay Memorial

Lecture). J Assoc Child Prosthet Orthot Clin 1989

Summer-Autumn;24(2-3):40-6.

Dismembering. Appl Ther 1967 Jun;9(6):536.

[Dmitrii Ivanovich Gritskevich]. Ortop Travmatol

Protez 1967 Jan;28(1):94. (Rus).

Dobrin L. Origin and evolution of the walkerette.

Mt Sinai J Med 1980 Mar-Apr;47(2):172-4.

Dziak A. [Some history of the prosthesis of the

extremities]. Pieleg Polozna 1988;(10):16. (Pol).

Ena YM. Instruments and other medical articles of the

Eastern Slavs. Biomed Eng (NY) 1974 Jul;7(5):

309-11.

Ena YM. [Instruments and other medical devices

among the Eastern Slavs]. Med Tekh 1973

Sep-Oct;7(5):47-50. (Rus).

Evolution of the modern above knee socket

[videocassette]. Atlanta: Emory University Medical

Network; 1991. 1 videocassette: 46 min., sound,

color, 1/2 in.

Filatov VI. [100th anniversary of Russian prosthetics

(1883-1983)]. Ortop Travmatol Protez 1983 Mar;

(3):61-3. (Rus).

Filatov VI, Pevzner MS. [On the centennial of the

birth of G. A. Albrecht]. Ortop Travmatol Protez

1978 Oct;(10):83-5. (Rus).

Fliegel O, Feuer SG. Historical development of lower-

extremity prostheses. Arch Phys Med Rehabil 1966

May;47(5):275-85.

Friedmann LW. Amputation in pre-Columbian

America. Arch Phys Med Rehabil 1973 Jul;

54(7):323-5.

Friedmann LW, Padula PA. Congenital limb defects

and prostheses before the seventeenth century.

Angiology 1988 Jun;39(6):548-54.

Galitsa TP, Sil’vai KK. [Basic facts of the

development of prosthetic-orthopedic aid in

Ukraine]. Ortop Travmatol Protez 1972 Oct;

33(10):1-6. (Rus).

Geissler C. Description and illustration of artificial

hands and arms. Med Prog Technol 1974;2(3):

171-4.

Goldner JL. Advances in care of the foot: 1800 to

1987. Orthopedics 1987 Dec;10(12):1817-36.

Groch J. Advances in artificial hands. Med Trial

Tech Q 1974 Fall;21(2):171-7.

Grosch G. [The development of orthopedics and

traumatology in Nuremberg and surroundings

(author’s transl)]. Z Orthop 1974 Oct;112(5):

1146-51. (Ger).

Harko V. [The role Gyula Dollinger in the

manufacturing of modern artificial limbs in

Hungary]. Orv Hetil 1974 May 5;115(18):1057-61.

(Hun).

Heim M, Steinbach T. Update on the use of orthotics

in hemophilia. Orthop Rev 1988 Oct;17(10):975-8.

James WV, Orr JF. The Pringle and Kirk four-bar

crossed linkage and the "safety-knee." Prosthet

Orthot Int 1986 Apr;10(1):23-6.

James WV, Orr JF. Surgeon Kirk, Mr. Pringle and the

"P & K" arm. Ulster Med J 1983;52(2):107-12.

Johnston JM, Paulos LE. Prophylactic lateral knee

braces. Med Sci Sports Exerc 1991 Jul;23(7):

783-7.

Jonecko A. [Woodcut depicting an amputated leg and

prosthesis in the Silesian poem "Officina ferraria"

by Rozdzienski, 1612]. Arch Hist Med (Warsz)

1984;47(1):107-16. (Pol).

Kamenetz HL. A brief history of the wheelchair.

J Hist Med Allied Sci 1969 Apr;24(2):205-10.

Kondrashin NI, Gritskevich DI. [TsNIIPP (Central

Scientific Research Institute of Prosthesis and

Prosthesis Construction)--35th anniversary]. Ortop

Travmatol Protez 1978 Oct;(10):86-9. (Rus).

Kondrashin NI, Iaremenko DA. [The role of the

Kharkov M.I. Sitenko Scientific Research Institute

of Orthopedics and Traumatology in the

development of Russian Prosthetics and Orthotics

(on the 80th anniversary of the founding of the

Institute)]. Ortop Travmatol Protez 1988 Jan;(1):

71-4. (Rus).

Kotov AP. [Fundamental stages in the development of

prosthesis in the Ukraine after the October

Revolution]. Ortop Travmatol Protez 1967 Jun;

28(6):66-71. (Rus).

Kotov AP. [On the history of prosthetics in the

Ukraine (The Ukrainian Scientific-Research

Institute of Prosthetics)]. Ortop Travmatol Protez

1966 Apr;27(4):74-9. (Rus).

Levay D. History of orthopaedics: an account of the

study and practice of orthopaedics from the earliest

times to the modern era. Lancaster (UK):

Parthenon; 1990. Amputations and prostheses;

p. 479-87.

The limb deficient child. ISPO symposium, Heidelberg,

August 1988. Prosthet Orthot Int 1991 Aug;15(2):

65-162.

Marincek C. The iron hand from Slovenia. Prosthet

Orthot Int 1992 Dec;16(3):153-6.

Marquardt E, Fisk JR. Thalidomide children: thirty

years later. J Assoc Child Prosthet Orthot Clin

1992 Summer;27(1):3-10.

Martins FL, Martins LS, Davin P. [A myoelectric

prosthesis for the forearm amputee]. Acta Med

Port 1989 Nov-Dec;2(6):297-301. (Por).

McWilliam R, Montgomery SR. Artificial arms--are

they practical? Med Biol Illus 1969 Oct;19(4):

200-1.

Moe JH. 38 years’ experience in scoliosis treatment.

Arch Putti Chir Organi Mov 1985;35:11-20.

Murphy EF. 1945-1970--and then? Bull Prosthet Res

1970 Spring;10(13):1-5.

Murphy EF. Tonnes Dennison, 1894-1976. Bull

Prosthet Res 1977 Fall:251-3.

Mustapha NM. Artificial limbs, past, present and

future. NATNEWS 1985 Feb;22(2 Suppl):18-20.

Northway RO Jr, Alexander RG, Riolo ML. A

cephalometric evaluation of the old Milwaukee

brace and the modified Milwaukee brace in relation

to the normal growing child. Am J Orthod 1974

Apr;65(4):341-63.

Novachenko NP, Korzh AA, El’iashberg FE. [60

years’ activity of the M. I. Sitenko Kharkov

Scientific Research Institute of Prosthesis-Fitting,

Orthopedics and Traumatology]. Ortop Travmatol

Protez 1967 Mar;28(3):75-84. (Rus).

Oberg K. Cost-benefits in orthopaedic technology by

using thermoplastics in developing countries.

Prosthet Orthot Int 1991 Apr;15(1):18-22.

Orr JF, James WV, Bahrani AS. The history and

development of artificial limbs. Eng Med 1982

Oct;11(4):155-61.

Padula PA, Friedmann LW. Acquired amputation and

prostheses before the sixteenth century. Angiology

1987 Feb;38(2 Pt 1):133-41.

Pavlik A. The functional method of treatment using a

harness with stirrups as the primary method of

conservative therapy for infants with congenital

dislocation of the hip. 1957 [classical article]. Clin

Orthop 1992 Aug;(281):4-10.

Pike AC, Nattress LW Jr. The changing role of the

amputee in the rehabilitation process. Phys Med

Rehabil Clin North Am 1991 May;2(2):405-14.

Popov BP, Zhuravlev AM. [Certain achievements and

perspectives of scientific research in prosthetics].

Ortop Travmatol Protez 1970 Mar;31(3):1-4. (Rus).

Riches E. Artificial limbs made by Col. Julian Taylor

in a prisoner of war camp. Ann R Coll Surg Engl

1966 Dec;39(6):373-5.

Robins R. An old Cornish hand. J Hand Surg [Br]

1984 Jun;9(2):199-200.

Romm S. Arms by design: from antiquity to the

Renaissance. Plast Reconstr Surg 1989 Jul;84(1):

158-63.

Romm S. Thomas Brian Gunning and his splint.

Plast Reconstr Surg 1986 Aug;78(2):252-8.

Roth N. Bioengineering: science of the cyborg. Med

Instrum 1978 Sep-Oct;12(5):303.

Ruskin AP, Rosner H, Saperstein H. Bent-knee

prosthesis. Geriatrics 1970 Jul;25(7):109-14.

Rydell N. [The myoelectric hand]. Lakartidningen

1980 Feb 27;77(9):758. (Swe).

Shenk NA, Popov BP. [The development of prosthesis

and prosthetic design as a science in the RSFSR

during the past 50 years]. Ortop Travmatol Protez

1967 Nov;28(11):13-20. (Rus).

Shumada IV, Gorodniaia VN. [Role of the Kiev

school of orthopedists in the development of

prosthetics and prosthesis construction in the

Ukraine]. Ortop Travmatol Protez 1984 Jan;(1):

69-70. (Rus).

Stewart RE. Variants of the PTB (patellar-tendon-

bearing) below-knee prosthesis. Bull Prosthet Res

1970 Spring;10(13):120-34.

Takechi H. History of prostheses and orthoses in

Japan. Prosthet Orthot Int 1992 Aug;16(2):98-103.

Webling DD, Fahrer M. Early bent knee prostheses:

ancestors of K9. Br Med J (Clin Res Ed) 1986

Dec 20-27;293(6562):1636-7.

Wedlick LT. External power and recent concepts in

control of limb prostheses. Med J Aust 1969

Feb 8;1(6):278-80.

Wilson AB Jr. History of amputation surgery and

prosthetics. In: Bowker JH, Michael JW, eds. Atlas

of limb prosthesis: surgical, prosthetic, and

rehabilitation principles. St. Louis: Mosby Year

Book; 1992. p. 3-15.

Wilson AB Jr. Limb prosthetics. 6th ed. New York:

Demos; 1989. The history of limb prosthetics;

p. 1-10.

Wilson AB Jr. The modern history of amputation

surgery and artificial limbs. Orthop Clin North Am

1972 Jul;3(2):267-85.

Wirta RW, Taylor DR, Finley FR. Pattern-recognition

arm prosthesis: a historical perspective-a final

report. Bull Prosthet Res 1978 Fall:8-35.

STANDARDS & CLASSIFICATION

Advances in rehabilitation technology. NSC-88. North

Sea Conference on Biomedical Engineering.

Maastricht, The Netherlands, April 13-15, 1988.

Proceedings. J Med Eng Technol 1989 Jan-Apr;

13(1-2):1-157.

Ambulation aids. Health Devices 1991 Jan;20(1):5-22.

Amirova EK, Efimov VA, Kuzhekin AP, Lunina NV,

Slepchenko AN, Ul’ianov SV, Khanukaev AS,

Shakhnazarov MM, Shakhnazarova IV, Shishkin

BV. [An expert system for choosing prostheses

for the lower extremities (hip) and assessing the

quality of the prosthesis. I.]. Med Tekh 1991

May-Jun;(3):26-31. (Rus).

Amirova EK, Efimov VA, Kuzhekin AP, Lunina NV,

Slepchenko AN, Ul’ianov SV, Khanukaev AS,

Shakhnazarov MM, Shakhnazarova IV, Shishkin

BV. [Expert system of choosing lower limb

(thigh) prosthesis and diagnosis of the quality of

prosthetics (II)]. Med Tekh 1991 Nov-Dec;(6):

5-12. (Rus).

Banzinger E. Technical note: thermoplastic Klenzak

AFO. J Prosthet Orthot 1992 Jul;4(4):219-22.

Batavi AI, Hammer GS. Toward the development of

consumer-based criteria for the evaluation of

assistive devices. J Rehabil Res Dev 1990 Fall;

27(4):425-36.

Behrman AL. Factors in functional assessment.

J Rehabil Res Dev Clin Suppl 1990;(2):17-30.

Bierling-Sorensen F, Ryde H, Bojsen-Moller F, Lyquist

E. Shock absorbing material on the shoes of long

leg braces for paraplegic walking. Prosthet Orthot

Int 1990 Apr;14(1):27-32.

Blocker WP Jr. How to help your patient choose the

right wheelchair. Postgrad Med 1990 Oct;88(5):

243, 246, 251-2.

Brasile FM. Performance evaluation of wheelchair

athletes: more than a disability classification level

issue. Adapt Phys Activ Q 1990 Oct;7(4):289-97.

Bresnahan PJ, Lubert MA. The Tibial Torsion

Transformer. J Am Podiatr Med Assoc 1992 Jan;

82(1):42-4.

Brienza DM, Inigo RM, Chung KC, Brubaker CE.

Seat support surface optimization using force

feedback. IEEE Trans Biomed Eng 1993 Jan;40(1):

95-104.

Brodke DS, Skinner SR, Lamoreux LW, Johanson ME,

St. Helen R, Moran SA, Ashley RK. Effects of

ankle-foot orthoses on the gait of children.

J Pediatr Orthop 1989 Nov-Dec;9(6):702-8.

Brubaker CE, ed. Wheelchair IV: report of a

conference on the state-of-the art of powered

wheelchair mobility; 1988 Dec 7-9; Charlottesville,

VA. Washington (DC): RESNA Press; 1989.

139 p.

Budiman-Mak E, Conrad KJ, Roach KE. The Foot

Function Index: a measure of foot pain and

disability. J Clin Epidemiol 1991;44(6):561-70.

Canale I, Felici F, Marchetti M, Ricci B. Ramp

length/grade prescriptions for wheelchair dependent

individuals. Paraplegia 1991 Sep;29(7):479-85.

Cappozzo A, Felici F, Figura F, Marchetti M, Ricci B.

Prediction of ramp traversability for wheelchair

dependent individuals. Paraplegia 1991 Sep;29(7):

470-8.

Casillas JM, Aurelle B, Coget P, Becker F, Marcer I,

Didier JP. Transcutaneous oxygen tension. How to

choose prosthetics for below knee amputation. Ann

Readapt Med Phys 1990 Dec;33(6):553-61.

Cawley PW, France EP, Paulos LE. Comparison of

rehabilitative knee braces. A biomechanical

investigation. Am J Sports Med 1989 Mar-Apr;

17(2):141-6.

Cawley PW, France EP, Paulos LE. The current state

of functional knee bracing research. A review of

the literature. Am J Sports Med 1991 May-Jun;

19(3):226-33.

Chase AP, Bader DL, Houghton GR. The

biomechanical effectiveness of the Boston brace in

the management of adolescent idiopathic scoliosis.

Spine 1989 Jun;14(6):636-42.

Christel P. The regulation of orthopaedic devices in

France. J Biomed Mater Res 1989 Apr;

23(A1 Suppl):3-7.

Cooper RA. Wheelchair racing sports science: a

review. J Rehabil Res Dev 1990 Summer;27(3):

295-312.

Craven PL. The development from a medical

classification to a player classification in wheelchair

basketball. In: Doll-Tepper G, Dahms C, Doll B,

von Selzam H, eds. Adapted physical activity: an

interdisciplinary approach. Proceedings of the 7th

International Symposium; 1989 Jun; Berlin. New

York: Springer-Verlag; 1990. p. 81-6.

Crewe R. Standards of wheelchairs [letter]. BMJ

1989 Jul 1;299(6690):53-4.

Curtis KA. Sport specific functional classification for

wheelchair athletes. Sports Spokes 1991 Jul-Aug:

45-8.

Day HJ. The ISO/ISPO classification of congenital

limb deficiency. Prosthet Orthot Int 1991 Aug;

15(2):67-9.

Diamond MF, Ottenbacher KJ. Effect of a tone-

inhibiting dynamic ankle-foot orthosis on stride

characteristics of an adult with hemiparesis. Phys

Ther 1990 Jul;70(7):423-30.

DiGaudio KM, Msall ME. Guidelines for safe

transportation of children in wheelchairs. Am J Dis

Child 1991 Jun;145(6):653-5.

Dijkers MP, deBear PC, Erlandson RF, Kristy K, Geer

DM, Nichols A. Patient and staff acceptance of

robotic technology in occupational therapy: a pilot

study. J Rehabil Res Dev 1991 Spring;28(2):33-44.

Dudley NJ. Wheelchair safety [letter]. Lancet 1993

Jan 23;341(8839):246.

Durance JP, Warren WK, Kerbel DB, Stroud TW.

Rehabilitation of below-knee amputees: factors

influencing outcome and costs in three programmes.

Int Disabil Stud 1989 Jul-Sep;11(3):127-32.

Ehrler S, Buch-Jaeger N. [Hand prosthesis.

Conception and surveillance]. Soins Chir 1991

May;(123):34-6. (Fre).

Eng JJ, Pierrynowski MR. Evaluation of soft foot

orthotics in the treatment of patellofemoral pain

syndrome. Phys Ther 1993 Feb;73(2):62-8;

discussion 68-70.

Farmer MR. Controlling anterior tibial displacement

under static load: a comparison of two braces

[letter]. Orthopedics 1989 Mar;12(3):354-6.

Ferstle J, Stewart P. Wheelchair road racing

guidelines. Road Race Manage 1989 Oct;93:1, 6-7.

Franks CA, Palisano RJ, Darbee JC. The effect of

walking with an assistive device and using a

wheelchair on school performance in students with

myelomeningocele. Phys Ther 1991 Aug;71(8):

570-7; discussion 577-9.

Garber SL, Dyerly LR. Wheelchair cushions for

persons with spinal cord injury: an update. Am J

Occup Ther 1991 Jun;45(6):550-4.

Garland LA, Dorion SL, Vietinghoff HE.

Development of a standard interface concept for

securing wheelchairs in accessible vehicles. Ottawa

(Canada): Centre for Studies on Aging; 1989.

118 p.

Garrett RE, Hartridge M, Seeger BR. Comparative

evaluation of chargers for wheelchair gel cell

batteries. Australas Phys Eng Sci Med 1990 Sep;

13(3):148-56.

Gehlsen GM, Karpuk J. Analysis of the NWAA

swimming classification system. Adapt Phys Activ

Q 1992 Apr;9(2):141-7.

Gerasimov AI. [A cane with a sliding-prevention

device]. Ortop Travmatol Protez 1991 Dec;(12):

47-9. (Rus).

Golding JS, Nathan RH. A third world wheelchair.

Int Disabil Stud 1987;9(1):38-40.

Hall J, Clarke AK. Walking frames [letter]. BMJ

1990 May 5;300(6733):1199.

Hall J, Elvins DM, Burke SJ, Ring EF, Clarke AK.

Heart rate evaluation of axillary and elbow

crutches. J Med Eng Technol 1991 Nov-Dec;15(6):

232-8.

Ham R, Roberts VC. Standards of wheelchairs [letter].

BMJ 1989 Jun 3;298(6686):1522.

Harburn KL, Hill KM, Kramer JF, Noh S, Vandervoort

AA, Matheson JE. An overhead harness and trolly

system for balance and ambulation assessment and

training. Arch Phys Med Rehabil 1993 Feb;74(2):

220-3.

Hartridge M, Seeger BR. International wheelchair

standards: a study of costs and benefits. Assist

Technol 1990;2(4):117-23.

Heary RF, Hunt CD, Krieger AJ, Antonio C,

Livingston DH. Acute stabilization of the cervical

spine by halo/vest application facilitates evaluation

and treatment of multiple trauma patients.

J Trauma 1992 Sep;33(3):445-51.

Higgs C, Babstock P, Buck J, Parsons C, Brewer J.

Wheelchair classification for track and field events:

a performance approach. Adapt Phys Activ Q

1990;7(1):22-40.

Hughes J. The Knud Jansen Lecture. Education: an

investment in everyone’s future. Prosthet Orthot

Int 1992 Aug;16(2):90-7.

Johnson KM. What is the best transportation for a

person without head control? SCI Nurs 1992 Dec;

9(4):144.

Johnstone KS, Perrin JCS. Sports for the handicapped

child. Phys Med Rehabil 1991 Jun;5(2):331-50.

Joyce BM, Kirby RL. Canes, crutches and walkers.

Am Fam Physician 1991 Feb;43(2):535-42.

Kenan S, Bloom N, Lewis MM. Limb-sparing surgery

in skeletally immature patients with osteosarcoma.

The use of an expandable prosthesis. Clin Orthop

1991 Sep;(270):223-30.

Kilmartin TE, Wallace WA, Hill TW. Orthotic effect

on metatarsophalangeal joint extension. A

preliminary study. J Am Podiatr Med Assoc 1991

Aug;81(8):414-7.

Kirby RL, Kumbhare DA, MacLeod DA. "Bedside"

test of static rear stability of occupied wheelchairs.

Arch Phys Med Rehabil 1989 Mar;70(3):241-4.

Korzh AA, Iaremenko DA. [What is necessary for

raising the quality of prosthetic and orthopedic

service to the community?] Ortop Travmatol

Protez 1989 Apr;(4):53-7. (Rus).

Kristinsson O. The ICEROSS concept: a discussion of a

philosophy. Prosthet Orthot Int 1993 Apr;17(1):

49-55.

Kullmann L, Laszlo G, Molnar F. [Results of

amputation and rehabilitation]. Orv Hetil 1991

Mar;32(9):459-63. (Hun).

Lasudry N, Warzee G, Van Rolleghem J. [Image

processing and use of CAD in prosthesis

manufacturing]. Onde Electr 1991 Jul-Aug;

71(4):45-8 (Fre).

Lemaire ED, Lamontagne M, Barclay HW, John T,

Martel G. A technique for the determination of

center of gravity and rolling resistance for tilt-seat

wheelchairs. J Rehabil Res Dev 1991 Summer;

28(3):51-8.

Lewis G, Tan T, Shiue YS. Characterization of the

performance of shoe insert materials. J Am Podiatr

Med Assoc 1991 Aug;81(8):418-24.

Limb M, Calnan M. Artificial limbs: a real need.

Health Serv J 1990 Nov 15;100(5227):1696-7.

Mahoney J, Euhardy R, Carnes M. A comparison of a

two-wheeled walker and a three-wheeled walker in

a geriatric population. J Am Geriatr Soc 1992

Mar;40(3):208-12.

Malcus Johnson P, Sandkvist G, Eberhardt K, Liang B,

Herrlin K. The usefulness of nocturnal resting

splints in the treatment of ulnar deviation of the

rheumatoid hand. Clin Rheumatol 1992 Mar;11(1):

72-5.

Marr J, Edmonds V. Cervical orthoses: the issue of

patient compliance. J Neurosci Nurs 1990 Apr;

22(2):104-7.

McFarland SR. Seeking information about wheelchair

evaluation: a call for action. J Rehabil Res Dev

Clin Suppl 1990;(2):86-7.

McKnight PT, Kwoh CK. Randomized, controlled

trial of compression gloves in rheumatoid arthritis.

Arthritis Care Res 1992 Dec;5(4):223-7.

McLaurin CA, Axelson P. Wheelchair standards: an

overview. J Rehabil Res Dev Clin Suppl 1990;(2):

100-3.

Medicare program; carrier jurisdiction for claims for

durable medical equipment, prosthetics, orthotics

and supplies (DMEPOS) and other issues involving suppliers, and criteria and standards for evaluating

regional DMEPOS carriers--HCFA. Final rule with

comment period. Fed Regist 1992 Jun 18;57(118):

27290-308.

Michael JW. Re: Below-knee amputee gait with

dynamic elastic response prosthetic feet: a pilot

study [letter]. J Rehabil Res Dev 1992 Winter;

29(1):x.

Milczarek JJ, Kirby RL, Harrison ER, MacLeod DA.

Standard and four-footed canes: their effect on the

standing balance of patients with hemiparesis.

Arch Phys Med Rehabil 1993 Mar;74(3):281-5.

Mulley G. Walking frames. BMJ 1990 Apr 7;

300(6729):925-7.

Mulley GP. Standards of wheelchairs. BMJ 1989

May 6;298(6682):1198-9.

Naumann T, Zahniel K. Comparing the rate of

femoral head necrosis of two different treatments of

congenital dislocation of the hip. J Pediatr Orthop

1990 Nov-Dec;10(6):780-5.

Nene AV, Kim Y, Spelman FA. An assessment of the

ORLAU ParaWalker-electrical stimulation hybrid

orthosis. In: Kim Y, Spelman FA, eds. Images of

the twenty-first century. Proceedings of the 11th

Annual International Conference of the IEEE

Engineering in Medicine and Biology Society; 1989

Nov 9-12; Seattle, WA. Vol 3. Piscataway (NJ):

IEEE; 1989. p. 1016-7.

Neumann H, O’Shea P, Nielson JP, Climstein M. A

physiological comparison of the short-leg walking

cast and an ankle-foot orthosis walker following 6

weeks of immobilization. Orthopedics 1989 Nov;

12(11):1429-33; discussion 1433-4.

North B, North C, Lee JL. Living in a halo [published

erratum appears in Am J Nurs 1992 May;92(5):27].

Am J Nurs 1992 Apr;92(4):54-6.

Ohman K, Spaniol D. Halo immobilization: discharge

planning and patient education. J Neurosci Nurs

1990 Dec;22(6):351-7.

Ohsawa S, Ikeda S, Tanaka S, Takahashi T, Takeuchi

T, Utsunomiya M, Ueno R, Ohkura M, Ito Y,

Katagi Y, et al. A new model of plastic ankle foot

orthosis (FAFO (II)) against spastic foot and genu

recurvatum. Prosthet Orthot Int 1992 Aug;16(2):

104-8.

Parziale JR. Standard v lightweight wheelchair

propulsion in spinal cord injured patients. Am J

Phys Med Rehabil 1991 Apr;70(2):76-80.

Phillips L, Nicosia A. An overview ... with reflections

past and present of a consumer. J Rehabil Res Dev

Clin Suppl 1990;(2):1-7.

Pieper B, Rodammer G, Gradinger R. [The value of

knee joint orthoses in performance sports].

Fortschr Med 1989 Feb 28;107(6):150-2. (Ger).

Pinzur MS, Littooy F, Osterman H, Schwartz D. A

safe, pre-fabricated, immediate postoperative

prosthetic limb system for rehabilitation of below-

knee amputations. Orthopedics 1989 Oct;12(10):

1343-5.

Post KM. From the field: clinical notes on cushion

prescription. Am J Occup Ther 1991 Jun;45(6):

559-62.

Potter BE, Wallace WA. Crutches. BMJ 1990 Nov 3;

301(6759):1037-9.

Powell RR. Performance comparisons among four

different arm cycling systems. Int J Rehabil Res

1992;15(4):334-40.

Pringle RG. Halo versus Minerva--which orthosis?

Paraplegia 1990 Jun;28(5):281-4.

Product comparison and evaluation: canes, crutches,

and walkers. Washington (DC): National

Rehabilitation Hospital, Rehabilitation Engineering

Center; 1990 Jun.

Product comparison and evaluation: scooters.

Washington (DC): National Rehabilitation Hospital,

Rehabilitation Engineering Center; 1991 Jun. 91 p.

Proper seating: a key to participation. Except Parent

1989 Mar;19(2):46-9.

Quesada P, Skinner HB. Analysis of a below-knee

patellar tendon-bearing prosthesis: a finite element

study. J Rehabil Res Dev 1991 Summer;28(3):

1-12.

Rechargeable, deep-cycle, lead-acid batteries for

powered wheelchair and scooter users. Health

Devices 1991 Dec;20(12):474-94.

Report on the Evaluation of the VA/SEATTLE Ankle.

The Rehabilitation R&D Evaluation Unit,

Rehabilitation Research and Development Service,

Department of Veterans Affairs. J Rehabil Res Dev

1991 Spring;28(2):79-90.

Roberts L, Alvarado MI, McElroy K, Rutan RL,

Robson MC, Herndon DN. Analysis of materials

for splinting of the thermally injured patient.

J Burn Care Rehabil 1991 May-Jun;12(3):268-9.

Robichaud JA, Agostinucci J, Vander Linden DW.

Effect of air-splint application on soleus muscle

motoneuron reflex excitability in nondisabled

subjects and subjects with cerebrovascular

accidents. Phys Ther 1992 Mar;72(3):176-83;

discussion 183-5.

Rohmert W, Lowenthal I, Ruckert A. Ergonomic

evaluation of a wheelchair for transfer of disabled passengers at a large airport. Int J Rehabil Res

1990;13(3):243-9.

Rome K. Behavior of orthotic materials in chiropody.

J Am Podiatr Med Assoc 1990 Sep;80(9):471-8.

Saadah ES. Swimming devices for below-knee

amputees. Prosthet Orthot Int 1992 Aug;16(2):

140-1.

Sadler C. Disability: wheelchair comfort. Community

Outlook 1989 Nov:4-8.

Samuelsson KA, Larsson H, Tropp HT. Power output

and propulsion technique in wheelchair driving. Int

J Rehabil Res 1991;14(1):76-81.

Sears HH, Shaperman J. Proportional myoelectric

hand control: an evaluation. Am J Phys Med

Rehabil 1991 Feb;70(1):20-8.

Shields RK, Cook TM. Lumbar support thickness:

effect on seated buttock pressure in individuals with

and without spinal cord injury. Phys Ther 1992

Mar;72(3):218-26.

Shirazi-Adl A. Finite element stress analysis of a

push-out test. Part 1: Fixed interface using stress

compatible elements. J Biomech Eng 1992 Feb;

114(1):111-8.

Smirnova LM, Kozlov AA, Iankovskii VM, Rozhkov

AV. [Thermovision in the evaluation of the

quality of fitting of acceptable intake sockets of

shin prostheses]. Ortop Travmatol Protez 1990

Sep;(9):14-6. (Rus).

Smith HG. Technical note: latex bonding of model

build-ups. J Prosthet Orthot 1992 Apr;4(3):175.

Solomonow M, Baratta R, Hirokawa S, Rightor N,

Walker W, Beaudette P, Shoji H, D’Ambrosia R.

The RGO Generation II: muscle stimulation

powered orthosis as a practical walking system for

thoracic paraplegics [published erratum appears in

Orthopedics 1989 Dec;12(12):1522]. Orthopedics

1989 Oct;12(10):1309-15.

Staheli LT. Lower positional deformity in infants and

children: a review. J Pediatr Orthop 1990 Jul-Aug;

10(4):559-63.

Stam HJ. The geriatric prosthesis as metaphor: a

clinical note. Prosthet Orthot Int 1992 Aug;16(2):

137-9.

Standards of wheelchairs [letter]. BMJ 1989 May 20;

298(6684):1382-3.

Stewart C. Living aids: wheelchair evaluation and

prescription. Nurs Stand 1992 Sep 23-29;7(1):

27-30.

Stewart CP, Carus DA, Kerr G. Development of a

universal wheelchair narrower. Prosthet Orthot Int

1989 Apr;13(1):39-41.

Stout JD, Bandy P, Feller N, Stroup KB, Bull MJ.

Transportation resources for pediatric orthopaedic

clients. Orthop Nurs 1992 Jul-Aug;11(4):26-30.

Strohkendl H. Classification for wheelchair table

tennis. Palaestra 1989 Spring;5(3):49-52.

Thompson NP. Three-wheeled walkers [letter]. J Am

Geriatr Soc 1992 Jul;40(7):735-6.

University of Strathclyde, National Centre for Training

and Education in Prosthetics and Orthotics, RECAL

Information Services. RECAL thesaurus:

prosthetics, orthotics, and rehabilitation. Glasgow

(UK): The University; 1988. 209 p.

User experience network. Safe use of supplemental

oxygen with powered wheelchairs. Health Devices

1992 Aug;21(8):291.

van Ross E. Pushchairs. Prosthet Orthot Int 1991

Apr;15(1):46-50.

van Vliet P, Wing AM. A new challenge--robotics in

the rehabilitation of the neurologically motor

impaired. Phys Ther 1991 Jan;71(1):39-47.

Watanabe H. [Knowledge of lower extremity

orthosis]. Nippon Seikeigeka Gakkai Zasshi 1991

Oct;65(10):997-1002. (Jpn).

Which orthosis? [editorial]. Lancet 1989 Sep 23;

2(8665):721.

Wilson AB Jr. Wheelchairs: a prescription guide. 2nd

ed. New York: Demos Publications; 1992. 96 p.

Wirta RW, Mason R, Calvo K, Golbranson FL. Effect

on gait using various prosthetic ankle-foot devices.

J Rehabil Res Dev 1991 Spring;28(2):13-24.

Wright DL, Kemp TL. The dual-task methodology

and assessing the attentional demands of ambulation

with walking devices. Phys Ther 1992 Apr;72(4):

306-12; discussion 313-5.

Yrjonen T. Prognosis in Perthes disease after

noncontainment treatment. 106 hips followed for

28-47 years. Acta Orthop Scand 1992 Oct;63(5):

523-6.

ECONOMIC ISSUES

American Orthotic and Prosthetic Association. The

illustrated guide to orthotics and prosthetics: O &

P’s comprehensive guide to Medicare codes and

reimbursement. Alexandria (VA): The Association;

1992- .

Banyard R. Artificial limb and appliance centres.

Health Manpow Manage 1989 Jul;15(1):13-5.

Beske F. Gutachten uber die nach dem Gesundheits-

Reform-Gesetz vorgeschriebene festbetragsregelung

fur rollstuhle. Kiel (Germany): Institut fur

Gesundheits-System-Forschung; 1989. 72 p. (Ger).

Belkin L. How rationing will really work. Med Econ

1993 Mar 22;70(6):160-1, 165-8, 171-2 passim.

Boyer JJ. Are tenodesis splints cost efficient [letter]?

Am J Occup Ther 1990 Sep;44(9):857-8.

Campbell GS, Gow D, Hooper G. Low cost cosmetic

hand prostheses. J Hand Surg [Br] 1992 Apr;17(2):

201-3.

Carne P. Nonsurgical treatment of ankle sprains using

the modified Sarmiento brace. Am J Sports Med

1989 Mar-Apr;17(2):253-7.

Cobb JW. Models for delivery of prosthetic services

to geriatric patients. Top Geriatr Rehabil 1992 Sep;

8(1):59-63.

Cock J. Life inside the shell: a needs survey of spinal

cord-injured wheelchair users in a black South

African township. Disabil Handicap Soc 1989;4(1):

3-20.

Corporate commitment: 10th National Veterans

Wheelchair Games. Paraplegia News 1990 May;

44(5):50-6.

Cotler HB, Cotler JM, Alden ME, Sparks G, Biggs CA.

The medical and economic impact of closed

cervical spine dislocations. Spine 1990 Jun;15(6):

448-52.

Deacon S. Wheelchair lifts: proper selection assures

user of a long-term investment. Contin Care 1991

Apr;10(4):30-1.

Djeddou N. Experience of treating scoliosis at the

Azur Plage medical centre. Ann Readapt Med

Phys 1989 Aug;32(4):321-30.

Durance JP, Warren WK, Kerbel DB, Stroud TW.

Rehabilitation of below-knee amputees: factors

influencing outcome and costs in three programmes.

Int Disabil Stud 1989 Jul-Sep;11(3):127-32.

Ennals S. Understanding benefits. Mobility allowance.

BMJ 1991 Feb 2;302(6771):284-5.

Garrett RE, Hartridge M, Seeger BR. Comparative

evaluation of chargers for wheelchair gel cell

batteries. Australas Phys Eng Sci Med 1990 Sep;

13(3):148-56.

Hardy G. Tapping new revenues. How to bill

Medicare Part-B directly for prosthetics and

orthotics products. Contemp Longterm Care 1992

Jan;15(1):30, 32.

Hartridge M, Seeger BR. International wheelchair

standards: a study of costs and benefits. Assist

Technol 1990;2(4):117-23.

Henke C. Funding to make the wheels turn round.

1990 wheelchair guide. Except Parent 1990 Mar;

20(2):8, 10-2.

Henke C. The mobility decision. 1990 wheelchair

guide. Except Parent 1990 Mar;20(2):5-8.

Henke C. Power to the people. Rx Home Care 1989

Jul;11(7):26-9.

Jones LE. Prosthetic limb use in Australia 1981-1985

under the Free Limb Scheme. Prosthet Orthot Int

1989 Aug;13(2):76-81.

Jones LE, Lipson A. The care of the limb deficient

child in Australia. Prosthet Orthot Int 1991 Aug;

15(2):140-2.

Katzmann RA. Transportation policy. Milbank Q

1991;69 Suppl 1-2:214-37.

Kejlaa GH. The social and economic outcome after

upper limb amputation. Prosthet Orthot Int 1992

Apr;16(1):25-31.

Kijkusol D. Simplified, low cost below-knee

prosthesis. Prosthet Orthot Int 1986 Aug;10(2):

96-8.

Lasudry N, Warzee G, Van Rolleghem J. [Image

processing and use of CAD in prosthesis

manufacturing]. Onde Electr 1991 Jul-Aug;

71(4):45-8 (Fre).

Little J. Taking control of purchasing a wheelchair:

tips for parents about mobility equipment. Except

Parent 1991 Mar;21(2):36-8, 46, 50.

Luebben AJ, Young LJ. Retrofitting: an unnecessary

expense. In: Technology for the future decade.

RESNA ’89: proceedings of the 12th annual

conference: 1989 Jun 25-30; New Orleans, LA.

Washington (DC): RESNA Press; 1989. p. 304-5.

Maxwell WR. Introduction or artificial limbs scheme

[letter]. Med J Aust 1990 Nov 5;153(9):567-8.

McClenneghen A. Reimbursing power wheelchairs:

what are the options? Contin Care 1990 Feb;9(2):

14-16, 33.

Medicare program; carrier jurisdiction for claims for

durable medical equipment, prosthetics, orthotics

and supplies (DMEPOS) and other issues involving

suppliers, and criteria and standards for evaluating

regional DMEPOS carriers--HCFA. Final rule with

comment period. Fed Regist 1992 Jun 18;57(118):

27290-308.

Medicare program; payment for customized

wheelchairs--HCFA. Interim final rule with

comment period. Fed Regist 1991 Dec 20;56(245):

65995-8.

Medicare program; payment for durable medical

equipment and orthotic, and prosthetic devices--

HCFA. Interim final rule with comment period.

Fed Regist 1992 Dec 7;57(235):57675-92.

Mohan D, Sethi PK, Ravi R. Mathematical modelling

and field trials of an inexpensive endoskeletal

above-knee prosthesis. Prosthet Orthot Int 1992

Aug;16(2):118-23.

Nader M. [Up-to-date supply of prostheses of the

lower and upper extremities. Possibilities from the

viewpoint of the prosthesis fitting manufacturer].

Dtsch Krankenpflegez 1989 Mar;42(3):154-9. (Ger).

Norrgard L, Crimaldi E, Wylde M. AARP product

report on manual wheelchairs. Washington (DC):

American Association of Retired Persons; 1992.

Oberg K. Cost-benefits in orthopaedic technology by

using thermoplastics in developing countries.

Prosthet Orthot Int 1991 Apr;15(1):18-22.

Ozyalcin H, Sesli E. Temporary prosthetic fitting for

below-knee amputation. Prosthet Orthot Int 1989

Aug;13(2):86-9.

Petrillo DK, Wooden VM, Kraft-Fine C, Siegal SG,

Cioschi HM. How to equip the quadriplegic

patient. Contin Care 1990 Nov;9(11):24-8, 35.

Phillips CA. Functional electrical stimulation and

lower extremity bracing for ambulation exercise of

the spinal cord injured individual: a medically

prescribed system. Phys Ther 1989 Oct;69(10):

842-9.

Plesko L. Heavy on the lightweights. Rx Homecare

1989 May;11(5):41-3.

Potter BE, Wallace WA. Crutches. BMJ 1990 Nov 3;

301(6759):1037-9.

Product comparison and evaluation: canes, crutches,

and walkers. Washington (DC): National

Rehabilitation Hospital, Rehabilitation Engineering

Center; 1990 Jun.

Product comparison and evaluation: scooters.

Washington (DC): National Rehabilitation Hospital,

Rehabilitation Engineering Center; 1991 Jun. 91 p.

Pullin G, Gammie A. Current capabilities of

rehabilitation robots. J Biomed Eng 1991 May;

13(3):215-6.

Ravaud JF, Madiot B, Ville I. Discrimination towards

disabled people seeking employment. Soc Sci Med

1992 Oct;35(8):951-8.

Rechargeable, deep-cycle, lead-acid batteries for

powered wheelchair and scooter users. Health

Devices 1991 Dec;20(12):474-94.

Sharma VP. The care of the limb deficient child in

India. Prosthet Orthot Int 1991 Aug;15(2):143-5.

Topper AK, Fernie GR. An evaluation of computer

aided design of below-knee prosthetic sockets.

Prosthet Orthot Int 1990 Dec;14(3):136-42.

Unger T. Medicare cutoff for seat lift chairs? Rx

Homecare 1989 May;11(5):11.

Vos R, Goslett N, van Hoogstraten A, Fourie P.

Albatros: an innovative low-cost wheelchair.

Disabil Rehabil 1993 Jan-Mar;15(1):44-6.

Vossberg A. The choice of prosthetic and orthotic

technique for less developed countries: analysis and

perspectives in Colombia. Prosthet Orthot Int 1988

Aug;12(2):96-100.

Wheelchair navigation: a computer-aided primer.

Health Care (Don Mills) 1989 Nov-Dec;31(9):11-2,

14.

Whittle MW, Cochrane GM, Chase AP, Copping AV,

Jefferson RJ, Staples DJ, Fenn PT, Thomas DC.

A comparative trial of two walking systems for

paralysed people. Paraplegia 1991 Feb;29(2):

97-102.

Wieck CA. Funding of assistive technology for

individuals with disabilities [audiocassette].

Washington (DC): RESNA; 1990. 6 audiocassettes:

630 min.

PSYCHOSOCIAL ISSUES

Asken MJ. Sport psychology and the physically

disabled athlete: interview with Michael D.

Goodling, OTR/L. Sport Psychol 1989 Jun;3(2):

166-76.

Atchusin WM. Psychological impact of traumatic leg

amputation [dissertation]. Cincinnati (OH): Union

Institute; 1989. 297 p.

Bailey DM, DeFelice T. Evaluating movement for

switch use in an adult with severe physical and

cognitive impairments. Am J Occup Ther 1991

Jan;45(1):76-9.

Bender LH. Part 2. Osteogenesis imperfecta. Orthop

Nurs 1991 Jul-Aug;10(4):23-32.

Borden W. Narrative perspectives in psychosocial

intervention following adverse life events. Social

Work 1992 Mar;37(2):135-41.

Bowser MS. Giving up the ghost: a review of

phantom limb phenomena. J Rehabil 1991 Jul-Sep;

57(3):55-62.

Brasile FM. Wheelchair sports: a new perspective on

integration. Adapt Phys Activ Q 1990 Jan;7(1):

3-11.

Brasile FM, Hedrick BN. A comparison of

participation incentives between adult and youth

wheelchair basketball players. Palaestra 1991

Summer;7(4):40-6.

Brasile FM, Kleiber DA, Harnisch D. Analysis of

participation incentives among athletes with and

without disabilities. Ther Recreat J 1991 1st Quart;

25(1):18-33.

Broadhurst C. Adjusting to amputation. Nurs Times

1989 Oct 25-31;85(43):55-7.

Brodzka WK, Thornhill HL, Zarapkar SE, Malloy JA,

Weiss L. Long-term function of persons with

atherosclerotic bilateral below-knee amputation

living in the inner city. Arch Phys Med Rehabil

1990 Oct;71(11):895-900.

Brooks NA. Users’ responses to assistive devices for

physical disability. Soc Sci Med 1991;32(12):

1417-24.

Bruce J. The function and operation of a parent

support association. Prosthet Orthot Int 1991 Aug;

15(2):160-1.

Butler DJ, Turkal NW, Seidl JJ. Amputation:

preoperative psychological preparation. J Am

Board Fam Pract 1992 Jan-Feb;5(1):69-73.

Cammack S. Integration of pediatric amputees and

their parents with an adult amputee support group.

J Assoc Child Prosthet Orthot Clin 1989 Spring;

24(1):6-7.

Campbell F, Ross F. Disability: dealing with wheels.

Community Outlook 1990 Oct:23-6.

Chan KM, Tan ES. Use of lower limb prosthesis

among elderly amputees. Ann Acad Med

Singapore 1990 Nov;19(6):811-6.

Chase J, Bailey DM. Evaluating the potential for

powered mobility. Am J Occup Ther 1990 Dec;

44(12):1125-9.

Cock J. Life inside the shell: a needs survey of spinal

cord-injured wheelchair users in a black South

African township. Disabil Handicap Soc 1989;4(1):

3-20.

Cox RH, Davis RW. Psychological skills of elite

wheelchair athletes. Palaestra 1992 Spring;8(3):

16-21.

Crocker P, Bouffard M. Coping and participation of

physically disabled adults in physical activity.

CAHPER J 1990 Nov-Dec;56(6):28-33.

Dai S. [Psychology of amputation in carcinoma

patients with vital life change events]. Chung Hua

Hu Li Tsa Chih 1990 Apr;25(4):175-6. (Chi).

Datta D, Nair PN, Payne J. Outcome of prosthetic

management of bilateral lower-limb amputees.

Disabil Rehabil 1992 Apr-Jun;14(2):98-102.

Dawson W. Spinal cord injury: a view from behind

the wheel. N C Med J 1990 Aug;51(8):397-9.

Derhaag MMC, Schoorl PM, Derhaag PJF.

Personality development in one handed children

treated with a myoelectrically controlled prosthesis.

J Rehabil 1990 Jul-Sep;56(3):25-9.

Dickstein R, Halevy E, Meir H, Bigon R. Use of the

early walking aid as a geriatric prosthesis in the

community. J Prosthet Orthot 1989 Jan;1(2):110-5.

Emery RP. [Amputation: unnecessary grief in

children]. Rev Infirm 1990 Nov;40(17):45-7. (Fre).

Fewster C. Wheelchair apartheid. Nurs Times 1990

Jun 6-12;86(23):49-51.

Frank B, Lorenzoni E. Experiences of phantom limb

sensations in dreams. Psychopathology 1989;22(4):

182-7.

Garcia-Viniegras CR, Rial Blanco N, Molina Martinez

O, Salazar Fernandez N, Almeida Hernandez L,

Herrera Rodriguez G. [The psychosocial

characteristics of the patient who has undergone

amputation for vascular reasons. The work, family

and sex life aspects]. Angiologia 1991 Jan-Feb;

43(1):26-9. (Spa).

Gauden P. Cancer nursing: learning to cope with an

artificial limb. Nursing (Lond) 1990

Aug 23-Sep 12;4(17):16-9.

Greenwood CM, Dzewaltowski DA. Self efficacy and

psychological well being of wheelchair tennis

participants and wheelchair nontennis participants.

Adapt Phys Activ Q 1990;7(1):12-21.

Hanspal RS, Fisher K. Assessment of cognitive and

psychomotor function and rehabilitation of elderly

people with prostheses [published erratum appears

in BMJ 1991 May 18;302(6786):1182]. BMJ 1991

Apr 20;302(6782):940.

Hirschhorn BE. The relationship among school

accessibility, student locus-of-control and the

satisfaction of New York City high school

wheelchair users [dissertation]. New York: New

York University; 1992. 108 p.

Horvat M, Roswal G, Jacobs D, Gaunt S. Selected

psychological comparisons of able bodied and

disabled athletes. Phys Educ 1989;46:202-8.

Huber JH. Equity and safety in sport: a case study.

Palaestra 1989 Spring;5(3):64.

Hunt SB. Relationships between meanings of work

and meanings of leisure among wheelchair

(basketball) athletes. Annu Ther Recreat 1991;

2:69-77.

Hunter GA. Clinical comment: psychological factors

leading to amputations in adults. Prosthet Orthot

Clin 1992 Dec;16(3):196-9.

Interacting with people in wheelchairs [videocassette].

[Los Angeles]: Hospital Satellite Network, Vantage

Point Productions; 1987. 1 videocassette: 29 min.,

sound, black & white with color, 1/2 in.

Jacobs D. A comparison between the psychological

profiles of wheelchair athletes, wheelchair

nonathletes, and able bodied athletes. Palaestra

1989 Spring;5(3):12.

Jacobs DP, Roswal GM, Horuat MA, Gorman DR. A

comparison between the psychological profiles of

wheelchair athletes, wheelchair nonathletes, and

able bodied athletes. In: Doll-Tepper G, Dahms C,

Doll B, von Selzam H, eds. Adapted physical

activity: an interdisciplinary approach. Proceedings

of the 7th International Symposium; 1989 Jun;

Berlin. New York: Springer-Verlag; 1990. p. 75-9.

James WV, McColl I. The way ahead for the

amputee. Ann R Coll Surg Engl 1991 May;

73(3):176-7.

Kahanovitz N, Weiser S. The psychological impact of

idiopathic scoliosis on the adolescent female. A

preliminary multi-center study. Spine 1989 May;

14(5):483-5.

Kejlaa G. [The course after amputation of upper

extremities with special reference to the use of

prostheses and social conditions]. Ugeskr Laeger

1991 Nov 18;153(47):3322-6. (Dan).

Kejlaa GH. The social and economic outcome after

upper limb amputation. Prosthet Orthot Int 1992

Apr;16(1):25-31.

Knaus RL. Physiological and psychological benefits

of exercise for athletes with disabilities: an

interview with Gerorge Murray. J Osteopath Sports

Med 1989 Nov;3(4):25-7.

Knudson GA. The effect of a wheelchair sports

presentation on modifying attitudes of junior high

school students toward physically disabled persons

[master’s thesis]. Vancouver (BC): University of

British Columbia; 1990.

Kotova VP, Vasil’eva IuI, Vasil’ev SV. [Socio-

medical characteristics of patients with post-

amputation defects of the upper limbs]. Ortop

Travmatol Protez 1989 Jun;(6):57-60. (Rus).

Kullmann L, Laszlo G, Molnar F. [Results of

amputation and rehabilitation]. Orv Hetil 1991

Mar 3;132(9):459-63. (Hun).

Lacroix R, Melzack R, Smith D, Mitchell N. Multiple

phantom limbs in a child. Cortex 1992 Sep;28(3):

503-7.

Leonard JA Jr, Esquenazi A, Fisher SV, Hicks JE,

Meier RH 3d, Nelson VS. Prosthetics, orthotics,

and assistive devices. 1. General concepts. Arch

Phys Med Rehabil 1989 May;70(5-S):S195-201.

Lewis K. Inglis House: a wheelchair community.

J Long Term Care Adm 1992 Spring;20(1):8, 10-1.

Lindsay JA. Rehabilitation of amputees [letter]. BMJ

1992 Mar 28;304(6830):842.

MacLean WE Jr, Green NE, Pierre CB, Ray DC.

Stress and coping with scoliosis: psychological

effects on adolescents and their families. J Pediatr

Orthop 1989 May-Jun;9(3):257-61.

Mader B, Hart LA, Bergin B. Social

acknowledegments for children with disabilities:

effects of service dogs. Child Dev 1989 Dec;60(6):

1529-34.

Mason KJ. Congenital orthopedic anomalies and their

impact on the family. Nurs Clin North Am 1991

Mar;26(1):1-16.

McDonnell PM, Scott RN, Dickison J, Theriault RA,

Wood B. Do artificial limbs become part of the

user? New evidence. J Rehabil Res Dev 1989

Spring;26(2):17-24.

Medhat A, Huber PM, Medhat MA. Factors that

influence the level of activities in persons with

lower extremity amputation. Rehabil Nurs 1990

Jan-Feb;15(1):13-8.

Michaels JA. The selection of amputation level: an

approach using decision analysis. Eur J Vasc Surg

1991;5(4):451-7.

Muthu S. Rehabilitation of amputees [letter]. BMJ

1992 Mar 28;304(6830):842.

Nemytin IUV, Kudriavtsev BP, Mironov GM,

Konovalov VA. [The rehabilitation of wounded

patients with limb stumps]. Voen Med Zh 1992

Apr-May;(4-5):54-6. (Rus).

Nicholas JJ, Robinson LR, Schulz R, Blair C, Aliota R,

Hairston G. Problems experienced and perceived

by prosthetic patients. J Prosthet Orthot 1993 Jan;

5(1):16-9.

Nielsen CC. A survey of amputees: functional level

and life satisfaction, information needs, and the

prosthetist’s rolee. J Prosthet Orthot 1991 Spring;

3(3):125-9.

Nissen SJ, Newman WP. Factors influencing

reintegration to normal living after amputation.

Arch Phys Med Rehabil 1992 Jun;73(6):548-51.

North B, North C, Lee JL. Living in a halo [published

erratum appears in Am J Nurs 1992 May;92(5):27].

Am J Nurs 1992 Apr;92(4):54-6.

Novotny MP. Psychosocial issues affecting

rehabilitation. Phys Med Rehabil Clin North Am

1991 May;2(2):373-93.

Olson B, Ustanko L. Self-care needs of patients in the

halo brace [published erratum appears in Orthop

Nurs 1990 May-Jun;9(3):90]. Orthop Nurs 1990

Jan-Feb;9(1):27-33, 52.

Olson B, Ustanko L, Warner S. The patient in a halo

brace: striving for normalcy in body image and

self-concept. Orthop Nurs 1991 Jan-Feb;10(1):

44-50.

Paulsen P, French R, Sherrill C. Comparison of mood

states of college able-bodied and wheelchair

basketball players. Percept Mot Skills 1991 Oct;

73(2):396-8.

Paulsen P, French R, Sherrill C. Comparison of

wheelchair athletes and nonathletes on selected

mood states. Percept Mot Skills 1990 Dec;

71(3 Pt 2):1160-2.

Pechman K. Rehabilitation: the diabetic amputee

[videocassette]. Secaucus (NJ): Network for

Continuing Medical Education; 1991. 1

videocassette: 32 min., sound, color, 1/2 in. (NCME

telecourse; no. 607). Accompanied by: 1 guide.

Penington G, Warmington S, Hull S, Freijah N.

Rehabilitation of lower limb amputees and some

implications for surgical management. Aust N Z J

Surg 1992 Oct;62(10):774-9.

Pohjolainen T, Alaranta H, Karkkainen M. Prosthetic

use and functional and social outcome following

major lower limb amputation. Prosthet Orthot Int

1990 Aug;14(2):75-9.

Psychology of limb loss [letter]. BMJ 1989 Dec 16;

299(6714):1526-7.

Racy JC. Psychological adaptation to amputation. In:

Bowker JH, Michael JW, eds. Atlas of limb

prosthetics: surgical, prosthetic, and rehabilitation

principles. St. Louis: Mosby Year Book; 1992.

p. 707-16.

Ragnarsson KT. Prescription considerations and a

comparison of conventional and lightweight

wheelchairs. J Rehabil Res Dev Clin Suppl 1990;

(2):8-16.

Ravaud JF, Madiot B, Ville I. Discrimination towards

disabled people seeking employment. Soc Sci Med

1992 Oct;35(8):951-8.

Raven KA, Brugger CA. Hemicorporectomy: a

nursing challenge. Orthop Nurs 1992 Mar-Apr;

11(2):73-8.

Reidy K, Crozier KS. Refusing treatment during

rehabilitation. A model for conflict resolution.

West J Med 1991 May;154(5):622-3.

Roeschlein RA, Domholdt E. Factors related to

successful upper extremity prosthetic use. Prosthet

Orthot Int 1989 Apr;13(1):14-8.

Rudolphi D. Limb loss in the elderly peripheral

vascular disease patient. J Vasc Nurs 1992 Sep;

10(3):8-13;

Rybarczyk BD, Nyenhuis DL, Nicholas JJ, Schulz R,

Alioto RJ, Blair C. Social discomfort and

depression in a sample of adults with leg

amputations. Arch Phys Med Rehabil 1992 Dec;

73(12):1169-73.

Sabolich J. Your’re not alone. Oklahoma City (OK):

Sabolich Prosthetic and Research Center; 1991.

356 p.

Saylor DE. Pastoral care of the rehabilitation patient.

Rehabil Nurs 1991 May-Jun;16(3):138-40.

Setoguchi Y. The management of the limb deficient

child and its family. Prosthet Orthot Int 1991 Aug;

15(2):78-81.

Sharma VP. The care of the limb deficient child in

India. Prosthet Orthot Int 1991 Aug;15(2):143-5.

Shell J. Sexual rehabilitation of the amputee. Oncol

Nurs Forum 1989 Jan-Feb;16(1):105-6.

Sherrill C, Silliman L, Gench B, Hinson M. Self-

actualisation of elite wheelchair athletes. Paraplegia

1990 May;28(4):252-60.

Silliman LM, Sherrill C. Self actualization of

wheelchair athletes. Clin Kinesiol 1989 Jul-Sep;

43(3):77-82.

Spencer JC. An ethnographic study of independent

living alternatives. Am J Occup Ther 1991 Mar;

45(3):243-51.

Subbarao JV. Walking after spinal cord injury. Goal

or wish? West J Med 1991 May;154(5):612-4.

Svoboda J. Psychosocial considerations in pediatrics:

use of amputee dolls. J Prosthet Orthot 1992 Jul;

4(4):207-12.

Swagman A. Caring for limb-deficient children and

their families. MCN Am J Matern Child Nurs

1986 Jan-Feb;11(1):46-52.

Swagman A, et al. Family perceptions regarding

conversion surgery experiences. J Assoc Child

Prosthet Orthot Clin 1991 Spring-1990 Winter;

25(3-4):50-5.

Szeinberg-Arazi D, Heim M, Nadvorna H, Ner IZ,

Szeinberg A, Azaria A. A functional and

psychosocial assessment of patients with post-

Sudeck atrophy amputation. Arch Phys Med

Rehabil 1993 Apr;74(4):416-8.

Talbot D. Review article: helping the limb-deficient

child deal with social reactions to physical

differences. J Assoc Child Prosthet Orthot Clin

1991 Spring-1990 Winter;25(3-4):76-80.

Tebbi CK, Petrilli AS, Richards ME. Adjustment to

amputation among adolescent oncology patients.

Am J Pediatr Hematol Oncol 1989 Fall;11(3):

276-80.

Tyc VL. Psychosocial adaptation of children and

adolescents with limb deficiencies: A review. Clin

Psychol Rev 1992;12(3):275-91.

The use of upper extremity prostheses [videocassette].

[United States]: Art Heinze; 1988. 1 videocassette:

49 min., sound, color, 1/2 in.

Varni JW, Rubenfeld LA, Talbot D, Setoguchi Y.

Determinants of self esteem in children with

congenital/acquired limb deficiencies. J Dev Behav

Pediatr 1989 Feb;10(1):13-6.

Varni JW, Rubenfeld LA, Talbot D, Setoguchi Y.

Stress, social support, and depressive

symptomatology in children with

congenital/acquired limb deficiencies. J Pediatr

Psychol 1989 Dec;14(4):515-30.

Varni JW, Setoguchi Y. Correlates of perceived

physical appearance in children with

congenital/acquired limb deficiencies. J Dev Behav

Pediatr 1991 Jun;12(3):171-6.

Varni JW, Setoguchi Y. Psychosocial factors in the

management of children with limb deficiencies.

Phys Med Rehabil Clin North Am 1991 May;2(2):

395-404.

Varni JW, Setoguchi Y. Self-perceived physical

appearance in children and adolescents with

congenital/acquired limb deficiencies. J Assoc

Child Prosthet Orthot Clin 1991 Fall;26(2):56-60.

Varni JW, Setoguchi Y, Rappaport LR, Talbot D.

Effects of stress, social support, and self-esteem on

depression in children with limb deficiencies. Arch

Phys Med Rehabil 1991 Dec;72(13):1053-8.

Varni JW, Setoguchi Y, Rappaport LR, Talbot D.

Psychological adjustment and perceived social

support in children with congenital/acquired limb

deficiencies. J Behav Med 1992 Feb;15(1):31-44.

Warren CG. Powered mobility and its implications.

J Rehabil Res Dev Clin Suppl 1990;(2):74-85.

Watts HG. Differences between a child and an adult

amputee. Contemp Orthop 1992 Jan;24(1):30-40.

Wilson AB Jr. Limb prosthetics. New York: Demos;

1989. Functional capacities of amputees and

vocational rehabilitation; p. 105-12.

Woodhouse L. Psychosocial aspects of adjustment to

limb loss [dissertation]. Belfast (UK): Queen’s

University of Belfast; 1990.

Yetzer EA, Winfree M, Scaglione C. An amputee

support group. Rehabil Nurs 1989 May-Jun;14(3):

141-2.

LEGAL & ETHICAL ISSUES

Beske F. Gutachten uber die nach dem Gesundheits-

Reform-Gesetz vorgeschriebene festbetragsregelung

fur rollstuhle. Kiel (Germany): Institut fur

Gesundheits-System-Forschung; 1989. 72 p. (Ger).

Christel P. The regulation of orthopaedic devices in

France. J Biomed Mater Res 1989 Apr;

23(A1 Suppl):3-7.

Curry LC, Gibson LY. Congenital hip dislocation: the

importance of early detection and comprehensive

treatment. Nurse Pract 1992 May;17(5):49-55.

DiGaudio KM, Msall ME. Guidelines for safe

transportation of children in wheelchairs. Am J Dis

Child 1991 Jun;145(6):653-5.

Fewster C. Wheelchair apartheid. Nurs Times 1990

Jun 6-12;86(23):49-51.

Health care legislation, oversight of health facility

security matters, and VA prosthetics and special

disability programs : hearing before the Committee

on Veterans’ Affairs, United States Senate, One

Hundred Second Congress, first session, on S. 127

(Title II, parts A, B, and C), S. 327, and S. 869,

April 23, 1991. Washington (DC): Government

Printing Office; 1992. 244 p.

Huber JH. Equity and safety in sport: a case study.

Palaestra 1989 Spring;5(3):64.

Katzmann RA. Transportation policy. Milbank Q

1991;69 Suppl 1-2:214-37.

Korzh AA, Iaremenko DA. [What is necessary for

raising the quality of prosthetic and orthopedic

service to the community?]. Ortop Travmatol

Protez 1989 Apr;(4):53-7. (Rus).

Kramer RA. Access to care for children and

adolescents with disabilities. Conn Med 1990 Aug;

54(8):428-30.

Maher F. Buses must have wheelchair access.

PA Law J Rep 1989 Feb 20;12:1.

Marcotte P. Law student sues her school; wants more

accessibility with her wheelchair. ABA J 1989

Mar;75:26-7.

Maxwell WR. Introduction or artificial limbs scheme

[letter]. Med J Aust 1990 Nov 5;153(9):567-8.

Medicare program; carrier jurisdiction for claims for

durable medical equipment, prosthetics, orthotics

and supplies (DMEPOS) and other issues involving

suppliers, and criteria and standards for evaluating

regional DMEPOS carriers--HCFA. Final rule with

comment period. Fed Regist 1992 Jun 18;57(118):

27290-308.

Medicare program; payment for customized

wheelchairs--HCFA. Interim final rule with

comment period. Fed Regist 1991 Dec 20;56(245):

65995-8.

Medicare program; payment for durable medical

equipment and orthotic, and prosthetic devices--

HCFA. Interim final rule with comment period.

Fed Regist 1992 Dec 7;57(235):57675-92.

Milota C, et al. Count me in: resource manual on

disabilities. Minneapolis: PACER Center; 1991.

121 p. Available from: ERIC, Arlington, VA.;

ED341218.

Reidy K, Crozier KS. Refusing treatment during

rehabilitation. A model for conflict resolution.

West J Med 1991 May;154(5):622-3.

Ross CT. Illinois: court orders more study on

handicapped athlete’s ability to compete. Sports

Courts 1990;11(1):4-5.

Samborn R. No flood of ADA suits - yet. (Americans

with Disabilities Act). Natl Law J 1992 Mar 16;

14(28):3.

United States Congress, Senate, Committee on

Veterans’ Affairs. Oversight on VA prosthetics

and special disabilities programs: hearing 101-1043;

before the Committee on Veterans’ Affairs, United

States Senate, One Hundred First Congress, second

session, June 7, 1990. Washington (DC):

Government Printing Office; 1990. 398 p.

PATIENT EDUCATION,

COMPLIANCE, & SATISFACTION

Alison A, Mackinnon SE. Evaluation of digital

prostheses. J Hand Surg [Am] 1992 Sep;17(5):

923-6.

Artificial body parts [videocassette]. Princeton (NJ):

Films for the Humanities; 1989. 1 videocassette: 26

min., sound, color, 1/2 in.

Barker L, et al. Improved positioning for enhanced

development: case study. J Assoc Child Prosthet

Orthot Clin 1991 Spring-1990 Winter;25(3-4):61-5.

Basford JR, Rhetta HL, Schleusner MP. Clinical

evaluation of the rocker bottom crutch.

Orthopedics 1990 Apr;13(4):457-60.

Behrman AL. Factors in functional assessment.

J Rehabil Res Dev Clin Suppl 1990;(2):17-30.

Bender LH. Part 2. Osteogenesis imperfecta. Orthop

Nurs 1991 Jul-Aug;10(4):23-32.

Blocker WP Jr. How to help your patient choose the

right wheelchair. Postgrad Med 1990 Oct;88(5):

243, 246, 251-2.

Brennan MJ, Hayes S, Watson JT. Orthotics versus

casting in the management of lower extremity

sprains, fractures, and other common orthopaedic

problems. Contemp Orthop 1991 Jun;22(6):

683-713.

Bruce J. The function and operation of a parent

support association. Prosthet Orthot Int 1991 Aug;

15(2):160-1.

Bull MJ, Stroup KB, Feller N. Information needs of

parents of a child in a Pavlik harness [letter].

Orthop Nurs 1988 Sep-Oct;7(5):12.

Butler DJ, Turkal NW, Seidl JJ. Amputation:

preoperative psychological preparation. J Am

Board Fam Pract 1992 Jan-Feb;5(1):69-73.

Calmels P, Pallot-Prades B, Alexandre C, Minaire P.

[The reeducation of the patient with rheumatoid

polyarthritis]. Servir 1989 Sep-Oct;37(5):306-9.

(Por).

Cammack S. Integration of pediatric amputees and

their parents with an adult amputee support group.

J Assoc Child Prosthet Orthot Clin 1989 Spring;

24(1):6-7.

Choosing a wheelchair system. J Rehabil Res Dev Clin

Suppl 1990;(2):1-116.

Cobb JW. Models for delivery of prosthetic services

to geriatric patients. Top Geriatr Rehabil 1992 Sep;

8(1):59-63.

Corbett D. Information needs of parents of a child in

a Pavlik harness. Orthop Nurs 1988 Mar-Apr;7(2):

20-3.

Corwin D, Miller CA. Get your patient off on the

right foot. RN 1990 Nov;53(11):44-6.

Cotter DH. Artificial limbs. Br Med J (Clin Res Ed)

1988 Apr 23;296(6630):1185-7.

Cullen C, Flowers W. A robust, accurate load cell for

use in training above-knee amputees. J Biomech

Eng 1990 Feb;112(1):103-5.

Curry LC, Gibson LY. Congenital hip dislocation: the

importance of early detection and comprehensive

treatment. Nurse Pract 1992 May;17(5):49-55.

Cutcliffe N, Prugger A. Adapted clothing for patients

in halo traction. Can J Occup Ther 1990 Feb;

57(1):39-42.

DeValles JH. Crutch walking and discharge

instructions [letter]. J Emerg Nurs 1989 Mar-Apr;

15(2 Pt 1):74-5.

Dijkers MP, deBear PC, Erlandson RF, Kristy K, Geer

DM, Nichols A. Patient and staff acceptance of

robotic technology in occupational therapy: a pilot

study. J Rehabil Res Dev 1991 Spring;28(2):33-44.

Dunst RM. Legg-Calv�-Perthes disease. Orthop Nurs

1990 Mar-Apr;9(2):18-27.

Edelstein JE. Preprosthetic management of patients

with lower or upper limb amputation. Phys Med

Rehabil Clin North Am 1991 May;2(2):285-97.

Feinberg J. Effect of the arthritis health professional

on compliance with use of resting hand splints by

patients with rheumatoid arthritis. Arthritis Care

Res 1992 Mar;5(1):17-23.

Ferguson H, Raskowsky M, Blake RL, Denton JA.

TL-61 versus Rohadur orthoses in heel spur

syndrome. J Am Podiatr Med Assoc 1991 Aug;

81(8):439-42.

Fisher LR, McLellan DL. Questionnaire assessment of

patient satisfaction with lower limb orthoses from a

district hospital. Prosthet Orthot Int 1989 Apr;

13(1):29-35.

Garber SL, Gregorio TL. Upper extremity assistive

devices: assessment of use by spinal cord-injured

patients with quadriplegia. Am J Occup Ther 1990

Feb;44(2):126-31.

Gauden P. Cancer nursing: learning to cope with an

artificial limb. Nursing (Lond) 1990

Aug 23-Sep 12;4(17):16-9.

Huber JH. Instructing college students in use of

wheelchair and prosthetics. Palaestra 1989 Winter;

5(2):41-6.

Kortman, B. Patient recall and understanding of

instructions concerning splints following a zone 2

flexor tendon repair. Aust Occup Ther J 1992 Jun;

39(2):5-11.

Lane PL, LeBlanc R. Crutch walking. Orthop Nurs

1990 Sep-Oct;9(5):31-8.

Lehneis HR, Dickey R. Special considerations: fitting

and training the bilateral upper-limb amputee. In:

Bowker JH, Michael JW, eds. Atlas of limb

prosthetics: surgical, prosthetic, and rehabilitation

principles. St. Louis: Mosby Year Book; 1992.

p. 311-23.

Lennon S. Wheelchair transfer training in a stroke

patient with neglect: a single case study design.

Physiother Theory Pract 1991;7(1):51-5.

Limb M, Calnan M. Artificial limbs: a real need.

Health Serv J 1990 Nov 15;100(5227):1696-7.

Little J. Taking control of purchasing a wheelchair:

tips for parents about mobility equipment. Except

Parent 1991 Mar;21(2):36-8, 46, 50.

Marmann C. [The geriatric amputee after release from

successful rehabilitation]. Chirurg 1992 Oct;

63(10):suppl 204-5. (Ger).

Marr J, Edmonds V. Cervical orthoses: the issue of

patient compliance. J Neurosci Nurs 1990 Apr;

22(2):104-7.

May BJ. Preprosthetic management for lower extremity

amputation. In: O’Sullivan SB, Schmitz TJ.

Physical rehabilitation: assessment and treatment.

2nd ed. Philadelphia: F.A. Davis; 1988.

p. 385-405.

McConnell EA. Teaching a patient to use a cane

correctly. Nursing 1991 Sep;21(9):83.

McConnell EA. Using a stationary walker. Nursing

1992 Oct;22(10):75.

McHale KA, Corbett D. Parental noncompliance with

Pavlik harness treatment of infantile hip problems.

J Pediatr Orthop 1989 Nov-Dec;9(6):649-52.

Meadows CB, Stallard J, Wright D, Gordon L, Major

RE, Jones N. The Edinburgh-ORLAU prosthetic

system to provide reciprocal locomotion in children

and adults with complete transverse lower limb

deficiency. Prosthet Orthot Int 1990 Dec;14(3):

111-6.

Menz G. [Amputation as a first step towards

rehabilitation. Aspects of nursing care after leg

amputation]. Dtsch Krankenpflegez 1989 Mar;

42(3):146-50. (Ger).

Mertens JM. [The nurse and the amputation patient].

Servir 1990 Nov-Dec;38(6):298-307. (Por).

Moraros J, Hodge W. Orthotic survey. Preliminary

results. J Am Podiatr Med Assoc 1993 Mar;83(3):

139-48.

Mulley G. Walking frames. BMJ 1990 Apr 7;

300(6729):925-7.

Mulley GP. Standards of wheelchairs. BMJ 1989

May 6;298(6682):1198-9.

Nawoczenski DA, Birke JA, Graham SL, Koziatek E.

The neuropathic foot--a management scheme: a

case report. Phys Ther 1989 Apr;69(4):287-91.

Naylor JR, Mulley GP. Surgical collars: a survey of

their prescription and use. Br J Rheumatol 1991

Aug;30(4):282-4.

Nemunaitis GA, Herbison GJ. Cosmetic, functional,

independent: self-help aids. Arch Phys Med

Rehabil 1991 Apr;72(5):334-5.

Nicholas JJ, Robinson LR, Schulz R, Blair C, Aliota R,

Hairston G. Problems experienced and perceived

by prosthetic patients. J Prosthet Orthot 1993 Jan;

5(1):16-9.

Niijima M, Mizushima K, Fujita N. [Preparation of a

care manual for patients using a halo brace].

Kango Gijutsu 1989 Jun;35(9):1112-4. (Jpn).

Novotny MP, Childress DS. Northwestern University

initiates prosthetics/orthotics information and

education resource. J Assoc Child Prosthet Orthot

Clin 1989 Spring;24(1):1-5.

Ohman K, Spaniol D. Halo immobilization: discharge

planning and patient education. J Neurosci Nurs

1990 Dec;22(6):351-7.

Olson B, Ustanko L. Self-care needs of patients in the

halo brace [published erratum appears in Orthop

Nurs 1990 May-Jun;9(3):90]. Orthop Nurs 1990

Jan-Feb;9(1):27-33, 52.

Ozer MN. A participatory planning process for

wheelchair selection. J Rehabil Res Dev Clin

Suppl 1990;(2):31-6.

Patterson D, et al. Acceptance rate of myoelectric

prosthesis. J Assoc Child Prosthet Orthot Clin

1991 Spring-1990 Winter;25(3-4):73-5.

Patton JG. Developmental approach to pediatric

prosthetic evaluation and training. In: Meier RH

3rd, Atkins DJ, eds. Comprehensive management of

the upper-limb amputee. New York: Springer-

Verlag; 1989. p. 137-49.

Patton JG. Upper-limb deficiencies: developmental

approach to pediatric upper-limb prosthetic training.

In: Bowker JH, Michael JW, eds. Atlas of limb

prosthetics: surgical, prosthetic, and rehabilitation

principles. St. Louis: Mosby Year Book; 1992.

p. 779-93.

Phillips L, Nicosia A. An overview ... with reflections

past and present of a consumer. J Rehabil Res Dev

Clin Suppl 1990;(2):1-7.

Potter BE, Wallace WA. Crutches. BMJ 1990 Nov 3;

301(6759):1037-9.

Powell RR. Performance comparisons among four

different arm cycling systems. Int J Rehabil Res

1992;15(4):334-40.

Ragnarsson KT. Prescription considerations and a

comparison of conventional and lightweight

wheelchairs. J Rehabil Res Dev Clin Suppl 1990;

(2):8-16.

Raven KA, Brugger CA. Hemicorporectomy: a

nursing challenge. Orthop Nurs 1992 Mar-Apr;

11(2):73-8.

Report on the Evaluation of the VA/SEATTLE Ankle.

The Rehabilitation R&D Evaluation Unit,

Rehabilitation Research and Development Service,

Department of Veterans Affairs. J Rehabil Res Dev

1991 Spring;28(2):79-90.

Rey B. [Non-drug and non-surgical measures in

chronic polyarthritis]. Ther Umsch 1991 Sep;

48(9):624-31. (Ger).

Roeschlein RA, Domholdt E. Factors related to

successful upper extremity prosthetic use. Prosthet

Orthot Int 1989 Apr;13(1):14-8.

Rybarczyk BD, Nyenhuis DL, Nicholas JJ, Schulz R,

Alioto RJ, Blair C. Social discomfort and

depression in a sample of adults with leg

amputations. Arch Phys Med Rehabil 1992 Dec;

73(12):1169-73.

Sabolich J. Your’re not alone. Oklahoma City (OK):

Sabolich Prosthetic and Research Center; 1991.

356 p.

Sadler C. Disability: wheelchair comfort. Community

Outlook 1989 Nov:4-8.

Sears HH, Shaperman J. Proportional myoelectric

hand control: an evaluation. Am J Phys Med

Rehabil 1991 Feb;70(1):20-8.

Setoguchi Y. The management of the limb deficient

child and its family. Prosthet Orthot Int 1991 Aug;

15(2):78-81.

Shaw G. Wheelchair seat comfort for the

institutionalized elderly. Assist Technol 1991;3(1):

11-23.

Shaw G, Taylor SJ. A survey of wheelchair seating

problems of the institutionalized elderly. Assist

Technol 1991;3(1):5-10.

Shoppee K. Developmental dysplasia of the hip.

Orthop Nurs 1992 Sep-Oct;11(5):30-6.

Smith DG, Burgess EM, Zettl JH. Special

considerations: fitting and training the bilateral

lower-limb amputee. In: Bowker JH, Michael JW,

eds. Atlas of limb prosthetics: surgical, prosthetic,

and rehabilitation principles. St. Louis: Mosby Year

Book; 1992. p. 599-622.

Speers AT, Speers M. Care of the infant in a Pavlik

harness. Pediatr Nurs 1992 May-Jun;18(3):229-32,

252.

Spiegel SR. Adult myoelectric upper-limb prosthetic

training. In: Meier RH 3rd, Atkins DJ, eds.

Comprehensive management of the upper-limb

amputee. New York: Springer-Verlag; 1989.

p. 60-71.

Staats TB. The importance of prosthetics information

to the amputee [dissertation]. Los Angeles:

Pepperdine University; 1991. 252 p.

Subbarao JV. Walking after spinal cord injury. Goal

or wish? West J Med 1991 May;154(5):612-4.

Swagman A. Caring for limb-deficient children and

their families. MCN Am J Matern Child Nurs

1986 Jan-Feb;11(1):46-52.

van Oers CAJM, van der Woude LHV, Roebroeck ME,

Rozendal RH. A failure diary for hand propelled

wheelchairs. J Rehabil Sci 1991;4(4):123-30.

Whittle MW, Cochrane GM, Chase AP, Copping AV,

Jefferson RJ, Staples DJ, Fenn PT, Thomas DC.

A comparative trial of two walking systems for

paralysed people. Paraplegia 1991 Feb;29(2):

97-102.

Wientroub S, Khermosh O. A new orthosis for the

management of clubfoot and other foot and leg

deformities in infancy and early childhood.

J Pediatr Orthop 1991 Jul-Aug;11(4):485-7.

Williamson VC. Amputation of the lower extremity:

an overview. Orthop Nurs 1992 Mar-Apr;11(2):

55-65.

Wilson AB Jr. How to select and use manual

wheelchairs. Topping (VA): Rehabilitation Press;

1992. 67 p.

Wilson AB Jr. Limb prosthetics. New York: Demos;

1989. Prosthetics training and stump care. p. 91-8.

Wirta RW, Mason R, Calvo K, Golbranson FL. Effect

on gait using various prosthetic ankle-foot devices.

J Rehabil Res Dev 1991 Spring;28(2):13-24.

Wu SH. A belly gutter splint for proximal

interphalangeal joint flexion contracture. Am J

Occup Ther 1991 Sep;45(9):839-43.

Yawalkar S, Shah A, Ganapati R, Yan LB, Zhang GC,

Chen H, Westmacott K, Osterwalder W. Modulan grip-aids for leprosy patients. Int J Lepr Other

Mycobact Dis 1992 Jun;60(2):250-4.

Yetzer EA, Winfree M, Scaglione C. An amputee

support group. Rehabil Nurs 1989 May-Jun;14(3):

141-2.

INTERNATIONAL ISSUES

al-Turaiki MH, al-Falahi LA. Prosthetics and

orthotics: a survey of centres in the Kingdom of

Saudi Arabia. Prosthet Orthot Int 1992 Apr;16(1):

38-45.

al-Turaiki MHS. Poliomyelitis and orthotic

management at Riyadh Medical Rehabilitation

Centre: a retrospective study. J Prosthet Orthot

1989 Jan;1(2):76-81.

Carlson JM. Orthotics and prosthetics in Madagascar

and Nicaragua. In: Technology for the future

decade. RESNA ’89: proceedings of the 12th

annual conference; 1989 Jun 25-30; New Orleans,

LA. Washington (DC): RESNA Press; 1989.

p. 32-3.

Chappell PH. Arm amputation statistics for England

1958-88: an exploratory statistical analysis. Int J

Rehabil Res 1992;15(1):57-62.

Christel P. The regulation of orthopaedic devices in

France. J Biomed Mater Res 1989 Apr;

23(A1 Suppl):3-7.

Cobey JC, Stover E. Prosthetics in Cambodia.

Contemp Orthop 1992 May;24(5):603-5.

Cock J. Life inside the shell: a needs survey of spinal

cord-injured wheelchair users in a black South

African township. Disabil Handicap Soc 1989;4(1):

3-20.

Dickstein R, Halevy E, Meir H, Bigon R. Use of the

early walking aid as a geriatric prosthesis in the

community. J Prosthet Orthot 1989 Jan;1(2):110-5.

Dixon P. Rehabilitation resources in certain Islamic

countries [letter]. Prosthet Orthot Int 1990 Dec;

14(3):145.

Djeddou N. Experience of treating scoliosis at the

Azur Plage medical centre. Ann Readapt Med

Phys 1989 Aug;32(4):321-30.

Eisma WH. Research in rehabilitation. The

Netherlands. Int J Rehabil Res 1989;12(4):411-5.

Ennals S. Understanding benefits. Mobility allowance.

BMJ 1991 Feb 2;302(6771):284-5.

Fahrer M. On perpetuating a medieval tradition

[letter]. Med J Aust 1991 Aug 19;155(4):279.

Fernandez-Palazzi F, de Gutierrez DP, Paladino R.

The care of the limb deficient child in Venezuela.

Prosthet Orthot Int 1991 Aug;15(2):156-9.

Fisher FR. Assistive devices in rehabilitation: a time

for a change. Can J Rehabil 1991 Winter;5(2):

67-9.

Gainor BJ. Experiences in an overseas amputee clinic.

Contemp Orthop 1992 Jan;24(1):68-75.

Garrett JF. Technology overseas. In: Technology for

the future decade. RESNA ’89: proceedings of the

12th annual conference; 1989 Jun 25-30; New

Orleans, LA. Washington (DC): RESNA Press;

1989. p. 34.

Golding JS, Nathan RH. A third world wheelchair.

Int Disabil Stud 1987;9(1):38-40.

Guha SK, Anand S, Sharma J. Foot-controlled

artificial arm with complementary activation by

body power. Automedica 1989;11:201-7.

Guha SK, Chaudhry KK. A practical approach to

multifunctional above knee prosthesis. Automedica

1989;11:233-45.

Ham RO, Roberts CV, Luff R. A five-year review of

referrals for prosthetic treatment in England, Wales

and Northern Ireland, 1981-85. Health Trends

1989 Feb;21(1):3-6.

Hambrey RA, Withinshaw G. Electrically powered

upper limb prostheses: their development and

application. Br J Occup Ther 1990 Jan;53(1):7-11.

Hartridge M, Seeger BR. International wheelchair

standards: a study of costs and benefits. Assist

Technol 1990;2(4):117-23.

Hotchkiss R. Wheelchair designs from the third

world: a radical change in cushion design. In:

Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 30-1;

Huckstep RL. Appropriate surgery and appliances for

patients with deformities and paralysis in

developing countries. Instr Course Lect

1992;41:461-9.

Hughes J. The Knud Jansen Lecture. Education: an

investment in everyone’s future. Prosthet Orthot

Int 1992 Aug;16(2):90-7.

Jones LE. Prosthetic limb use in Australia 1981-1985

under the Free Limb Scheme. Prosthet Orthot Int

1989 Aug;13(2):76-81.

Jones LE, Lipson A. The care of the limb deficient

child in Australia. Prosthet Orthot Int 1991 Aug;

15(2):140-2.

Kakurai S, Kida M. The care of the limb deficient

child in Japan. Prosthet Orthot Int 1991 Aug;15(2):

146-51.

Kald A, Carlsson R, Nilsson E. Major amputation in a

defined population: incidence, mortality and results

of treatment. Br J Surg 1989 Mar;76(3):308-10.

Keessen W, van der Eijken JW, Diepstraten AF. [The

treatment of congenital clubfoot in The

Netherlands; results of a survey among orthopedic

surgeons]. Ned Tijdschr Geneeskd 1992 Aug

29;136(35):1710-2. (Dut).

Kijkusol D. Simplified, low cost below-knee

prosthesis. Prosthet Orthot Int 1986 Aug;10(2):

96-8.

Korzh AA, Iaremenko DA. [What is necessary for

raising the quality of prosthetic and orthopedic

service to the community?] Ortop Travmatol

Protez 1989 Apr;(4):53-7. (Rus).

Kovalenko VV. [Reflexotherapy in orthopedics,

traumatology and prosthetics (review of the

literature)]. Ortop Travmatol Protez 1990 Apr;

(4):66-8. (Rus).

Kullmann L, Laszlo G, Molnar F. [Results of

amputation and rehabilitation]. Orv Hetil 1991

Mar 3;132(9):459-63. (Hun).

Lasudry N, Warzee G, Van Rolleghem J. [Image

processing and use of CAD in prosthesis

manufacturing]. Onde Electr 1991 Jul-Aug;

71(4):45-8 (Fre).

Limb M, Calnan M. Artificial limbs: a real need.

Health Serv J 1990 Nov 15;100(5227):1696-7.

Loro A, Franceschi F, Mosha EC, Samwel J. A

survey of amputations at Dodoma Regional

Hospital, Tanzania. Prosthet Orthot Int 1990 Aug;

14(2):71-4.

Meanley S. The development of a prototype patella

tendon bearing prosthesis using high-density

polyethylene piping (the drainpipe leg). Proc Inst

Mech Eng [H] 1991;205(2):121-3.

Meanley S. Rehabilitation engineering and leprosy in

Nepal: a personal view. J Med Eng Technol 1992

Jul-Aug;16(4):165-9.

Meghdari A, Arefi M, Mahmoudian M, Hamza MH.

Biomechanical aspects of the Sharif artificial hand.

In: Hamza MH, ed. Proceedings of the IASTED

International Symposium. Computers and

Advanced Technology in Medicine, Healthcare and

Bioengineering; 1990 Aug 15-17; Hawaii.

Anaheim (CA): ACTA Press; 1990. p. 32-6.

Mohan D, Sethi PK, Ravi R. Mathematical modelling

and field trials of an inexpensive endoskeletal

above-knee prosthesis. Prosthet Orthot Int 1992

Aug;16(2):118-23.

Oberg K. Cost-benefits in orthopaedic technology by

using thermoplastics in developing countries.

Prosthet Orthot Int 1991 Apr;15(1):18-22.

Ozyalcin H, Sesli E. Temporary prosthetic fitting for

below-knee amputation. Prosthet Orthot Int 1989

Aug;13(2):86-9.

Raab W. Education feature: ten years in the

development of the Tanzania Training Centre for

Orthopaedic Technologists. Prosthet Orthot Int

1992 Dec;16(3):206-10.

Sethi PK. The Knud Jansen lecture. Technological

choices in prosthetics and orthotics for developing

countries. Prosthet Orthot Int 1989 Dec;13(3):

117-24.

Sharma VP. The care of the limb deficient child in

India. Prosthet Orthot Int 1991 Aug;15(2):143-5.

Skolimowski T, Ostrowska B. [Evaluation of results

of the prosthesis using after an amputation within

the lower limbs]. Postepy Rehabilitacji (Warsaw)

1990;4(3):13-9. (Pol).

Sliman N, Mrabet A, Daghfous S, Douik M. The care

of the limb deficient child in north Africa. Prosthet

Orthot Int 1991 Aug;15(2):152-5.

Stewart CP, Jain AS. Dundee revisited--25 years of a

total amputee service. Prosthet Orthot Int 1993 Apr;

17(1):14-20.

Takechi H. History of prostheses and orthoses in

Japan. Prosthet Orthot Int 1992 Aug;16(2):98-103.

van Dijk AJ. Congenital reduction deficiencies of the

upper extremities. Epidemiology and rehabilitation

services in the Netherlands. J Rehabil Sci 1990;

3(3):84-8.

Vossberg A. The choice of prosthetic and orthotic

technique for less developed countries: analysis and

perspectives in Colombia. Prosthet Orthot Int 1988

Aug;12(2):96-100.

Vulliet F, Tschibangu P. [Treatment and rehabilitation

of disabilities caused by leprosy at a rural hospital

(Kapolowe, Zaire)]. Acta Leprol 1990;7(3):225-8.

(Fre).

Walsh NE, Lancaster JL, Faulkner VW, Rogers WE.

A computerized system to manufacture prostheses

for amputees in developing countries. J Prosthet

Orthot 1989 Apr;1(3):165-81.

Watts HG. Management of common Third World

orthopaedic problems: paralytic poliomyelitis,

tuberculosis of bones and joints, Hansen’s disease

(leprosy), and chronic osteomyelitis. Instr Course

Lect 1992;41:471-8.

NURSING CARE

Assessment and care of the patient with a neck

immobilizer [videocassette]. Houston: University of

Texas Health Science Center at Houston, UT/TV;

1992. 1 videocassette: 7 min., sound, color, 1/2 in.

(Orthopedic nursing series; 1). Accompanied by: 1

guide.

Beida II. [The treatment of suppurative wounds of the

stump of the extremities]. Feldsher Akush 1989

Oct;54(10):28-30. (Rus).

Bender LH. Part 2. Osteogenesis imperfecta. Orthop

Nurs 1991 Jul-Aug;10(4):23-32.

Broadhurst C. Adjusting to amputation. Nurs Times

1989 Oct 25-31;85(43):55-7.

Brosnan H. Nursing management of the adolescent

with idiopathic scoliosis. Nurs Clin North Am

1991 Mar;26(1):17-31.

Bull MJ, Stroup KB, Feller N. Information needs of

parents of a child in a Pavlik harness [letter].

Orthop Nurs 1988 Sep-Oct;7(5):12.

Calmels P, Pallot-Prades B, Alexandre C, Minaire P.

[The reeducation of the patient with rheumatoid

polyarthritis]. Servir 1989 Sep-Oct;37(5):306-9.

(Por).

Caring for people at home. Aids to walking. Aust Fam

Physician 1989 Jul;18(7):860.

Corwin D, Miller CA. Get your patient off on the

right foot. RN 1990 Nov;53(11):44-6.

Crutchwalking: an overview for nurses [videocassette].

[Spokane (WA)]: I.C.N.E., Learning Resources

Unit; 1989. 1 videocassette: sound, color, 1/2 in.

Curry LC, Gibson LY. Congenital hip dislocation: the

importance of early detection and comprehensive

treatment. Nurse Pract 1992 May;17(5):49-55.

Dai S. [Psychology of amputation in carcinoma

patients with vital life change events]. Chung Hua

Hu Li Tsa Chih 1990 Apr;25(4):175-6. (Chi).

DeValles JH. Crutch walking and discharge

instructions [letter]. J Emerg Nurs 1989 Mar-Apr;

15(2 Pt 1):74-5.

Diogo MD, Campedelli MC. [The patient undergoing

amputation of the lower limbs and the changes in

activitites of daily living]. Rev Paul Enferm 1992

May-Aug;11(2):92-9. (Por).

Dunst RM. Legg-Calv�-Perthes disease. Orthop Nurs

1990 Mar-Apr;9(2):18-27.

Erhart C, Barnsteiner KH. [Possibilities with provision

of temporary prostheses]. Dtsch Krankenpflegez

1989 Mar;42(3):150-3. (Ger).

Ewerbeck V, Koster G. [Basic principles of

amputation surgery. Surgical strategy, postoperative

treatment and provision of prostheses]. Dtsch

Krankenpflegez 1989 Mar;42(3):142-6. (Ger).

Ficner HB. Revision surgery in adult scoliosis patients.

Orthop Nurs 1993 Mar-Apr;12(2):23-32.

Gauden P. Cancer nursing: learning to cope with an

artificial limb. Nursing (Lond) 1990

Aug 23-Sep 12;4(17):16-9.

Gregory E. Nursing practice management: Karen,

aged 15 years, has an above-the-knee amputation.

J Sch Nurs 1992 Feb;8(1):30, 32.

Grisell J. Turning and transferring the patient: good

body mechanics are essential [videocassette].

[Houston]: University of Texas Health Science

Center at Houston, School of Nursing; 1991. 1

videocassette: 14 min., sound, color, 1/2 in.

Harden NG, Luster SH. Rehabilitation considerations

in the care of the acute burn patient. Crit Care

Nurs Clin North Am 1991 Jun;3(2):245-53.

Home Study Program. Congenital dysplasia of the hip.

AORN J 1989 Jun;49(6):1563-612.

Kiely T. Laura’s story... osteogenic sarcoma...

amputation. Nurs Times 1989 Aug 23-29;85(34):

35-8.

Krouskop TA, Cullen B, Garber SL. Custom selection

of support surfaces for wheelchairs and beds: one

size does not fit all. Dermatol Nurs 1992 Jun;4(3):

191-4, 204.

Kruse DH. Leave the collar on [letter]. J Emerg Nurs

1990 Nov-Dec;16(6):376.

Lane PL, LeBlanc R. Crutch walking. Orthop Nurs

1990 Sep-Oct;9(5):31-8.

Levine JM, Gross J. Atypical locations of pressure

sores: presentation of two cases. Decubitus 1989

Nov;2(4):44-6.

Marr J, Edmonds V. Cervical orthoses: the issue of

patient compliance. J Neurosci Nurs 1990 Apr;

22(2):104-7.

Mason KJ. Congenital orthopedic anomalies and their

impact on the family. Nurs Clin North Am 1991

Mar;26(1):1-16.

McConnell EA. Applying an abduction pillow

correctly. Nursing 1992 Jun;22(6):22.

McConnell EA. Correctly positioning an arm sling.

Nursing 1991 Jul;21(7):70.

McConnell EA. Teaching a patient to use a cane

correctly. Nursing 1991 Sep;21(9):83.

McKenna ME, McCarthy C. Acute care of the patient

with spinal cord injury. CONA J 1989 Spring;

11(1):5-10.

Medhat A, Huber PM, Medhat MA. Factors that

influence the level of activities in persons with

lower extremity amputation. Rehabil Nurs 1990

Jan-Feb;15(1):13-8.

Menz G. [Amputation as a first step towards

rehabilitation. Aspects of nursing care after leg

amputation]. Dtsch Krankenpflegez 1989 Mar;

42(3):146-50. (Ger).

Mertens JM. [The nurse and the amputation patient].

Servir 1990 Nov-Dec;38(6):298-307. (Por).

Mikulaninec CE. An amputee critical path. J Vasc

Nurs 1992 Jun;10(2):6-9.

Motte KM. Making a thoraco-lumbo-sacral orthosis.

Orthop Nurs 1991 Jul-Aug;10(4):59-62.

Nazaroff KS, Stanton JH, Magana KR, Kaufman RL.

Halo-body jacket immobilization in rheumatoid

arthritis patients with cervical myelopathy. Nurs

Clin North Am 1989 Mar;24(1):209-23.

Niijima M, Mizushima K, Fujita N. [Preparation of a

care manual for patients using a halo brace].

Kango Gijutsu 1989 Jun;35(9):1112-4. (Jpn).

North B, North C, Lee JL. Living in a halo [published

erratum appears in Am J Nurs 1992 May;92(5):27].

Am J Nurs 1992 Apr;92(4):54-6.

Novotny M, Swagman A. Caring for children with

orthotic/prosthetic needs. J Prosthet Orthot 1992

Jul;4(4):191-5.

Ohman K, Spaniol D. Halo immobilization: discharge

planning and patient education. J Neurosci Nurs

1990 Dec;22(6):351-7.

Olson B, Ustanko L. Self-care needs of patients in the

halo brace [published erratum appears in Orthop

Nurs 1990 May-Jun;9(3):90]. Orthop Nurs 1990

Jan-Feb;9(1):27-33, 52.

Olson B, Ustanko L, Warner S. The patient in a halo

brace: striving for normalcy in body image and

self-concept. Orthop Nurs 1991 Jan-Feb;10(1):

44-50.

Pediani R. Supporting cast. Br J Theatre Nurs 1992

May;2(2):20-1.

Radermacher M. [Our "Project Wheelchair."

Experiences in class--on the way in a wheelchair].

Krankenpflege (Frankf) 1989 Jan;43(1):43. (Ger).

Raven KA, Brugger CA. Hemicorporectomy: a

nursing challenge. Orthop Nurs 1992 Mar-Apr;

11(2):73-8.

Redheffer GM, Bailey M. Assessing and splinting

fractures. Nursing 1989 Jun;19(6):51-9.

Rudolphi D. Limb loss in the elderly peripheral

vascular disease patient. J Vasc Nurs 1992 Sep;

10(3):8-13;

Sanford M, Fowler C. Positioning the patient with an

abductor pillow. Orthop Nurs 1989 Sep-Oct;8(5):

21-3.

Saylor DE. Pastoral care of the rehabilitation patient.

Rehabil Nurs 1991 May-Jun;16(3):138-40.

Schaming D, Gorry M, Soroka K, Catullo ME. When

babies are born with orthopedic problems. RN

1990 Apr;53(4):62-7.

Shoppee K. Developmental dysplasia of the hip.

Orthop Nurs 1992 Sep-Oct;11(5):30-6.

Specht J. Wheelchair clinic. J Gerontol Nurs 1992

May;18(5):47.

Speers AT, Speers M. Care of the infant in a Pavlik

harness. Pediatr Nurs 1992 May-Jun;18(3):229-32,

252.

Stout JD, Bandy P, Feller N, Stroup KB, Bull MJ.

Transportation resources for pediatric orthopaedic

clients. Orthop Nurs 1992 Jul-Aug;11(4):26-30.

Swagman A. Caring for limb-deficient children and

their families. MCN Am J Matern Child Nurs

1986 Jan-Feb;11(1):46-52.

Teloken M. Current concepts review. Reduction of

congenital dislocation of the hip [letter]. J Bone

Joint Surg Am 1992 Dec;74(10):1579.

Transfer techniques [videocassette]. Garden Grove

(CA): Medcom/Trainex; 1990. 2 videocassettes:

sound, color, 1/2 in.

Uratani H. [Innovation in shampooing while using

direct skull traction--with special reference to

shampooing while fitted with a halo vest]. Kango

Gijutsu 1989 Jun;35(9):1109-11. (Jpn).

Van GH, Benichou M, Chiesa G, Lefevre B, Menager

D. [Care of amputations of the lower extremities].

Servir 1989 Jan-Feb;37(1):15-20. (Por).

Walsh M, Judd M. Long term immobility and self

care: the Orem nursing approach. Nurs Stand 1989

Jul 8;3(41):34-6.

Williamson VC. Amputation of the lower extremity:

an overview. Orthop Nurs 1992 Mar-Apr;11(2):

55-65.

Windorski J. The nursing role in the prosthetic clinic

team. J Assoc Child Prosthet Orthot Clin 1992

Summer;27(1):11-5.

Yetzer EA, Winfree M, Scaglione C. An amputee

support group. Rehabil Nurs 1989 May-Jun;14(3):

141-2.

Yoshida K. [20 years on wheelchair: unpleasant

experiences at a rehabilitation center]. Kango 1991

May;43(6):148-54. (Jpn).

Yoshido K. [20 years in a wheelchair--first

hospitalization after traffic accident]. Kango 1991

Apr;43(5):119-26. (Jpn).

REHABILITATION

Advances in rehabilitation technology. NSC-88. North

Sea Conference on Biomedical Engineering.

Maastricht, The Netherlands, April 13-15, 1988.

Proceedings. J Med Eng Technol 1989 Jan-Apr;

13(1-2):1-157.

Aisen M, ed. Orthotics in neurologic rehabilitation.

New York: Demos; 1992. (Comprehensive

neurologic rehabilitation; vol. 5).

Baumgartner R. [Congenital limb abnormalities:

amputate or not amputate?]. Rehabilitation (Stuttg)

1990 Feb;29(1):4-11. (Ger).

Baumgartner R. [Rehabilitation following amputation].

Ther Umsch 1989 Jul;46(7):441-8. (Ger).

Becker HM. [Current state of amputation surgery].

Langenbecks Arch Chir Suppl Ii Verh Dtsch Ges

Forsch Chir 1989:623-5. (Ger).

Becker HM, Neufeldt KH, Furgani P, Niedermeier H.

[Current status of amputation surgery]. Zentralbl

Chir 1990;115(14):857-63. (Ger).

Bensahel H, Dal Monte A, Hjelmstedt A, Bjerkreim I,

Wientroub S, Matasovic T, Porat S, Bialik V.

Congenital dislocation of the knee. J Pediatr

Orthop 1989 Mar-Apr;9(2):174-7.

Bensahel H, Guillaume A, Czukonyi Z, Desgrippes Y.

Results of physical therapy for idiopathic clubfoot:

a long-term follow-up study. J Pediatr Orthop 1990

Mar-Apr;10(2):189-92.

Berko VG, Tomchuk VN, Shevchuk VI, Kisil’ IIu. [A

device used in early rehabilitation of invalids with

amputation defects of 4 extremities]. Ortop

Travmatol Protez 1989 Feb;(2):59-60. (Rus).

Binder H, Conway A, Gerber LH. Rehabilitation

approaches to children with osteogenesis

imperfecta: a ten-year experience. Arch Phys Med

Rehabil 1993 Apr;74(4):386-90.

Binder H, Eng GD. Rehabilitation management of

children with spastic diplegic cerebral palsy. Arch

Phys Med Rehabil 1989 Jun;70(6):482-9.

Blizzard P. Save our thumbs. Physiotherapy 1991;

77(8):573-4.

Block JE, Steinbach LS, Friedlander AL, Steiger P,

Ellis W, Morris JM, Genant HK. Electrically-

stimulated muscle hypertrophy in paraplegia:

assessment by quantitative CT. J Comput Assist

Tomogr 1989 Sep-Oct;13(5):852-4.

Bogataj U, Gros N, Malezic M, Kelih B, Kljajic M,

Acimovic R. Restoration of gait during two to

three weeks of therapy with multichannel electrical

stimulation. Phys Ther 1989 May;69(5):319-27.

Bowker JH, Michael JW, eds. Atlas of limb

prosthetics: surgical, prosthetic, and rehabilitation

principles. 2nd ed. St. Louis: Mosby Year Book;

1992. 930 p.

Bowser MS. Giving up the ghost: a review of

phantom limb phenomena. J Rehabil 1991 Jul-Sep;

57(3):55-62.

Brooke MH, Fenichel GM, Griggs RC, Mendell JR,

Moxley R, Florence J, King WM, Pandya S,

Robison J, Schierbecker J, et al. Duchenne

muscular dystrophy: patterns of clinical progression

and effects of supportive therapy. Neurology 1989

Apr;39(4):475-81.

Brooks NA. Users’ responses to assistive devices for

physical disability. Soc Sci Med 1991;32(12):

1417-24.

Butler C. Augmentative mobility: why do it? Phys

Med Rehabil Clin North Am 1991 Nov;2(4):

801-15.

Butler PB, Thompson N, Major RE. Improvement in

walking performance of children with cerebral

palsy: preliminary results. Dev Med Child Neurol

1992 Jul;34(7):567-76.

Campbell WB, Thornberry DJ. Patients who have

undergone amputation [letter]. Ann R Coll Surg

Engl 1989 Jul;71(4 Suppl):58.

Canelon MF. Training for a patient with shoulder

disarticulation. Am J Occup Ther 1993 Feb;47(2):

174-8.

Casa B, Caleffi E, Bocchi A, Ferraro F, Del Piano P.

[Rehabilitation of burned patients. II. Therapeutic

exercise]. Acta Biomed Ateneo Parmense 1990;

61(1-2):67-71. (Ita).

Cassella MC, Hall JE. Current treatment approaches

in the nonoperative and operative management of

adolescent idiopathic scoliosis. Phys Ther 1991

Dec;71(12):897-909.

Cassinis A, Conti B, Redaelli T, Cosignani F,

Bartemucci G. [The multidisciplinary treatment of

children with spina bifida]. Riabilitazione 1991;

24(4):207-21. (Ita).

Chadwick SJ, Wolfe JH. ABC of vascular diseases.

Rehabilitation of the amputee. BMJ 1992 Feb 8;

304(6823):373-6.

Charney EB, Melchionni JB, Smith DR. Community

ambulation by children with myelomeningocele and

high-level paralysis. J Pediatr Orthop 1991

Sep-Oct;11(5):579-82.

Clemmons NW. ABLEDATA: a database of products

for the disabled. Med Ref Serv Q 1991 Fall;10(3):

1-15.

Clinical affairs: individual development program for

Prosthetic and Sensory Aids Service chiefs:

program guide. Washington (DC): Dept. of

Veterans Affairs, Veterans Health Services and

Research Administration, Prosthetic and Sensory

Aids Service; 1990.

Closson JB, Toerge JE, Ragnarsson KT, Parsons KC,

Lammertse DP. Rehabilitation in spinal cord

disorders. 3. Comprehensive management of spinal

cord injury. Arch Phys Med Rehabil 1991 Mar;

72(4-S):S298-308.

Cobb JW. Models for delivery of prosthetic services

to geriatric patients. Top Geriatr Rehabil 1992 Sep;

8(1):59-63.

Colburn J, Ibbotson V. Amputation. In: Turner A,

Foster M, Johnson SE, eds. Occupational therapy

and physical dysfunction: principles, skills, and

practice. Edinburgh (UK): Churchill Livingstone;

1992. p. 627-53.

Collin C. Rehabilitation of elderly people with

prostheses [letter]. BMJ 1991 Jun 1;302(6788):

1336.

Computerized databases aid rehabilitation. J Assoc

Child Prosthet Orthot Clin 1990 Spring;25(1):23.

Cornall C. Self propelling wheelchairs: The effects on

spasticity in hemiplegic patients. Physiother

Theory Pract 1991;7(1):13-21.

Cross AB. The 1945 St Helena poliomyelitis epidemic

after 40 years. J R Soc Med 1989 Jun;82(6):

339-42.

Cupo M. Application of rehabilitation engineering for

a bilateral hemipelvectomy amputee with chronic

sacral decubitus ulcers. Clin Kinesiol 1991 Spring;

45(1):22-5.

Cutcliffe N, Prugger A. Adapted clothing for patients

in halo traction. Can J Occup Ther 1990 Feb;

57(1):39-42.

Datta D, Nair PN, Payne J. Outcome of prosthetic

management of bilateral lower-limb amputees.

Disabil Rehabil 1992 Apr-Jun;14(2):98-102.

De Luccia N, Pinto MA, Guedes JP, Albers MT.

Rehabilitation after amputation for vascular disease:

a follow-up study. Prosthet Orthot Int 1992 Aug;

16(2):124-8.

Dean E. Clinical decision making in the management

of the late sequelae of poliomyelitis. Phys Ther

1991 Oct;71(10):752-61.

DiCowden M. Pediatric rehabilitation: special patients,

special needs. J Rehabil 1990 Jul-Sep;56(3):13-7.

Dijkers MP, deBear PC, Erlandson RF, Kristy K, Geer

DM, Nichols A. Patient and staff acceptance of robotic technology in occupational therapy: a pilot

study. J Rehabil Res Dev 1991 Spring;28(2):33-44.

Diogo MJ, Campedelli MC. [The patient undergoing

amputation of the lower limbs and the changes in

activities of daily living]. Rev Paul Enferm 1992

May-Aug;11(2):92-9. (Por).

Directory of national recreation organizations. Except

Parent 1991 Oct-Nov;21(7):44.

Directory of on-line networks, databases and bulletin

boards on assistive technology. 2nd ed. Washington

(DC): RESNA Technical Assistance Project; 1990

Nov. 20 p.

Dixon P. Rehabilitation resources in certain Islamic

countries [letter]. Prosthet Orthot Int 1990 Dec;

14(3):145.

Dohler K, de Neve W. [Rehabilitation of leg

amputees]. Z Arztl Fortbild (Jena) 1989;83(19):

949-51. (Ger).

Dovelle S, Heeter PK. The Washington Regimen:

rehabilitation of the hand following flexor tendon

injuries. Phys Ther 1989 Dec;69(12):1034-40.

Duncan RM. Basic principles of splinting the hand.

Phys Ther 1989 Dec;69(12):1104-16.

Durance JP, Warren WK, Kerbel DB, Stroud TW.

Rehabilitation of below-knee amputees: factors

influencing outcome and costs in three programmes.

Int Disabil Stud 1989 Jul-Sep;11(3):127-32.

Eisma WH. Research in rehabilitation. The

Netherlands. Int J Rehabil Res 1989;12(4):411-5.

Enders A, Hall M, eds. Assistive technology

sourcebook. Washington (DC): RESNA Press;

1990. 576 p.

Engstrom B, Van de Ven C. Physiotherapy for

amputees: the Roehampton approach. 2nd ed. New

York: Churchill Livingstone; 1993.

Epps CH Jr, Schneider PL. Treatment of hemimelias

of the lower extremity. Long-term results. J Bone

Joint Surg [Am] 1989 Feb;71(2):273-7.

Erhart C, Barnsteiner KH. [Possibilities with provision

of temporary prostheses]. Dtsch Krankenpflegez

1989 Mar;42(3):150-3. (Ger).

Ewerbeck V, Koster G. [Basic principles of

amputation surgery. Surgical strategy, postoperative

treatment and provision of prostheses]. Dtsch

Krankenpflegez 1989 Mar;42(3):142-6. (Ger).

Fielden RHN. Natural development of the

quadrimembral congenital amputee: a case report.

J Assoc Child Prosthet Orthot Clin 1991

Spring-1990 Winter;25(3-4):66-7.

Fraser BA, Hensinger RN, Phelps JA. Physical

management of multiple handicaps: a professional’s

guide. 2nd ed. Baltimore: Paul H. Brookes Publ.;

1990. 337 p.

Friedmann LW. Rehabilitation of the lower extremity

amputee. In: Kottke FJ, Lehman JF. Krusen’s

handbook of physical medicine and rehabilitation.

4th ed. Philadelphia: Saunders; 1990. p. 1024-69.

Fyfe NC, Berridge DC. Success rates for rehabilitation

of vascular amputees: implications for preoperative

assessment and amputation level [letter]. Br J Surg

1993 Jan;80(1):128.

Gailey RS Jr, Clark CR. Physical therapy management

of adult lower-limb amputees. In: Bowker JH,

Michael JW, eds. Atlas of limb prosthetics:

surgical, prosthetic, and rehabilitation principles. St.

Louis: Mosby Year Book; 1992. p. 569-97.

Garcia-Viniegras CR, Rial Blanco N, Molina Martinez

O, Salazar Fernandez N, Almeida Hernandez L,

Herrera Rodriguez G. [The psychosocial

characteristics of the patient who has undergone

amputation for vascular reasons. The work, family

and sex life aspects]. Angiologia 1991 Jan-Feb;

43(1):26-9. (Spa).

Geiger CM. The utilization of assistive devices by

patients discharged from an acute rehabilitation

setting. Phys Occup Ther Geriatr 1990;9(1):3-25.

Gyorki JR. Enabling the disabled. Mach Des 1991

Nov 7;63(22):108-13.

Hagberg E, Berlin K, Renstrom P. Function after

through-knee as compared to above-knee and

below-knee amputation. Prosthet Orthot Int 1992

Dec;16(3):168-73.

Ham R, Cotton LT. Limb amputation: from aetiology to

rehabilitation. London: Chapman & Hall; 1991. 229

p. (Therapy in practice series; no. 23).

Hammel JM, Van der Loos HF, Perkash I. Evaluation

of a vocational robot with a quadriplegic employee.

Arch Phys Med Rehabil 1992 Jul;73(7):683-93.

Hammell KRW. Occupational therapy in the

management of high level quadriplegia. Br J

Occup Ther 1991 Sep;54(9):333-40.

Hanger HC, Mulley GP. A survey of lower leg braces

worn by the over-60s. Clin Rehabil 1991 May;

5(2):95-101.

Hanspal RS, Fisher K. Assessment of cognitive and

psychomotor function and rehabilitation of elderly

people with prostheses [published erratum appears

in BMJ 1991 May 18;302(6786):1182]. BMJ 1991

Apr 20;302(6782):940.

Harden NG, Luster SH. Rehabilitation considerations

in the care of the acute burn patient. Crit Care

Nurs Clin North Am 1991 Jun;3(2):245-53.

Harryman SE. Lower-extremity surgery for children

with cerebral palsy: physical therapy management.

Phys Ther 1992 Jan;72(1):16-24.

Hicks JE. Rehabilitation and biomechanics. Curr

Opin Rheumatol 1990 Apr;2(2):320-6.

Howell JW. Management of the acutely burned hand

for the nonspecialized clinician. Phys Ther 1989

Dec;69(12):1077-90.

Jackson-Wyatt O. Age-related changes in amputee

rehabilitation. Top Geriatr Rehabil 1992 Sep;8(1):

1-12.

James WV, McColl I. The way ahead for the

amputee. Ann R Coll Surg Engl 1991 May;73(3):

176-7.

Jonas HP, Ott W, Morscher M. [Amputation and

prosthetic replacement of the lower extremities in

arterial occlusive diseases]. Vasa Suppl 1992;37:

68-70. (Ger).

Jones D, Smart H, Hughes J. A bibliographic database

and information retrieval system in prosthetics and

orthotics. Health Bull (Edinb) 1991 Jul;49(4):

277-84.

Karacoloff LA, Hammersley CS, Schneider FJ. Lower

extremity amputation: a guide to functional

outcomes in physical therapy management. 2nd ed.

Gaithersburg (MD): Aspen Publishers; 1992. 254 p.

Kejlaa G. [The course after amputation of upper

extremities with special reference to the use of

prostheses and social conditions]. Ugeskr Laeger

1991 Nov 18;153(47):3322-6. (Dan).

Kovalenko VV. [Reflexotherapy in orthopedics,

traumatology and prosthetics (review of the

literature)]. Ortop Travmatol Protez 1990 Apr;

(4):66-8. (Rus).

Kullmann L. [Treatment and rehabilitation of

dysmelic children]. Magy Traumatol Orthop

Helyreallito Sebesz 1989;32(2):99-106. (Hun).

Kurtz LA, Scull SA. Rehabilitation for developmental

disabilities. Pediatr Clin North Am 1993 Jun;40(3):

629-43.

Lane JM, Kroll MA, Rossbach PG. New advances

and concepts in amputee management after

treatment for bone and soft-tissue sarcomas. Clin

Orthop 1990 Jul;(256):22-8.

Lavan J. Rehabilitation of the elderly amputee

[published erratum appears in Ir Med J 1992

Jun;85(2):42]. Ir Med J 1991 Oct;84(3):91-3.

Lein S. How are physiotherapists using the Vessa

Pneumatic Post Amputation Mobility Aid?

Physiother 1992 May;78(5):318-22.

Lennon S. Wheelchair transfer training in a stroke

patient with neglect: a single case study design.

Physiother Theory Pract 1991;7(1):51-5.

Leung P. Robotics in rehabilitation. J Rehabil 1988

Oct-Dec;54(4):6-7.

Lewis K. Inglis House: a wheelchair community.

J Long Term Care Adm 1992 Spring;20(1):8, 10-1.

Lindsay JA. Rehabilitation of amputees [letter]. BMJ

1992 Mar 28;304(6830):842.

Marmann C. [The geriatric amputee after release from

successful rehabilitation]. Chirurg 1992 Oct;

63(10):suppl 204-5. (Ger).

Martini G, Vitangeli L, Assennato P, Drommi M.

[Problems and techniques of functional

rehabilitation of upper limb stump]. Clin Ter 1990

Jul 15;134(1):13-24. (Ita).

Menz G. [Amputation as a first step towards

rehabilitation. Aspects of nursing care after leg

amputation]. Dtsch Krankenpflegez 1989 Mar;

42(3):146-50. (Ger).

Mikulaninec CE. An amputee critical path. J Vasc

Nurs 1992 Jun;10(2):6-9.

Milner M, Naumann S, Literowich W, Martin M, Ryan

S, Sauter WF, Shein GF, Verburg G.

Rehabilitation engineering in pediatrics.

Pediatrician 1990;17(4):287-96.

Muthu S. Rehabilitation of amputees [letter]. BMJ

1992 Mar 28;304(6830):842.

Nawoczenski DA, Birke JA, Graham SL, Koziatek E.

The neuropathic foot--a management scheme: a

case report. Phys Ther 1989 Apr;69(4):287-91.

Nemytin IUV, Kudriavtsev BP, Mironov GM,

Konovalov VA. [The rehabilitation of wounded

patients with limb stumps]. Voen Med Zh 1992

Apr-May;(4-5):54-6. (Rus).

Newell AF. Technology for the disabled--future

research needs. J Med Eng Technol 1989 Jan-Apr;

13(1-2):156-7.

Novotny MP. Psychosocial issues affecting

rehabilitation. Phys Med Rehabil Clin North Am

1991 May;2(2):373-93.

O’Connell PG, Gnatz S. Hemiplegia and amputation:

rehabilitation in the dual disability. Arch Phys Med

Rehabil 1989 Jun;70(6):451-4.

Pechman K. Rehabilitation: the diabetic amputee

[videocassette]. Secaucus (NJ): Network for

Contnuing Medical Education; 1991. 1

videocassette: 32 min., sound, color, 1/2 in. (NCME

telecourse; no. 607). Accompanied by: 1 guide.

Penington G, Warmington S, Hull S, Freijah N.

Rehabilitation of lower limb amputees and some

implications for surgical management. Aust N Z J

Surg 1992 Oct;62(10):774-9.

Philips CA. Management of the patient with

rheumatoid arthritis. The role of the hand therapist.

Hand Clin 1989 May;5(2):291-309.

Philips CA. Rehabilitation of the patient with

rheumatoid hand involvement. Phys Ther 1989

Dec;69(12):1091-8.

Pike AC, Nattress LW Jr. The changing role of the

amputee in the rehabilitation process. Phys Med

Rehabil Clin North Am 1991 May;2(2):405-14.

Pohjolainen T, Alaranta H. [Rehabilitation of limb

amputees]. Duodecim 1989;105(2):175-85. (Fin).

Presperin JJ, ed. Capitalizing on technology:

proceedings of the RESNA 13th annual conference;

1990 Jun 15-20; Washington, DC. Washington

(DC): RESNA Press; 1990. 445 p.

Puddicombe BE, Nardone MA. Rehabilitation of the

burned hand. Hand Clin 1990 May;6(2):281-92.

Refisch A. [Rehabilitation of amputees].

Langenbecks Arch Chir Suppl Ii Verh Dtsch Ges

Forsch Chir 1989:657-62. (Ger).

Rehabilitation R & D Progress Reports 1988. J Rehabil

Res Dev 1989 Feb;25 Suppl:1-419.

Rehabilitation R & D progress reports 1989. J Rehabil

Res Dev 1990 Feb;26 Suppl:1-509.

Rehabilitation R & D progress reports 1990. J Rehabil

Res Dev 1991 Winter;28(1):1-535.

Rehabilitation technology education for prosthetics,

orthotics, and PTA students [computer program +

videodisc]. Memphis (TN): Shelby State

Community College, Allied Health Department;

1989. computer discs; 1 videodisc: sound, color, 12

in. System requirements: IBM PC, AT, XT, or PS/2

or compatible; IBM InfoWindow and compatible

systems.

RESNA ’90: capitalizing on technology for people with

disabilities. Proceedings of the 13th annual

conference; 1990 Jun 15-20; Washington, DC.

Washington (DC): RESNA Press; 1990. 445 p.

RESNA ’91: technology for the nineties. Proceedings of

the 14th annual conference; 1991 Jun 21-26;

Kansas City, MO. Washington (DC): RESNA

Press; 1991. 442 p.

RESNA ’92: technology for consumers. Proceedings of

the 15th annual conference; 1992 Jun 6-11;

Toronto, Canada. Washington (DC): RESNA Press;

1992. 657 p.

Rhodes VJ. Physical therapy management of patients

with juvenile rheumatoid arthritis. Phys Ther 1991

Dec;71(12):910-9.

Roeschlein RA, Domholdt E. Factors related to

successful upper extremity prosthetic use. Prosthet

Orthot Int 1989 Apr;13(1):14-8.

Rozhkov AV, Shcherbina KK, Susliaev VG.

[Functional characteristics of the upper leg stumps

after knee joint disarticulation and prosthesis].

Ortop Travmatol Protez 1991 Jun;(6):29-33. (Rus).

Rozsos I, Kollar L, Kiss T, Tanto Z, Molnar L. [Data

on possibilities of rehabilitation of lower limb

amputees]. Orv Hetil 1991 Sep 15;132(37):2045-8.

(Hun).

Ryan KD, Ploski C, Emans JB. Myelodysplasia the

musculoskeletal problem: habilitation from infancy

to adulthood. Phys Ther 1991 Dec;71(12):935-46.

Ryder RA. Occupational therapy for a patient with a

bilateral Krukenberg amputation. Am J Occup

Ther 1989 Oct;43(10):689-91.

Saadah ESM. Rehabilitation of a below-knee amputee

with a diving limb. Clin Rehabil 1989 Aug;3(3):

249-51.

Saunders SR. Physical therapy management of hand

fractures. Phys Ther 1989 Dec;69(12):1065-76.

Saylor DE. Pastoral care of the rehabilitation patient.

Rehabil Nurs 1991 May-Jun;16(3):138-40.

Shell J. Sexual rehabilitation of the amputee. Oncol

Nurs Forum 1989 Jan-Feb;16(1):105-6.

Shin DY. Advances in rehabilitation technology.

Introduction. Adv Clin Rehabil 1990;3:3-9.

Sinclair AM. Occupational therapy and the lower limb

amputee in Western Australia. Br J Occup Ther

1991 Feb;54(2):69-71.

Siriwardena GJA, Bertrand PV. Factors influencing

rehabilitation of arteriosclerotic lower limb

amputees. J Rehabil Res Dev 1991 Summer;28(3):

35-44.

Skolimowski T, Ostrowska B. [Evaluation of results

of the prosthesis using after an amputation within

the lower limbs]. Postepy Rehabilitacji (Warsaw)

1990;4(3):13-9 (Pol).

Stone LR, Keenan MA, Shin DY. Acquired limb loss

in patients with traumatic brain injury. Am J Phys

Med Rehabil 1990 Jun;69(3):135-9.

Subbarao JV. Walking after spinal cord injury. Goal

or wish? West J Med 1991 May;154(5):612-4.

Svoboda J. Psychosocial considerations in pediatrics:

use of amputee dolls. J Prosthet Orthot 1992 Jul;

4(4):207-12.

Thacker K. Facing the fleshmovers... physiatrists,

physical therapists, rehab doctors and the like.

J Rehabil 1990 Jan-Mar;56(1):8-10.

University of Strathclyde, National Centre for Training

and Education in Prosthetics and Orthotics, RECAL

Information Services. RECAL thesaurus:

prosthetics, orthotics, and rehabilitation. Glasgow

(UK): The University; 1988. 209 p.

van Dijk AJ. Congenital reduction deficiencies of the

upper extremities. Epidemiology and rehabilitation

services in the Netherlands. J Rehabil Sci 1990;

3(3):84-8.

Vermeer A. Toward an interdisciplinary model for

movement rehabilitation of physically disabled

children. Appl Phys Activ Q 1989 Apr;6(2):

133-44.

Vulliet F, Tschibangu P. [Treatment and rehabilitation

of disabilities caused by leprosy at a rural hospital

(Kapolowe, Zaire)]. Acta Leprol 1990;7(3):225-8.

(Fre).

Wahle H. [Ten years follow-up of post-discharge

training status of 50 patients with complete

paraplegia]. Rehabilitation (Stuttg) 1991 Feb;

30(1):3-13. (Ger).

Wilson AB Jr. Limb prosthetics. New York: Demos;

1989. Functional capacities of amputees and

vocational rehabilitation. p. 105-12.

Wolf E, Lilling M, Ferber I, Marcus J. Prosthetic

rehabilitation of elderly bilateral amputees. Int J

Rehabil Res 1989;12(3):271-8.

York J. Mobility methods selected for use in home

and community environments. Phys Ther 1989

Sep;69(9):736-47.

Zijp EM, Rasenberg EM, van den Bosch JS.

[Rehabilitation of nursing home patients with a leg

amputation. A retrospective study]. Tijdschr

Gerontol Geriatr 1992 Apr;23(2):54-9. (Dut).

PROFESSIONAL EDUCATION,

TRAINING, & ORGANIZATIONS

al-Turaiki MH, al-Falahi LA. Prosthetics and

orthotics: a survey of centres in the Kingdom of

Saudi Arabia. Prosthet Orthot Int 1992 Apr;16(1):

38-45.

American Board for Certification in Orthotics and

Prosthetics, Inc. 1992 Registry of the American

Board for Certification in Orthotics and Prosthetics.

Alexandria (VA): The Board; 1992. 199 p.

Barber EL. Strength and range-of-motion examination

skills for the clinical orthotist. J Prosthet Orthot

1993 Apr;5(2):49-51.

Barringer WJ, Kapp S, Dankmeyer CH Jr, Clark D,

Supan TJ, Seabrook R. The changing face of

O&P education: Can we make a better practitioner?

J Prosthet Orthot 1993 Apr;5(2):55-8.

Clinic members of the Association of Children’s

Prosthetics-Orthotics Clinics. J Assoc Child

Prosthet Orthot Clin 1989 Spring;24(1):14-22.

Clinical affairs: individual development program for

Prosthetic and Sensory Aids Service chiefs:

program guide. Washington (DC): Dept. of

Veterans Affairs, Veterans Health Services and

Research Administration, Prosthetic and Sensory

Aids Service; 1990.

Directory of national recreation organizations. Except

Parent 1991 Oct-Nov;21(7):44.

Directory of wheelchair carriers, van lifts and ramps.

Except Parent 1991 Mar;21(2):45.

Directory of Wheelchair Manufacturers. Except Parent

1991 Mar;21(2):44.

Goldberg B. The orthopaedist as prosthetic team

leader: getting the best for your patient from the

team. Instr Course Lect 1990;39:353-4.

Heim S. Education feature: a training and

development concept for the field of Orthopaedic

Technology. Prosthet Orthot Int 1992 Dec;16(3):

203-5.

Hughes J. The Knud Jansen Lecture. Education: an

investment in everyone’s future. Prosthet Orthot

Int 1992 Aug;16(2):90-7.

McCarron EJ. Self assessment examination: 1989

pretest on prosthetics, orthotics, and assistive

devices. Arch Phys Med Rehabil (Suppl) 1989

May;70(5-S):Study Guide Issue:S192-4 .

McCarron EJ. Answer key to the 1989 pretest on

prosthetics, orthotics, and assistive devices. Arch

Phys Med Rehabil (Suppl) 1989 May;70(5-S):Study

Guide Issue:S218-9.

O & P Education. J Prosthet Orthot 1992 Oct;

4(5):223-282.

Raab W. Education feature: ten years in the

development of the Tanzania Training Centre for

Orthopaedic Technologists. Prosthet Orthot Int

1992 Dec;16(3):206-10.

Rehabilitation technology education for prosthetics,

orthotics, and PTA students [computer program +

videodisc]. Memphis (TN): Shelby State

Community College, Allied Health Department;

1989. computer discs; 1 videodisc: sound, color,

12 in. System requirements: IBM PC, AT, XT, or

PS/2 or compatible; IBM InfoWindow and

compatible systems.

ORTHOTIC DEVICES

OVERVIEW

Aisen M, ed. Orthotics in neurologic rehabilitation.

New York: Demos; 1992. (Comprehensive

neurologic rehabilitation; vol. 5).

al-Turaiki MH, al-Falahi LA. Prosthetics and

orthotics: a survey of centres in the Kingdom of

Saudi Arabia. Prosthet Orthot Int 1992 Apr;

16(1):38-45.

American Board for Certification in Orthotics and

Prosthetics, Inc. 1992 registry of the American

Board for Certification in Orthotics and Prosthetics.

Alexandria (VA): The Board; 1992. 199 p.

American Occupational Therapy Association, Practice

Division. Orthotics, prosthetics: information packet

[bibliography]. Rockville (MD): The Association;

[1989]. 126 p.

American Orthotic and Prosthetic Association. The

illustrated guide to orthotics and prosthetics: O &

P’s comprehensive guide to Medicare codes and

reimbursement. Alexandria (VA): The Association;

1992- .

Aston JW Jr. Post-polio syndrome. An emerging

threat to polio survivors. Postgrad Med 1992 Jul;

92(1):249-56, 260.

Bardot A. L’Appareillage en orthopedie: membres

inferieurs de l’enfant: amputes pour arteriopathie

des membres inferieurs de l’adulte. Montpellier

(France): Sauramps Medical; 1990. 157 p. (Fre).

Boker P, et al, eds. Biomechancial basis of orthotic

management. Oxford; Boston: Butterworth-

Heinemann; 1993.

Burns MJ. Useful considerations for orthotic control.

Am Acad Podiatr Sports Med Newsl 1989 Jan:8.

Calmels P, Escafit M, Domenach M, Minaire P.

Posturographic evaluation of the proprioceptive

effect of ankle orthoses in healthy volunteers. Int

Disabil Stud 1991 Apr-Jun;13(2):42-5.

Childress DS. Hector Kay, Alan Kay, and the future

of prosthetics and orthotics (Hector Kay Memorial

Lecture). J Assoc Child Prosthet Orthot Clin 1989

Summer-Autumn;24(2-3):40-6.

Cole WG. Orthotics and prosthetics in the management

of limb inequality. In: Menelaus MB, ed.

Management of limb inequality. Edinburgh (UK):

Churchill Livingstone; 1991. p. 59-70.

A compendium of rehabilitation technology research

supported by NIDRR: national workshop on

rehabilitation technology; 1990 Oct 3-4;

Washington, DC. Washington (DC): Electronic

Industries Foundation, Rehabilitation Center; 1990.

278 p.

Condie DN. Lower limb orthotics. Curr Opin Orthop

1990 Dec;1(3):462-5.

Dittmer DK, McArthur-Turner DE, Jones IC.

Orthotics in stroke. Phys Med Rehabil 1993 Feb;

7(1):161-78.

Edelstein JE. Orthotic assessment and management. In:

O’Sullivan SB, Schmitz TJ. Physical rehabilitation:

assessment and treatment. 2nd ed. Philadelphia:

F.A. Davis; 1988. p. 589-614.

Eisma WH. Research in rehabilitation. The

Netherlands. Int J Rehabil Res 1989;12(4):411-5.

Esquenazi A, Hirai B. Assessment of gait and orthotic

prescription. Phys Med Rehabil Clin North Am

1991 Aug;2(3):473-85.

Fisher FR. Assistive devices in rehabilitation: a time

for a change. Can J Rehabil 1991 Winter;5(2):

67-9.

Fisher LR, McLellan DL. Questionnaire assessment of

patient satisfaction with lower limb orthoses from a

district hospital. Prosthet Orthot Int 1989 Apr;

13(1):29-35.

Fraser BA, Hensinger RN, Phelps JA. Physical

management of multiple handicaps: a professional’s

guide. 2nd ed. Baltimore: Paul H. Brookes Publ.;

1990. 337 p.

Garrett JF. Technology overseas. In: Technology for

the future decade. RESNA ’89: proceedings of the

12th annual conference; 1989 Jun 25-30; New

Orleans, LA. Washington (DC): RESNA Press;

1989. p. 34.

Gyorki JR. Enabling the disabled. Mach Des 1991

Nov 7;63(22):108-13.

Hicks JE. Rehabilitation and biomechanics. Curr

Opin Rheumatol 1990 Apr;2(2):320-6.

Hicks JE, Leonard JA Jr, Nelson VS, Fisher SV,

Esquenazi A. Prosthetics, orthotics, and assistive

devices. 4. Orthotic management of selected

disorders. Arch Phys Med Rehabil 1989 May;

70(5-S):S210-7.

Huckstep RL. Appropriate surgery and appliances for

patients with deformities and paralysis in

developing countries. Instr Course Lect

1992;41:461-9.

Jones D, Smart H, Hughes J. A bibliographic database

and information retrieval system in prosthetics and

orthotics. Health Bull (Edinb) 1991

Jul;49(4):277-84.

Kraft GH, Lehmann JF. Orthotics. Phys Med Rehabil

Clin North Am 1992 Feb;3(1):1-241.

Krebs DE. Prosthetics and orthotics. In: Scully RM,

Barnes MR, Canfield JS, et al., eds. Physical

therapy. Philadelphia: Lippincott; 1989.

p. 998-1051.

Kurtz LA, Scull SA. Rehabilitation for developmental

disabilities. Pediatr Clin North Am 1993 Jun;40(3):

629-43.

Lehmann JF, ed. Orthotics. Phys Med Rehabil 1991

Jun;5(2):1-247.

Leonard JA Jr, Esquenazi A, Fisher SV, Hicks JE,

Meier RH 3d, Nelson VS. Prosthetics, orthotics,

and assistive devices. 1. General concepts. Arch

Phys Med Rehabil 1989 May;70(5-S):S195-201.

Lohman M, Goldstein H. Alternative strategies in tone

reducing AFO design. J Prosthet Orthot 1993 Jan;

5(1):1-4.

Mararos J, Hodge W. Orthotic survey. Preliminary

results. J Am Podiatr Med Assoc 1993 Mar;

83(3):139-48.

Nelson VS, Leonard JA Jr, Fisher SV, Esquenazi A,

Hicks JE. Prosthetics, orthotics, and assistive

devices. 2. Specialized seating and assistive devices.

Arch Phys Med Rehabil 1989 May;70(5-S):S202-5.

Nesbitt L. A practical guide to prescribing orthoses.

Physician Sportsmed 1992 May;20(5):76-8, 83-7.

Novotny MP, Childress DS. Northwestern University

initiates prosthetics/orthotics information and

education resource. J Assoc Child Prosthet Orthot

Clin 1989 Spring;24(1):1-5.

Paul JP, Barbenel JC, Courtney JM, Kenedi RM, eds.

Progress in Bioengineering: Strathclyde

bioengineering seminars: proceedings of an

International Seminar held on the Occasion of the

25th Anniversary of the Strathclyde Bioengineering

Unit; 1988 Sep; Glasgow, Scotland. Bristol (UK):

A. Hilger; 1989. 299 p.

Pinnington LL, Rowe P. Orthotics. In: Turner A, Foster

M, Johnson SE, eds. Occupational therapy and

physical dysfunction: principles, skills, and practice.

Edinburgh: Churchill Livingstone; 1992. p. 343-57.

Presperin JJ, ed. Capitalizing on technology:

proceedings of the RESNA 13th annual conference;

1990 Jun 15-20; Washington, DC. Washington

(DC): RESNA Press; 1990. 445 p.

Presperin JJ, ed. Technology for the next decade.

RESNA ’89: proceedings of the 12th annual

conference; 1989 Jun 25-30; New Orleans, LA.

Washington (DC): RESNA Press; 1989 Jun. 481 p.

Press JM, Wiesner SL. Prevention: conditioning and

orthotics. Hand Clin 1990 Aug;6(3):383-92.

Rehabilitation R & D progress reports 1988. J Rehabil

Res Dev 1989 Feb;25 Suppl:1-419.

Rehabilitation R&D progress reports 1989. J Rehabil

Res Dev 1990 Feb;26 Suppl:1-509.

Rehabilitation R&D progress reports 1990. J Rehabil

Res Dev 1991 Winter;28(1):1-535.

RESNA ’90: capitalizing on technology for people with

disabilities. Proceedings of the 13th annual

conference; 1990 Jun 15-20; Washington, DC.

Washington (DC): RESNA Press; 1990. 445 p.

RESNA ’91: technology for the nineties. Proceedings of

the 14th annual conference; 1991 Jun 21-26;

Kansas City, MO. Washington (DC): RESNA

Press; 1991. 442 p.

RESNA ’92: technology for consumers. Proceedings of

the 15th annual conference; 1992 Jun 6-11;

Toronto, Canada. Washington (DC): RESNA Press;

1992. 657 p.

Schutt AH. Upper extremity and hand orthotics. Phys

Med Rehabil Clin North Am 1992 Feb;3(1):223-41.

Shurr DG, Cook TM. Prosthetics & orthotics. Norwalk

(CT): Appleton & Lange; 1990. 225 p.

Sutherland J. Orthotics. In: Nickel VL, Botte MJ, eds.

Orthopaedic rehabilitation. 2nd ed. New York:

Churchill Livingstone; 1992. p. 117-26.

University of Strathclyde, National Centre for Training

and Education in Prosthetics and Orthotics, RECAL

Information Services. RECAL thesaurus:

prosthetics, orthotics, and rehabilitation. Glasgow

(Scotland): The University; 1988. 209 p.

Watanabe H. [Knowledge of lower extremity

orthosis]. Nippon Seikeigeka Gakkai Zasshi 1991

Oct;65(10):997-1002. (Jpn).

Watanabe H. [Recent research in prosthetics and

orthotics]. Nippon Seikeigeka Gakkai Zasshi 1991

Apr;65(4):271-5. (Jpn).

Watts HG. Management of common Third World

orthopaedic problems: paralytic poliomyelitis,

tuberculosis of bones and joints, Hansen’s disease

(leprosy), and chronic osteomyelitis. Instr Course

Lect 1992;41:471-8.

Weber D. Clinical aspects of lower extremity orthotics.

Oakville (ON): Elgan Enterprises; 1990. 372 p.

Which orthosis? [editorial]. Lancet 1989 Sep 23;

2(8665):721.

White FJ. Orthotics. In: Drennan JC, ed. The child’s

foot and ankle. New York: Raven Press; 1992.

p. 71-96.

SPECIFIC DEVICES

Braces

Abou-Hanna JJ, Okamura K, Tayyari F. Preloading of

the knee joint by prophylactic braces. Soma Eng

Human Body 1989;3(4):25-35.

Akamatsu N, Hamada Y, Kohno H, Siddiqi NA.

Osteofibrous dysplasia of the tibia treated by

bracing. Int Orthop 1992;16(2):180-4.

American Academy of Pediatrics Committee on Sports

Medicine: Knee brace use by athletes. Pediatrics

1990 Feb;85(2):228.

Andersen J, Rostgaard-Christensen E. Progressive

noninfectious anterior vertebral fusion. J Bone

Joint Surg [Br] 1991 Sep;73(6):859-62.

Anderson K, Wojtys EM, Loubert PV, Miller RE. A

biomechanical evaluation of taping and bracing in

reducing knee joint translation and rotation. Am J

Sports Med 1992 Jul-Aug;20(4):416-21.

Anderson MA, Rutt RA. The effects of counterforce

bracing on forearm and wrist muscle function.

J Orthop Sports Phys Ther 1992 Feb;15(2):87-91.

Andrews BJ, Cobelli C, Mariani L. Rule based control

of hybrid FES orthoses. In: Cobelli C, Mariani L,

eds. Modelling and control in biomedical systems:

selected papers from the 1st IFAC Symposium;

1988 Apr 6-8; Venice, Italy. Oxford; New York:

Pergamon Press; 1989. p. 287-94.

Andrews BJ, Kirkwood CA, Kim Y, Spelman FA.

Control of hybrid FES orthoses. In: Kim Y,

Spelman FA, eds. Images of the twenty-first

century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Vol. 5. Piscataway (NJ): IEEE; 1989.

p. 1473-4.

Andrews G, MacEwen GD. Idiopathic scoliosis. An

11-year follow-up study of the role of the

Milwaukee brace in curve control and trunco-pelvic

alignment. Orthopedics 1989 Jun;12(6):809-16.

Appelgren G, Willner S. End vertebra angle--a

roentgenographic method to describe a scoliosis. A

follow-up study of idiopathic scoliosis treated with

the Boston brace. Spine 1990 Feb;15(2):71-4.

Arvidson EB, Micheli LJ. Spine and trunk problems

in athletes. Curr Opin Orthop 1990 Dec;1(3):

361-4.

Bailes JE, Hadley MN, Quigley MR, Sonntag VK,

Cerullo LJ. Management of athletic injuries of the

cervical spine and spinal cord. Neurosurgery 1991

Oct;29(4):491-7.

Baker BE. Prevention of ligament injuries to the knee.

Exerc Sport Sci Rev 1990;18:291-305.

Baker BE, VanHanswyk E, Bogosian SP, Werner FW,

Murphy D. The effect of knee braces on lateral

impact loading of the knee. Am J Sports Med

1989 Mar-Apr;17(2):182-6.

Benzel EC, Larson SJ, Kerk JJ, Millington PJ, Novak

SM, Falkner RH, Wenninger WJ. The

thermoplastic Minerva body jacket: a clinical

comparison with other cervical spine splinting

techniques. J Spinal Disord 1992 Sep;5(3):311-9.

Berned Muller E, Nordwall A, von Wendt L. The

influence of scoliosis brace treatment on function in

children with myelomeningocele. Acta Paediatr

1992 Nov;81(11):925-8.

Beynnon BD, Pope MH, Wertheimer CM, Johnson RJ,

Fleming BC, Nichols CE, Howe JG. The effect of

functional knee-braces on strain on the anterior

cruciate ligament in vivo. J Bone Joint Surg Am

1992 Oct;74(9):1298-312.

Beynnon BD, Renstrom PA. The effect of bracing and

taping in sports. Ann Chir Gynaecol 1991;80(2):

230-8.

Bierling-Sorensen F, Ryde H, Bojsen-Moller F, Lyquist

E. Shock absorbing material on the shoes of long

leg braces for paraplegic walking. Prosthet Orthot

Int 1990 Apr;14(1):27-32.

Binder H, Conway A, Gerber LH. Rehabilitation

approaches to children with osteogenesis

imperfecta: a ten-year experience. Arch Phys Med

Rehabil 1993 Apr;74(4):386-90.

Black JR. Management of diabetic plantar ulcers with

a walking brace. A clinical trial. J Am Podiatr

Med Assoc 1990 Mar;80(3):156-7.

Blauth W, Ulrich HW, Hahne HJ. [Sense and

nonsense of knee orthosis]. Unfallchirurg 1990

May;93(5):221-7. (Ger).

Boachie-Adjei O, Bradford DS. Vertebral column

resection and arthrodesis for complex spinal

deformities. J Spinal Disord 1991 Jun;4(2):

193-202.

Bordelon RL. Orthotics, shoes, and braces. Orthop

Clin North Am 1989 Oct;20(4):751-7.

Boulot J, Cahuzac JP, Clement JL, Gaubert J. CTM

orthesis for iodiopathic scoliosis. Ann Readapt

Med Phys 1990;33(3):291-301.

Branch TP, Hunter R, Donath M. Dynamic EMG

analysis of anterior cruciate deficient legs with and

without bracing during cutting. Am J Sports Med

1989 Jan-Feb;17(1):35-41.

Bresnahan PJ, Lubert MA. The Tibial Torsion

Transformer. J Am Podiatr Med Assoc 1992 Jan;

82(1):42-4.

Brosnan H. Nursing management of the adolescent

with idiopathic scoliosis. Nurs Clin North Am

1991 Mar;26(1):17-31.

Brown TD, Van Hoeck JE, Brand RA. Laboratory

evaluation of prophylactic knee brace performance

under dynamic valgus loading using a surrogate leg

model. Clin Sports Med 1990 Oct;9(4):751-62.

Bull MJ, Stroup KB, Feller N. Information needs of

parents of a child in a Pavlik harness [letter].

Orthop Nurs 1988 Sep-Oct;7(5):12.

Burks RT, Bean BG, Marcus R, Barker HB. Analysis

of athletic performance with prophylactic ankle

devices. Am J Sports Med 1991 Mar-Apr;19(2):

104-6.

Burl MM, Williams JG, Nayak US. Effects of cervical

collars on standing balance. Arch Phys Med

Rehabil 1992 Dec;73(12):1181-5.

Camden P, Nade S. Fracture bracing the humerus.

Injury 1992;23(4):245-8.

Carne P. Nonsurgical treatment of ankle sprains using

the modified Sarmiento brace. Am J Sports Med

1989 Mar-Apr;17(2):253-7.

Cassella MC, Hall JE. Current treatment approaches

in the nonoperative and operative management of

adolescent idiopathic scoliosis. Phys Ther 1991

Dec;71(12):897-909.

Cawley PW. Postoperative knee bracing. Clin Sports

Med 1990 Oct;9(4):763-70.

Cawley PW, France EP, Paulos LE. The current state

of functional knee bracing research. A review of

the literature. Am J Sports Med 1991 May-Jun;

19(3):226-33.

Cerny K, Perry J, Walker JM. Effect of an

unrestricted knee-ankle-foot orthosis on the stance

phase of gait in healthy persons. Orthopedics 1990

Oct;13(10):1121-7.

Charney EB, Melchionni JB, Smith DR. Community

ambulation by children with myelomeningocele and

high-level paralysis. J Pediatr Orthop 1991

Sep-Oct;11(5):579-82.

Chase AP, Bader DL, Houghton GR. The

biomechanical effectiveness of the Boston brace in

the management of adolescent idiopathic scoliosis.

Spine 1989 Jun;14(6):636-42.

Cheng JC, Cheung SS. Modified functional bracing in

the ambulatory treatment of femoral shaft fractures

in children. J Pediatr Orthop 1989 Jul-Aug;9(4):

457-62.

Cherf J, Paulos LE. Bracing for patellar instability.

Clin Sports Med 1990 Oct;9(4):813-21.

Chevalier J, Cordonnier D, Vinchon B, Bayart M.

[First-choice orthopedic treatment in congenital hip

dislocations discovered after walking age]. Acta

Orthop Belg 1990;56(1 Pt B):217-27. (Fre).

Cimino W, Ichtertz D, Slabaugh P. Early mobilization

of ankle fractures after open reduction and internal

fixation. Clin Orthop 1991 Jun;(267):152-6.

Clayman DA, Murakami ME, Vines FS. Compatibility

of cervical spine braces with MR imaging: a study

of nine nonferrous devices. AJNR Am J

Neuroradiol 1990 Mar-Apr;11(2):385-90.

Conry MA. Orthomedics fracture bracing at LA

County USC Medical Center. J Prosthet Orthot

1992 Apr;4(3):151-6.

Cooley WC, Melkonian G, Moses C, Moeschler JB.

Autosomal dominant familial spastic paraplegia:

description of a large New England family and a

study of management. Dev Med Child Neurol

1990 Dec;32(12):1098-104.

Coombs R, Green SA, Sarmiento A, eds. External

fixation and functional bracing. London: Orthotext;

1989. 419 p.

Cowart VS. Bracing those knees: how effective?

[news]. JAMA 1990 Jan 12;263(2):201.

Cunliffe MW. An adjustable thermoplastic knee brace,

directly moulded and colour coordinated. Br J

Occup Ther 1992 Nov;55(11):430-4.

Cunliffe MW. Lumbar spinal orthoses: direct

moulding using thermoplastic mesh sheet. Br J

Occup Ther 1990 Jun;53(6):244-8.

Curbow KJ. Effects of a double metal upright ankle-

foot orthosis on postural sway of normal subjects

[masters thesis]. Denton (TX): Texas Woman’s

University; 1991. 67 p.

de Ruiter M. Back to basics with ProFlex.

Ergonomics 1990 Mar;33(3):383-5.

Dahl T, Fretheim OJ. [Closed functional treatment of

fractures of the ulnar shaft]. Tidsskr Nor

Laegeforen 1993 Mar 10;113(7):857-8.

Daley BJ, Ralston JL, Brown TD, Brand RA. A

parametric design evaluation of lateral prophylactic

knee braces. J Biomech Eng 1993 May;115(2):

131-6.

de Vries J. Evaluation of lower leg orthosis use

following cerebro-vascular accident. Int J Rehabil

Res 1991;14(3):239-43.

Dearolf WW 3d, Betz RR, Vogel LC, Levin J, Clancy

M, Steel HH. Scoliosis in pediatric spinal cord-

injured patients. J Pediatr Orthop 1990 Mar-Apr;

10(2):214-8.

del Pozo LJ, Merino FJ, Imaz M, Vilella J, Campos A.

[Dermatosis in a girl with an orthopedic corset].

Enferm Infecc Microbiol Clin 1990 Nov;8(9):584-5.

(Spa).

Delamarter R, Hohl M. The cast brace and tibial

plateau fractures. Clin Orthop 1989 May;(242):

26-31.

Denner F, Siegling CW, Franke J, Hochheim B.

[Personal experiences using the Cheneau brace].

Beitr Orthop Traumatol 1990 Jul;37(7):378-82.

(Ger).

Devita P, Hunter PB, Skelly WA. Effects of a

functional knee brace on the biomechanics of

running. Med Sci Sports Exerc 1992 Jul;24(7):

797-806.

Dickson JH, Erwin WD. Scoliosis. Crit Rev Phys

Rehabil Med 1989;1(2):77-95.

Dostal M, Hradil J, Mihal V, Andresova S. [A

distraction abduction apparatus for treatment of

Calv�-Legg-Perthes disease]. Acta Chir Orthop

Traumatol Cech 1989 Dec;56(6):516-21. (Cze).

Drez D Jr. Knee braces. Video J Orthop Surg

[videocassette] 1989;3(5 Pt 2):[presentation 2, 23

min.]. 1 videocassette: sound, color, 1/2 in.

Durham JW, Moskowitz A, Whitney J. Surface

electrical stimulation versus brace in treatment of

idiopathic scoliosis. Spine 1990 Sep;15(9):888-92.

Edelmann P. Brace treatment in idiopathic scoliosis.

Acta Orthop Belg 1992;58 Suppl 1:85-90.

Edwards BG, Marsolais EB. Energy costs of

ambulation with reciprocal gait orthosis, electrical

stimulation, long leg braces and hybrids: A case

study. Clin Kinesiol 1990;44(2):43-7.

Engen T. Lightweight modular orthosis. Prosthet

Orthot Int 1989 Dec;13(3):125-9.

Enzenauer RJ, Nordstrom DM. Anterior interosseous

nerve syndrome associated with forearm band

treatment of lateral epicondylitis. Orthopedics 1991

Jul;14(7):788-90.

Erickson AR, Yasuda K, Beynnon B, Johnson R, Pope

M. An in vitro dynamic evaluation of prophylactic

knee braces during lateral impact loading. Am J

Sports Med 1993 Jan-Feb;21(1):26-35.

Evans DL, Bethem D. Cervical spine injuries in

children. J Pediatr Orthop 1989 Sep-Oct;9(5):

563-8.

Exner GU. [Current aspects of treatment for clubfoot

in infants and young children]. Schweiz Rundsch

Med Prax 1990 Nov 20;79(47):1452-6. (Ger).

Farmer MR. Controlling anterior tibial displacement

under static load: a comparison of two braces

[letter]. Orthopedics 1989 Mar;12(3):354-6.

Feldman MD, Bridwell KH, Sheridan JJ. Hyndman-

Schneider procedure for paraplegia caused by a

sharp, angular scoliosis: a case report and a review

of the literature. J Spinal Disord 1993 Feb;6(1):

76-82.

Feuerbach JW, Grabiner MD. Effect of the aircast on

unilateral postural control: amplitude and frequency

variables. J Orthop Sports Phys Ther 1993 Mar;

17(3):149-54.

Fisher LR, McLellan DL. Questionnaire assessment of

patient satisfaction with lower limb orthoses from a

district hospital. Prosthet Orthot Int 1989 Apr;

13(1):29-35.

Focarile FA, Bonaldi A, Giarolo MA, Ferrari U, Zilioli

E, Ottaviani C. Effectiveness of nonsurgical

treatment for idiopathic scoliosis. Overview of

available evidence. Spine 1991 Apr;16(4):395-401.

Gavin TM, Boscardin JB, Patwardhan AG, Bunch WH,

Zindrick MR, Lorenz MA, Vrbos LA. Preliminary

results of orthotic treatment for chronic low back

pain. J Prosthet Orthot 1993 Jan;5(1):5-9.

Gerber LH, Binder H, Weintrob J, Grange DK, Shapiro

J, Fromherz W, Berry R, Conway A, Nason S,

Marini J. Rehabilitation of children and infants

with osteogenesis imperfecta. A program for

ambulation. Clin Orthop 1990 Feb;(251):254-62.

Glover SD, Benson MK. Iliotibial band contracture

after using the Pavlik harness. J Bone Joint Surg

[Br] 1989 May;71(3):535.

Grocholski-Plescher B. ["Mobile occupational

therapy" for rheumatic patients: development of the

service, utilization and management with aids and

braces]. Z Rheumatol 1992;51 Suppl 1:35-40.

(Ger).

Gunnoe BA. Adolescent idiopathic scoliosis. Orthop

Rev 1990 Jan;19(1):35-43.

Gunnoe BA. Adolescent idiopathic scoliosis.

Physician Assist 1990 Sep;14(9):66-7, 70, 72

passim.

Hanger HC, Mulley GP. A survey of lower leg braces

worn by the over-60s. Clin Rehabil 1991 May;

5(2):95-101.

Hart DL. Spinal immobility: braces and corsets. In:

Gould JA 3rd, ed. Orthopaedic and sports physical

therapy. 2nd ed. St. Louis: Mosby; 1990.

p. 265-89.

Heary RF, Hunt CD, Krieger AJ, Antonio C,

Livingston DH. Acute stabilization of the cervical

spine by halo/vest application facilitates evaluation

and treatment of multiple trauma patients.

J Trauma 1992 Sep;33(3):445-51.

Herkert F, Ruflin G. [Experiences with conservative

therapy of humerus shaft fractures]. Z Unfallchir

Versicherungsmed 1992;85(4):202-14. (Ger).

Herndon JH. Distal radius fractures: nonsurgical

treatment options. Instr Course Lect 1993;42:

67-72.

Herring JA, Williams JJ, Neustadt JN, Early JS.

Evolution of femoral head deformity during the

healing phase of Legg-Calv�-Perthes disease.

J Pediatr Orthop 1993 Jan-Feb;13(1):41-5.

Hierholzer G, Ludolph E. [Indications, choice of

procedure and results of conservative therapy of

spinal injuries]. Langenbecks Arch Chir Suppl

Kongressbd 1992:274-7. (Ger).

Highgenboten CL, Jackson A, Meske N, Smith J. The

effects of knee brace wear on perceptual and

metabolic variables during horizontal treadmill

running. Am J Sports Med 1991 Nov-Dec;19(6):

639-43.

Hokken W, Kalkman S, Blanken WC, van Asbeck FW.

A dynamic pronation orthosis for the C6

tetraplegic arm. Arch Phys Med Rehabil 1993 Jan;

74(1):104-5.

Home Study Program. Congenital dysplasia of the hip.

AORN J 1989 Jun;49(6):1563-612.

Hong C, San Luis EB, Chung S. Follow up study on

the use of leg braces issued to spinal cord injury

patients. Paraplegia 1990;28(3):172-7.

Hoppenfeld S, Lopez RA, Molnar G. Plantar weight-

bearing pattern in idiopathic scoliosis. Spine 1991

Jul;16(7):757-60.

Hsu JD, Furumasu J. Gait and posture changes in the

Duchenne muscular dystrophy child. Club Orthop

1993 Mar;(288):122-5.

Hullin MG, Robb JE, Loudon IR. Ankle-foot orthosis

function in low-level myelomeningocele. J Pediatr

Orthop 1992 Jul-Aug;12(4):518-21.

Hylton N. Dynamic casting and orthotics. In: Glenn

MB, Whyte J, eds. Practical management of

spasticity in children and adults. Philadelphia: Lea

& Febiger; 1990. p. 167-200.

Isakov E, Mizrahi J, Onna I, Susak Z. The control of

genu recurvatum by combining the Swedish knee-

cage and an ankle-foot brace. Disabil Rehabil 1992

Oct-Dec;14(4):187-91.

Jefferson RJ, Whittle MW. Performance of three

walking orthoses for the paralysed: a case study

using gait analysis. Prosthet Orthot Int 1990 Dec;

14(3):103-10.

Johnston CE 2d. Infantile tibia vara. Clin Orthop

1990 Jun;(255):13-23.

Johnston JM, Paulos LE. Prophylactic lateral knee

braces. Med Sci Sports Exerc 1991 Jul;23(7):

783-7.

Kahanovitz N, Weiser S. The psychological impact of

idiopathic scoliosis on the adolescent female. A

preliminary multi-center study. Spine 1989 May;

14(5):483-5.

Karjalainen M, Aho AJ, Katevuo K. Painful spine

after stable fractures of the thoracic and lumbar

spine. What benefit from the use of extension

brace? Ann Chir Gynaecol 1991;80(1):45-8.

Keim HA, Hensinger RN. Spinal deformities.

Scoliosis and kyphosis. Clin Symp 1989;41(4):

3-32.

Keller RB. Nonoperative treatment of adolescent

idiopathic scoliosis. Instr Course Lect 1989;38:

129-35.

Kennedy JD, Robertson CF, Hudson I, Phelan PD.

Effect of bracing on respiratory mechanics in mild

idiopathic scoliosis. Thorax 1989 Jul;44(7):548-53.

King GJ, Schatzker J. Nonunion of a complex tibial

plateau fracture. J Orthop Trauma 1991;5(2):

209-12.

King HA. Orthotic management of idiopathic

scoliosis. Phys Med Rehabil Clin North Am 1992

Feb;3(1):45-55.

Knee bracing. Clin Sports Med 1990 Oct;9(4):731-869.

Labelle H, Dansereau J, Bellefleur C, Poitras B. [3-D

study of the immediate effect of the Boston brace

on the scoliotic lumbar spine]. Ann Chir

1992;46(9):814-20.

Lawhon SM, Ballard WT, Hays KR. Orthopaedic

aspects of Down Syndrome. Contemp Orthop 1990

Apr;20(4):395-403.

Ledingham WM, Wytch R, Goring CC, Mathieson AB,

Wardlaw D. On immediate functional bracing of

Colles’ fracture. Injury 1991 May;22(3):197-201.

Lehmann JF. Push-off and propulsion of the body in

normal and abnormal gait. Correction by ankle-foot

orthoses. Clin Orthop 1993 Mar;(288):97-108.

Letts M, Rathbone D, Yamashita T, Nichol B, Keeler

A. Soft Boston orthosis in management of

neuromuscular scoliosis: a preliminary report.

J Pediatr Orthop 1992 Jul-Aug;12(4):470-4.

Levy J, Ward WT. Pediatric femur fractures: an

overview of treatment. Orthopedics 1993 Feb;

16(2):183-90.

Liggins AB. Quantitative assessment of knee

stabilization orthoses [dissertation]. Salford (UK):

University of Salford; 1989. 464 p.

Limbird TJ, Stills M, Elliott D, Wharton G. Lower

extremity telescopic orthosis for immediate fitting

in paraplegia. Orthopedics 1989 Jun;12(6):851-4.

Lofvenberg R, Karrholm J. The influence of an ankle

orthosis on the talar and calcaneal motions in

chronic lateral instability of the ankle. A

stereophotogrammetric analysis. Am J Sports Med

1993 Mar-Apr;21(2):224-30.

Lyles M, Munday J. Report on the evaluation of the

Vannini-Rizzoli Stabilizing Limb Orthosis.

J Rehabil Res Dev 1992 Spring;29(2):77-104.

MacLean WE Jr, Green NE, Pierre CB, Ray DC.

Stress and coping with scoliosis: psychological

effects on adolescents and their families. J Pediatr

Orthop 1989 May-Jun;9(3):257-61.

Madden G. Orthotic management for osteochondritis

dissecans of the talar dome. J Prosthet Orthot 1989

Jan;1(2):72-5.

Maeda CJ, Baydur A, Waters RL, Adkins RH. The

effect of the halovest and body position on

pulmonary function in quadriplegia. J Spinal

Disord 1990 Mar;3(1):47-51.

Magyari Z, Kadas I, Salacz T. [Management of lower

leg fractures by external fixators and thermoplastic

braces. Preliminary report]. Magy Traumatol

Orthop Helyreallito Sebesz 1992;35(1):55-60.

(Hun).

Magyari Z, Salacz T, Kadas I. [Management of upper

arm fractures using a thermoplastic functional

brace]. Magy Traumatol Orthop Helyreallito

Sebesz 1992;35(4):325-31. (Hun).

Maiman D, Millington P, Novak S, Kerk J, Ellingsen J,

Wenninger W. The effect of the thermoplastic

Minerva body jacket on cervical spine motion.

Neurosurgery 1989 Sep;25(3):363-7; discussion

367-8.

Marchesi D, Rudeberg A, Aebi M. [Development in

conservatively treated scoliosis in patients with

myelomeningocele (patients of the years

1964-1977)]. Acta Orthop Belg 1991;57(4):390-8.

(Fre).

Martin N. The comparative effectiveness of ankle

prophylactic devices in limiting inversion before

and after vigorous exercise [masters thesis]. San

Jose (CA): San Jose State University; 1991. 74 p.

Martinez AG, Weinstein SL, Dietz FR. The weight-

bearing abduction brace for the treatment of Legg-

Perthes disease. J Bone Joint Surg [Am] 1992 Jan;

74(1):12-21.

Mazur JM, Sienko-Thomas S, Wright N, Cummings RJ.

Swing-through vs. reciprocating gait patterns in

patients with thoracic-level spina bifida.

Z Kinderchir 1990 Dec;45 Suppl 1:23-5.

Mehta MH. The conservative management of Juvenile

Idiopathic Scoliosis. Acta Orthop Belg 1992;58

Suppl 1:91-7.

Milford PI, Dunleavy PJ. A pilot trial of treatment of

acute inversion sprains to the ankle by ankle

supports. J R Nav Med Serv 1990 Summer;76(2):

97-100.

Miller EA, Hergenroeder AC. Prophylactic ankle

bracing. Pediatr Clin North Am 1990 Oct;37(5):

1175-85.

Miller RA, Hardcastle P, Renwick SE. Lower spinal

mobility and external immobilization in the normal

and pathologic condition. Orthop Rev 1992 Jun;

21(6):753-7.

Mishra DK, Daniel DM, Stone ML. The use of

functional knee braces in the control of pathologic

anterior knee laxity. Clin Orthop 1989 Apr;(241):

213-20.

Moir JS, Wytch R, Ashcroft GP, Neil G, Ross N,

Wardlaw D. Intracast pressure measurements in

Colles’ fractures. Injury 1991 Nov;22(6):446-50.

Mok DW, Good C. Non-operative management of

acute grade III medial collateral ligament injury of

the knee: a prospective study. Injury 1989 Sep;

20(5):277-80.

Montgomery DL, Koziris PL. The knee brace

controversy. Sports Med 1989 Nov;8(5):260-72.

Montgomery F, Willner S. Prognosis of brace-treated

scoliosis. Comparison of the Boston and Milwaukee

methods in 244 girls. Acta Orthop Scand 1989

Aug;60(4):383-5.

Montgomery F, Willner S, Appelgren G. Long-term

follow-up of patients with adolescent idiopathic

scoliosis treated conservatively: an analysis of the

clinical value of progression. J Pediatr Orthop

1990 Jan-Feb;10(1):48-52.

Motte KM. Making a thoraco-lumbo-sacral orthosis.

Orthop Nurs 1991 Jul-Aug;10(4):59-62.

Mubarak SJ. Idiopathic scoliosis. Audio Dig Orthop

[audiocassette] 1992 Jan;15(1):Side A [presentation

1, 21 min.]. Accompanied by: 1 guide.

Mubarak SJ, Camp JF, Vuletich W, Wenger DR, Garfin

SR. Halo application in the infant. J Pediatr

Orthop 1989 Sep-Oct;9(5):612-4.

Mukherjee A, Fabry G. Evaluation of the prognostic

indices in Legg-Calv�-Perthes disease: statistical

analysis of 116 hips. J Pediatr Orthop 1990

Mar-Apr;10(2):153-8.

Naumann T, Zahniel K. Comparing the rate of

femoral head necrosis of two different treatments of

congenital dislocation of the hip. J Pediatr Orthop

1990 Nov-Dec;10(6):780-5.

Nene AV, Patrick JH. Energy cost of paraplegic

locomotion using the ParaWalker--electrical

stimulation "hybrid" orthosis. Arch Phys Med

Rehabil 1990 Feb;71(2):116-20.

Niijima M, Mizushima K, Fujita N. [Preparation of a

care manual for patients using a halo brace].

Kango Gijutsu 1989 Jun;35(9):1112-4. (Jpn).

North B, North C, Lee JL. Living in a halo [published

erratum appears in Am J Nurs 1992 May;92(5):27].

Am J Nurs 1992 Apr;92(4):54-6.

Oberlander MA, Seidman GD, Whitelaw GP.

Treatment of isolated ulnar shaft fractures with

functional bracing. Orthopedics 1993 Jan;16(1):

29-32.

Ogilvie JW. Adult scoliosis: evaluation and

nonsurgical treatment. Instr Course Lect 1992;

41:251-5.

Olson B, Ustanko L. Self-care needs of patients in the

halo brace [published erratum appears in Orthop

Nurs 1990 May-Jun;9(3):90]. Orthop Nurs 1990

Jan-Feb;9(1):27-33, 52.

Olson B, Ustanko L, Warner S. The patient in a halo

brace: striving for normalcy in body image and

self-concept. Orthop Nurs 1991 Jan-

Feb;10(1):44-50.

Ott JW, Clancy WG Jr. Functional knee braces.

Orthopedics 1993 Feb;16(2):171-5; discussion

175-6.

Petrofsky JS, Smith J. A combined computer-

controlled walking and exercise system. J Clin Eng

1991 May-Jun;16(3):223-35.

Pettine KA, Salib RM, Walker SG. External electrical

stimulation and bracing for treatment of

spondylolysis. A case report. Spine 1993 Mar 15;

18(4):436-9.

Pfeiffer U, Hahnel H. [Use of the halo-gravitation-

extension in preoperative preparation in severe

scoliosis]. Beitr Orthop Traumatol 1990 Jul;37(7):

382-91. (Ger).

Phillips CA. Functional electrical stimulation and

lower extremity bracing for ambulation exercise of

the spinal cord injured individual: a medically

prescribed system. Phys Ther 1989 Oct;69(10):

842-9.

Phillips DP, Lindseth RE. Ambulation after transfer of

adductors, external oblique, and tensor fascia lata in

myelomeningocele. J Pediatr Orthop 1992

Nov-Dec;12(6):712-7.

Piazza MR, Bassett GS. Curve progression after

treatment with the Wilmington brace for idiopathic

scoliosis. J Pediatr Orthop 1990 Jan-Feb;10(1):

39-43.

Pichora DR, McMurtry RY, Bell MJ. Gamekeepers

thumb: a prospective study of functional bracing.

J Hand Surg [Am] 1989 May;14(3):567-73.

Pieper B, Rodammer G, Gradinger R. [The value of

knee joint orthoses in performance sports].

Fortschr Med 1989 Feb 28;107(6):150-2. (Ger).

Pope MH, Broman H, Hansson T. Factors affecting

the dynamic response of the seated subject.

J Spinal Disord 1990 Jun;3(2):135-42.

Popovic D, Schwirtlich L, Kim Y, Spelman FA.

Sensory feed-back in hybrid orthotic system. In:

Kim Y, Spelman FA, eds. Images of the twenty-

first century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Vol. 5. Piscataway (NJ): IEEE; 1989.

p. 1475-6.

Popovic D, Tomovic R, Schwirtlich L. Hybrid

assistive system--the motor neuroprosthesis. IEEE

Trans Biomed Eng 1989 Jul;36(7):729-37.

Popovic DB. Dynamics of the self-fitting modular

orthosis. IEEE Trans Robot Autom 1990 Apr;6(2):

200-7.

Price CT, Scott DS, Reed FE Jr, Riddick MF.

Nighttime bracing for adolescent idiopathic

scoliosis with the Charleston bending brace.

Preliminary report. Spine 1990 Dec;15(12):1294-9.

PTB cast, long-leg cast-braces, and hip spica casts

[videocassette]. United States: American Academy

of Orthopedic Surgeons; 1990. 1 videocassette: 16

min., sound, color, 1/2 in.

Pun WK, Chow SP, Fang D, Ip FK, Leong JC, Ng C.

A study of function and residual joint stiffness after

functional bracing of tibial shaft fractures. Clin

Orthop 1991 Jun;(267):157-63.

Racette WL. Clinical experience with functional

fracture bracing of the tibial diaphysis. J Prosthet

Orthot 1992 Apr;4(3):142-50.

Rader L, Tausch W. [Functional conservative

treatment of humerus shaft fracture with the plaster

brace]. Zentralbl Chir 1991;116(8):525-30. (Ger).

Rao S, Patel A, Schilhauer T. Osteogenesis imperfecta

as a differential diagnosis of pathologic burst

fractures of the spine. A case report. Clin Orthop

1993 Apr;(289):113-7.

Rebman LW. Knee braces [letter]. Orthopedics 1989

Mar;12(3):354.

Reding MJ, McDowell FH. Focused stroke

rehabilitation programs improve outcome. Arch

Neurol 1989 Jun;46(6):700-1.

Refsum HE, Naess-Andresen CF, Lange JE.

Pulmonary function and gas exchange at rest and

exercise in adolescent girls with mild idiopathic

scoliosis during treatment with Boston thoracic

brace. Spine 1990 May;15(5):420-3.

Regalbuto MA, Rovick JS, Walker PS. The forces in

a knee brace as a function of hinge design and

placement. Am J Sports Med 1989 Jul-Aug;17(4):

535-43.

Reid DT, Sochaniwskyj A. Influences of a hand

positioning device on upper-extremity control of

children with cerebral palsy. Int J Rehabil Res

1992;15(1):15-29.

Reikereas O. Brace with a lateral pad for patellar

pain. 2-year follow-up of 25 patients. Acta Orthop

Scand 1990 Aug;61(4):319-20.

Requa RK, Garrick JG. Clinical significance and

evaluation of prophylactic knee brace studies in

football. Clin Sports Med 1990 Oct;9(4):853-69.

Requa RK, Garrick JG. A review of the use of

prophylactic knee braces in football. Pediatr Clin

North Am 1990 Oct;37(5):1165-73.

Riegler HF. Orthotic devices in winter sports. In: Casey

MJ, Foster C, Hixson EG, eds. Winter sports

medicine. Philadelphia: F.A. Davis; 1990.

p. 56-65. (Contemporary exercise and sports

medicine; vol. 3).

Ries MD, Ray S, Winter RB, Bowen JR. Scoliosis in

trisomy 18. Spine 1990 Dec;15(12):1281-4.

Rinsky LA. Advances in management of idiopathic

scoliosis. Hosp Pract (Off Ed) 1992 Apr 15;27(4):

49-55.

Rovere GD, Curl WW, Browning DG. Bracing and

taping in an office sports medicine practice. Clin

Sports Med 1989 Jul;8(3):497-515.

Sakamoto H. [Cap brace: a new treatment for

newborn and infant congenital muscular torticollis].

Nippon Seikeigeka Gakkai Zasshi 1992 Nov;66(11):

1123-36. (Jpn).

Sarmiento A, Gersten LM, Sobol PA, Shankwiler JA,

Vangsness CT. Tibial shaft fractures treated with

functional braces. Experience with 780 fractures.

J Bone Joint Surg [Br] 1989 Aug;71(4):602-9.

Sauter WF, Bush G, Sommerville J. A single case

study: myoelectrically controlled exoskeletal

mobilizer for amyotrophic lateral sclerosis (ALS)

patients. Prosthet Orthot Int 1989 Dec;13(3):145-8.

Schlenzka D, Ylikoski M, Poussa M. [Experiences

with lateral electric surface stimulation in the

treatment of idiopathic scoliosis]. Beitr Orthop

Traumatol 1990 Jul;37(7):373-8. (Ger).

Schlickewei W, Schutzhoff G, Kuner EH. [Early

functional treatment of fractures of the lower

thoracic and lumbar vertebrae with a 3-point brace].

Unfallchirurg 1991 Jan;94(1):40-4. (Ger).

Schultz AB. The use of mathematical models for

studies of scoliosis biomechanics. Spine 1991

Oct;16(10):1211-6.

Scoloveno MA, Yarcheski A, Mahon NE. Scoliosis

treatment effects on selected variables among

adolescents. West J Nurs Res 1990 Oct;12(5):

601-15; discussion 615-8.

Seltsa K. Of spines, braces and steel rods. Med J

Aust 1992 Mar 2;156(5):354-5.

Sharma VK, Jain AK, Gupta RK, Tyagi AK, Sethi PK.

Non-operative treatment of fractures of the humeral

shaft: a comparative study. J Indian Med Assoc

1991 Jun;89(6):157-60.

Shepherd CC, Ruzicka SH. Tenodesis brace use by

persons with spinal cord injuries. Am J Occup

Ther 1991 Jan;45(1):81-3.

Shoppee K. Developmental dysplasia of the hip.

Orthop Nurs 1992 Sep-Oct;11(5):30-6.

Sitler M, Ryan J, Hopkinson W, Wheeler J, Santomier

J, Kolb R, Polley D. The efficacy of a

prophylactic knee brace to reduce knee injuries in

football. A prospective, randomized study at West

Point. Am J Sports Med 1990 May-Jun;18(3):

310-5.

Slongo T, Kehrer B, Braga S, R:udeberg A.

[Experiences with the early treatment of

osteogenesis imperfecta]. Z Kinderchir 1989 Oct;

44(5):293-6. (Ger).

Snyder-Mackler L, Epler M. Effect of standard and

Aircast tennis elbow bands on integrated

electromyography of forearm extensor musculature

proximal to the bands. Am J Sports Med 1989

Mar-Apr;17(2):278-81.

Solgaard S, Bunger C, Slund K. Displaced distal

radius fractures. A comparative study of early

results following external fixation, functional bracing in supination, or dorsal plaster

immobilization. Arch Orthop Trauma Surg 1990;

109(1):34-8.

Sombolos K, Kapetanos G, Kalogeras KT,

Christodoulou A, Chrousos GP, Symeonidis P.

Effect on atrial natriuretic peptide by bracing in

scoliosis. Boston brace removal studied in 10 cases.

Acta Orthop Scand 1991 Aug;62(4):379-82.

Staheli LT. Managing hip dysplasia. Audio Dig Orthop

[audiocassette] 1990 Nov;13(11):Side A

[presentation 1, 17 min.]. Accompanied by: 1

guide.

Steadman AK, Netscher DT. A detachable thumb

spica for a rheumatoid brace. J Hand Surg [Am]

1991 May;16(3):564-6.

Stearns ZR, Lacassie Y, MacEwen GD. Perthes-like

disease and the tricho-rhino-phalangeal syndromes:

the first black patient. Orthopedics 1990 Apr;

13(4):468-73.

Stein V, Horner K. [The abduction orthosis, a

therapeutic variant in Perthes’ disease]. Beitr

Orthop Traumatol 1990 Apr;37(4):242-5. (Ger).

Stern EB. Wrist extensor orthoses: dexterity and grip

strength across four styles. Am J Occup Ther 1991

Jan;45(1):42-9.

Stromqvist B, Johnsson R, Jonsson K, Sunden G.

Early intensive treatment of clubfoot. 75 feet

followed for 6-11 years. Acta Orthop Scand 1992

Apr;63(2):183-8.

Stuart PR, Brumby C, Smith SR. Comparative study

of functional bracing and plaster cast treatment of

stable lateral malleolar fractures. Injury 1989 Nov;

20(6):323-6.

Stuberg WA. Considerations related to weight-bearing

programs in children with developmental

disabilities. Phys Ther 1992 Jan;72(1):35-40.

Styf JR, Nakhostine M, Gershuni DH. Functional

knee braces increase intramuscular pressures in the

anterior compartment of the leg. Am J Sports Med

1992 Jan-Feb;20(1):46-9.

Szabo RM. Extra-articular fractures of the distal

radius. Orthop Clin North Am 1993 Apr;24(2):

229-37.

Taylor A, McNamara A. Ambulation status of adults

with myelomeningocoele. Z Kinderchir 1990 Dec;

45 Suppl 1:32-3.

Taylor TK, Cummine JL. Of spines, braces and steel

rods [letter]. Med J Aust 1992 May 18;156(10):

742.

Tegner Y, Lorentzon R. Evaluation of knee braces in

Swedish ice hockey players. Br J Sports Med 1991

Sep;25(3):159-61.

Teloken M. Current concepts review. Reduction of

congenital dislocation of the hip [letter]. J Bone

Joint Surg Am 1992 Dec;74(10):1579.

Theodorou SD. Conservative treatment of congenital

dislocation of the hip in infants 1 to 9 months of

age. Acta Orthop Belg 1990;56(1 Pt A):167-75.

Theodorou SD, Gerostathopoulos N. Congenital

dislocation of the hip. Observations on the early

diagnosis and results of treatment with an abduction

brace in infants two to nine months of age in

Greece. Clin Orthop 1989 Sep;(246):22-9.

Thomas SE, Mazur JM, Child ME, Supan TJ.

Quantitative evaluation of AFO use with

myelomeningocele children. Z Kinderchir 1989

Dec;44 Suppl 1:38-40.

Thovez G, Castelli PG, Ferrari C, Siclari A, Schneider

L. [Halo vest in the treatment of fractures of the

upper cervical spine. Fractures of the epistropheus.

Minerva Med 1992 Dec;83(12 Suppl 1):83-7. (Ita).

Tomory I. [Idiopathic scoliosis in adults]. Orv Hetil

1990 Aug 19;131(33):1799-801. (Hun).

Tomory I. [Significance of early conservative

treatment of idiopathic scoliosis in young children].

Magy Traumatol Orthop Helyreallito Sebesz 1991;

34(1):25-8. (Hun).

Torode IP. Of spines, braces and steel rods [letter].

Med J Aust 1992 Jul 20;157(2):141.

Toth L, Slechta J, Vlach O. [Personal experience with

the Milwaukee orthosis in the treatment of

idiopathic scoliosis]. Acta Chir Orthop Traumatol

Cech 1989 Apr;56(2):122-8. (Cze).

Touzet P, Chaumien JP, Rigault P, Padovani JP.

[Pavlik’s harness in congenital hip dislocation

before the first birthday]. Acta Orthop Belg

1990;56(1 Pt A):141-7. (Fre).

Traynelis VC, Gold M. Cervical spine injury in an

air-bag-equipped vehicle. J Spinal Disord 1993

Feb;6(1):60-1.

Truong XT. Bracing for serratus anterior palsy [letter].

Arch Phys Med Rehabil 1993 Apr;74(4):447.

Tscherne H, Wippermann B. [Functional therapy in

treatment of fractures and joint injuries]. Zentralbl

Chir 1990;115(16):997-1005. (Ger).

Tscherne H, Wippermann BW. [Conservative

treatment in fractures of the upper limb]. Chirurg

1990 Nov;61(11):752-60. (Ger).

Vailas JC, Pink M. Biomechanical effects of

functional knee bracing. Practical implications.

Sports Med 1993 Mar;15(3):210-8.

van der Hoeven H, van der Net J, Helders PJ, Keessen

W. [Physiotherapy and orthopedic treatment of

juvenile chronic arthritis]. Tijdschr Kindergeneeskd

1991 Oct;59(5):167-72. (Dut).

van Raay JJ, Logghe R, van der Werken C.

[Treatment of isolated ulnar shaft fractures using

Sarmiento’s method]. Ned Tijdschr Geneeskd 1989

Mar 11;133(10):507-9. (Dut).

Vaucher D, Dutoit M, Anderegg A. [Early diagnosis

and ambulatory treatment of congenital dislocation

of the hip]. Rev Med Suisse Romande 1990 Mar;

110(3):265-70. (Fre).

Veldhuizen JW, Koene FM, Oostvogel HJ, von Thiel

TP, Verstappen FT. The effects of a supportive

knee brace on leg performance in healthy subjects.

Int J Sports Med 1991 Dec;12(6):577-80.

von Gumppenberg S, Claudi B. [Conservative fracture

treatment of the cervical spine with halo fixation].

Aktuel Traumatol 1989 Apr;19(2):57-60. (Ger).

von Gumppenberg S, Vieweg J, Claudi B, Harms J.

[Primary management of fresh injuries of the

thoracic and lumbar vertebrae]. Aktuel Traumatol

1991 Dec;21(6):265-73. (Ger).

Weisz I, Jefferson RJ, Carr AJ, Turner-Smith AR,

McInerney A, Houghton GR. Back shape in brace

treatment of idiopathic scoliosis. Clin Orthop 1989

Mar;(240):157-63.

White M, Hammer G. SDIO technology transfer:

lightweight composite brace. In: Technology for the

next decade. RESNA ’89: proceedings of the 12th

annual conference; 1989 Jun 25-30; New Orleans,

LA. Washington (DC): RESNA Press; 1989.

p. 200-1.

Whitelaw GP, Wetzler MJ, Levy AS, Segal D,

Bissonnette K. A pneumatic leg brace for the

treatment of tibial stress fractures. Clin Orthop

1991 Sep;(270):301-5.

Willers U, Normelli H, Aaro S, Svensson O, Hedlund

R. Long-term results of Boston brace treatment on

vertebral rotation in idiopathic scoliosis. Spine

1993 Mar 15;18(4):432-5.

Willner S. [Scoliosis--a review]. Nord Med

1990;105(3):82-5. (Swe).

Willner SW. Test instrument for predicting the effect

of rigid braces in cases with low back pain.

Prosthet Orthot Int 1990 Apr;14(1):22-6.

Wojtys EM, Loubert PV, Samson SY, Viviano DM.

Use of a knee-brace for control of tibial translation

and rotation. A comparison, in cadavera, of

available models. J Bone Joint Surg [Am] 1990

Oct;72(9):1323-9.

Wolter D, Reimann B. [Possibilities and limits of

therapy of injuries of the cervical vertebrae with halo fixation]. Unfallchirurgie 1989 Apr;15(2):

83-94. (Ger).

Womter RB. The Milwaukee Brace - 1992. J Assoc

Child Prosthet Orthot Clin 1992 Summer;27(1):

16-24.

Wong AM, Tang FT, Wu SH, Chen CM. Clinical trial

of a low-temperature plastic anterior ankle foot

orthosis. Am J Phys Med Rehabil 1992 Feb;71(1):

41-3.

Wynarsky GT, Schultz AB. Optimization of skeletal

configuration: studies of scoliosis correction

biomechanics. J Biomech 1991;24(8):721-32.

Wynarsky GT, Schultz AB. Trunk muscle activities in

braced scoliosis patients. Spine 1989 Dec;14(12):

1283-6.

Ylikoski M, Peltonen J, Poussa M. Biological factors

and predictability of bracing in adolescent

idiopathic scoliosis. J Pediatr Orthop 1989 Nov-

Dec;9(6):680-3.

Young R, Kersting R, Westermann K. [Sarmiento

function fracture treatment of the tibia].

Unfallchirurg 1989 Aug;92(8):394-8. (Ger).

Zachazewski JE, Geissler G. When to prescribe a

knee brace. Physician Sportsmed 1992 Nov;20(11):

91-6, 99.

Zagorski JB, Zych GA, Latta LL, Finnieston AR.

Orthotic design and application for functional

treatment of tibial shaft fractures. J Prosthet Orthot

1992 Apr;4(3):126-41.

Zwart S, Voorhoeve HW. [Functional treatment of

Colles’ fractures and the relationship between

anatomical recovery and function (letter)]. Ned

Tijdschr Geneeskd 1989 Jun 10;133(23):1189.

(Dut).

Harnesses

Atar D, Lehman WB, Grant AD. Pavlik harness

pathology. Isr J Med Sci 1991 Jun;27(6):325-30.

Atar D, Lehman WB, Tenenbaum Y, Grant AD. Pavlik

harness versus Frejka splint in the treatment of

developmental dysplasia of the hip: bicenter study.

J Pediatr Orthop 1993 May-Jun;13(3):311-3.

Bull MJ, Stroup KB, Feller N. Information needs of

parents of a child in a Pavlik harness [letter].

Orthop Nurs 1988 Sep-Oct;7(5):12.

Corbett D. Information needs of parents of a child in

a Pavlik harness. Orthop Nurs 1988 Mar-Apr;

7(2):20-3.

Curry LC, Gibson LY. Congenital hip dislocation: the

importance of early detection and comprehensive

treatment. Nurse Pract 1992 May;17(5):49-55.

Dobner DL. A prosthetic harness adaptation. Arch

Phys Med Rehabil 1990 May;71(6):436-8.

Harburn KL, Hill KM, Kramer JF, Noh S, Vandervoort

AA, Matheson JE. An overhead harness and trolly

system for balance and ambulation assessment and

training. Arch Phys Med Rehabil 1993

Feb;74(2):220-3.

Harris IE, Dickens R, Menelaus MB. Use of the

Pavlik harness for hip displacements. When to

abandon treatment. Clin Orthop 1992 Aug;(281):

29-33.

Jones GT, Schoenecker PL, Dias LS. Developmental

hip dysplasia potentiated by inappropriate use of the

Pavlik harness. J Pediatr Orthop 1992 Nov-Dec;

12(6):722-6.

Lotem M. Use of the Pavlik harness in congenital

dislocation of the hip [letter]. J Bone Joint Surg

[Am] 1991 Mar;73(3):472.

McHale KA, Corbett D. Parental noncompliance with

Pavlik harness treatment of infantile hip problems.

J Pediatr Orthop 1989 Nov-Dec;9(6):649-52.

Mitani S, Oda K, Tanabe G. Prediction for prognosis

from radiologic measurements of patients treated

with the Pavlik harness for congenital dislocation of

the hip. J Pediatr Orthop 1993 May-Jun;13(3):

303-10.

Pavlik A. The functional method of treatment using a

harness with stirrups as the primary method of

conservative therapy for infants with congenital

dislocation of the hip. 1957 [classical article]. Clin

Orthop 1992 Aug;(281):4-10.

Polanuer PA, Harcke HT, Bowen JR. Effective use of

ultrasound in the management of congenital

dislocation and/or dysplasia of the hip. Clin Orthop

1990 Mar;(252):176-81.

Rombouts JJ, Kaelin A. Inferior (obturator)

dislocation of the hip in neonates. A complication

of treatment by the Pavlik harness. J Bone Joint

Surg [Br] 1992 Sep;74(5):708-10.

Speers AT, Speers M. Care of the infant in a Pavlik

harness. Pediatr Nurs 1992 May-Jun;18(3):229-32,

252.

Suzuki S. Ultrasound and the Pavlik harness in CDH.

J Bone Jt Surg Br 1993 May;75(3):483-7.

Suzuki S, Yamamuro T. Avascular necrosis in

patients treated with the Pavlik harness for

congenital dislocation of the hip. J Bone Jt Surg

Am 1990 Jul;72(7):1048-55.

Touzet P, Chaumien JP, Rigault P, Padovani JP.

[Pavlik’s harness in congenital hip dislocation

before the first birthday]. Acta Orthop Belg 1990;

56(1 Pt A):141-7. (Fre).

Tucci JJ, Kumar SJ, Guille JT, Rubbo ER. Late

acetabular dysplasia following early successful

Pavlik harness treatment of congenital dislocation

of the hip. J Pediatr Orthop 1991 Jul-Aug;11(4):

502-5.

Viere RG, Birch JG, Herring JA, Roach JW, Johnston

CE. Use of the Pavlik harness in congenital

dislocation of the hip. An analysis of failures of

treatment. J Bone Jt Surg Am 1990 Feb;72(2):

238-34.

Splints

Ader PB, Nadel E, Wingate L. A survey of

postoperative elbow immobilization approaches.

J Burn Care Rehabil 1992 May-Jun;13(3):365-70.

Aron M. The use and effectiveness of elbow splints in

the Rett syndrome. Brain Dev 1990;12(1):162-3.

Ashall G, Foster A. The cage splint: an added

protection for flexor tendon repair. J Hand Surg

[Br] 1989 Feb;14(1):128.

Atar D, Lehman WB, Tenenbaum Y, Grant AD. Pavlik

harness versus Frejka splint in the treatment of

developmental dysplasia of the hip: bicenter study.

J Pediatr Orthop 1993 May-Jun;13(3):311-3.

Barrett DS, Donell ST. Entrapment neuropathies: 1.

Upper limb. Br J Hosp Med 1991 Aug;46(2):94-8.

Barth A. [Indications and technic of conservative

fracture treatment with a plastic arm splint with

velcro straps (brace)]. Zentralbl Chir 1990;115(4):

235-8. (Ger).

Beck-Foehn M. [Occupationally-induced carpal tunnel

syndrome]. Nervenarzt 1992 Aug;63(8):467-72.

(Ger).

Bensahel H, Dal Monte A, Hjelmstedt A, Bjerkreim I,

Wientroub S, Matasovic T, Porat S, Bialik V.

Congenital dislocation of the knee. J Pediatr

Orthop 1989 Mar-Apr;9(2):174-7.

Bensahel H, Guillaume A, Czukonyi Z, Desgrippes Y.

Results of physical therapy for idiopathic clubfoot:

a long-term follow-up study. J Pediatr Orthop 1990

Mar-Apr;10(2):189-92.

Benzel EC, Larson SJ. Postoperative stabilization of

the posttraumatic thoracic and lumbar spine: a

review of concepts and orthotic techniques.

J Spinal Disord 1989 Mar;2(1):47-51.

Benzel EC, Larson SJ, Kerk JJ, Millington PJ, Novak

SM, Falkner RH, Wenninger WJ. The

thermoplastic Minerva body jacket: a clinical

comparison with other cervical spine splinting

techniques. J Spinal Disord 1992 Sep;5(3):311-9.

Bernau A. [The Tubingen hip flexion splint in the

treatment of hip dysplasia]. Z Orthop 1990

Jul-Aug;128(4):432-5. (Ger).

A better splint for the burned hand. Emerg Med 1989

Jun 30;21(12):66, 68.

Bhattacharya S, Bhatnagar SK, Chandra R. Postburn

contracture of the neck--our experience with a new

dynamic extension splint. Burns 1991 Feb;17(1):

65-7.

Bishop AT, Hench PK, Lacroix E, Millender LH, Opitz

JL. Keeping the rheumatoid hand working.

Patient Care 1991 Oct 30;25(17):74-8, 80, 85-6.

Blizzard P. Save our thumbs. Physiotherapy 1991;

77(8):573-4.

Bongi SM. A personalised splint for osteoarthritis.

Nurs Times 1992 Feb 12-18;88(7):46-7.

Bora FW Jr, Culp RW, Osterman AL, Skirven T. A

flexible wrist splint. J Hand Surg [Am] 1989 May;

14(3):574-5.

Borrelli AH. A modification of digital splinting to

prevent neurovascular impairment. J Am Podiatr

Med Assoc 1989 Jan;79(1):34-5.

Boyer JJ. Are tenodesis splints cost efficient? [letter].

Am J Occup Ther 1990 Sep;44(9):857-8.

Bradley ET. Sprain, splinter, splint. Conn Med 1991

Mar;55(3):175.

Breger-Lee DE, Buford WL Jr. Update in splinting

materials and methods. Hand Clin 1991 Aug;7(3):

569-85.

Brentnall E, Murtagh J. Preparation of a volar arm

plaster splint. Aust Fam Physician 1992 Aug;21(8):

1165.

Bresler MI. The tamara system: integrated control of

mobility, communication, and environment. In:

Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 300-1.

Brooke MH, Fenichel GM, Griggs RC, Mendell JR,

Moxley R, Florence J, King WM, Pandya S,

Robison J, Schierbecker J, et al. Duchenne

muscular dystrophy: patterns of clinical progression

and effects of supportive therapy. Neurology 1989

Apr;39(4):475-81.

Browne EZ Jr, Ribik CA. Early dynamic splinting for

extensor tendon injuries. J Hand Surg [Am] 1989

Jan;14(1):72-6.

Burge PD, Brown M. Elastic band mobilisation after

flexor tendon repair; splint design and risk of

flexion contracture. J Hand Surg [Br] 1990 Nov;

15(4):443-8.

Carstens C, Schmidt E, Fromm B, Schiltenwolf M.

[Results of surgical therapy of knee flexion

contractures in patients with myelomeningocele].

Z Orthop Ihre Grenzgeb 1992 May-Jun;130(3):

207-12. (Ger).

Chandler DR, Nemejc C, Adkins RH, Waters RL.

Emergency cervical-spine immobilization. Ann

Emerg Med 1992 Oct;21(10):1185-8.

Cheng JC. Dynamic pressure therapy for scars in the

finger web spaces. J Hand Surg [Am] 1991 Jan;

16(1):176-7.

Chow JA, Dovelle S, Thomes LJ, Ho PK, Saldana J.

A comparison of results of extensor tendon repair

followed by early controlled mobilisation versus

static immobilisation. J Hand Surg [Br] 1989 Feb;

14(1):18-20.

Chow SP, Stephens MM, Ngai WK, So YC, Pun WK,

Chu M, Crosby C. A splint for controlled active

motion after flexor tendon repair. Design,

mechanical testing, and preliminary clinical results.

J Hand Surg [Am] 1990 Jul;15(4):645-51.

Cruickshank DA, O’Neill DL. Upper extremity

inhibitive casting in a boy with spastic quadriplegia.

Am J Occup Ther 1990 Jun;44(6):552-5.

Donatto KC, Rightor N, D’Ambrosia R. Custom-

molded orthotics in postoperative hallux valgus

immobilization. Orthopedics 1992 Apr;15(4):

449-51.

Dovelle S, Heeter PK. The Washington Regimen:

rehabilitation of the hand following flexor tendon

injuries. Phys Ther 1989 Dec;69(12):1034-40.

Duncan RM. Basic principles of splinting the hand.

Phys Ther 1989 Dec;69(12):1104-16.

Dunn PM. Complications of splintage in congenital

dislocation of the hip [letter]. Arch Dis Child 1992

Apr;67(4):568.

Egan JM. An aid for the management of shoulder

pain in hemiplegia. Br J Occup Ther 1990

Sep;53(9):362-4.

Falconer J. Hand splinting in rheumatoid arthritis: a

perspective on current knowledge and directions for

research. Arthritis Care Res 1991 Jun;4(2):81-6.

Feinberg J. Effect of the arthritis health professional

on compliance with use of resting hand splints by

patients with rheumatoid arthritis. Arthritis Care

Res 1992 Mar;5(1):17-23.

Feldman PA. Upper extremity casting and splinting. In:

Glenn MB, Whyte J, eds. Practical management of

spasticity in children and adults. Philadelphia: Lea

& Febiger; 1990. p. 149-66.

Foucher G, Greant P, Ehrler S, Buch N, Braun FM,

Michon J. [Role of orthosis in the treatment of

stiffness of the hand]. Chirurgie 1989;115(2):

100-5. (Fre).

Gardiner HM, Duncan AW. Radiological assessment

of the effects of splinting on early hip development:

results from a randomised controlled trial of

abduction splinting vs sonographic surveillance.

Pediatr Radiol 1992;22(3):159-62.

Gardiner HM, Dunn PM. Controlled trial of

immediate splinting versus ultrasonographic

surveillance in congenitally dislocatable hips.

Lancet 1990 Dec 22-29;336(8730):1553-6.

Gerbino PG 2d, Saldana MJ, Westerbeck P, Schacherer

TG. Complications experienced in the

rehabilitation of zone I flexor tendon injuries with

dynamic traction splinting. J Hand Surg [Am]

1991 Jul;16(4):680-6.

Goodman G, Bazyk S. The effects of a short thumb

opponens splint on hand function in cerebral palsy:

a single-subject study. Am J Occup Ther 1991

Aug;45(8):726-31.

Hand splinting for arthritis health professionals

[audiocassette]. Atlanta: Arthritis Health Professions

Association; 1988. 1 audiocassette: Sides A & B; 1

7/8 ips. Recorded at the concurrent session KK,

May 23-28, 1988, Houston.

Heinrich SD, Sharps CH. Lower extremity torsional

deformities in children: a prospective comparison of

two treatment modalities. Orthopedics 1991 Jun;

14(6):655-9.

Herring JA. Conservative treatment of congenital

dislocation of the hip in the newborn and infant.

Clin Orthop 1992 Aug;(281):41-7.

Hinderaker T, Rygh M, Uden A. The von Rosen

splint compared with the Frejka pillow. A study of

408 neonatally unstable hips. Acta Orthop Scand

1992 Aug;63(4):389-92.

Horii E, Lin GT, Cooney WP, Linscheid RL, An KN.

Comparative flexor tendon excursion after passive

mobilization: an in vitro study. J Hand Surg [Am]

1992 May;17(3):559-66.

Howell JW. Management of the acutely burned hand

for the nonspecialized clinician. Phys Ther 1989

Dec;69(12):1077-90.

Hung LK, Chan A, Chang J, Tsang A, Leung PC.

Early controlled active mobilization with dynamic

splintage for treatment of extensor tendon injuries.

J Hand Surg [Am] 1990 Mar;15(2):251-7.

Iwasawa M, Matsuo K, Hirose T, Sakaguchi Y.

Improvement in the surgical results of treatment of

duplicated thumb by preoperative splinting. J Hand

Surg [Am] 1989 Nov;14(6):941-5.

Johnstone M. Current advances in the use of pressure

splints in the management of adult hemiplegia.

Physiother 1989 Jul;75(7):381-4.

Kamil NI, Correia AM. A dynamic elbow flexion

splint for an infant with arthrogryposis. Am J

Occup Ther 1990 May;44(5):460-1.

Kaplan SJ, Glickel SZ, Eaton RG. Predictive factors

in the non-surgical treatment of carpal tunnel

syndrome. J Hand Surg [Br] 1990 Feb;15(1):

106-8.

Kaufman T, Newman RA, Weinberg A, Wexler MR.

The Kerlix tongue-depressor splint for skin-grafted

areas in burned children. J Burn Care Rehabil

1989 Sep-Oct;10(5):462-3.

Kealey GP, Chang P, Laubenthal KN, Jensen KL.

Physical therapy: a vital aspect of burn care. Crit

Rev Phys Rehabil Med 1991;2(4):227-42.

Keessen W, van der Eijken JW, Diepstraten AF. [The

treatment of congenital clubfoot in The

Netherlands; results of a survey among orthopedic

surgeons]. Ned Tijdschr Geneeskd 1992 Aug

29;136(35):1710-2. (Dut).

Kohn D, Wirth CJ, John H. The function of the

Thomas splint. An experimental study. Arch

Orthop Trauma Surg 1991;111(1):26-8.

Kohn D, Wirth CJ, John H, Busche T. [Stress relief

of the hip joint by the Thomas splint]. Z Orthop

1991 May-Jun;129(3):225-9. (Ger).

Koop SE, Gage JR. [Treatment of deformities of the

locomotor system in hemiplegia]. Orthopade 1992

Sep;21(5):293-300. (Ger).

Kortman B. Patient recall and understanding of

instructions concerning splints following a zone 2

flexor tendon repair. Aust Occup Ther J 1992 Jun;

39(2):5-11.

Kraft S, Serex AM, Cavin B, Isoz J. [Lesions of zone

II flexor tendons: splints and rehabilitation]. Helv

Chir Acta 1992 Jan;58(4):451-3. (Fre).

Krajnik SR, Bridle MJ. Hand splinting in

quadriplegia: current practice. Am J Occup Ther

1992 Feb;46(2):149-56.

Kramer J, Schleberger R, Steffen R. Closed reduction

by two-phase skin traction and functional splinting

in mitigated abduction for treatment of congenital

dislocation of the hip. Clin Orthop 1990 Sep;(258):

27-32.

Krauspe R. [Splint treatment of Perthes disease].

Z Orthop 1990 Jul-Aug;128(4):411-4. (Ger).

Kruger VL, Kraft GH, Deitz JC, Ameis A, Polissar L.

Carpal tunnel syndrome: objective measures and

splint use. Arch Phys Med Rehabil 1991 Jun;72(7):

517-20.

Kruger VL, Veer L, Nicholls LA. A modified ulnar

gutter wrist splint for the treatment of carpal tunnel

syndrome. Can J Occup Ther 1992 Aug;59(3):

159-62.

Kubas ES. Use of splints to develop hand skills in a

woman with Rett syndrome. Am J Occup Ther

1992 Apr;46(4):364-8.

Kuliev AM, Kuliev RA. [A splint for the treatment of

congenital hip dislocation]. Ortop Travmatol Protez

1990 May;(5):50-1. (Rus).

Kurer MH, Regan MW. Completely displaced

supracondylar fracture of the humerus in children.

A review of 1708 comparable cases. Clin Orthop

1990 Jul;(256):205-14.

Langkamer VG, Clarke NM, Witherow P.

Complications of splintage in congenital dislocation

of the hip. Arch Dis Child 1991 Nov;66(11):

1322-5.

Langlois S, MacKinnon JR, Pederson L. Hand splints

and cerebral spasticity: a review of the literature.

Can J Occup Ther 1989 Jun;56(3):113-9.

Langlois S, Pederson L, MacKinnon JR. The effects

of splinting on the spastic hemiplegic hand: report

of a feasibility study. Can J Occup Ther 1991 Apr;

58(1):17-25.

Laporte JM, Berrettoni BA, Seitz WH Jr, Winsberg D,

Froimson AI. The figure-of-eight splint for

proximal interphalangeal joint volar plate injuries.

Orthop Rev 1992 Apr;21(4):457-62.

LaStayo P, Flowers K. Correction: torque and the

quantification of joint stiffness [letter]. J Burn Care

Rehabil 1992 Jan-Feb;13(1):118-9.

Leman CJ. Splints and accessories following burn

reconstruction. Clin Plast Surg 1992 Jul;19(3):

721-31.

Ley CC, Villar RN, Ronen A. Splinting for CDH:

temporary splinting for the neonate. Prosthet

Orthot Int 1990 Aug;14(2):85-6.

Lieberson S, Mendes DG. Congenital hallux valgus.

Orthopedics 1991 May;14(5):588-94.

Luster SH, Patterson PE, Cioffi WG, Mason AD Jr,

McManus WF, Pruitt BA Jr. An evaluation device

for quantifying joint stiffness in the burned hand.

J Burn Care Rehabil 1990 Jul-Aug;11(4):312-7.

Maitra A, Sen B. The boxers fracture: a simple and

effective method of external splintage [letter]. Arch

Emerg Med 1990 Mar;7(1):52-4.

Maitra A, Sen B. Displaced boxers’ fractures: a

simple and effective method of external splintage.

Br J Clin Pract 1990 Sep;44(9):348-51.

Malcus Johnson P, Sandkvist G, Eberhardt K, Liang B,

Herrlin K. The usefulness of nocturnal resting

splints in the treatment of ulnar deviation of the

rheumatoid hand. Clin Rheumatol 1992 Mar;11(1):

72-5.

Mandel S. Overuse syndrome in musicians. When

playing an instrument hurts. Postgrad Med 1990

Aug;88(2):111-4.

Marsh JL, Nepola JV. External fixation for open tibia

fractures. A management strategy. Orthop Rev

1990 Mar;19(3):273-80.

May EJ, Silfverskiold KL, Sollerman CJ. Controlled

mobilization after flexor tendon repair in zone II: a

prospective comparison of three methods. J Hand

Surg [Am] 1992 Sep;17(5):942-52.

McClure PW, Flowers KR. Treatment of limited

shoulder motion using an elevation splint. Phys

Ther 1992 Jan;72(1):57-62.

Mennen U. A simple, comfortable, conforming, and

adaptable splint. J Hand Surg [Am] 1989 May;

14(3):576-8.

Moeller M. Splints versus casts [letter]. Postgrad

Med 1990 Feb 15;87(3):34.

Molnar GE. Rehabilitation in cerebral palsy. West J

Med 1991 May;154(5):569-72.

Muftakhidenov SB, Eleusizov AB, Briske VA. [A

splint for immobilization of the arm]. Ortop

Travmatol Protez 1989 Nov;(11):73-4. (Rus).

Murphy MS. An adjustable splint for forearm

supination. Am J Occup Ther 1990 Oct;44(10):

936-9.

Naganuma GM, Billingsley FF. The use of hand

splints with the neurologically involved child. Crit

Rev Phys Rehabil Med 1990;2(2):87-100.

Newport ML, Blair WF, Steyers CM Jr. Long-term

results of extensor tendon repair. J Hand Surg

[Am] 1990 Nov;15(6):961-6.

Newport ML, Shukla A. Electrophysiologic basis of

dynamic extensor splinting. J Hand Surg [Am]

1992 Mar;17(2):272-7.

Ofiaeli RO. Complications of methods of fracture

treatment used by traditional healers: a report of

three cases necessitating amputation at Ihiala,

Nigeria. Trop Doct 1991 Oct;21(4):182-3.

Osterhout BM. Postoperative splinting of the pediatric

upper extremity. Hand Clin 1990 Nov;6(4):693-5.

Ouellette EA. The rheumatoid hand: orthotics as

preventative. Semin Arthritis Rheum 1991 Oct;

21(2):65-72.

Ovechkin VS, Vasil’ev SF, Dorogan’ SD. [Prevention

and treatment of persistent contractures of the hand

after injuries of the ulnar and median nerves].

Vestn Khir 1990 Feb;144(2):112-3. (Rus).

Parry CB. Orthotics and rehabilitation after extensive

upper limb paralysis. Hand Clin 1989 Feb;5(1):

97-105.

Patel MR, Bassini L. Trigger fingers and thumb:

when to splint, inject, or operate. J Hand Surg

[Am] 1992 Jan;17(1):110-3.

Patel MR, Pearlman HS, Bassini L, Ravich S.

Fractures of the sesamoid bones of the thumb.

J Hand Surg [Am] 1990 Sep;15(5):776-81.

Pediani R. Supporting cast. Br J Theatre Nurs 1992

May;2(2):20-1.

Percival NJ, Sykes PJ. Flexor pollicis longus tendon

repair: a comparison between dynamic and static

splintage. J Hand Surg [Br] 1989 Nov;14(4):412-5.

Philips CA. Management of the patient with

rheumatoid arthritis. The role of the hand therapist.

Hand Clin 1989 May;5(2):291-309.

Philips CA. Rehabilitation of the patient with

rheumatoid hand involvement. Phys Ther 1989

Dec;69(12):1091-8.

Phillips WE, Audet M. Use of serial casting in the

management of knee joint contractures in an

adolescent with cerebral palsy. Phys Ther 1990

Aug;70(8):521-3.

Poole JL, Whitney SL, Hangeland N, Baker C. The

effectiveness of inflatable pressure splints on motor

function in stroke patients. Occup Ther J Res 1990

Nov-Dec;10(6):360-6.

Puddicombe BE, Nardone MA. Rehabilitation of the

burned hand. Hand Clin 1990 May;6(2):281-92.

Redheffer GM, Bailey M. Assessing and splinting

fractures. Nursing 1989 Jun;19(6):51-9.

Reid DT. A survey of Canadian occupational

therapists’ use of hand splints for children with

neuromuscular dysfunction. Can J Occup Ther

1992 Apr;59(1):16-27.

Reinherz RP. Varus-rotated fifth digits are frequently

observed during podopediatric examination

[editorial]. J Foot Surg 1991 Sep-Oct;30(5):

429-30.

Reith HB, Mackowski M, Kozianka J, Kozuschek W.

[Early functional treatment of rupture of the fibular

ligament with a personally developed ankle splint].

Zentralbl Chir 1989;114(21):1396-400. (Ger).

Rejholec M, Vosatka J, Sadil K. [Conservative

containment in the treatment of Legg-Calv�-Perthes

disease]. Acta Chir Orthop Traumatol Cech 1990

Apr;57(2):178-84. (Cze).

Rider BA. Carpal tunnel syndrome rehabilitation. Crit

Rev Phys Rehabil Med 1991;3(1):27-57.

Ridge J. Three simple surgical aids. Injury 1991

Nov;22(6):496-7.

Riley PM. Splints. BMJ 1990 Apr 21;300(6731):

1066-7.

Roberts L, Alvarado MI, McElroy K, Rutan RL,

Robson MC, Herndon DN. Analysis of materials

for splinting of the thermally injured patient.

J Burn Care Rehabil 1991 May-Jun;12(3):268-9.

Robichaud JA, Agostinucci J, Vander Linden DW.

Effect of air-splint application on soleus muscle

motoneuron reflex excitability in nondisabled

subjects and subjects with cerebrovascular

accidents. Phys Ther 1992 Mar;72(3):176-83;

discussion 183-5.

Rosen PB, McSwain NE Jr, Arata M, Stahl S, Mercer

D. Comparison of two new immobilization

collars. Ann Emerg Med 1992 Oct;21(10):

1189-95.

Salafia A. Tension equalizer for claw-hand correction.

Indian J Lepr 1992 Apr-Jun;64(2):209-10.

Saldana MJ, Choban S, Westerbeck P, Schacherer TG.

Results of acute zone III extensor tendon injuries

treated with dynamic extension splinting. J Hand

Surg [Am] 1991 Nov;16(6):1145-50.

Saldana MJ, Chow JA, Gerbino P 2d, Westerbeck P,

Schacherer TG. Further experience in

rehabilitation of zone II flexor tendon repair with

dynamic traction splinting. Plast Reconstr Surg

1991 Mar;87(3):543-6.

Saleh M, Marshall PD, Senior R, MacFarlane A. The

Sheffield splint for controlled early mobilisation

after rupture of the calcaneal tendon. A prospective,

randomised comparison with plaster treatment.

J Bone Joint Surg [Br] 1992 Mar;74(2):206-9.

Sanchez Zaplana I, Zaragoza Arnau M. [The Braun

and Braun-Bohler splints]. Rev Enferm 1990

Mar;13(139):69-71, 73-4. (Spa).

Saunders SR. Physical therapy management of hand

fractures. Phys Ther 1989 Dec;69(12):1065-76.

Savvidis E, Loer F. [A treatment principle with

questionable effectiveness in Perthes disease].

Z Orthop Ihre Grenzgeb 1992 Mar-Apr;130(2):

120-4. (Ger).

Scherling E, Johnson H. A tone-reducing wrist--hand

orthosis. Am J Occup Ther 1989 Sep;43(9):

609-11.

Schnebly WA, Ward RS, Warden GD, Saffle JR. A

nonsplinting approach to the care of the thermally

injured patient. J Burn Care Rehabil 1989

May-Jun;10(3):263-6.

Schneider E, Niethard FU, Lukoschek M. [Congenital

hip dysplasia]. Dtsch Krankenpflegez 1990 Nov;

43(11):812-6. (Ger).

Schwanholt C, Daugherty MB, Gaboury T, Warden

GD. Splinting the pediatric palmar burn. J Burn

Care Rehabil 1992 Jul-Aug;13(4):460-4.

Seligman D, Burack E. A customized ankle foot

positioning support. Can J Occup Ther 1989 Apr;

56(2):80-2.

Sennik VT. [Improvement of Vinogradov’s abduction

splint in the treatment of fractures of the humerus].

Ortop Travmatol Protez 1991 Aug;(8):53-4. (Rus).

Sennik VT, Mizak ST, Sukachev BA. [A modification

of Beler’s splint for the skeletal traction treatment

of diaphyseal fractures of the leg bones]. Voen

Med Zh 1989 Jul;(7):61. (Rus).

Sessa S, Dubousset J. [Cotrel-Dubousset

instrumentation in idiopathic scoliosis. Angular

results in 70 cases]. Rev Chir Orthop 1990;76(2):

112-7. (Fre).

Shah A, Saluja K. Rehabilitation in Hansen’s disease.

Int Disabil Stud 1991 Oct-Dec;13(4):125-33.

Shantharam SS. Tips of the trade #41. Modified

coaptation splint for humeral shaft fractures.

Orthop Rev 1991 Nov;20(11):1033, 1039.

Sharpe PA. Comparative effects of bilateral hand

splints and an elbow orthosis on stereotypic hand

movements and toy play in two children with Rett

syndrome. Am J Occup Ther 1992 Feb;46(2):

134-40.

Sharpe PA, Ottenbacher KJ. Use of an elbow restraint

to improve finger-feeding skills in a child with Rett

syndrome. Am J Occup Ther 1990 Apr;44(4):

328-32.

Sherepo KM, Povarov LA. [Splint for immobilization

of patients with spinal injuries during

transportation]. Ortop Travmatol Protez 1991 Nov;

(11):42-3. (Rus).

Siegert JJ, Cooney WP, Dobyns JH. Management of

simple camptodactyly. J Hand Surg [Br] 1990

May;15(2):181-9.

Silfverskiold JP. Splinting tips. Postgrad Med 1989

Nov 1;86(6):185-8.

Smrcka V, Koprivova M. Rehabilitation in plastic

surgery. Splinting and positioning of flexor tendons

of the hand. Acta Chir Plast 1990;32(1):16-27.

Sollerman C, Abrahamsson SO, Lundborg G, Adalbert

K. Functional splinting versus plaster cast for

ruptures of the ulnar collateral ligament of the

thumb. A prospective randomized study of 63

cases. Acta Orthop Scand 1991 Dec;62(6):524-6.

Staheli LT. Managing hip dysplasia. Audio Dig Orthop

[audiocassette] 1990 Nov;13(11):Side A

[presentation 1, 17 min.]. Accompanied by: 1

guide.

Staheli LT. Management of congenital hip dysplasia.

Pediatr Ann 1989 Jan;18(1):24, 26-7, 29-32.

Steffen R, Schleberger R, Fett H. [Ultrasound control

of the repositioning of hip dislocation in a child in

the unstable phase of splint retention (Hanausek

position)]. Z Orthop 1990 Jan-Feb;128(1):83-9.

(Ger).

Stephens MM. Congenital talipes equinovarus

[editorial]. Ir Med J 1990 Jun;83(2):48-9.

Stewart KM. Review and comparison of current

trends in the postoperative management of tendon

repair. Hand Clin 1991 Aug;7(3):447-60.

Stromqvist B, Sunden G. CDH diagnosed at 2 to 12

months of age--treatment and results. J Pediatr

Orthop 1989 Mar-Apr;9(2):208-12.

Sunde D, Pearl R. A better sky hook: for hand

elevation. Ann Plast Surg 1990 Feb;24(2):189-90.

Swezey RL. Rheumatoid arthritis: the role of the

kinder and gentler therapies. J Rheumatol Suppl

1990 Nov;25:8-13.

Takami M, Fukui K, Saitou S, Sugiyama I, Terayama

K. Application of a shape memory alloy to hand

splinting. Prosthet Orthot Int 1992 Apr;16(1):

57-63.

Theodorou SD. Conservative treatment of congenital

dislocation of the hip in infants 1 to 9 months of

age. Acta Orthop Belg 1990;56(1 Pt A):167-75.

Tscherne H, Wippermann B. [Functional therapy in

treatment of fractures and joint injuries]. Zentralbl

Chir 1990;115(16):997-1005. (Ger).

Tubiana R. Carpal tunnel syndrome: some views on

its management. Ann Chir Main Memb Super

1990;9(5):325-30.

Tuten H, Miedaner J. Effect of hand splints on

stereotypic hand behavior of girls with Rett

syndrome: a replication study. Phys Ther 1989

Dec;69(12):1099-103.

Tylman D, Siwek W. Long-term results of functional

treatment in intraarticular knee fractures and

multifragment fractures of the shaft of femurs. Clin

Orthop 1991 Nov;(272):114-21.

Vaccaro AR, Kupcha PC, Salvo JP. Accurate

reduction and splinting of the common boxer’s

fracture. Orthop Rev 1990 Nov;19(11):994-6.

Valembois B, Moutet F, Hoel G. [Shearing splints].

Ann Chir Main 1989;8(2):176-8. (Fre).

van der Hoeven H, van der Net J, Helders PJ, Keessen

W. [Physiotherapy and orthopedic treatment of

juvenile chronic arthritis]. Tijdschr Kindergeneeskd

1991 Oct;59(5):167-72. (Dut).

van Straten O. A dynamic mouth splint for the patient

with facial burns. J Burn Care Rehabil 1991

Mar-Apr;12(2):174-6.

van Straten O, Shemesh Y, Rosenberg L. Modern

static splinting for an age-old problem--burns.

J Burn Care Rehabil 1991 Mar-Apr;12(2):172-4.

van-Straten O, Atar D, Ben-Yakar Y. Rehabilitation

of the hand after an explosion injury. Am J Occup

Ther 1991 Oct;45(10):937-40.

Volkov VS, Volkova EV. [Modification of the Bohler

splint]. Vestn Khir 1990 Apr;144(4):116. (Rus).

Wadsworth TG. Colles’ fracture. BMJ 1990 Jul 28;

301(6745):192-4.

Walker SJ, Bullen P, Sells RA. A new splint for use

in axillary surgery. Br J Plast Surg 1989 Jan;42(1):

114-5.

Wallen M, O’Flaherty S. The use of the Soft Splint in

the management of spasticity of the upper limb.

Aust Occup Ther J 1991;38(1):227-31.

Wapner KL, Sharkey PF. The use of night splints for

treatment of recalcitrant plantar fasciitis. Foot

Ankle 1991 Dec;12(3):135-7.

Ward RS. The rehabilitation of burn patients. Crit

Rev Phys Rehabil Med 1991;2(3):121-38.

Ward RS, Schnebly WA, Kravitz M, Warden GD,

Saffle JR. Have you tried the sandwich splint? A

method of preventing hand deformities in children.

J Burn Care Rehabil 1989 Jan-Feb;10(1):83-5.

Wenberg SJ. The term restraints is archaic [letter].

Am J Occup Ther 1991 Jan;45(1):86.

Werdmann, MJ. Traction splinting. Emergency 1992

Jul;24(7):51-3;

Werntz JR, Chesher SP, Breidenbach WC, Kleinert HE,

Bissonnette MA. A new dynamic splint for

postoperative treatment of flexor tendon injury.

J Hand Surg [Am] 1989 May;14(3):559-66.

Whalen JL, Bishop AT, Linscheid RL. Nonoperative

treatment of acute hamate hook fractures. J Hand

Surg [Am] 1992 May;17(3):507-11.

Witczak JW, Masear VR, Meyer RD. Triggering of

the thumb with de Quervain’s stenosing

tendovaginitis. J Hand Surg [Am] 1990 Mar;15(2):

265-8.

Witt J, Pess G, Gelberman RH. Treatment of de

Quervain tenosynovitis. A prospective study of the

results of injection of steroids and immobilization

in a splint. J Bone Joint Surg [Am] 1991

Feb;73(2):219-22.

Wright MP, Taddonio TE, Prasad JK, Thomson PD.

The microbiology and cleaning of thermoplastic

splints in burn care. J Burn Care Rehabil 1989

Jan-Feb;10(1):79-83.

Wu SH. A belly gutter splint for proximal

interphalangeal joint flexion contracture. Am J

Occup Ther 1991 Sep;45(9):839-43.

Wytch R, Ashcroft GP, Ledingham WM, Wardlaw D,

Ritchie IK. Modern splinting bandages. J Bone

Joint Surg [Br] 1991 Jan;73(1):88-91.

Yamamoto H, Furuya K. Treatment of congenital club

foot with a modified Denis Browne splint. J Bone

Joint Surg [Br] 1990 May;72(3):460-3.

Yrjonen T. Prognosis in Perthes disease after

noncontainment treatment. 106 hips followed for

28-47 years. Acta Orthop Scand 1992 Oct;63(5):

523-6.

Zeegers AV, Van Raay JJ, van der Werken C. Ankle

fractures treated with a stabilizing shoe. Acta

Orthop Scand 1989 Oct;60(5):597-9.

Zwipp H, Schievink B. Primary orthotic treatment of

ruptured ankle ligaments: a recommended

procedure. Prosthet Orthot Int 1992 Apr;16(1):

49-56.

Zwipp H, Thermann H, Sudkamp N, Tscherne H,

Milbradt H, Reimer P, Heintz P. [An innovative

concept for primary functional treatment of Achilles

tendon rupture]. Sportverletz Sportschaden 1990

Mar;4(1):29-35. (Ger).

Shoes

Alexander IJ, Campbell KR. Dynamic assessment of

foot mechanics as an adjunct to orthotic

prescription. In: Donatelli R, Wolf SL, eds.

Biomechanics of the foot and ankle. Philadelphia:

F.A. Davis; 1990. p. 148-52. (Contemporary

perspectives in rehabilitation; vol. 3).

Anderson JC, Sockler JM. Effects of orthoses on

selected physiologic parameters in cycling. J Am

Podiatr Med Assoc 1990 Mar;80(3):161-6.

Anthony RJ. The manufacture and use of the functional

foot orthosis. New York: Karger; 1991. 219 p.

Antia NH. Plastic footwear for leprosy. Lepr Rev

1990 Mar;61(1):73-8.

Baitch SP, Blake RL, Fineagan PL, Senatore J.

Biomechanical analysis of running with 25 degrees

inverted orthotic devices. J Am Podiatr Med Assoc

1991 Dec;81(12):647-52.

Baker BE. Prevention of ligament injuries to the knee.

Exerc Sport Sci Rev 1990;18:291-305.

Bao HP. Automated orthopedic shoe last production.

In: Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 151-2.

Bartolomei FJ. Tumefactive amyloidosis: a plantar

pedal presentation. Cutis 1990 Sep;46(3):255-9.

Baycroft CM. Foot orthotics and musculoskeletal

function. J Man Med 1990;5(1):22-4.

Berenter R, Morris J, Yee B. Bilateral congenital

absence of the fibula. J Am Podiatr Med Assoc

1990 Jun;80(6):325-8.

Bergmann JN. History and mechanical control of heel

spur pain. Clin Podiatr Med Surg 1990 Apr;7(2):

243-59.

Bierling-Sorensen F, Ryde H, Bojsen-Moller F, Lyquist

E. Shock absorbing material on the shoes of long

leg braces for paraplegic walking. Prosthet Orthot

Int 1990 Apr;14(1):27-32.

Birke JA, Novick A, Graham SL, Coleman WC,

Brasseaux DM. Methods of treating plantar ulcers.

Phys Ther 1991 Feb;71(2):116-22.

Blanco JS, Herring JA. Congenital Chopart

amputation. A functional assessment. Clin Orthop

1990 Jul;(256):14-21.

Bordelon RL. Orthotics, shoes, and braces. Orthop

Clin North Am 1989 Oct;20(4):751-7.

Brantingham JW, Snyder WR, Michaud T. Morton’s

neuroma. J Manip Physiol Ther 1991;14(5):

317-22.

Chantelau E, Kushner T, Spraul M. How effective is

cushioned therapeutic footwear in protecting

diabetic feet? A clinical study. Diabetic Med 1990

May;7(4):355-9.

Cohen J, Cowell HR. Corrective shoes [editorial].

J Bone Joint Surg [Am] 1989 Jul;71(6):799.

Condie DN, Stills ML. Partial-foot amputations:

prosthetic and orthotic management. In: Bowker JH,

Michael JW, eds. Atlas of limb prosthetics:

surgical, prosthetic, and rehabilitation principles. St.

Louis: Mosby Year Book; 1992. p. 277-91.

Corrective shoes and inserts as treatment for flexible

flatfoot in infants and children [letter]. J Bone

Joint Surg Am 1989 Jul;71(6):953-4.

Corrective shoes and inserts as treatment for flexible

flatfoot in infants and children [letter]. J Bone

Joint Surg [Am] 1990 Mar;72(3):470-3.

de Vries J. Evaluation of lower leg orthosis use

following cerebro-vascular accident. Int J Rehabil

Res 1991;14(3):239-43.

de Vries J. [Temporary shoes in foot injuries]. Ned

Tijdschr Geneeskd 1991 Jun 15;135(24):1073-6.

(Dut).

Derbyshire B, Platts RG. A shapeable foot-pressure

measuring device. J Biomed Eng 1989 May;11(3):

258-64.

Donatelli R, Wooden M. Biomechanical orthotics. In:

Donatelli R, Wolf SL, eds. Biomechanics of the

foot and ankle. Philadelphia: F.A. Davis; 1990.

p. 193-216. (Comprehensive perspectives in

rehabilitation; vol. 3).

Donn JM, Porter D, Roberts VC. The effect of

footwear mass on the gait patterns of unilateral

below-knee amputees. Prosthet Orthot Int 1989

Dec;13(3):140-4.

Engsberg JR, Allinger TL, Harder JA. Standing

pressure distribution for normal and below-knee

amputee children. Prosthet Orthot Int 1989 Dec;

13(3):152-5.

Fisher LR, McLellan DL. Questionnaire assessment of

patient satisfaction with lower limb orthoses from a

district hospital. Prosthet Orthot Int 1989 Apr;

13(1):29-35.

Gould N, Moreland M, Alvarez R, Trevino S, Fenwick

J. Development of the child’s arch. Foot Ankle

1989 Apr;9(5):241-5.

Gross ML, Davlin LB, Evanski PM. Effectiveness of

orthotic shoe inserts in the long-distance runner.

Am J Sports Med 1991 Jul-Aug;19(4):409-12.

Gross ML, Napoli RC. Treatment of lower extremity

injuries with orthotic shoe inserts. An overview.

Sports Med 1993 Jan;15(1):66-70.

Guin P, Hudson A, Gallo J. The efficacy of six heel

pressure reducing devices. Decubitus 1991 Aug;

4(3):15-6, 18, 20 passim.

Herold DC, Palmer RG. Questionnaire study of the

use of surgical shoes prescribed in a rheumatology

outpatient clinic. J Rheumatol 1992 Oct;19(10):

1542-4.

Hesse S, Platz T, Mauritz KH. [Indications for

optimal use of orthoses in the treatment of

hemiparetic patients]. Biomed Tech (Berlin)

1990;35 Suppl 3:52-3. (Ger).

Hintermann B. [Shoe supports and corrective shoes in

performance athletes--a 3-year study in young

cross-country skiers]. Schweiz Rundsch Med Prax

1992 Mar 24;81(13):389-94. (Ger).

Hogan-Budris J. Choosing foot materials for the

elderly. Top Geriatr Rehabil 1992 Mar;7(3):49-61.

Holmes GB Jr, Timmerman L. A quantitative

assessment of the effect of metatarsal pads on

plantar pressures. Foot Ankle 1990 Dec;11(3):

141-5.

Ikeda K. Conservative treatment of idiopathic

clubfoot. J Pediatr Orthop 1992 Mar-Apr;12(2):

217-23.

Irvin RE. Reduction of lumbar scoliosis by use of a

heel lift to level the sacral base. J Am Osteopath

Assoc 1991 Jan;91(1):34, 37-44.

Joganich TG. Influence of in-shoe orthotics on lower

extremity function in cycling [dissertation on

microfiche]. Tempe (AZ): Arizona State University;

1991. 2 microfiche.

Kent HO. Vannini-Rizzoli stabilizing orthosis (boot):

preliminary report on a new ambulatory aid for

spinal cord injury. Arch Phys Med Rehabil 1992

Mar;73(3):302-7.

Kilmartin TE, Wallace WA, Hill TW. Orthotic effect

on metatarsophalangeal joint extension. A

preliminary study. J Am Podiatr Med Assoc 1991

Aug;81(8):414-7.

Kirby KA. The medial heel skive technique.

Improving pronation control in foot orthoses. J Am

Podiatr Med Assoc 1992 Apr;82(4):177-88.

Kudriavtsev VA, Kiselev AL, Kozlov DI, Kaluzhskaia

MO, Matveeva EG. [Orthopedic devices for

footwear in flatness of the anterior part of the foot].

Ortop Travmatol Protez 1991 Sep;(9):28-31. (Rus).

Kudriavtsev VA, Rozhkov AV, Ogorodnikov VI.

[Insertable orthopedic devices in the treatment of

flatness of the anterior section of the foot and

valgus deviation of the great toe]. Ortop Travmatol

Protez 1990 Sep;(9):9-11. (Rus).

Kulkarni VN, Antia NH, Mehta JM. Newer designs in

foot-wear for leprosy patients. Indian J Lepr 1990

Oct-Dec;62(4):483-7.

Larsen K, Holstein P, Deckert T. Limb salvage in

diabetics with foot ulcers. Prosthet Orthot Int 1989

Aug;13(2):100-3.

Lehmann JF, de Lateur BJ. Lower extremity orthotics.

In: Kottke FJ, Lehman JF. Krusen’s handbook of

physical medicine and rehabilitation. 4th ed.

Philadelphia: Saunders; 1990. p. 602-46.

Levitz SJ, Dykyj D. Improvements in the design of

viscoelastic heel orthoses. A clinical study. J Am

Podiatr Med Assoc 1990 Dec;80(12):653-6.

Lewis G, Tan T, Shiue YS. Characterization of the

performance of shoe insert materials. J Am Podiatr

Med Assoc 1991 Aug;81(8):418-24.

Lord M, Foulston J. Clinical trial of a computer-aided

system for orthopaedic shoe upper design. Prosthet

Orthot Int 1991 Apr;15(1):11-7.

McAllister DF, Carver D, Devarajan R, Harrison L,

Pietenpol JL, Yang SH. An interactive computer

graphics system for the design of molded and

orthopedic shoe lasts. J Rehabil Res Dev 1991

Fall;28(4):39-46.

McPoil TG Jr, Adrian M, Pidcoe P. Effects of foot

orthoses on center-of-pressure patterns in women.

Phys Ther 1989 Feb;69(2):149-54.

McPoil TG, Cornwall MW. Rigid versus soft foot

orthoses. A single subject design. J Am Podiatr

Med Assoc 1991 Dec;81(12):638-42.

McPoil TG, Schuit D, Knecht HG. Comparison of

three methods used to obtain a neutral plaster foot

impression. Phys Ther 1989 Jun;69(6):448-52.

Menke W, Bodem F, Casel J, Volkert R. A new lower

leg prosthesis with simulation device for the

achilles tendon. In: Johnson RJ, Mote CD, Binet

M, eds. Skiing trauma and safety: the 7th

International Symposium; 1987 May 10-16;

Chamonix-Mont-Blanc, France. Philadelphia:

American Society for Testing and Materials; 1989.

p. 160-6.

Meyer PE, Petersen D. [Compensation in leg length

inequality with orthopedic shoe measures].

Orthopade 1992 Jun;21(3):174-83. (Ger).

Miault D, Brun JP, Dupre JC, PIll M, Miault P,

Deschamps E, Priollet P, Laurian C, Fichelle JM,

Cormier JM. [Foot equipment of diabetic

arteriopathy]. J Mal Vasc 1993;18(1):42-6. (Fre).

Miller CD, Paulos LE, Parker RD, Fishell M. The

ballet technique shoe: a preliminary study of eleven

differently modified ballet technique shoes using

force and pressure plates. Foot Ankle 1990 Oct;

11(2):97-100.

Mills JA, Menelaus MB. Hallux varus. J Bone Joint

Surg [Br] 1989 May;71(3):437-40.

Moncur C, Ward JR. Heat-moldable shoes for

management of forefoot problems in rheumatoid

arthritis. J Prosthet Orthot 1990 Dec;3(4):222-6.

Mueller K, Cornwall M, McPoil T, Mueller D,

Barnwell J. Effect of a tone-inhibiting dynamic

ankle-foot orthosis on the foot-loading pattern of a

hemiplegic adult: a preliminary study. J Prosthet

Orthot 1992 Winter;4(2):86-92.

Nawoczenski DA, Birke JA, Graham SL, Koziatek E.

The neuropathic foot--a management scheme: a

case report. Phys Ther 1989 Apr;69(4):287-91.

Newell SG. Functional neutral orthoses and shoe

modifications. Phys Med Rehabil Clin North Am

1992 Feb;3(1):193-222.

Novick A, Birke JA, Hoard AS, Brasseauz DM,

Broussard JB, Hawkins ES. Rigid orthoses for the

insensitive foot: the rigid-relief orthosis. J Prosthet

Orthot 1991 Fall;4(1):31-40.

Novick A, Stone J, Birke JA, Brasseaux DM, Broussard

JB, Hoard AS, Hawkins ES. Reduction of plantar

pressure with the rigid relief orthosis. J Am

Podiatr Med Assoc 1993 Mar;83(3):115-22.

Nuber GW. Biomechanics of the foot and ankle

during gait. Clin Podiatr Med Surg 1989 Jul;6(3):

615-27.

Palamarchuk HJ, Fry J. In-shoe casting technique for

specialized sports shoes. J Am Podiatr Med Assoc

1989 Sep;79(9):462-5.

Philps JW. The functional foot orthosis. Edinburgh

(UK): Churchill Livingstone; 1990. 180 p.

Pratt DJ. Long term comparison of some shock

attenuating insoles. Prosthet Orthot Int 1990 Aug;

14(2):59-62.

Rome K. Behavior of orthotic materials in chiropody.

J Am Podiatr Med Assoc 1990 Sep;80(9):471-8.

Rudicel S. Arthritis of the foot. Pinpointing the

disease process involved. Postgrad Med 1989

Sep 1;86(3):122-5, 128-9, 132.

Ruttimann B. [Orthopedic technical and surgical

measures in the diabetic foot]. Ther Umsch 1990

Jan;47(1):63-70. (Ger).

Sanner WH. The functional foot orthosis prescription.

In: Jay RM, ed. Current therapy in podiatric

surgery. Philadelphia: Decker; 1989. p. 302-14.

Sauvain MJ, Brock D, Gerber NJ. [Foot problems in

chronic polyarthritis: shoe advice and foot care].

Ther Umsch 1991 Sep;48(9):640-4. (Ger).

Schaars AH, Postema K. Conservative treatment of

foot deformities in Duchenne Muscular Dystrophy.

J Rehabil Sci 1990 Jun;3(2):49-52.

Senner V, Schaff P, Hauser W. A new artificial leg

for ski boot testing. In: Mote CD, Johnson RJ, eds.

Skiing trauma and safety: 8th International

Symposium; 1989; Riksgrasen, Sweden.

Philadelphia: ASTM; 1991. p. 200-7.

Staats TB, Kriechbaum MP. Computer aided design

and computer aided manufacturing of foot orthoses.

J Prosthet Orthot 1989 Apr;1(3):182-6.

Staheli LT. Lower positional deformity in infants and

children: a review. J Pediatr Orthop 1990 Jul-Aug;

10(4):559-63.

Staheli LT. Shoes for children: a review. Pediatrics

1991 Aug;88(2):371-5.

Subotnick SI, Block AJ. Retrocalcaneal problems.

Clin Podiatr Med Surg 1990 Apr;7(2):323-32.

Surgical footwear [letter]. BMJ 1989 Nov 11;

299(6709):1216-7.

Tax HR. Conservative treatment of flatfoot in the

newborn. Clin Podiatr Med Surg 1989 Jul;6(3):

521-36.

Taylor TL. Idiopathic flexible flatfoot in the

adolescent. Clin Podiatr Med Surg 1989 Jul;6(3):

537-53.

Uhlig R. [Technical orthopedic compensation of leg

length inequality]. Orthopade 1992 Jun;21(3):

184-96. (Ger).

Viladot A. Surgical treatment of the child’s flatfoot.

Clin Orthop 1992 Oct;(283):34-8.

Vitek M, Kerkoc P. [Treatment of positional

anomalies of the foot with a functional supportive

inlay]. Z Orthop 1989 Jan-Feb;127(1):15-21. (Ger).

Vosatka J, Vrbicky B. [Technical orthopedic care of

the diseased and deformed foot]. Acta Chir Orthop

Traumatol Cech 1989 Jul;56(4):365-73. (Cze).

Warren BL. Plantar fasciitis in runners. Treatment and

prevention. Sports Med 1990 Nov;10(5):338-45.

Wasson JH, Gall V, McDonald R, Liang MH. The

prescription of assistive devices for the elderly:

practical considerations. J Gen Intern Med 1990

Jan-Feb;5(1):46-54.

Weller C, Humphrey SJ, Kirollos C, Bowes SG,

Charlett A, Dobbs SM, Dobbs RJ. Gait on a

shoestring: falls and foot separation in

parkinsonism. Age Ageing 1992 Jul;21(4):242-4.

Wenger DR, Mauldin D, Speck G, Morgan D, Lieber

RL. Corrective shoes and inserts as treatment for

flexible flatfoot in infants and children. J Bone

Joint Surg [Am] 1989 Jul;71(6):800-10.

Wertsch JJ, Webster JG, Tompkins WJ. A portable

insole plantar pressure measurement system.

J Rehabil Res Dev 1992 Winter;29(1):13-8.

White FJ. Orthotics. In: Drennan JC, ed. Child’s foot

and ankle. New York: Raven Press; 1992.

p. 71-96.

Winkler W. The role of orthotics in the rehabilitation

of patients with fracture of the calcaneum. Prosthet

Orthot Int 1989 Aug;13(2):70-5.

Wooden MJ. Biomechanical evaluation for functional

orthotics. In: Donatelli R, Wolf SL, eds.

Biomechanics of the foot and ankle. Philadelphia:

F.A. Davis; 1990. p. 131-47. (Contemprary

perspectives in rehabilitation; vol. 3).

Wu KK. Foot orthoses: priniciples and clinical

applications. Baltimore: Williams & Wilkins; 1990.

379 p.

Wu KK. Shoes and their modifications [videocassette].

United States: [publisher unknown]; 1991.

1 videocassette: 16 min., sound, color, 1/2 in.

Zeegers AV, Van Raay JJ, van der Werken C. Ankle

fractures treated with a stabilizing shoe. Acta

Orthop Scand 1989 Oct;60(5):597-9.

Zhu H. In-shoe plantar pressure distribution under

sensate and insensate feet [dissertation]. Milwaukee

(WI): Marquette University; 1991. 103 p.

Zwipp H, Thermann H, Sudkamp N, Tscherne H,

Milbradt H, Reimer P, Heintz P. [An innovative

concept for primary functional treatment of Achilles

tendon rupture]. Sportverletz Sportschaden 1990

Mar;4(1):29-35. (Ger).

Cushions & Seating

Bar CA. Evaluation of cushions using dynamic

pressure measurement. Prosthet Orthot Int 1991

Dec;15(3):232-40.

Barbenel JC. Pressure management. Prosthet Orthot

Int 1991 Dec;15(3):225-31.

Brienza DM, Brubaker CE, McLaurin CA, Chun KC.

A manufacturing system for contoured foam

cushions. J Rehabil Res Dev 1992 Fall;29(4):

32-40.

Cron L, Sprigle S. Clinical evaluation of the Hemi

Wheelchair Cushion. Am J Occup Ther 1993

Feb;47(2):141-4.

Eckrich KM. Dynamic interface pressure between

seated users and their wheelchairs [dissertation].

Ames (IA): Iowa State University; 1991. 171 p.

Eckrich KM. A pneumatic bladder array for

measuring dynamic interface pressure between

seated users and their wheelchairs. Biomed Sci

Instrum 1991;27:135-40.

el Andaloussi M, Harouchi A, Refass A, Lazrak F,

Bennani S. [Neonatal treatment of congenital hip

dislocation using an abduction pillow]. Acta

Orthop Belg 1990;56(1 Pt A):149-54. (Fre).

Ferguson-Pell MW. Seat cushion selection. J Rehabil

Res Dev Clin Suppl 1990;(2):49-73.

Fife SE, Roxborough LA, Armstrong RW, Harris SR,

Gregson JL, Field D. Development of a clinical

measure of postural control for assessment of

adaptive seating in children with neuromotor

disabilities [published erratum appears in Phys Ther

1992 Jan;72(1):41]. Phys Ther 1991 Dec;71(12):

981-93.

Garber SL, Dyerly LR. Wheelchair cushions for

persons with spinal cord injury: an update. Am J

Occup Ther 1991 Jun;45(6):550-4.

Gilsdorf P, Patterson R, Fisher S. Thirty-minute

continuous sitting force measurements with

different support surfaces in the spinal cord injured

and able-bodied. J Rehabil Res Dev 1991

Fall;28(4):33-8.

Green EM, Nelham RL. Development of sitting

ability, assessment of children with a motor

handicap and prescription of appropriate seating

systems. Prosthet Orthot Int 1991 Dec;15(3):

203-16.

Hinderaker T, Rygh M, Uden A. The von Rosen

splint compared with the Frejka pillow. A study of

408 neonatally unstable hips. Acta Orthop Scand

1992 Aug;63(4):389-92.

Inglis S, Gibbett K. Custom designed stroller inserts

for young children with cerebral palsy. Aust Occup

Ther J 1991;38(3):147-53.

Kanyer B. Meeting the seating and mobility needs of

the client with traumatic brain injury. J Head

Trauma Rehabil 1992 Sep;7(3):81-93.

Kotzki N, Pelissier J, Dusotoit C, Toulemonde M,

Codine P, Enjalbert M, Daures P, Simon L.

Preventive processes of shoulder hand syndrome in

bedridden hemiplegic patients: Evaluation of three

processes. Ann Readapt Med Phys 1991;34(4):

351-5.

Krouskop TA, Cullen B, Garber SL. Custom selection

of support surfaces for wheelchairs and beds: one

size does not fit all. Dermatol Nurs 1992 Jun;4(3):

191-4, 204.

McConnell EA. Applying an abduction pillow

correctly. Nursing 1992 Jun;22(6):22.

Michael SM. Advances in wheelchair cushioning.

Crit Rev Phys Rehabil Med 1991;3(1):1-12.

Moretto DF, Minkel JL, Cardi MD. Prosthetic/orthotic

management after recent hemipelvectomy for a

myelomeningocele patient. J Prosthet Orthot 1992

Winter;4(2):93-102.

Nelson VS, Leonard JA Jr, Fisher SV, Esquenazi A,

Hicks JE. Prosthetics, orthotics, and assistive

devices. 2. Specialized seating and assistive devices.

Arch Phys Med Rehabil 1989 May;70(5-S):S202-5.

Odderson IR, Jaffe KM, Sleicher CA, Price R, Kropp

RJ. Gel wheelchair cushions: a potential cold

weather hazard. Arch Phys Med Rehabil 1991

Nov;72(12):1017-20.

Patterson K, Michael S. Correcting the sitting posture

of a person with a hindquarter amputation. Austral

Occup Ther J 1991 Mar;38(1):237-40.

Post KM. From the field: clinical notes on cushion

prescription. Am J Occup Ther 1991 Jun;45(6):

559-62.

Presperin J. Seating systems: the therapist and

rehabilitation engineering team. Phys Occup Ther

Pediatr 1990;10(2):11-45.

Proper seating: a key to participation. Except Parent

1989 Mar;19(2):46-9.

Sanford M, Fowler C. Positioning the patient with an

abductor pillow. Orthop Nurs 1989 Sep-Oct;8(5):

21-3.

Shields RK, Cook TM. Lumbar support thickness:

effect on seated buttock pressure in individuals with

and without spinal cord injury. Phys Ther 1992

Mar;72(3):218-26.

Sposato BA. Computer-aided shape sensing for

prescribing custom contoured seat cushions

[master’s thesis]. Charlottesville (VA): University

of Virginia Press; 1990.

Sprigle S, Chung KC, Brubaker CE. Factors affecting

seat contour characteristics. J Rehabil Res Dev

1990 Spring;27(2):127-34.

Sprigle S, Chung KC, Brubaker CE. Reduction of

sitting pressures with custom contoured cushions.

J Rehabil Res Dev 1990 Spring;27(2):135-40.

Sprigle SH. Biomechanical analysis of contoured

foam for use by spinal cord-injured persons

[dissertation]. Charlottesville (VA): University of

Virginia; 1989. 179 p.

Sprigle SH, Faisant TE, Chung KC. Clinical

evaluation of custom-contoured cushions for the

spinal cord injured. Arch Phys Med Rehabil 1990

Aug;71(9):655-8.

Todd BA. Finite element analysis of the stress

distribution within the seated and supine human

buttocks [dissertation]. Charlottesville (VA):

University of Virginia; 1992. 252 p.

Trail IA, Galasko CS. The Matrix seating system.

J Bone Joint Surg [Br] 1990 Jul;72(4):666-9.

van Straten O. An unusual positioning pillow for use

with burns. J Burn Care Rehabil 1991 Mar-Apr;

12(2):170-1.

Ankle-Foot-Othoses & Other

Devices

Assessment and care of the patient with a neck

immobilizer [videocassette]. Houston: University of

Texas Health Science Center at Houston, UT/TV;

1992. 1 videocassette: 7 min., sound, color, 1/2 in.

(Orthopedic nursing series; 1). Accompanied by: 1

guide.

Abitbol JJ, Botte MJ, Garfin SR, Akeson WH. The

treatment of multiple myeloma of the cervical spine

with a halo vest. J Spinal Disord 1989 Dec;2(4):

263-7.

Anderson EG. The rheumatoid foot: a sideways look.

Ann Rheum Dis 1990 Oct;49 Suppl 2:851-7.

Andrews BJ, Barnett RW, Phillips GF, Kirkwood CA,

Donaldson N, Rushton DN, Perkins TA. Rule-

based control of a hybrid FES orthosis for assisting

paraplegic locomotion. Automedica 1989;11:

175-99.

Ator R, Gunn K, McPoil TG, Knecht HG. The effect

of adhesive strapping on medial longitudinal arch

support before and after exercise. J Orthop Sports

Phys Ther 1991 Jul;14(1):18-23.

Axelsson P, Johnsson R, Stromqvist B. Effect of

lumbar orthosis on intervertebral mobility. A

roentgen stereophotogrammetric analysis. Spine

1992 Jun;17(6):678-81.

Bahler A. Fundamental biomechanical principles in

the orthotic treatment of the knee. J Prosthet

Orthot 1992 Apr;4(3):157-65.

Baiges IJ, Rosen MJ. Development of a whole-arm

orthosis for tremor suppression. In: Technology for

the future decade. RESNA ’89: proceedings of the

12th annual conference; 1989 Jun 25-30; New

Orleans, LA. Washington (DC): RESNA Press;

1989. p. 290-1.

Baitch SP, Blake RL, Fineagan PL, Senatore J.

Biomechanical analysis of running with 25 degrees

inverted orthotic devices. J Am Podiatr Med Assoc

1991 Dec;81(12):647-52.

Ballock RT, Hajek PC, Byrne TP, Garfin SR. The

quality of magnetic resonance imaging, as affected

by the composition of the halo orthosis. A brief

note. J Bone Joint Surg [Am] 1989 Mar;71(3):

431-4.

Banta JV, Bell KJ, Muik EA, Fezio J. Parawalker:

energy cost of walking. Eur J Pediatr Surg 1991

Dec;1 Suppl 1:7-10.

Banziger E, et al. Dynamic dorsiflexion assist

polypropylene ankle foot orthosis. J Assoc Child

Prosthet Orthot Clin 1991 Fall;26(2):65-8.

Barbenel JC, Paul JP. Bioengineering developments

for paraplegic patients. Paraplegia 1992 Jan;30(1):

61-4.

Barnett RW. Paraplegic standing and reciprocal gait

using a floor reaction hybrid F.E.S. orthosis

[dissertation]. Glasgow (UK): University of

Strathclyde; 1990. 174 p.

Beavis A. Cervical orthoses. Prosthet Orthot Int 1989

Apr;13(1):6-13.

Bender LH. Part 2. Osteogenesis imperfecta. Orthop

Nurs 1991 Jul-Aug;10(4):23-32.

Benzel EC, Hadden TA, Saulsbery CM. A comparison

of the Minerva and halo jackets for stabilization of

the cervical spine. J Neurosurg 1989

Mar;70(3):411-4.

Berard C, Delmas MC, Locqueneux F, Vadot JP.

[Anti-calcaneus carbon fiber orthosis in children

with myelomeningocele]. Rev Chir Orthop

1990;76(3):222-5. (Fre).

Berger A, Schaller E, Mailander P. Brachial plexus

injuries: an integrated treatment concept [published

erratum appears in Ann Plast Surg 1991 Aug;27(2):

194-5]. Ann Plast Surg 1991 Jan;26(1):70-6.

Bergmann JN. History and mechanical control of heel

spur pain. Clin Podiatr Med Surg 1990 Apr;7(2):

243-59.

Binder H, Eng GD. Rehabilitation management of

children with spastic diplegic cerebral palsy. Arch

Phys Med Rehabil 1989 Jun;70(6):482-9.

Blake RL, Ferguson H. Extrinsic rearfoot posts.

J Am Podiatr Med Assoc 1992 Apr;82(4):202-7.

Blake RL, Ferguson H. Foot orthosis for the severe

flatfoot in sports. J Am Podiatr Med Assoc 1991

Oct;81(10):549-55.

Blanco JS, Herring JA. Congenital Chopart

amputation. A functional assessment. Clin Orthop

1990 Jul;(256):14-21.

Blauth W, Hippe P. The surgical treatment of partial

tibial deficiency and ankle diastasis. Prosthet

Orthot Int 1991 Aug;15(2):127-30.

Bordelon RL. Orthotics, shoes, and braces. Orthop

Clin North Am 1989 Oct;20(4):751-7.

Botte MJ, Mason RD, Gellman H. Temporary orthosis

for the cast-immobilized thumb. J Hand Surg [Am]

1993 Jan;18(1):164-5.

Bowker JH. Medical and surgical considerations in

the care of patients with insensate dyvascular feet.

J Prosthet Orthot 1991 Fall;4(1):23-30.

Bowker P, Messenger N, Ogilvie C, Rowley DI.

Energetics of paraplegic walking. J Biomed Eng

1992 Jul;14(4):344-50.

Brantingham JW, Snyder WR, Michaud T. Morton’s

neuroma. J Manip Physiol Ther 1991;14(5):

317-22.

Brennan MJ, Hayes S, Watson JT. Orthotics versus

casting in the management of lower extremity

sprains, fractures, and other common orthopaedic

problems. Contemp Orthop 1991 Jun;22(6):

683-713.

Brims J, Lynch T, Isaac TC. Appliance for hemiplegic

patients [letter]. Br J Gen Pract 1992

Jan;42(354):41.

Brooke MM, de Lateur BJ, Diana-Rigby GC, Questad

KA. Shoulder subluxation in hemiplegia: effects

of three different supports. Arch Phys Med Rehabil

1991 Jul;72(8):582-6.

Brown JK. Too few cooks: too many cooks

[editorial]. Dev Med Child Neurol 1992 Jul;34(7):

565-6.

Bruns J, Staerk H. Mechanical ankle stabilisation due

to the use of orthotic devices and peroneal muscle

strength. An experimental investigation. Int J

Sports Med 1992 Nov;13(8):611-5.

Burl MM, Williams JG, Nayak USL. The effect of

cervical collars on walking balance. Physiotherapy

1992 Jan;78(1):19-22.

Butler PB, Thompson N, Major RE. Improvement in

walking performance of children with cerebral

palsy: preliminary results. Dev Med Child Neurol

1992 Jul;34(7):567-76.

Calmels P, Escafit M, Domenach M, Minaire P.

Posturographic evaluation of the proprioceptive

effect of ankle orthoses in healthy volunteers. Int

Disabil Stud 1991 Apr-Jun;13(2):42-5.

Calmels P, Pallot-Prades B, Alexandre C, Minaire P.

[The reeducation of the patient with rheumatoid

polyarthritis]. Servir 1989 Sep-Oct;37(5):306-9.

(Por).

Carlson JM, French J. Knee orthoses for valgus

protection. Experiments on 11 designs with related

analyses of orthosis length and rigidity. Clin

Orthop 1989 Oct;(247):175-92.

Carlson JM, Hollerback F, Day B. A calf corset

weightbearing ankle-foot orthosis design. J

Prosthet Orthot 1991 Fall;4(1):41-4.

Carter TR, Fowler PJ, Blokker C. Functional

postoperative treatment of Achilles tendon repair.

Am J Sports Med 1992 Jul-Aug;20(4):459-62.

Casa B, Caleffi E, Bocchi A, Ferraro F, Del Piano P.

[Rehabilitation of burned patients. II. Therapeutic

exercise]. Acta Biomed Ateneo Parmense

1990;61(1-2):67-71. (Ita).

Caselli MA, Cohen-Sobel E, Thompson J, Adler J,

Gonzalez L. Biomechanical management of

children and adolescents with Down syndrome.

J Am Podiatr Med Assoc 1991 Mar;81(3):119-27.

Cassinis A, Conti B, Redaelli T, Cosignani F,

Bartemucci G. [The multidisciplinary treatment of

children with spina bifida]. Riabilitazione 1991;

24(4):207-21. (Ita).

Chandler DR, Nemejc C, Adkins RH, Waters RL.

Emergency cervical-spine immobilization. Ann

Emerg Med 1992 Oct;21(10):1185-8.

Chu T. Three-dimensional finite element stress

analysis of a polymeric orthotic device:

biomechanics of the ankle-foot orthosis

[dissertation]. Akron (OH): University of Akron;

1992. 258 p.

Clayman DA, Murakami ME, Vines FS. Compatibility

of cervical spine braces with MR imaging: a study

of nine nonferrous devices. AJNR Am J

Neuroradiol 1990 Mar-Apr;11(2):385-90.

Closson JB, Toerge JE, Ragnarsson KT, Parsons KC,

Lammertse DP. Rehabilitation in spinal cord

disorders. 3. Comprehensive management of spinal

cord injury. Arch Phys Med Rehabil 1991 Mar;

72(4-S):S298-308.

Condie DN. Lower limb orthotics. Curr Opin Orthop

1990 Dec;1(3):462-5.

Conway PJ, Herzog W. Changes in walking

mechanics associated with wearing an

intertrochanteric support belt. J Manipulative

Physiol Ther 1991 Mar-Apr;14(3):185-8.

Cool JC. Biomechanics of orthoses for the subluxed

shoulder. Prosthet Orthot Int 1989 Aug;13(2):90-6.

Cornwall MW, McPoil TG. Effect of rearfoot posts in

reducing forefoot forces. A single-subject design.

J Am Podiatr Med Assoc 1992 Jul;82(7):371-4.

Correll J. The state of technical orthopaedics in spina

bifida. Z Kinderchir 1989 Dec;44 Suppl 1:8-10.

Cotler HB, Cotler JM, Alden ME, Sparks G, Biggs CA.

The medical and economic impact of closed

cervical spine dislocations. Spine 1990 Jun;15(6):

448-52.

Craig GR, Nielsen MS. Rigid cervical collars and

intracranial pressure. Intensive Care Med 1991;

17(8):504-5.

Cutcliffe N, Prugger A. Adapted clothing for patients

in halo traction. Can J Occup Ther 1990 Feb;

57(1):39-42.

Cuxart A, Iborra J, Melendez M, Pages E. Physeal

injuries in myelomeningocele patients. Paraplegia

1992 Nov;30(11):791-4.

Davidson MR, Copoloff JA. Neuromas of the heel.

Clin Podiatr Med Surg 1990 Apr;7(2):271-88.

De Korvin G, Pialoux B, Allainmat T, Michelin F,

Morvan MF, Bracq H. The contribution of

orthotic devices and technical aids to locomotor

development in a group of 29 children with various

mental and physical disabilities. Ann Readapt Med

Phys 1989 Dec;32(6):743-65.

Diamond MF, Ottenbacher KJ. Effect of a tone-

inhibiting dynamic ankle-foot orthosis on stride

characteristics of an adult with hemiparesis. Phys

Ther 1990 Jul;70(7):423-30.

Djeddou N. Experience of treating scoliosis at the

Azur Plage medical centre. Ann Readapt Med

Phys 1989 Aug;32(4):321-30.

Donatto KC, Rightor N, D’Ambrosia R. Custom-

molded orthotics in postoperative hallux valgus

immobilization. Orthopedics 1992 Apr;15(4):

449-51.

Dunst RM. Legg-Calv�-Perthes disease. Orthop Nurs

1990 Mar-Apr;9(2):18-27.

Durfee WK, Hausdorff JM. Regulating knee joint

position by combining electrical stimulation with a

controllable friction brake. Ann Biomed Eng 1990;

18(6):575-96.

Egan JM. An aid for the management of shoulder

pain in hemiplegia. Br J Occup Ther 1990

Sep;53(9):362-4.

Elattrache N, Fadale PD, Fu FH. Thoracic spine

fracture in a football player. A case report. Am J

Sports Med 1993 Jan-Feb;21(1):157-60.

Elizarov VG, Buslov IV, Gerasimov OR, Korolev AN.

[Compression-flexion fractures of lower thoracic

and lumbar vertebrae: causes of failure of the

reclination treatment and the ways of its

improvement]. Vestn Khir 1990 Jul;145(7):58-62.

(Rus).

Elizarov VG, Buslov IV, Gerasimov OR, Korolev AN.

[Long-term forced reclination in fractures of the

lower thoracic and lumbar vertebrae: its

biomechanical substantiation and results]. Sov Med

1990;(2):101-3. (Rus).

Elschner H, Kleditzsch J, Schulze KJ, Stenzel R. The

posture training device. Function and first tests.

Z Physiother 1990;42(2):105-8.

Embrey DG, Yates L, Mott DH. Effects of neuro-

developmental treatment and orthoses on knee

flexion during gait: a single-subject design. Phys

Ther 1990 Oct;70(10):626-37.

Enneking WF, Dunham W, Gebhardt MC, Malawar M,

Pritchard DJ. A system for the functional

evaluation of reconstructive procedures after

surgical treatment of tumors of the musculoskeletal

system. Clin Orthop 1993 Jan;(286):241-6.

Ernst E. [Does a supportive muscle corset: prevent

spinal complaints?]. Wien Med Wochenschr

1992;142(13):291-3. (Ger).

Federico DJ, Renshaw TS. Results of treatment of

idiopathic scoliosis with the Charleston bending

orthosis. Spine 1990 Sep;15(9):886-7.

Ferguson H, Raskowsky M, Blake RL, Denton JA.

TL-61 versus Rohadur orthoses in heel spur

syndrome. J Am Podiatr Med Assoc 1991 Aug;

81(8):439-42.

Fernandez-Palazzi F, Silva JR. Congenital dislocation

of the knee. Int Orthop 1990;14(1):17-9.

Fettweis E. Treatment of congenital dislocation of the

hip in a squatting position, Fettweis method. Acta

Orthop Belg 1990;56(1 Pt A):155-65.

Fillion PL. Treatment of lateral epicondylitis. Am J

Occup Ther 1991 Apr;45(4):340-3.

Fisher SV. Cervical orthotics. Phys Med Rehabil Clin

North Am 1992 Feb;3(1):29-43.

Fisher SV. Spinal orthoses. In: Kottke FJ, Lehman JF.

Krusen’s handbook of physical medicine and

rehabilitation. 4th ed. Philadelphia: Saunders; 1990.

p. 593-601.

Flenner TJ, Meek M. A stump protector for the

person with a lower extremity amputation. Am J

Occup Ther 1991 Feb;45(2):171-2.

Fukushima M, Sigeno Y, Yamamoto K, Nakamura T,

Watanabe T. Patellar band for patellofemoral

disorders: results and indications. Prosthet Orthot

Int 1992 Aug;16(2):109-13.

Gajiwala KJ, Sams SB, Pandya N, Wagh A. A new

dynamic lumbrical simulating splint for claw hand

deformity. Plast Reconstr Surg 1991 Jan;87(1):

170-3.

Garber SL, Gregorio TL. Upper extremity assistive

devices: assessment of use by spinal cord-injured

patients with quadriplegia. Am J Occup Ther 1990

Feb;44(2):126-31.

Gaskill SJ, Marlin AE. Custom fitted thermoplastic

Minerva jackets in the treatment of cervical spine

instability in preschool age children. Pediatr

Neurosurg 1990-91;16(1):35-9.

Gavin TM, Boscardin JB, Patwardhan AG, Bunch WH,

Zindrick MR, Lorenz MA, Vrbos LA. Preliminary

results of orthotic treatment for chronic low back

pain. J Prosthet Orthot 1993 Jan;5(1):5-9.

Gaynor R, Hake D, Spinner SM, Tomczak RL. A

comparative analysis of conservative versus surgical

treatment of Morton’s neuroma. J Am Podiatr Med

Assoc 1989 Jan;79(1):27-30.

Glover SD, Benson MK. Iliotibial band contracture

after using the Pavlik harness. J Bone Joint Surg

[Br] 1989 May;71(3):535.

Granata C, De Lollis A, Campo G, Piancastelli L,

Merlini L. Analysis, design and development of a

carbon fibre reinforced plastic knee-ankle-foot

orthosis prototype for myopathic patients. Proc Inst

Mech Eng [H] 1990;204(2):91-6.

Grant AD, Atar D, Lehman WB. Ilizarov technique in

correction of foot deformities: a preliminary report.

Foot Ankle 1990 Aug;11(1):1-5.

Greene TA, Hillman SK. Comparison of support

provided by a semirigid orthosis and adhesive ankle

taping before, during, and after exercise. Am J

Sports Med 1990 Sep-Oct;18(5):498-506.

Greene TA, Wight CR. A comparative support

evaluation of three ankle orthoses before, during,

and after exercise. J Orthop Sports Phys Ther 1990

Apr;11(10):453-66.

Greene WB. Infantile tibia vara. Instr Course Lect

1993;42:525-38.

Greene WB. Infantile tibia vara. J Bone Joint Surg

Am 1993 Jan;75(1):130-43.

Gross MT, Ballard CL, Mears HG, Watkins EJ.

Comparison of DonJoy Ankle Ligament Protector

and Aircast Sport Stirrup orthoses in restricting foot

and ankle motion before and after exercise.

J Orthop Sports Phys Ther 1992 Aug;16(2):60-7.

Guidera KJ, Smith S, Raney E, Frost J, Pugh L, Griner

D, Ogden JA. Use of the reciprocating gait

orthosis in myelodysplasia. J Pediatr Orthop 1993

May-Jun;13(3):341-8

Haje SA, Bowen JR. Preliminary results of orthotic

treatment of pectus deformities in children and

adolescents. J Pediatr Orthop 1992 Nov-Dec;

12(6):795-800.

Hale S. Carbon fiber articulated AFO - an alternative

design. J Prosthet Orthot 1989 Jul;1(4):191-8.

Hanson CJ, Jones LJ. Gait abnormalities and

inhibitive casts in cerebral palsy. Literature review.

J Am Podiatr Med Assoc 1989 Feb;79(2):53-9.

Harden NG, Luster SH. Rehabilitation considerations

in the care of the acute burn patient. Crit Care

Nurs Clin North Am 1991 Jun;3(2):245-53.

Harding WG 3d. Use and misuse of the tennis elbow

strap. Physician Sportsmed 1992 Aug;20(8):65-8,

71-2, 74.

Harlow ML, Russ JC, Nolinske TL, et al. Orthotic

management of the spine. In: Meyer PR. Surgery of

spine trauma. New York: Churchill Livingstone;

1989. p. 279-304.

Harryman SE. Lower-extremity surgery for children

with cerebral palsy: physical therapy management.

Phys Ther 1992 Jan;72(1):16-24.

Hart DL. Spinal immobility: braces and corsets. In:

Gould JA 3rd, ed. Orthopaedic and sports physical

therapy. 2nd ed. St. Louis: Mosby; 1990.

p. 265-89.

Heckmatt J, Rodillo E, Dubowitz V. Management of

children: pharmacological and physical. Br Med

Bull 1989 Jul;45(3):788-801.

Helliwell PS, Wright V. What are the indications for

the use of a lumbar corset in low back pain? Br J

Rheumatol 1991 Feb;30(1):62.

Hesse S, Platz T, Mauritz KH. [Indications for

optimal use of orthoses in the treatment of

hemiparetic patients]. Biomed Tech (Berlin) 1990;

35 Suppl 3:52-3. (Ger).

Hirons RR, Williams KB, Amor RF, Day HJ. The

prosthetic treatment of lower limb deficiency.

Prosthet Orthot Int 1991 Aug;15(2):112-6.

Holmstrom E, Moritz U. Effects of lumbar belts on

trunk muscle strength and endurance: a follow-up

study of construction workers. J Spinal Disord

1992 Sep;5(3):260-6.

Hopkins BP. The development of a symmetrical hip

orthosis. Physiotherapy 1992 Jun;78(6):428-32.

Ikeda K. Conservative treatment of idiopathic

clubfoot. J Pediatr Orthop 1992 Mar-Apr;12(2):

217-23.

Ikzkovich M, Catz A, Ona I. A new double-purpose

device for elbow extension in tetraplegia with

paralysis below C5. Paraplegia 1993 Feb;31(2):

116-8.

Inglis S, Gibbett K. Custom designed stroller inserts

for young children with cerebral palsy. Aust Occup

Ther J 1991;38(3):147-53.

Ishal VA. [Possibilities of conservative treatment of

scoliosis]. Ortop Travmatol Protez 1990 Mar;(3):

74-7. (Rus).

Jaivin JS, Bishop JO, Braly WG, Tullos HS.

Management of acquired adult dropfoot. Foot

Ankle 1992 Feb;13(2):98-104.

Jani L. [Conservative treatment of hip dysplasia/hip

dislocation in infancy]. Z Orthop 1990 Jul-Aug;

128(4):361-4. (Ger).

Jay RM, Schoenhaus HD. Hyperpronation control

with a dynamic stabilizing innersole system. J Am

Podiatr Med Assoc 1992 Mar;82(3):149-53.

Johnson MW, Peckham PH. Evaluation of shoulder

movement as a command control source. IEEE

Trans Biomed Eng 1990 Sep;37(9):876-85.

Johnsson R. The use of orthoses in lumbar spine

fusion. Acta Orthop Scand Suppl 1993;251:92-3.

Jones DC. Foot othoses. Instr Course Lect 1993;42:

219-24.

Jurisson ML. Rehabilitation in rheumatic diseases.

What’s new. West J Med 1991 May;154(5):545-8.

Kahn DL. The reciprocation gait orthosis for children

with myelodysplasia. Phys Occup Ther Pediatr

1989;9(2):107-17.

Kaplan SL, Rocco TP, Tun CG, Silverman DI, Kemper

AJ. Acute pulmonary edema following removal of

a spinal orthosis: an unusual complication of a halo

vest. Arch Phys Med Rehabil 1990 Mar;71(3):

255-7.

King HA. Orthotic management of idiopathic

scoliosis. Phys Med Rehabil Clin North Am 1992

Feb;3(1):45-55.

King TI 2d. A standing belt. Am J Occup Ther 1989

Jul;43(7):471-3.

Knutson LM, Clark DE. Orthotic devices for

ambulation in children with cerebral palsy and

myelomeningocele. Phys Ther 1991 Dec;71(12):

947-60.

Kohlmeyer KM, Weber CG, Yarkony GM. A new

orthosis for central cord syndrome and brachial

plexus injuries. Arch Phys Med Rehabil 1990 Nov;

71(12):1006-9.

Korbelar P. [Basics of conservative therapy of

idiopathic scoliosis]. Cesk Pediatr 1989 May;44(5):

296-8. (Cze).

Korzh NA, Bilinskii PI. [Orthotic devices in the

treatment of injuries of the ankle joint]. Ortop

Travmatol Protez 1991 Apr;(4):5-10. (Rus).

Kotzki N, Pelissier J, Dusotoit C, Toulemonde M,

Codine P, Enjalbert M, Daures P, Simon L.

Preventive processes of shoulder hand syndrome in

bedridden hemiplegic patients: Evaluation of three

processes. Ann Readapt Med Phys 1991;34(4):

351-5.

Kruse DH. Leave the collar on [letter]. J Emerg Nurs

1990 Nov-Dec;16(6):376.

Lane SE. Severe ankle sprains: treatment with an

ankle foot orthosis. Physician Sportsmed 1990

Nov;18(11):43-4, 46-51.

Lauritzen JB, Petersen MM, Lund B. Effect of

external hip protectors on hip fractures. Lancet

1993 Jan 2;341(8836):11-3.

LeBlanc MA, Carlson LE, Nauenberg T. A

quantitative comparison of four experimental

axillary crutches. J Prosthet Orthot 1993 Jan;

5(1):20-8.

Lee S, Agah A, Bekey G. IROS: an intelligent

rehabilitative orthotic system for cerebrovascular

accident. In: 1990 IEEE International Conference

on Systems, Man and Cybernetics Conference

Proceedings; 1990 Nov 4-7; Los Angeles, CA. New

York: IEEE; 1990. p. 815-9.

Lehmann JF. Push-off and propulsion of the body in

normal and abnormal gait. Correction by ankle-foot

orthoses. Clin Orthop 1993 Mar;(288):97-108.

Lehmann JF, de Lateur BJ. Lower extremity orthotics.

In: Kottke FJ, Lehman JF. Krusen’s handbook of

physical medicine and rehabilitation. 4th ed.

Philadelphia: Saunders; 1990. p. 602-46.

Lehmann JF, De Lateur BJ, Price R. Ankle foot

orthoses for paresis and paralysis. Phys Med

Rehabil Clin North Am 1992 Feb;3(1):139-59.

Lehmann JF, De Lateur BJ, Price R. Biomechanics of

normal gait. Phys Med Rehabil Clin North Am

1992 Feb;3(1):95-109.

Lehmann JF, De Lateur BJ, Price R. Knee ankle foot

orthoses for paresis and paralysis. Phys Med

Rehabil Clin North Am 1992 Feb;3(1):161-83.

Lehmann JF, De Lateur BJ, Price R. Weight bearing

and other orthoses for skeletal and joint

insufficiency. Phys Med Rehabil Clin North Am

1992 Feb;3(1):185-92.

Lein S. How are physiotherapists using the Vessa

Pneumatic Post Amputation Mobility Aid?

Physiotherapy 1992 May;78(5):318-22.

Leone D, Diemente S, Lopez-Isa M, Fox MD, Epstein

MA, Davis RB, Alward TM. Structural stability

prediction for thermoplastic ankle-foot orthoses. In:

Proceedings of the 17th Annual Northeast

Bioengineering Conference; 1991 Apr 4-5;

Hartford, CT. New York: IEEE; 1991. p. 231-2.

Lough LK. The effects of fixed and hinged ankle foot

orthoses on gait myoelectric activity and standing

joint alignment in children with cerebral palsy

[dissertation]. Iowa City (IA): University of Iowa;

1990. 223 p.

Lumbar support belts. J Occup Med 1992 Jul;34(7):

679-80.

Madden G. Orthotic management for osteochondritis

dissecans of the talar dome. J Prosthet Orthot 1989

Jan;1(2):72-5.

Maeda CJ, Baydur A, Waters RL, Adkins RH. The

effect of the halovest and body position on

pulmonary function in quadriplegia. J Spinal

Disord 1990 Mar;3(1):47-51.

Mann DC, Hoffer MM. Flat foot in spastic cerebral

palsy. Semin Orthop 1989;4(4):277-88.

Marcinko DE, Azzolini TJ, Mariash SA. Enigma of

pediatric vertical talus deformity. J Foot Surg 1990

Sep-Oct;29(5):452-8.

Markley VJ, Shepperd JA. Corset supply and the

Hastings corset shop. Br J Occup Ther 1990 Apr;

53(4):155-7.

Marr J, Edmonds V. Cervical orthoses: the issue of

patient compliance. J Neurosci Nurs 1990 Apr;

22(2):104-7.

Matsusue Y, Ueno T, Yamamuro T. Effective

treatment by orthosis of dislocation of the patella

associated with Down’s syndrome. A report of case.

Nippon Geka Hokan 1991 May 1;60(3):189-94.

McConnell EA. Correctly positioning an arm sling.

Nursing 1991 Jul;21(7):70.

McCulloch MU, Brunt D, Vander Lindern D. The

effect of foot orthotics and gait velocity on lower

limb kinematics and temporal events of stance.

J Orthop Sports Phys Ther 1993 Jan;17(1):2-10.

McGuire RA, Degnan G, Amundson GM. Evaluation

of current extrication orthoses in immobilization of

the unstable cervical spine. Spine 1990

Oct;15(10):1064-7.

McGuire RA Jr. Protection of the unstable spine

during transport and early hospitalization. J Miss

State Med Assoc 1991 Aug;32(8):305-8.

McKenna ME, McCarthy C. Acute care of the patient

with spinal cord injury. CONA J 1989 Spring;

11(1):5-10.

McKnight PT, Kwoh CK. Randomized, controlled

trial of compression gloves in rheumatoid arthritis.

Arthritis Care Res 1992 Dec;5(4):223-7.

Meehan PL, Angel D, Nelson JM. The Scottish Rite

abduction orthosis for the treatment of Legg-Perthes

disease. A radiographic analysis. J Bone Joint Surg

[Am] 1992 Jan;74(1):2-12.

Miault D, Brun JP, Dupre JC, Pill M, Miault P,

Deschamps E, Priollet P, Laurian C, Fichelle JM,

Cormier JM. [Foot equipment of diabetic

arteriopathy]. J Mal Vasc 1993;18(1):42-6.

Michael JW, Isbell MA, Harrelson JM. Orthotic

management of diabetic neuropathic arthropathy.

J Prosthet Orthot 1991 Fall;4(1):45-55.

Milgrom C, Burr DB, Boyd RD, Robin GC, Higgins

WL, Radin EL. The effect of a viscoelastic

orthotic on the incidence of tibial stress fractures in

an animal model. Foot Ankle 1990 Apr;10(5):

276-9.

Miller CD, Paulos LE, Parker RD, Fishell M. The

ballet technique shoe: a preliminary study of eleven

differently modified ballet technique shoes using

force and pressure plates. Foot Ankle 1990 Oct;

11(2):97-100.

Moore P, Major R, Stallard J, Butler PB. Contracture

correction device for arthrogryposis. Physiotherapy

1990 May;76(5):303-5.

Moore P, Stallard J. A clinical review of adult

paraplegic patients with complete lesions using the

Orlau Parawalker. Paraplegia 1991 Mar;29(3):

191-6.

Moreau C. [Myopathies]. Rev Infirm 1989 Nov;

39(18):27-31. (Fre).

Mossberg KA, Linton KA, Friske K. Ankle-foot

orthoses: effect on energy expenditure of gait in

spastic diplegic children. Arch Phys Med Rehabil

1990 Jun;71(7):490-4.

Mueller K, Cornwall M, McPoil T, Mueller D,

Barnwell J. Effect of a tone-inhibiting dynamic

ankle-foot orthosis on the foot-loading pattern of a

hemiplegic adult: a preliminary study. J Prosthet

Orthot 1992 Winter;4(2):86-92.

Mulder AJ, Veltink PH, Boom HB, Zilvold G. Low-

level finite state control of knee joint in paraplegic

standing. J Biomed Eng 1992 Jan;14(1):3-8.

Murtagh J. Fractured rib. Aust Fam Physician 1991

Apr;20(4):491.

Murtagh J. Slings (Part 1). Aust Fam Physician 1992

Nov;21(11):1681.

Myhr U, von Wendt L. Improvement of functional

sitting position for children with cerebral palsy.

Dev Med Child Neurol 1991 Mar;33(3):246-56.

Nash RS, Davy MS, Orpwood R, Swain ID.

Development of a wheelchair-mounted folding

standing frame. J Biomed Eng 1990 May;12(3):

189-92.

Naylor JR, Mulley GP. Surgical collars: a survey of

their prescription and use. Br J Rheumatol 1991

Aug;30(4):282-4.

Nazaroff KS, Stanton JH, Magana KR, Kaufman RL.

Halo-body jacket immobilization in rheumatoid

arthritis patients with cervical myelopathy. Nurs

Clin North Am 1989 Mar;24(1):209-23.

Nemunaitis GA, Herbison GJ. Cosmetic, functional,

independent: self-help aids. Arch Phys Med

Rehabil 1991 Apr;72(5):334-5.

Nene AV, Patrick JH. Energy cost of paraplegic

locomotion using the ParaWalker--electrical

stimulation "hybrid" orthosis. Arch Phys Med

Rehabil 1990 Feb;71(2):116-20.

Neumann H, O’Shea P, Nielson JP, Climstein M. A

physiological comparison of the short-leg walking

cast and an ankle-foot orthosis walker following 6

weeks of immobilization. Orthopedics 1989 Nov;

12(11):1429-33; discussion 1433-4.

Newell SG. Functional neutral orthoses and shoe

modifications. Phys Med Rehabil Clin North Am

1992 Feb;3(1):193-222.

Nordenskiold U. Elastic wrist orthoses. Reduction of

pain and increase in grip force for women with

rheumatoid arthritis. Arthritis Care Res 1990 Sep;

3(3):158-62.

Novick A, Birke JA, Hoard AS, Brasseaux DM,

Broussard JB, Hawkins ES. Rigid orthoses for the

insensitive foot: the rigid-relief orthosis. J Prosthet

Orthot 1991 Fall;4(1):31-40.

Novick A, Kelley DL. Position and movement

changes of the foot with orthotic intervention

during the loading response of gait. J Orthop Sport

Phys Ther 1990;11(7):301-12’.

Novick A, Stone J, Birke JA, Brasseauz DM, Broussard

JB, Hoard AS, Hawkins ES. Reduction of plantar

pressure with the rigid relief orthosis. J Am

Podiatr Med Assoc 1993 Mar;83(3):115-22.

O’Neill DB, Zarins B, Gelberman RH, Keating TM,

Louis D. Compression of the anterior interosseous

nerve after use of a sling for dislocation of the

acromioclavicular joint. A report of two cases.

J Bone Joint Surg [Am] 1990 Aug;72(7):1100-2.

Officer TM. A microprocessor controlled page turner.

Biomed Sci Instrum 1991;27:141-4.

Ogilvie C, Bowker P, Rowley DI. The physiological

benefits of paraplegia orthotically aided walking.

Paraplegia 1993 Feb;31(2):111-5.

Ohman K, Spaniol D. Halo immobilization: discharge

planning and patient education. J Neurosci Nurs

1990 Dec;22(6):351-7.

Ohsawa S, Ikeda S, Tanaka S, Takahashi T, Takeuchi

T, Utsunomiya M, Ueno R, Ohkura M, Ito Y,

Katagi Y, et al. A new model of plastic ankle foot

orthosis (FAFO (II)) against spastic foot and genu

recurvatum. Prosthet Orthot Int 1992 Aug;16(2):

104-8.

Pal’gov KA, Idrisova RS. [Functional treatment of

congenital clubfoot in infants]. Ortop Travmatol

Protez 1990 Nov;(11):57-8. (Rus).

Patwardhan AG, Li SP, Gavin T, Lorenz M, Meade

KP, Zindrick M. Orthotic stabilization of

thoracolumbar injuries. A biomechanical analysis of

the Jewett hyperextension orthosis. Spine 1990 Jul;

15(7):654-61.

Pavlik A. Stirrups as an aid in the treatment of

congenital dysplasias of the hip in children. By

Arnold Pavlik, 1950 [classical article]. J Pediatr

Orthop 1989 Mar-Apr;9(2):157-9.

Peltier RA. Effects of semi-rigid orthotics on

abduction-adduction moments at the knee joint

during walking [masters thesis]. Lansing (MI):

Michigan State University; 1990. 67 p.

Philps JW. The functional foot orthosis. Edinburgh

(UK): Churchill Livingstone; 1990. 180 p.

Pollock FE, Pollock FE Jr. Idiopathic scoliosis:

correction of lateral and rotational deformities using

the Cotrel-Dubousset spinal instrumentation system.

South Med J 1990 Feb;83(2):161-5.

Popovic D, Schwirtlich L, Kim Y, Spelman FA.

Sensory feed-back in hybrid orthotic system. In:

Kim Y, Spelman FA, eds. Images of the twenty-

first century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Vol. 5. Piscataway (NJ): IEEE; 1989.

p. 1475-6.

Popsuishapka AK. [The functional treatment of

diaphyseal fractures of the femur]. Ortop

Travmatol Protez 1989 Sep;(9):74-7. (Rus).

Popsuishapka AK, Pavlenko SI. [Functional treatment

of diaphyseal fractures of the humerus using a

polyvic orthosis]. Ortop Travmatol Protez 1989

Jun;(6):24-9. (Rus).

Pringle RG. Halo versus Minerva--which orthosis?

Paraplegia 1990 Jun;28(5):281-4.

Product comparison and evaluation: canes, crutches,

and walkers. Washington (DC): National

Rehabilitation Hospital, Rehabilitation Engineering

Center; 1990 Jun.

Product comparison and evaluation: scooters.

Washington (DC): National Rehabilitation Hospital,

Rehabilitation Engineering Center; 1991 Jun. 91 p.

Prokop LL. Upper-extremity rehabilitation:

conditioning and orthotics for the athlete and

performing artist. Hand Clin 1990 Aug;6(3):

517-24.

Regional Spinal Cord Injury Center of Delaware

Valley. Halo vest orthosis: application &

maintenance of the halo vest orthosis

[videocassette]. United States: [publisher unknown];

1991. 1 videocassette: 15 min., sound, color, 1/2 in

Rey B. [Non-drug and non-surgical measures in

chronic polyarthritis]. Ther Umsch 1991 Sep;

48(9):624-31. (Ger).

Reyburn TV. The "Z" strap: harnessing modification

for patients with upper extremity amputations.

Arch Phys Med Rehabil 1991 Mar;72(3):250-2.

Rhodes VJ. Physical therapy management of patients

with juvenile rheumatoid arthritis. Phys Ther 1991

Dec;71(12):910-9.

Ricks NR, Eilert RE. Effects of inhibitory casts and

othoses on bony alignment of foot and ankle during

weight-bearing in children with spasticity. Dev

Med Child Neurol 1993 Jan;35(1):11-6.

Rogers JC, Holm MB. Assistive technology device

use in patients with rheumatic disease: a literature

review. Am J Occup Ther 1992 Feb;46(2):120-7.

Romero PW, Rice J. Clinical suggestions. Clinical use

of the knee hyperextension block orthosis. Pediatr

Phys Ther 1992 Winter;4(4):205-7.

Rose NE, Feiwell LA, Cracchiolo A 3d. A method for

measuring foot pressures using a high resolution,

computerized insole sensor: the effect of heel

wedges on plantar pressure distribution and center

of force. Foot Ankle 1992 Jun;13(5):263-70.

Rosen PB, McSwain NE Jr, Arata M, Stahl S, Mercer

D. Comparison of two new immobilization

collars. Ann Emerg Med 1992 Oct;21(10):

1189-95.

Ross BW, Krilov MA. A patellar-tendon-bearing

orthosis used in pediatric burn rehabilitation. Arch

Phys Med Rehabil 1992 Oct;73(10):950-2.

Rowed DW. Management of cervical spinal cord

injury in ankylosing spondylitis: the intervertebral disc as a cause of cord compression. J Neurosurg

1992 Aug;77(2):241-6.

Ruttimann B. [Orthopedic technical and surgical

measures in the diabetic foot]. Ther Umsch 1990

Jan;47(1):63-70. (Ger).

Ryan S, Belbin G, SLack M, Naumann S, Moran R.

Development of a modular design, custom-fitted

protective helmet. J Prosthet Orthot 1992 Jul;

4(4):213-8.

Sankey RJ, Anderson DM, Young JA. Characteristics

of ankle-foot orthoses for management of the

spastic lower limb. Dev Med Child Neurol 1989

Aug;31(4):466-70.

Schaars AH, Hendriksen H, Toornend JL, Zilvold G.

Orthotic management of the lower extremity in

cerebral palsy. Lower extremity orthoses in cerebral

palsy. J Rehabil Sci 1990 Dec;3(4)::113-7.

Schaars AH, Postema K. Conservative treatment of

foot deformities in Duchenne Muscular Dystrophy.

J Rehabil Sci 1990 Jun;3(2):49-52.

Schepsis AA, Leach RE, Gorzyca J. Plantar fasciitis.

Etiology, treatment, surgical results, and review of

the literature. Clin Orthop 1991 May;(266):185-96.

Scherling E, Johnson H. A tone-reducing wrist--hand

orthosis. Am J Occup Ther 1989 Sep;43(9):

609-11.

Schiltenwolf M, Carstens C, Bernd L.

[Myelomeningocele--what can be done? Aids for

evaluating rehabilitation from the orthopedic

viewpoint]. Geburtshilfe Frauenheilkd 1992

Aug;52(8):449-53. (Ger).

Schiltenwolf M, Carstens C, Rohwedder J, Grundel E.

Results of orthotic treatment in children with

myelomeningocele. Eur J Pediatr Surg 1991 Dec;

1 Suppl 1:50-2.

Schindler A, Yaffe B, Chetrit A, Modan M, Engel J.

Factors influencing elbow arthrolysis. Ann Chir

Main Memb Super 1991;10(3):237-42.

Sears W, Fazl M. Prediction of stability of cervical

spine fracture managed in the halo vest and

indications for surgical intervention. J Neurosurg

1990 Mar;72(3):426-32.

Selby-Silverstein L, Hillstrom H, Palisano R, Hice G,

Kugler F. Aberrant gait of children with Down

syndrome and the efficacy of treatment with foot

orthoses. In: Woollacott M, Horak F, eds. Posture

and gait: control mechanisms. Proceedings of the

11th International Symposium of the Society for

Postural and Gait Research; 1992; Portland, OR.

Vol. 2. Portland (OR): University of Oregon; 1992.

p. 427-30.

Seligman D, Burack E. A customized ankle foot

positioning support. Can J Occup Ther 1989 Apr;

56(2):80-2.

Seror P. [Orthosis as treatment of ulnar nerve

compression at the elbow. Preliminary results in 22

patients (letter)]. Presse Med 1991 Dec 14;20(43):

2214-5. (Fre).

Shewring DJ, Beaudet M, Carvell JE. Reversed

dynamic slings: results of use in the treatment of

post-traumatic flexion contractures of the elbow.

Injury 1991 Sep;22(5):400-2.

Shirazi-Adl A. Finite element stress analysis of a

push-out test. Part 1: Fixed interface using stress

compatible elements. J Biomech Eng 1992 Feb;

114(1):111-8.

Simkin A, Leichter I, Giladi M, Stein M, Milgrom C.

Combined effect of foot arch structure and an

orthotic device on stress fractures. Foot Ankle

1989 Aug;10(1):25-9.

Slings (Part 2). Aust Fam Physician 1992 Dec;21(12):

1815.

Smith RM, Emans JB, Miller J. Fracture of the

odontoid in a toddler. Injury 1992;23(5):352-3.

Solem OI, Reikeras O. [Treatment of chronic

subacromial pain syndrome using a sling]. Tidsskr

Nor Laegeforen 1991 May 10;111(12):1504-5.

(Nor).

Solot JA, Winzelberg GG. Clinical and radiological

evaluation of Vertebrace extrication collars.

J Emerg Med 1990 Jan-Feb;8(1):79-83.

Staats TB, Kriechbaum MP. Computer aided design

and computer aided manufacturing of foot orthoses.

J Prosthet Orthot 1989 Apr;1(3):182-6.

Staheli LT. Lower positional deformity in infants and

children: a review. J Pediatr Orthop 1990 Jul-Aug;

10(4):559-63.

Stanton RP. Scoliosis evaluation and management.

Del Med J 1989 Dec;61(12):669-74.

Stern EB. Stability of the Jebsen-Taylor Hand

Function Test across three test sessions. Am J

Occup Ther 1992 Jul;46(7):647-9.

Stillo JV, Stein AB, Ragnarsson KT. Low back

orthoses. Phys Med Rehabil Clin North Am 1992

Feb;3(1):57-94.

Subbarao JV. Walking after spinal cord injury. Goal

or wish? West J Med 1991 May;154(5):612-4.

Sullivan BE, Rogers SL. Modified Bobath sling with

distal support. Am J Occup Ther 1989 Jan;43(1):

47-9.

Sullivan MJL, Heisel B, Lemaire E, Martel G, Grinnell

D. Utilization of orthotic devices in stroke

patients: a comparison of out-reach and institution

based services.’’ Can J Rehabil 1990 Sep;4(1):

47-50.

Swain RA, Holt WS Jr. Ankle injuries. Tips from

sports medicine physicians. Postgrad Med 1993

Feb 15;93(3):91-2, 97-100.

Swanson VM. Below-knee polyethylene semi-rigid

dressing. J Prosthet Orthot 1993 Jan;5(1):10-5.

Swanson VM. Technical note: the anatomical above-

knee suspension belt. J Prosthet Orthot 1992

Winter;4(2):119-24.

Tamura K. [Selection of containment treatment for

Legg-Calv�-Perthes disease]. Nippon Seikeigeka

Gakkai Zasshi 1991 Nov;65(11):1152-61. (Jpn).

Tax HR. Conservative treatment of flatfoot in the

newborn. Clin Podiatr Med Surg 1989 Jul;6(3):

521-36.

Taylor SJ, Monahan LC, Abraham FJ. A headband for

anterior head support. Am J Occup Ther 1989

Apr;43(4):261-2.

Taylor TL. Idiopathic flexible flatfoot in the

adolescent. Clin Podiatr Med Surg 1989 Jul;6(3):

537-53.

Thevenon A, Dalinval P, Gania L, Dewailly P,

Delcambre B. [Relief orthosis with sub-patellar

support and Paget’s disease]. Rev Rhum Mal

Osteoartic 1990 Jul-Sep;57(7-8):553-5. (Fre).

Thomas SE, Mazur JM, Child ME, Supan TJ.

Quantitative evaluation of AFO use with

myelomeningocele children. Z Kinderchir 1989

Dec;44 Suppl 1:38-40.

Thompson JA, Jennings MB, Hodge W. Orthotic

therapy in the management of osteoarthritis. J Am

Podiatr Med Assoc 1992 Mar;82(3):136-9.

Tloka VA, Savitskii VT, Krat IA, Ziabchenko IS,

Shvets VA. [Method of correction of spinal

deformity in children during the growth period].

Klin Khir 1990;(6):66-7. (Rus).

Tonnis D. Ischemic necrosis as a complication of

treatment of C.D.H. Acta Orthop Belg 1990;

56(1 Pt A):195-206.

Triggs KJ, Ballock RT, Byrne T, Garfin SR. Length

dependence of a halo orthosis on cervical

immobilization. J Spinal Disord 1993 Feb;6(1):

34-7.

Uellendahl J, Heckathorne CW, Krick H, Duff S,

Patwardhan AG, Li S, Gavin T, Lorenz M, Meade

KP, Logan GD, et al. Session 17: prosthetics and

orthotics. In: Capitalizing on technology:

proceedings of the RESNA 13th annual conference;

1990 Jun 15-20; Washington, DC. Washington

(DC): RESNA Press; 1990. p. 167-76.

Uratani H. [Innovation in shampooing while using

direct skull traction--with special reference to

shampooing while fitted with a halo vest]. Kango

Gijutsu 1989 Jun;35(9):1109-11. (Jpn).

Valiquette C, Robert G, Audet J. The lateral abductor

device. J Prosthet Orthot 1992 Winter;4(2):109-18.

Viladot A. Surgical treatment of the child’s flatfoot.

Clin Orthop 1992 Oct;(283):34-8.

Vleeming A, Buyruk HM, Stoeckart R, Karamursel S,

Snijders CJ. An integrated therapy for peripartum

pelvic instability: a study of the biomechanical

effects of pelvic belts. Am J Obstet Gynecol 1992

Apr;166(4):1243-7.

Walsh NE, Schwartz RK. The influence of

prophylactic orthoses on abdominal strength and

low back injury in the workplace. Am J Phys Med

Rehabil 1990 Oct;69(5):245-50. Comment in: Am J

Phys Med Rehabil 1991 Apr;70(2):111-2.

Waring WP, Maynard F, Grady W, Grady R, Boyles C.

Influence of appropriate lower extremity orthotic

management on ambulation, pain, and fatigue in a

postpolio population. Arch Phys Med Rehabil 1989

May;70(5):371-5.

Wasson JH, Gall V, McDonald R, Liang MH. The

prescription of assistive devices for the elderly:

practical considerations. J Gen Intern Med 1990

Jan-Feb;5(1):46-54.

Waters RL, Tajyra HS, Adkins RH. Gait performance

after spinal cord injury. Clin Orthop 1993 Mar;

(288):87-96.

Waters RL, Yakura JS, Adkins R, Barnes G.

Determinants of gait performance following spinal

cord injury. Arch Phys Med Rehabil 1989 Nov;

70(12):811-8.

Weber D. Clinical aspects of lower extremity orthotics.

Oakville (ON): Published by Elgan Enterprises in

conjunction with the Canadian Association of

Prosthetists and Orthotists; 1990. 372 p.

Weber D. Use of the Hinged AFO for children with

spastic cerebral palsy and midfoot instability.

J Assoc Child Prosthet Orthot Clin 1991

Spring-1990 Winter;25(3-4):61-5.

Wenberg SJ. The term restraints is archaic [letter].

Am J Occup Ther 1991 Jan;45(1):86.

White FJ. Orthotics. In: Drennan JC, ed. Child’s foot

and ankle. New York: Raven Press; 1992.

p. 71-96.

Whittle MW, Cochrane GM, Chase AP, Copping AV,

Jefferson RJ, Staples DJ, Fenn PT, Thomas DC.

A comparative trial of two walking systems for

paralysed people. Paraplegia 1991 Feb;29(2):

97-102.

Wientroub S, Khermosh O. A new orthosis for the

management of clubfoot and other foot and leg

deformities in infancy and early childhood.

J Pediatr Orthop 1991 Jul-Aug;11(4):485-7.

Willner S. [Scoliosis--a review]. Nord Med 1990;

105(3):82-5. (Swe).

Wolfe SA, Brueckmann FR. Conservative treatment

of genu valgus and varum with medial/lateral heel

wedges. Indiana Med 1991 Sep;84(9):614-5.

Wong AM, Tang FT, Wu SH, Chen CM. Clinical trial

of a low-temperature plastic anterior ankle foot

orthosis. Am J Phys Med Rehabil 1992 Feb;71(1):

41-3.

Wood S, Clapham L, Pickard JD. Medico-legal

collars--time for a consensus to agree to disagree

[editorial]. Br J Neurosurg 1990;4(4):247-8.

Wooden MJ. Biomechanical evaluation for functional

orthotics. In: Donatelli R, Wolf SL, eds.

Biomechanics of the foot and ankle. Philadelphia:

F.A. Davis; 1990. p. 131-47. (Contemprary

perspectives in rehabilitation; vol. 3).

Wooten B, Uhl TL, Chandler J. Use of an orthotic

device in the treatment of posterior heel pain.

J Orthop Sports Phys Ther 1990 Mar;11(9):410-3.

Wright JG, Menelaus MB, Broughton NS, Shurtleff D.

Natural history of knee contractures in

myelomeningocele. J Pediatr Orthop 1991

Nov-Dec;11(6):725-30.

Wu KK. Foot orthoses: priniciples and clinical

applications. Baltimore: Williams & Wilkins; 1990.

379 p.

Yale JF. The conservative treatment of adult flexible

flatfoot. Clin Podiatr Med Surg 1989 Jul;6(3):

555-60.

Yamamoto H, Okumura S, Morita S, Obata K, Furuya

K. Surgical correction of foot deformities after

stroke. Clin Orthop 1992 Sep;(282):213-8.

Yamamoto S, Ebina M, Iwasaki M, Kubo S, Kawai H,

Kayashi T. Comparative study of mechanical

characteristic of plastic AFOs. J Prosthet Orthot

1993 Apr;5(2):59-64.

Yawalkar S, Shah A, Ganapati R, Yan LB, Zhang GC,

Chen H, Westmacott K, Osterwalder W. Modular

grip-aids for leprosy patients. Int J Lepr Other

Mycobact Dis 1992 Jun;60(2):250-4.

York J. Mobility methods selected for use in home

and community environments. Phys Ther 1989

Sep;69(9):736-47.

Zambelli PY, Dutoit M, Genton N. [Dorso-lumbar

spinal compression fractures in the child. Follow-up

at the termination of development]. Helv Chir Acta

1991 Jul;58(1-2):119-22. (Fre).

Zander CL, Healy NL. Elbow flexion contractures

treated with serial casts and conservative therapy.

J Hand Surg [Am] 1992 Jul;17(4):694-7.

Zwipp H, Schievink B. Primary orthotic treatment of

ruptured ankle ligaments: a recommended

procedure. Prosthet Orthot Int 1992 Apr;16(1):

49-56.

DESIGN & MATERIALS

Antia NH. Plastic footwear for leprosy. Lepr Rev

1990 Mar;61(1):73-8.

Baiges IJ, Rosen MJ. Development of a whole-arm

orthosis for tremor suppression. In: Technology for

the future decade. RESNA ’89: proceedings of the

12th annual conference; 1989 Jun 25-30; New

Orleans, LA. Washington (DC): RESNA Press;

1989. p. 290-1.

Banzinger E. Technical note: thermoplastic Klenzak

AFO. J Prosthet Orthot 1992 Jul;4(4):219-22.

Benzel EC, Larson SJ. Postoperative stabilization of

the posttraumatic thoracic and lumbar spine: a

review of concepts and orthotic techniques.

J Spinal Disord 1989 Mar;2(1):47-51.

Bierling-Sorensen F, Ryde H, Bojsen-Moller F, Lyquist

E. Shock absorbing material on the shoes of long

leg braces for paraplegic walking. Prosthet Orthot

Int 1990 Apr;14(1):27-32.

Blake RL, Ferguson H. Extrinsic rearfoot posts.

J Am Podiatr Med Assoc 1992 Apr;82(4):202-7.

Breger-Lee DE, Buford WL Jr. Update in splinting

materials and methods. Hand Clin 1991 Aug;7(3):

569-85.

Brienza DM, Brubaker CE, McLaurin CA, Chun KC.

A manufacturing system for contoured foam

cushions. J Rehabil Res Dev 1992 Fall;29(4):

32-40.

Carrico F. Rapid anthropometry for cad/cam design in

prosthetics and orthotics. In: Technology for the

future decade. RESNA ’89: proceedings of the 12th

annual conference; 1989 Jun 25-30; New Orleans,

LA. Washington (DC): RESNA Press; 1989.

p. 157-8.

Chase AP, Bader DL, Houghton GR. The

biomechanical effectiveness of the Boston brace in

the management of adolescent idiopathic scoliosis.

Spine 1989 Jun;14(6):636-42.

Cunliffe MW. An adjustable thermoplastic knee brace,

directly moulded and colour coordinated. Br J

Occup Ther 1992 Nov;55(11):430-4.

Derbyshire B, Platts RG. A shapeable foot-pressure

measuring device. J Biomed Eng 1989 May;11(3):

258-64.

Egan JM. An aid for the management of shoulder

pain in hemiplegia. Br J Occup Ther 1990

Sep;53(9):362-4.

Elschner H, Kleditzsch J, Schulze KJ, Stenzel R. The

posture training device. Function and first tests.

Z Physiother 1990;42(2):105-8.

Engen T. Lightweight modular orthosis. Prosthet

Orthot Int 1989 Dec;13(3):125-9.

Golay W, Lunsford T, Lunsford BR, Greenfield J.

The effect of malleolar prominence on

polypropylene afo rigidity and buckling. J Prosthet

Orthot 1989 Jul;1(4):231-41.

Granata C, De Lollis A, Campo G, Piancastelli L,

Merlini L. Analysis, design and development of a

carbon fibre reinforced plastic knee-ankle-foot

orthosis prototype for myopathic patients. Proc Inst

Mech Eng [H] 1990;204(2):91-6.

Hale S. Carbon fiber articulated AFO - an alternative

design. J Prosthet Orthot 1989 Jul;1(4):191-8.

Kudriavtsev VA, Rozhkov AV, Ogorodnikov VI.

[Insertable orthopedic devices in the treatment of

flatness of the anterior section of the foot and

valgus deviation of the great toe]. Ortop Travmatol

Protez 1990 Sep;(9):9-11. (Rus).

Lehmann JF, De Lateur BJ, Price R. Weight bearing

and other orthoses for skeletal and joint

insufficiency. Phys Med Rehabil Clin North Am

1992 Feb;3(1):185-92.

Limbird TJ, Stills M, Elliott D, Wharton G. Lower

extremity telescopic orthosis for immediate fitting

in paraplegia. Orthopedics 1989 Jun;12(6):851-4.

Lohman M, Goldstein H. Alternative strategies in tone

reducing AFO design. J Prosthet Orthot 1993 Jan;

5(1):1-4.

Lord M, Foulston J. Clinical trial of a computer-aided

system for orthopaedic shoe upper design. Prosthet

Orthot Int 1991 Apr;15(1):11-7.

Lyles M, Munday J. Report on the evaluation of the

Vannini-Rizzoli Stabilizing Limb Orthosis.

J Rehabil Res Dev 1992 Spring;29(2):77-104.

McAdam WH. Productivity improvement through the

use of a three-dimensional digitizer in the

production of personal customized orthotic

accessories [masters thesis]. Winnipeg (Canada):

University of Manitoba; 1989. 155 p.

McAllister DF, Carver D, Devarajan R, Harrison L,

Pietenpol JL, Yang SH. An interactive computer

graphics system for the design of molded and

orthopedic shoe lasts. J Rehabil Res Dev 1991

Fall;28(4):39-46.

McPoil TG, Cornwall MW. Rigid versus soft foot

orthoses. A single subject design. J Am Podiatr

Med Assoc 1991 Dec;81(12):638-42.

Meyer PE, Petersen D. [Compensation in leg length

inequality with orthopedic shoe measures].

Orthopade 1992 Jun;21(3):174-83. (Ger).

Michael JW. Reflections on cad/cam in prosthetics

and orthotics. J Prosthet Orthot 1989 Apr;1(3):

116-21.

Nagata H, Onomura T, Tominaga A, Kawamura I.

Orthoses of ventilative plastics. Prosthet Orthot Int

1991 Dec;15(3):175-7.

Nene AV, Patrick JH. Energy cost of paraplegic

locomotion using the ParaWalker--electrical

stimulation "hybrid" orthosis. Arch Phys Med

Rehabil 1990 Feb;71(2):116-20.

Novick A, Birke JA, Hoard AS, Brasseaux DM,

Broussard JB, Hawkins ES. Rigid orthoses for the

insensitive foot: the rigid-relief orthosis. J Prosthet

Orthot 1991 Fall;4(1):31-40.

Palamarchuk HJ, Fry J. In-shoe casting technique for

specialized sports shoes. J Am Podiatr Med Assoc

1989 Sep;79(9):462-5.

Penn ND. Callipers. BMJ 1991 Feb 16;302(6773):

402-3.

Product comparison and evaluation: scooters.

Washington (DC): National Rehabilitation Hospital,

Rehabilitation Engineering Center; 1991 Jun. 91 p.

Regalbuto MA, Rovick JS, Walker PS. The forces in

a knee brace as a function of hinge design and

placement. Am J Sports Med 1989 Jul-Aug;17(4):

535-43.

Rome K. A study of the properties of materials used

in podiatry. J Am Podiatr Med Assoc 1991 Feb;

81(2):73-83.

Ryan S, Belbin G, SLack M, Naumann S, Moran R.

Development of a modular design, custom-fitted

protective helmet. J Prosthet Orthot 1992 Jul;

4(4):213-8.

Sanchez Zaplana I, Zaragoza Arnau M. [The Braun

and Braun-Bohler splints]. Rev Enferm 1990 Mar;

13(139):69-71, 73-4. (Spa).

Saunders CG, Bannon M, Sabiston RM, Panych L,

Jenks SL, Wood IR, Raschke S. The canfit

system: shape management technology for

prosthetic and orthotic applications. J Prosthet

Orthot 1989 Apr;1(3):122-30.

Scarnati F. Technical note: the use of the step-lock

knee joints in management of wrist flexion

contractures. J Prosthet Orthot 1989 Jan;1(2):82-5.

Schutt AH. Upper extremity and hand orthotics. Phys

Med Rehabil Clin North Am 1992 Feb;3(1):223-41.

Shirazi-Adl A. Finite element stress analysis of a

push-out test. Part 1: Fixed interface using stress

compatible elements. J Biomech Eng 1992 Feb;

114(1):111-8.

Staats TB, Kriechbaum MP. Computer aided design

and computer aided manufacturing of foot orthoses.

J Prosthet Orthot 1989 Apr;1(3):182-6.

Vossberg A. The choice of prosthetic and orthotic

technique for less developed countries: analysis and

perspectives in Colombia. Prosthet Orthot Int 1988

Aug;12(2):96-100.

White M, Hammer G. SDIO technology transfer:

lightweight composite brace. In: Technology for the

next decade. RESNA ’89: proceedings of the 12th

annual conference; 1989 Jun 25-30; New Orleans,

LA. Washington (DC): RESNA Press; 1989.

p. 200-1.

Yamamoto S, Ebina M, Iwasaki M, Kubo S, Kawai H,

Kayashi T. Comparative study of mechanical

characteristic of plastic AFOs. J Prosthet Orthot

1993 Apr;5(2):59-64.

Zagorski JB, Zych GA, Latta LL, Finnieston AR.

Orthotic design and application for functional

treatment of tibial shaft fractures. J Prosthet Orthot

1992 Apr;4(3):126-41.

USES

Geriatric Applications

Hanger HC, Mulley GP. A survey of lower leg braces

worn by the over-60s. Clin Rehabil 1991 May;

5(2):95-101.

Hogan-Budris J. Choosing foot materials for the

elderly. Top Geriatr Rehabil 1992 Mar;7(3):49-61.

Lauritzen JB, Petersen MM, Lund B. Effect of

external hip protectors on hip fractures. Lancet

1993 Jan 2;341(8836):11-3.

Wasson JH, Gall V, McDonald R, Liang MH. The

prescription of assistive devices for the elderly:

practical considerations. J Gen Intern Med 1990

Jan-Feb;5(1):46-54.

Pediatric Applications

Abstracts from the Scientific Program presented ant the

Annual Meeting of the Association of Children’s

Prosthetic-Orthotic Clinics at Blythedale Children’s

Hospital, Valhalla, New York, June 7-9, 1990.

J Assoc Child Prosthet Orthot Clin 1990 Fall;25(2):

26-47.

Abstracts from the Scientific Program presented and the

Annual Meeting of the Association of Children’s

Prosthetic-Orthotic Clinics at St. Louis, Missouri on

June 10-13, 1992. J Assoc Child Prosthet Orthot

Clin 1992 Fall;27(2):1-68.

Abstracts from the scientific program presented at the

annual meeting of the Association of Children’s

Prosthetic-Orthotic Clinics at Shriner’s Hospital for

Crippld Children- Portland, Oregon- May 1-4,

1991. J Assoc Child Prosthet Orthot Clin 1991

Summer;26(1):1-41.

Abstracts from the Scientific Program presented at the

1989 Annual Meeting. J Assoc Child Prosthet

Orthot Clin 1989 Summer-Autumn;14(2-3):26-39.

American Academy of Pediatrics Committee on Sports

Medicine. Knee brace use by athletes. Pediatrics

1990 Feb;85(2):228.

Aron M. The use and effectiveness of elbow splints in

the Rett syndrome. Brain Dev 1990;12(1):162-3.

Arzhannikova EE, Shikhmagomedov AA. [Providing

orthotic devices to children with diseases of the

ankle joint]. Ortop Travmatol Protez 1990 Feb;

(2):55-6. (Rus).

Banziger E, et al. Dynamic dorsiflexion assist

polypropylene ankle foot orthosis. J Assoc Child

Prosthet Orthot Clin 1991 Fall;26(2):65-8.

Berenter R, Morris J, Yee B. Bilateral congenital

absence of the fibula. J Am Podiatr Med Assoc

1990 Jun;80(6):325-8.

Brodke DS, Skinner SR, Lamoreux LW, Johanson ME,

St. Helen R, Moran SA, Ashley RK. Effects of

ankle-foot orthoses on the gait of children.

J Pediatr Orthop 1989 Nov-Dec;9(6):702-8.

Butler C. Augmentative mobility: why do it? Phys

Med Rehabil Clin North Am 1991 Nov;2(4):

801-15.

Caselli MA, Cohen-Sobel E, Thompson J, Adler J,

Gonzalez L. Biomechanical management of

children and adolescents with Down syndrome.

J Am Podiatr Med Assoc 1991 Mar;81(3):119-27.

Cheng JC, Cheung SS. Modified functional bracing in

the ambulatory treatment of femoral shaft fractures

in children. J Pediatr Orthop 1989 Jul-Aug;9(4):

457-62.

De Korvin G, Pialoux B, Allainmat T, Michelin F,

Morvan MF, Bracq H. The contribution of

orthotic devices and technical aids to locomotor

development in a group of 29 children with various

mental and physical disabilities. Ann Readapt Med

Phys 1989 Dec;32(6):743-65.

Elschner H, Kleditzsch J, Schulze KJ, Stenzel R. The

posture training device. Function and first tests.

Z Physiother 1990;42(2):105-8.

Evans DL, Bethem D. Cervical spine injuries in

children. J Pediatr Orthop 1989 Sep-Oct;9(5):

563-8.

Fernandez-Palazzi F, de Gutierrez DP, Paladino R.

The care of the limb deficient child in Venezuela.

Prosthet Orthot Int 1991 Aug;15(2):156-9.

Gould N, Moreland M, Alvarez R, Trevino S, Fenwick

J. Development of the child’s arch. Foot Ankle

1989 Apr;9(5):241-5.

Green EM, Nelham RL. Development of sitting

ability, assessment of children with a motor

handicap and prescription of appropriate seating

systems. Prosthet Orthot Int 1991 Dec;15(3):

203-16.

Haje SA, Bowen JR. Preliminary results of orthotic

treatment of pectus deformities in children and

adolescents. J Pediatr Orthop 1992 Nov-Dec;

12(6):795-800.

Heckmatt J, Rodillo E, Dubowitz V. Management of

children: pharmacological and physical. Br Med

Bull 1989 Jul;45(3):788-801.

Heinrich SD, Sharps CH. Lower extremity torsional

deformities in children: a prospective comparison of

two treatment modalities. Orthopedics 1991 Jun;

14(6):655-9.

Hirons RR, Williams KB, Amor RF, Day HJ. The

prosthetic treatment of lower limb deficiency.

Prosthet Orthot Int 1991 Aug;15(2):112-6.

Holt KS. Mobility aids and appliances for disabled

children. BMJ 1991 Jan 12;302(6768):105-7.

Johnston CE 2d. Infantile tibia vara. Clin Orthop

1990 Jun;(255):13-23.

Kamil NI, Correia AM. A dynamic elbow flexion

splint for an infant with arthrogryposis. Am J

Occup Ther 1990 May;44(5):460-1.

Kurtz LA, Scull SA. Rehabilitation for developmental

disabilities. Pediatr Clin North Am 1993 Jun;40(3):

629-43.

Massagli TL. Spasticity and its management in

children. Phys Med Rehabil Clin North Am 1991

Nov;2(4):867-89.

Michael J. Pediatric prosthetics and orthotics. In:

Hedman G, ed. Rehabilitation technology.

Binghamton (NY): Haworth Press; 1990. p. 123-46.

Michael J. Pediatric prosthetics and orthotics. Phys

Occup Ther Pediatr 1990;10(2):123-46.

Miller EA, Hergenroeder AC. Prophylactic ankle

bracing. Pediatr Clin North Am 1990 Oct;37(5):

1175-85.

Milner M, Naumann S, Literowich W, Martin M, Ryan

S, Sauter WF, Shein GF, Verburg G.

Rehabilitation engineering in pediatrics.

Pediatrician 1990;17(4):287-96.

Moore P, Major R, Stallard J, Butler PB. Contracture

correction device for arthrogryposis. Physiotherapy

1990 May;76(5):303-5.

Mubarak SJ, Camp JF, Vuletich W, Wenger DR, Garfin

SR. Halo application in the infant. J Pediatr

Orthop 1989 Sep-Oct;9(5):612-4.

Naganuma GM, Billingsley FF. The use of hand

splints with the neurologically involved child. Crit

Rev Phys Rehabil Med 1990;2(2):87-100.

Novotny M, Swagman A. Caring for children with

orthotic/prosthetic needs. J Prosthet Orthot 1992

Jul;4(4):191-5.

Oglesby DG Jr, Tablada C. Lower limb deficiencies:

prosthetic and orthotic management. In: Bowker JH,

Michael JW, eds. Atlas of limb prosthetics:

surgical, prosthetic, and rehabilitation principles. St.

Louis: Mosby Year Book; 1992. p. 835-8.

Osterhout BM. Postoperative splinting of the pediatric

upper extremity. Hand Clin 1990 Nov;6(4):693-5.

Proper seating: a key to participation. Except Parent

1989 Mar;19(2):46-9.

Reid DT. A survey of Canadian occupational

therapists’ use of hand splints for children with

neuromuscular dysfunction. Can J Occup Ther

1992 Apr;59(1):16-27.

Requa RK, Garrick JG. A review of the use of

prophylactic knee braces in football. Pediatr Clin

North Am 1990 Oct;37(5):1165-73.

Ricks NR, Eilert RE. Effects of inhibitory casts and

othoses on bony alignment of foot and ankle during

weight-bearing in children with spasticity. Dev

Med Child Neurol 1993 Jan;35(1):11-6.

Rine RR, Ward J, Lindeblad S, Blaker K, Higbie-Smith

T, Verdin A, Gropper M. Comparison of the

effects of ankle-foot orthoses on gait and standing

posture in children with lower extremity spasticity.

In: Woollacott M, Horak F, eds. Posture and gait:

control mechanisms, 1992. Proceedings of the 11th

International Symposium of the Society for Postural

and Gait Research; 1992; Portland, OR. Vol. 2.

Portland (OR): University of Oregon; 1992.

p. 415-8.

Romero PW, Rice J. Clinical suggestions. Clinical use

of the knee hyperextension block orthosis. Pediatr

Phys Ther 1992 Winter;4(4):205-7.

Ryan KD, Ploski C, Emans JB. Myelodysplasia the

musculoskeletal problem: habilitation from infancy

to adulthood. Phys Ther 1991 Dec;71(12):935-46.

Sakamoto H. [Cap brace: a new treatment for

newborn and infant congenital muscular torticollis].

Nippon Seikeigeka Gakkai Zasshi 1992 Nov;66(11):

1123-36. (Jpn).

Schaming D, Gorry M, Soroka K, Catullo ME. When

babies are born with orthopedic problems. RN

1990 Apr;53(4):62-7.

Scrutton D. The causes of developmental deformity

and their implication for seating. Prosthet Orthot

Int 1991 Dec;15(3):199-202.

Staheli LT. Lower positional deformity in infants and

children: a review. J Pediatr Orthop 1990

Jul-Aug;10(4):559-63.

Stout JD, Bandy P, Feller N, Stroup KB, Bull MJ.

Transportation resources for pediatric orthopaedic

clients. Orthop Nurs 1992 Jul-Aug;11(4):26-30.

Stuberg WA. Considerations related to weight-bearing

programs in children with developmental

disabilities. Phys Ther 1992 Jan;72(1):35-40.

Thornett CE. Designing special switches and control

systems for multiply handicapped young people--a

problem-led approach. J Med Eng Technol 1990

May-Jun;14(3):87-91.

Thornett CEE. Mobility for very young handicapped

children. In: IEE Colloquim of High-Tech Help for

the Handicapped; 1990 Apr 2; London. London:

IEE; 1990. p. 46.

Ullman BC, Brncic M. Orthotic and pedorthotic

management of the diabetic foot. In: Sammarco GJ,

ed. The foot in diabetes. Malvern (PA): Lea &

Febiger: 1991. p. 207-24.

White FJ. Orthotics. In: Drennan JC, ed. Child’s foot

and ankle. New York: Raven Press; 1992. p. 71-96.

Sports & Recreation

-Prevention

Abou-Hanna JJ, Okamura K, Tayyari F. Preloading of

the knee joint by prophylactic braces. Soma Eng

Hum Body 1989;3(4):25-35.

American Academy of Orthopaedic Surgeons. Athletic

training and sports medicine. 2nd ed. Park Ridge

(IL): The Academy; 1991. Taping, bandaging,

orthotics. p. 647-704.

American Academy of Pediatrics Committee on Sports

Medicine. Knee brace use by athletes. Pediatrics

1990 Feb;85(2):228.

Anderson JC, Sockler JM. Effects of orthoses on

selected physiologic parameters in cycling. J Am

Podiatr Med Assoc 1990 Mar;80(3):161-6.

Anderson K, Wojtys EM, Loubert PV, Miller RE. A

biomechanical evaluation of taping and bracing in

reducing knee joint translation and rotation. Am J

Sports Med 1992 Jul-Aug;20(4):416-21.

Anderson MA, Rutt RA. The effects of counterforce

bracing on forearm and wrist muscle function.

J Orthop Sports Phys Ther 1992 Feb;15(2):87-91.

Ator R, Gunn K, McPoil TG, Knecht HG. The effect

of adhesive strapping on medial longitudinal arch

support before and after exercise. J Orthop Sports

Phys Ther 1991 Jul;14(1):18-23.

Baker BE. Prevention of ligament injuries to the knee.

Exerc Sport Sci Rev 1990;18:291-305.

Baker BE, VanHanswyk E, Bogosian SP, Werner FW,

Murphy D. The effect of knee braces on lateral

impact loading of the knee. Am J Sports Med

1989 Mar-Apr;17(2):182-6.

Baycroft CM. Foot orthotics and musculoskeletal

function. J Man Med 1990;5(1):22-4.

Beynnon BD, Renstrom PA. The effect of bracing and

taping in sports. Ann Chir Gynaecol 1991;80(2):

230-8.

Blake RL, Ferguson H. Foot orthosis for the severe

flatfoot in sports. J Am Podiatr Med Assoc 1991

Oct;81(10):549-55.

Brown TD, Van Hoeck JE, Brand RA. Laboratory

evaluation of prophylactic knee brace performance

under dynamic valgus loading using a surrogate leg

model. Clin Sports Med 1990 Oct;9(4):751-62.

Bruns J, Staerk H. Mechanical ankle stabilisation due

to the use of orthotic devices and peroneal muscle

strength. An experimental investigation. Int J

Sports Med 1992 Nov;13(8):611-5.

Burks RT, Bean BG, Marcus R, Barker HB. Analysis

of athletic performance with prophylactic ankle

devices. Am J Sports Med 1991 Mar-Apr;19(2):

104-6.

Burns MJ. Useful considerations for orthotic control.

Am Acad Podiatr Sports Med Newsl 1989 Jan:8.

Carlson JM, French J. Knee orthoses for valgus

protection. Experiments on 11 designs with related

analyses of orthosis length and rigidity. Clin

Orthop 1989 Oct;(247):175-92.

Chandler TJ, Kibler WB. A biomechanical approach to

the prevention, treatment and rehabilitation of

plantar fasciitis. Sports Med 1993 May;15(5):

344-52.

Cowart VS. Bracing those knees: how effective?

[news]. JAMA 1990 Jan 12;263(2):201.

Daley BJ, Ralston JL, Brown TD, Brand RA. A

parametric design evaluation of lateral prophylactic

knee braces. J Biomech Eng 1993 May;115(2):

131-6.

D’Ambrosia RD. Orthotic devices for running. Audio

Dig Orthop [audiocassette] 1991 Nov;14(11):Side B

[presentation 2, 18 min.]. Accompanied by: 1

guide.

Devita P, Hunter PB, Skelly WA. Effects of a

functional knee brace on the biomechanics of

running. Med Sci Sports Exerc 1992 Jul;24(7):

797-806.

Drez D Jr. Knee braces. Video J Orthop Surg

[videocassette] 1989;3(5 Pt 2):[presentation 2, 23

min.]. 1 videocassette: sound, color, 1/2 in.

Ellis J. Selection and use of orthotic devices. Sports

Med Dig 1992 Jan;14(1):1-2.

Erickson AR, Yasuda K, Beynnon B, Johnson R, Pope

M. An in vitro dynamic evaluation of prophylactic

knee braces during lateral impact loading. Am J

Sports Med 1993 Jan-Feb;21(1):26-35.

Feuerbach JW, Grabiner MD. Effect of the aircast on

unilateral postural control: amplitude and frequency

variables. J Orthop Sports Phys Ther 1993 Mar;

17(3):149-54.

Greene TA, Hillman SK. Comparison of support

provided by a semirigid orthosis and adhesive ankle

taping before, during, and after exercise. Am J

Sports Med 1990 Sep-Oct;18(5):498-506.

Greene TA, Wight CR. A comparative support

evaluation of three ankle orthoses before, during,

and after exercise. J Orthop Sports Phys Ther 1990

Apr;11(10):453-66.

Gross ML, Davlin LB, Evanski PM. Effectiveness of

orthotic shoe inserts in the long-distance runner.

Am J Sports Med 1991 Jul-Aug;19(4):409-12.

Gross MT, Ballard CL, Mears HG, Watkins EJ.

Comparison of DonJoy Ankle Ligament Protector

and Aircast Sport Stirrup orthoses in restricting foot

and ankle motion before and after exercise.

J Orthop Sports Phys Ther 1992 Aug;16(2):60-7.

Harding WG 3d. Use and misuse of the tennis elbow

strap. Physician Sportsmed 1992 Aug;20(8):65-8,

71-2, 74.

Highgenboten CL, Jackson A, Meske N, Smith J. The

effects of knee brace wear on perceptual and

metabolic variables during horizontal treadmill

running. Am J Sports Med 1991 Nov-Dec;19(6):

639-43.

Hintermann B. [Shoe supports and corrective shoes in

performance athletes--a 3-year study in young

cross-country skiers]. Schweiz Rundsch Med Prax

1992 Mar 24;81(13):389-94. (Ger).

Joganich TG. Influence of in-shoe orthotics on lower

extremity function in cycling [dissertation on

microfiche]. Tempe (AZ): Arizona State University;

1991. 2 microfiche.

Johnston JM, Paulos LE. Prophylactic lateral knee

braces. Med Sci Sports Exerc 1991 Jul;23(7):

783-7.

Johnstone KS, Perrin JCS. Sports for the handicapped

child. Phys Med Rehabil 1991 Jun;5(2):331-50.

Jones DC. Foot orthoses. Instr Course Lect 1993;42:

219-24.

Knee bracing. Clin Sports Med 1990 Oct;9(4):731-869.

Lewis G, Tan T, Shiue YS. Characterization of the

performance of shoe insert materials. J Am Podiatr

Med Assoc 1991 Aug;81(8):418-24.

Martin N. The comparative effectiveness of ankle

prophylactic devices in limiting inversion before

and after vigorous exercise [masters thesis]. San

Jose (CA): San Jose State University; 1991. 74 p.

McCaw ST. Leg length inequality. Implications for

running injury prevention. Sports Med 1992 Dec;

14(6):422-9.

McPoil TG, Cornwall MW. Rigid versus soft foot

orthoses. A single subject design. J Am Podiatr

Med Assoc 1991 Dec;81(12):638-42.

Miller CD, Paulos LE, Parker RD, Fishell M. The

ballet technique shoe: a preliminary study of eleven

differently modified ballet technique shoes using

force and pressure plates. Foot Ankle 1990 Oct;

11(2):97-100.

Miller EA, Hergenroeder AC. Prophylactic ankle

bracing. Pediatr Clin North Am 1990 Oct;37(5):

1175-85.

Montgomery DL, Koziris PL. The knee brace

controversy. Sports Med 1989 Nov;8(5):260-72.

Nesbitt L. A practical guide to prescribing orthoses.

Physician Sportsmed 1992 May;20(5):76-8, 83-7.

Novick A, Kelley DL. Position and movement

changes of the foot with orthotic intervention

during the loading response of gait. J Orthop Sport

Phys Ther 1990;11(7):301-12.

Palamarchuk HJ, Fry J. In-shoe casting technique for

specialized sports shoes. J Am Podiatr Med Assoc

1989 Sep;79(9):462-5.

Pieper B, Rodammer G, Gradinger R. [The value of

knee joint orthoses in performance sports].

Fortschr Med 1989 Feb 28;107(6):150-2. (Ger).

Press JM, Wiesner SL. Prevention: conditioning and

orthotics. Hand Clin 1990 Aug;6(3):383-92.

Regalbuto MA, Rovick JS, Walker PS. The forces in

a knee brace as a function of hinge design and

placement. Am J Sports Med 1989 Jul-Aug;17(4):

535-43.

Requa RK, Garrick JG. Clinical significance and

evaluation of prophylactic knee brace studies in

football. Clin Sports Med 1990 Oct;9(4):853-69.

Requa RK, Garrick JG. A review of the use of

prophylactic knee braces in football. Pediatr Clin

North Am 1990 Oct;37(5):1165-73.

Riegler HF. Orthotic devices in winter sports. In: Casey

MJ, Foster C, Hixson EG, eds. Winter sports

medicine. Philadelphia: F.A. Davis; 1990.

p. 56-65. (Contemporary exercise and sports

medicine; vol. 3).

Rovere GD, Curl WW, Browning DG. Bracing and

taping in an office sports medicine practice. Clin

Sports Med 1989 Jul;8(3):497-515.

Santoro JP, Cachia VV, Tilley GE, Cartwright D,

Grumbine NA. Effect of the orthosis on

performance in alpine skiing. A preliminary report.

J Am Podiatr Med Assoc 1989 Feb;79(2):93-9.

Sforzo GA, Chen NM, Gold CA, Frye PA. The effect

of prophylactic knee bracing on performance. Med

Sci Sports Exerc 1989 Jun;21(3):254-7.

Sitler M, Ryan J, Hopkinson W, Wheeler J, Santomier

J, Kolb R, Polley D. The efficacy of a

prophylactic knee brace to reduce knee injuries in

football. A prospective, randomized study at West

Point. Am J Sports Med 1990 May-Jun;18(3):

310-5.

Tegner Y, Lorentzon R. Evaluation of knee braces in

Swedish ice hockey players. Br J Sports Med 1991

Sep;25(3):159-61.

Veldhuizen JW, Koene FM, Oostvogel HJ, von Thiel

TP, Verstappen FT. The effects of a supportive

knee brace on leg performance in healthy subjects.

Int J Sports Med 1991 Dec;12(6):577-80.

Wallace LA, Kaumeyer GW. Immobility: lower

extremity appliances and pads. In: Gould JA 3d, ed.

Orthopaedic and sports physical therapy. 2nd ed. St.

Louis: Mosby; 1990. p. 253-64.

-Rehabilitation

Arvidson EB, Micheli LJ. Spine and trunk problems

in athletes. Curr Opin Orthop 1990 Dec;1(3):

361-4.

Bailes JE, Hadley MN, Quigley MR, Sonntag VK,

Cerullo LJ. Management of athletic injuries of the

cervical spine and spinal cord. Neurosurgery 1991

Oct;29(4):491-7.

Baitch SP, Blake RL, Fineagan PL, Senatore J.

Biomechanical analysis of running with 25 degrees

inverted orthotic devices. J Am Podiatr Med Assoc

1991 Dec;81(12):647-52.

Barringer WJ. Principles of orthotic management of

athletic injury. In: Grana WA, Kalenak A, eds.

Clinical sports medicine. Philadelphia: Saunders;

1991. p. 315-25.

Blake RL. Athletic injuries: orthoses versus surgery. In:

Jay RM, ed. Current therapy in podiatric surgery.

Philadelphia: Decker; 1989. p. 296-301.

Branch TP, Hunter R, Donath M. Dynamic EMG

analysis of anterior cruciate deficient legs with and

without bracing during cutting. Am J Sports Med

1989 Jan-Feb;17(1):35-41.

Carne P. Nonsurgical treatment of ankle sprains using

the modified Sarmiento brace. Am J Sports Med

1989 Mar-Apr;17(2):253-7.

Carter TR, Fowler PJ, Blokker C. Functional

postoperative treatment of Achilles tendon repair.

Am J Sports Med 1992 Jul-Aug;20(4):459-62.

Cawley PW. Postoperative knee bracing. Clin Sports

Med 1990 Oct;9(4):763-70.

Cawley PW, France EP, Paulos LE. Comparison of

rehabilitative knee braces. A biomechanical

investigation. Am J Sports Med 1989 Mar-Apr;

17(2):141-6.

Cawley PW, France EP, Paulos LE. The current state

of functional knee bracing research. A review of

the literature. Am J Sports Med 1991 May-

Jun;19(3):226-33.

Cherf J, Paulos LE. Bracing for patellar instability.

Clin Sports Med 1990 Oct;9(4):813-21.

Elattrache N, Fadale PD, Fu FH. Thoracic spine

fracture in a football player. A case report. Am J

Sports Med 1993 Jan-Feb;21(1):157-60.

Ellis J. Selection and use of orthotic devices. Sports

Med Dig 1992 Jan;14(1):1-2.

Gross ML, Napoli RC. Treatment of lower extremity

injuries with orthotic shoe inserts. An overview.

Sports Med 1993 Jan;15(1):66-70.

Hart DL. Spinal immobility: braces and corsets. In:

Gould JA 3d, ed. Orthopaedic and sports physical

therapy. 2nd ed. St. Louis: Mosby; 1990.

p. 265-89.

Hintermann B. [Shoe supports and corrective shoes in

performance athletes--a 3-year study in young

cross-country skiers]. Schweiz Rundsch Med Prax

1992 Mar 24;81(13):389-94. (Ger).

Kannus VP. Evaluation of abnormal biomechanics of

the foot and ankle in athletes. Br J Sports Med

1992 Jun;26(2):83-9.

Knee bracing. Clin Sports Med 1990 Oct;9(4):731-869.

Lane SE. Severe ankle sprains: treatment with an

ankle foot orthosis. Physician Sportsmed 1990

Nov;18(11):43-4, 46-51.

Nesbitt L. A practical guide to prescribing orthoses.

Physician Sportsmed 1992 May;20(5):76-8, 83-7.

Nuber GW. Biomechanics of the foot and ankle

during gait. Clin Podiatr Med Surg 1989 Jul;6(3):

615-27.

Pieper B, Rodammer G, Gradinger R. [The value of

knee joint orthoses in performance sports].

Fortschr Med 1989 Feb 28;107(6):150-2. (Ger).

Prokop LL. Upper-extremity rehabilitation:

conditioning and orthotics for the athlete and

performing artist. Hand Clin 1990 Aug;6(3):

517-24.

Riegler HF. Orthotic devices in winter sports. In: Casey

MJ, Foster C, Hixson EG, eds. Winter sports

medicine. Philadelphia: F.A. Davis; 1990.

p. 56-65. (Contemporary exercise and sports

medicine; vol. 3).

Santoro JP, Cachia VV, Tilley GE, Cartwright D,

Grumbine NA. Effect of the orthosis on

performance in alpine skiing. A preliminary report.

J Am Podiatr Med Assoc 1989 Feb;79(2):93-9.

Scheuffelen C, Rapp W, Gollhofer A, Lohrer H.

Orthotic devices in functional treatment of ankle

sprain. Stabilizing effects during real movements.

Int J Sports Med 1993 Apr;14(3):140-9.

Snyder-Mackler L, Epler M. Effect of standard and

Aircast tennis elbow bands on integrated

electromyography of forearm extensor musculature

proximal to the bands. Am J Sports Med 1989

Mar-Apr;17(2):278-81.

Swain RA, Holt WS Jr. Ankle injuries. Tips from

sports medicine physicians. Postgrad Med 1993

Feb 15;93(3):91-2, 97-100.

Vailas JC, Pink M. Biomechanical effects of

functional knee bracing. Practical implications.

Sports Med 1993 Mar;15(3):210-8.

Wallace LA, Kaumeyer GW. Immobility: lower

extremity appliances and pads. In: Gould JA 3d, ed.

Orthopaedic and sports physical therapy. 2nd ed. St.

Louis: Mosby; 1990. p. 253-64.

Warren BL. Plantar fasciitis in runners. Treatment and

prevention. Sports Med 1990 Nov;10(5):338-45.

Wooten B, Uhl TL, Chandler J. Use of an orthotic

device in the treatment of posterior heel pain.

J Orthop Sports Phys Ther 1990 Mar;11(9):410-3.

Zachazewski JE, Geissler G. When to prescribe a

knee brace. Physician Sportsmed 1992 Nov;20(11):

91-6, 99.

Biomechanics & Gait

Andres RO, Stimmel SK. Prosthetic alignment effects

on gait symmetry: A case study. Clin Biomech

1990;5(2):88-96.

Annesley AL, Almada-Norfleet M, Arnall DA,

Cornwall MW. Energy expenditure of ambulation

using the Sure-Gait crutch and the standard axillary

crutch. Phys Ther 1990 Jan;70(1):18-23.

Ashley RK, Vallier GT, Skinner SR. Gait analysis in

pediatric lower extremity amputees. Orthop Rev

1992 Jun;21(6):745-9.

Bahler A. Fundamental biomechanical principles in

the orthotic treatment of the knee. J Prosthet

Orthot 1992 Apr;4(3):157-65.

Baker PA, Hewison SR. Gait recovery pattern of

unilateral lower limb amputees during

rehabilitation. Prosthet Orthot Int 1990 Aug;

14(2):80-4.

Barr AE, Siegel KL, Danoff JV, McGarvey CL 3d,

Tomasko A, Sable I, Stanhope SJ. Biomechanical

comparison of the energy-storing capabilities of

SACH and Carbon Copy II prosthetic feet during

the stance phase of gait in a person with below-

knee amputation. Phys Ther 1992

May;72(5):344-54.

Barth DG, Schumacher L, Sienko Thomas S. Gait

analysis and energy cost of below-knee amputees

wearing six different prosthetic feet. J Prosthet

Orthot 1992 Winter;4(2):63-76.

Bartlett DJ. Testing gait efficiency of limb-deficient

children using the physiological cost index.

J Assoc Child Prosthet Orthot Clin 1989

Summer-Autumn;24(2-3):51-2.

Baycroft CM. Foot orthotics and musculoskeletal

function. J Man Med 1990;5(1):22-4.

Beavis A. Cervical orthoses. Prosthet Orthot Int 1989

Apr;13(1):6-13.

Berg KO, Maki BE, Willaims JI, Hilliday PJ, Wood-

Dauphinee SL. Clinical and laboratory measures

of postural balance in an elderly population. Arch

Phys Med Rehabil 1992 Nov;73(11):1073-80.

Besser MP. An investigation of the stump-socket

interface of the patellar-tendon bearing below-knee

prosthesis [dissertation]. Philadelphia: Drexel

University; 1991. 84 p.

Bierling-Sorensen F, Ryde H, Bojsen-Moller F, Lyquist

E. Shock absorbing material on the shoes of long

leg braces for paraplegic walking. Prosthet Orthot

Int 1990 Apr;14(1):27-32.

Blanco JS, Herring JA. Congenital Chopart

amputation. A functional assessment. Clin Orthop

1990 Jul;(256):14-21.

Boker P, et al, eds. Biomechancial basis of orthotic

management. Oxford; Boston: Butterworth-

Heinemann; 1993.

Bowker P, Messenger N, Ogilvie C, Rowley DI.

Energetics of paraplegic walking. J Biomed Eng

1992 Jul;14(4):344-50.

Brodke DS, Skinner SR, Lamoreux LW, Johanson ME,

St. Helen R, Moran SA, Ashley RK. Effects of

ankle-foot orthoses on the gait of children.

J Pediatr Orthop 1989 Nov-Dec;9(6):702-8.

Brouwer BJ, Allard P, Labelle H. Running patterns of

juveniles wearing SACH and single-axis foot

components. Arch Phys Med Rehabil 1989 Feb;

70(2):128-34.

Brown DD, Knowlton RG, Hamill J, Schneider TL,

Hetzler RK. Physiological and biomechanical

differences between wheelchair-dependent and able-

bodied subjects during wheelchair ergometry. Eur J

Appl Physiol 1990;60(3):179-82.

Burl MM, Williams JG, Nayak USL. The effect of

cervical collars on walking balance. Physiotherapy

1992 Jan;78(1):19-22.

Butler PB, Thompson N, Major RE. Improvement in

walking performance of children with cerebral

palsy: preliminary results. Dev Med Child Neurol

1992 Jul;34(7):567-76.

Cahan LD, Adams JM, Perry J, Beeler LM.

Instrumented gait analysis after selective dorsal

rhizotomy. Dev Med Child Neurol 1990 Dec;

32(12):1037-43.

Campbell JH. Reciprocating gait orthosis with linear

bearing. J Assoc Child Prosthet Orthot Clin 1990

Spring;25(1):2-5.

Caselli MA, Cohen-Sobel E, Thompson J, Adler J,

Gonzalez L. Biomechanical management of

children and adolescents with Down syndrome.

J Am Podiatr Med Assoc 1991 Mar;81(3):119-27.

Cawley PW, France EP, Paulos LE. Comparison of

rehabilitative knee braces. A biomechanical

investigation. Am J Sports Med 1989 Mar-Apr;

17(2):141-6.

Cerny K, Perry J, Walker JM. Effect of an

unrestricted knee-ankle-foot orthosis on the stance

phase of gait in healthy persons. Orthopedics 1990

Oct;13(10):1121-7.

Chappell PH, Kyberd PJ. Prehensile control of a hand

prosthesis by a microcontroller. J Biomed Eng

1991 Sep;13(5):363-9.

Chase AP, Bader DL, Houghton GR. The

biomechanical effectiveness of the Boston brace in

the management of adolescent idiopathic scoliosis.

Spine 1989 Jun;14(6):636-42.

Cherf J, Paulos LE. Bracing for patellar instability.

Clin Sports Med 1990 Oct;9(4):813-21.

Chu T. Three-dimensional finite element stress

analysis of a polymeric orthotic device:

biomechanics of the ankle-foot orthosis

[dissertation]. Akron (OH): University of Akron;

1992. 258 p.

Colborne GR, Naumann S, Longmuir PE, Berbrayer D.

Analysis of mechanical and metabolic factors in the

gait of congenital below knee amputees. A

comparison of the SACH and Seattle feet. Am J

Phys Med Rehabil 1992 Oct;71(5):272-8.

Conway PJ, Herzog W. Changes in walking

mechanics associated with wearing an

intertrochanteric support belt. J Manipulative

Physiol Ther 1991 Mar-Apr;14(3):185-8.

Cool JC. Biomechanics of orthoses for the subluxed

shoulder. Prosthet Orthot Int 1989 Aug;13(2):90-6.

Cornwall MW, McPoil TG. Effect of rearfoot posts in

reducing forefoot forces. A single-subject design.

J Am Podiatr Med Assoc 1992 Jul;82(7):371-4.

Crosbie WJ, Nicol AC. Aided gait in rheumatoid

arthritis following knee arthroplasty. Arch Phys

Med Rehabil 1990 Apr;71(5):299-303.

Crosbie WJ, Nicol AC. Reciprocal aided gait in

paraplegia. Paraplegia 1990 Jul;28(6):353-63.

Deathe AB, Hayes KC, Winter DA. The biomechanics

of canes, crutches, and walkers. Curr Rev Phys

Rehabil Med 1993;5(1):15-30.

Diamond MF, Ottenbacher KJ. Effect of a tone-

inhibiting dynamic ankle-foot orthosis on stride

characteristics of an adult with hemiparesis. Phys

Ther 1990 Jul;70(7):423-30.

Donatelli R, Wooden M. Biomechanical orthotics. In:

Donatelli R, Wolf SL, eds. Biomechanics of the

foot and ankle. Philadelphia: F.A. Davis; 1990.

p. 193-216. (Comprehensive perspectives in

rehabilitation; vol. 3).

Durfee WK, Hausdorff JM. Regulating knee joint

position by combining electrical stimulation with a

controllable friction brake. Ann Biomed Eng 1990;

18(6):575-96.

Edwards BG, Marsolais EB. Energy costs of

ambulation with reciprocal gait orthosis, electrical

stimulation, long leg braces and hybrids: A case

study. Clin Kinesiol 1990;44(2):43-7.

Ehara Y, Beppu M, Nomura S, Kunimi Y, Takahashi S.

Energy storing property of so-called energy-storing

prosthetic feet. Arch Phys Med Rehabil 1993

Jan;74(1):68-72.

Ehrlich R, Garlick D, Ninio M. Electromyographic

activity in walking subjects with and without

prosthetic devices. In: Woollacott M, Horak F, eds.

Posture and gait: control mechanisms, 1992.

Proceedings of the 11th International Symposium of

the Society for Postural and Gait Research,

Portland, OR. Vol. 2. Portland (OR): University of

Oregon; 1992. p. 369-71.

Embrey DG, Yates L, Mott DH. Effects of neuro-

developmental treatment and orthoses on knee

flexion during gait: a single-subject design. Phys

Ther 1990 Oct;70(10):626-37.

Engsberg JR, et al. Comparison of effort between

below-knee amputee and normal children. J Assoc

Child Prosthet Orthot Clin 1991 Fall;26(2):46-52.

Engsberg JR, Aldridge KC, Harder JA. Lower limb

intersegmental forces for below-knee amputee

children during standing. Prosthet Orthot Int 1991

Dec;15(3):185-91.

Engsberg JR, Allinger TL. A function of the

talocalcaneal joint during running support. Foot

Ankle 1990 Oct;11(2):93-6.

Engsberg JR, Allinger TL, Harder JA. Standing

pressure distribution for normal and below-knee

amputee children. Prosthet Orthot Int 1989 Dec;

13(3):152-5.

Engsberg JR, Lee AG, Patterson JL, Harder JA.

External loading comparisons between able-bodied

and below-knee-amputee children during walking.

Arch Phys Med Rehabil 1991 Aug;72(9):657-61.

Engsberg JR, Lee AG, Tedford KG, Harder Ja.

Normative ground reaction force data for able-

bodied and below-knee-amputee children during

walking. J Pediatr Orthop 1993 Mar-Apr;13(2):

69-73.

Engsberg JR, Springer M, Harder J. Quantifying

interface pressures in below-knee-amputee sockets.

J Assoc Child Prosthet Orthot Clin 1992 Winter;

27(3):81-8.

Engsberg JR, Tedford KG, Harder JA. Center of mass

location and segment angular orientation of below-

knee-amputee and able-bodied children during

walking. Arch Phys Med Rehabil 1992

Dec;73(12):1163-8.

Engsberg JR, Tedford KG, Harder JA, Mills JP.

Timing changes for stance, swing, and double

support in a recent below knee amputee child.

Pediatr Exerc Sci 1990 Aug;2(3):255-62.

Engsberg JR, Tedford KG, Springer MJN, Harder JA.

Technical note: weight distribution of below-knee

amputee and able-bodies children during standing.

Prosthet Orthot Int 1992 Dec;16(3):200-2.

Esquenazi A, Hirai B. Assessment of gait and orthotic

prescription. Phys Med Rehabil Clin North Am

1991 Aug;2(3):473-85.

Gitter A, Czerniecki JM, DeGroot DM.

Biomechanical analysis of the influence of

prosthetic feet on below-knee amputee walking.

Am J Phys Med Rehabil 1991 Jun;70(3):142-8.

Granat MH, Heller BW, Nicol DJ, Baxendale RH,

Andrews BJ. Improving limb flexion in FES gait

using the flexion withdrawal response for the spinal

cord injured person. J Biomed Eng 1993 Jan;15(1):

51-6.

Greiner BM, Czerniecki JM, Deitz JC. Gait

parameters of children with spastic diplegia: a

comparison of posterior and anterior walkers. Arch

Phys Med Rehabil 1993 Apr;74(4):381-5.

Guidera KJ, Smith S, Raney E, Frost J, Pugh L, Griner

D, Ogden JA. Use of the reciprocating gait

orthosis in myelodysplasia. J Pediatr Orthop 1993

May-Jun;13(3):341-8.

Guttenberg U, Rogoll G, Vossius G. [Measuring force

distribution of the hand surface in grasping].

Biomed Tech (Berlin) 1989;34 Suppl:157-8. (Ger).

Hale SA. Analysis of the swing phase dynamics and

muscular effort of the above-knee amputee for

varying prosthetic shank loads. Prosthet Orthot Int

1990 Dec;14(3):125-35.

Hale SA. The effect of walking speed on the joint

displacement patterns and forces and moments

acting on the above-knee amputee prosthetic leg.

J Prosthet Orthot 1991 Winter;3(2):59-78.

Harburn KL, Hill KM, Kramer JF, Noh S, Vandervoort

AA, Matheson JE. An overhead harness and trolly

system for balance and ambulation assessment and

training. Arch Phys Med Rehabil 1993

Feb;74(2):220-3.

Hart TJ. Below-knee child amputee gait: dynamics of

an energy-storing prosthesis [dissertation]. Los

Angeles: University of California, Los Angeles;

1991. 140 p.

Hicks JE. Rehabilitation and biomechanics. Curr

Opin Rheumatol 1990 Apr;2(2):320-6.

Hirokawa S, Grimm M, Le T, Solomonow M, Baratta

RV, Shoji H, D’Ambrosia RD. Energy

consumption in paraplegic ambulation using the

reciprocating gait orthosis and electric stimulation

of the thigh muscles. Arch Phys Med Rehabil 1990

Aug;71(9):687-94.

Holzreiter SH, Kohle ME. Assessment of gair patterns

using neural networks. J Biomech 1993 Jun;26(6):

645-51.

Hsu JD, Furumasu J. Gait and posture changes in the

Duchenne muscular dystrophy child. Clin Orthop

1993 Mar;(288):122-5.

Hullin MG, Robb JE, Loudon IR. Ankle-foot orthosis

function in low-level myelomeningocele. J Pediatr

Orthop 1992 Jul-Aug;12(4):518-21.

Hurley GR, McKenney R, Robinson M, Zadravec M,

Pierrynowski MR. The role of the contralateral

limb in below-knee amputee gait. Prosthet Orthot

Int 1990 Apr;14(1):33-42.

Isakov E, Douglas R, Berns P. Ambulation using the

reciprocating gait orthosis and functional electrical

stimulation. Paraplegia 1992 Apr;30(4):239-45.

Isakov E, Mizrahi J, Ring H, Susak Z, Hakim N.

Standing sway and weight-bearing distribution in

people with below-knee amputations. Arch Phys

Med Rehabil 1992 Feb;73(2):174-8.

Jefferson RJ, Whittle MW. Performance of three

walking orthoses for the paralysed: a case study

using gait analysis. Prosthet Orthot Int 1990 Dec;

14(3):103-10.

Kabra SG. Articulated cadaveric bones as a structural

endoskeleton in an ankle-foot prosthesis: a

preliminary report. J Rehabil Res Dev 1990

Winter;27(1):43-52.

Kabra SG, Narayanan R. Ankle-foot prosthesis with

articulated human bone endoskeleton: force-

deflection and fatigue study. J Rehabil Res Dev

1991 Summer;28(3):13-22.

Kahn DL. The reciprocation gait orthosis for children

with myelodysplasia. Phys Occup Ther Pediatr

1989;9(2):107-17.

Kannus VP. Evaluation of abnormal biomechanics of

the foot and ankle in athletes. Br J Sports Med

1992 Jun;26(2):83-9.

Kemp M. Comment on: the energetics of paraplegic

walking [letter]. J Biomed Eng 1993 Jan;15(1):83.

Kent HO. Vannini-Rizzoli stabilizing orthosis (boot):

preliminary report on a new ambulatory aid for

spinal cord injury. Arch Phys Med Rehabil 1992

Mar;73(3):302-7.

Kirby KA. The medial heel skive technique.

Improving pronation control in foot orthoses. J Am

Podiatr Med Assoc 1992 Apr;82(4):177-88.

Kohn D, Wirth CJ, John H. The function of the

Thomas splint. An experimental study. Arch

Orthop Trauma Surg 1991;111(1):26-8.

Kohn D, Wirth CJ, John H, Busche T. [Stress relief

of the hip joint by the Thomas splint]. Z Orthop

1991 May-Jun;129(3):225-9. (Ger).

LeBlanc M, Setoguchi Y, Shaperman J, and Carlson L.

Mechanical work efficiencies of body-powered

prehensors for young children. J Assoc Child

Prosthet Orthot Clin 1992 Winter;27(3):70-5.

Lehmann JF. Push-off and propulsion of the body in

normal and abnormal gait. Correction by ankle-foot

orthoses. Clin Orthop 1993 Mar;(288):97-108.

Lehmann JF, De Lateur BJ, Price R. Biomechanics of

normal gait. Phys Med Rehabil Clin North Am

1992 Feb;3(1):95-109.

Lehmann JF, De Lateur BJ, Price R. Knee ankle foot

orthoses for paresis and paralysis. Phys Med

Rehabil Clin North Am 1992 Feb;3(1):161-83.

Lemaire ED, Fisher FR, Robertson DG. Gait patterns

of elderly men with trans-tibial amputations.

Prosthet Orthot Int 1993 Apr;17(1):27-37.

Leonard CT, Hirschfeld H, Forssberg H. The

development of independent walking in children

with cerebral palsy. Dev Med Child Neurol 1991

Jul;33(7):567-77.

Leone D, Diemente S, Lopez-Isa M, Fox MD, Epstein

MA, Davis RB, Alward TM. Structural stability

prediction for thermoplastic ankle-foot orthoses. In:

Proceedings of the 17th Annual Northeast

Bioengineering Conference; 1991 Apr 4-5;

Hartford, CT. New York: IEEE; 1991. p. 231-2.

Lin JH, Chou YL, Ju MS, Sung YT. [Application and

evaluation of the VICON system in gait analysis].

Kao Hsiung I Hsueh Ko Hsueh Tsa Chih 1990 Jan;

6(1):6-11. (Chi).

Logan L, Byers-Hinkley K, Ciccone CD. Anterior

versus posterior walkers: a gait analysis study. Dev

Med Child Neurol 1990 Dec;32(12):1044-8.

Lohman M, Goldstein H. Alternative strategies in tone

reducing AFO design. J Prosthet Orthot 1993 Jan;

5(1):1-4.

Lough LK. The effects of fixed and hinged ankle foot

orthoses on gait myoelectric activity and standing

joint alignment in children with cerebral palsy

[dissertation]. Iowa City (IA): University of Iowa;

1990. 223 p.

Lyles M, Munday J. Report on the evaluation of the

Vannini-Rizzoli Stabilizing Limb Orthosis.

J Rehabil Res Dev 1992 Spring;29(2):77-104.

Malezic M, Bogataj U, Gros N, Decman I, Vrtacnik P,

Kljajic M, Acimovic-Janezic R. Application of a

programmable dual-channel adaptive electrical

stimulation system for the control and analysis of

gait. J Rehabil Res Dev 1992 Fall;29(4):41-53.

Mandel AR, Nymark JR, Balmer SJ, Grinnell DM,

O’Riain MD. Electromyographic versus rhythmic

positional biofeedback in computerized gait

retraining with stroke patients. Arch Phys Med

Rehabil 1990 Aug;71(9):649-54.

Mazur JM, Sienko-Thomas S, Wright N, Cummings RJ.

Swing-through vs. reciprocating gait patterns in

patients with thoracic-level spina bifida.

Z Kinderchir 1990 Dec;45 Suppl 1:23-5.

McCulloch MU, Brunt D, Vander Linden D. The

effect of foot orthotics and gait velocity on lower

limb kinematics and temporal events of stance.

J Orthop Sports Phys Ther 1993 Jan;17(1):2-10.

McDonald CM, Jaffe KM, Mosca VS, Shurtleff DB.

Ambulatory outcome of children with

myelomeningocele: effect of lower extremity

muscle strength. Dev Med Child Neurol 1991 Jun;

33(6):482-90.

McElroy GK, Hubbard WA. Strategy of gait re-

education for amputees. In: Proceedings of the

18th National Biennial Conference of ACHPER

(Australian Council for Health, Physical Education

and Recreation) 1991; Perth, Australia. Vol. 2.

Hindmarsh (Australia): ACHPER; 1991. p. 441-8.

Menard MR, McBride ME, Sanderson DJ, Murray DD.

Comparative biomechanical analysis of energy-

storing prosthetic feet. Arch Phys Med Rehabil

1992 May;73(5):451-8.

Menard MR, Murray DD. Subjective and objective

analysis of an energy-storing prosthetic foot.

J Prosthet Orthot 1989 Jul;1(4):220-30.

Michael JW. Overview of prosthetic feet. Instr

Course Lect 1990;39:367-72.

Mossberg KA, Linton KA, Friske K. Ankle-foot

orthoses: effect on energy expenditure of gait in

spastic diplegic children. Arch Phys Med Rehabil

1990 Jun;71(7):490-4.

Neumann DA. Biomechanical analysis of selected

principles of hip joint protection. Arthritis Care

Res 1989 Dec;2(4):146-55.

Newell SG. Functional neutral orthoses and shoe

modifications. Phys Med Rehabil Clin North Am

1992 Feb;3(1):193-222.

Nielsen DH, Harris JM, Minton YM, Motley NS,

Rowley JL, Wadsworth CT. Energy cost, exercise

intensity, and gait efficiency of standard versus

rocker-bottom axillary crutch walking. Phys Ther

1990 Aug;70(8):487-93.

Nissan M. The initiation of gait in lower limb

amputees: some related data. J Rehabil Res Dev

1991 Spring;28(2):1-12.

Novick A, Kelley DL. Position and movement

changes of the foot with orthotic intervention

during the loading response of gait. J Orthop Sport

Phys Ther 1990;11(7):301-12.

Nuber GW. Biomechanics of the foot and ankle

during gait. Clin Podiatr Med Surg 1989 Jul;6(3):

615-27.

Olaogun MOB, Abereoje OK, Obajuluwa VA.

Forward upward leading step test for the clinical

evaluation of locomotor ability. Clin Rehabil 1989

Feb;3(1):41-5.

Padula PA, Friedmann LW. Amputee gait. Phys Med

Rehabil Clin North Am 1991 May;2(2):423-32.

Parziale JR, Daniels JD. The mechanical performance

of ambulation using spring-loaded axillary crutches.

A preliminary report. Am J Phys Med Rehabil

1989 Aug;68(4):192-5.

Patwardhan AG, Li SP, Gavin T, Lorenz M, Meade

KP, Zindrick M. Orthotic stabilization of

thoracolumbar injuries. A biomechanical analysis of

the Jewett hyperextension orthosis. Spine 1990 Jul;

15(7):654-61.

Peltier RA. Effects of semi-rigid orthotics on

abduction-adduction moments at the knee joint

during walking [masters thesis]. Lansing (MI):

Michigan State University; 1990. 67 p.

Petrofsky JS, Smith JB. Physiologic costs of

computer-controlled walking in persons with

paraplegia using a reciprocating-gait orthosis. Arch

Phys Med Rehabil 1991 Oct;72(11):890-6.

Phillips CA. An interactive system of electronic

stimulators and gait orthosis for walking in the

spinal cord injured. Automedica 1989;11:247-61.

Phillips CA, Hendershot DM. Functional electrical

stimulation and reciprocating gait orthosis for

ambulation exercise in a tetraplegic patient: a case

study. Paraplegia 1991 May;29(4):268-76.

Phillips CA, Koubek RJ, Hendershot DM. Walking

while using a sensory tactile feedback system:

potential use with a functional electrical

stimulation orthosis. J Biomed Eng 1991

Mar;13(2):91-6.

Pinzur MS, Asselmeier M, Smith D. Dynamic

electromyography in active and limited walking

below-knee amputees. Orthopedics 1991 May;

14(5):535-7; discussion 537-8.

Pinzur MS, Littooy F, Daniels J, Arney C, Reddy NK,

Graham G, Osterman H. Multidisciplinary

preoperative assessment and late function in

dysvascular amputees. Clin Orthop 1992 Aug;

(281):239-43.

Pinzur MS, Perona P, Patwardhan A, Havey R.

Loading of the contralateral foot in peripheral

vascular insufficiency below-knee amputees. Foot

Ankle 1991 Jun;11(6):368-71.

Pohjolainen T, Alaranta H. Predictive factors of

functional ability after lower-limb amputation. Ann

Chir Gynaecol 1991;80(1):36-9.

Pope MH, Broman H, Hansson T. Factors affecting

the dynamic response of the seated subject.

J Spinal Disord 1990 Jun;3(2):135-42.

Porter D, Roberts VC. A review of gait assessment in

the lower limb amputee part 1: temporal and

kinematic analysis. Clin Rehabil 1989 Feb;3:65-74.

Pratt DJ. Three dimensional electrogoniometric study

of selected knee orthoses. Clin Biomech 1991;6(2):

67-72.

Pritham CH. Biomechanics and shape of the above-

knee socket considered in light of the ischial

containment concept. Prosthet Orthot Int 1990 Apr;

14(1):9-21.

Ranu HS, Kim Y, Spelman FA. A quantitative

method of measuring the distribution of forces

under the different regions of the human foot:

during normal and abnormal gait. In: Kim Y,

Spelman FA, eds. Images of the twenty-first

century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Vol. 3. Piscataway (NJ): IEEE; 1989.

p. 824-5.

Reynolds DP, Lord M. Interface load analysis for

computer-aided design of below-knee prosthetic

sockets. Med Biol Eng Comput 1992 Jul;30(4):

419-26.

Ricks NR, Eilert RE. Effects of inhibitory casts and

othoses on bony alignment of foot and ankle during

weight-bearing in children with spasticity. Dev

Med Child Neurol 1993 Jan;35(1):11-6.

Rose NE, Feiwell LA, Cracchiolo A 3d. A method for

measuring foot pressures using a high resolution,

computerized insole sensor: the effect of heel

wedges on plantar pressure distribution and center

of force. Foot Ankle 1992 Jun;13(5):263-70.

Rose SA, Ounpuu S, DeLuca PA. Strategies for the

assessment of pediatric gait in the clinical setting.

Phys Ther 1991 Dec;71(12):961-80.

Savvidis E, Loer F. [A treatment principle with

questionable effectiveness in Perthes disease].

Z Orthop Ihre Grenzgeb 1992 Mar-Apr;130(2):

120-4. (Ger).

Schultz AB. The use of mathematical models for

studies of scoliosis biomechanics. Spine 1991 Oct;

16(10):1211-6.

Selby-Silverstein L, Hillstrom H, Palisano R, Hice G,

Kugler F. Aberrant gait of children with Down

syndrome and the efficacy of treatment with foot

orthoses. In: Woollacott M, Horak F, eds. Posture

and gait: control mechanisms. Proceedings of the

11th International Symposium of the Society for

Postural and Gait Research; 1992; Portland, OR.

Vol. 2. Portland (OR): University of Oregon; 1992.

p. 427-30.

Seliktar R, Mizrahi J, Vachranukunkiet T, Besser M,

Kuenzig D. Human performance with the

prosthetic devices and surgically modified skeletal

elements. Automedica 1989;11:145-62.

Shirazi-Adl A. Finite element stress analysis of a

push-out test. Part 1: Fixed interface using stress

compatible elements. J Biomech Eng 1992 Feb;

114(1):111-8.

Siriwardena GJA, Bertrand PV. Factors influencing

rehabilitation of arteriosclerotic lower limb

amputees. J Rehabil Res Dev 1991 Summer;28(3):

35-44.

Smith AW. A biomechanical analysis of amputee

athlete gait. Int J Sport Biomech 1990 Aug;6(3):

262-82.

Steadward RD, Walsh CM, Gervais P. A kinematic

analysis of wheelchair propulsion. In: Doll-Tepper

G, Dahms C, Doll B, von Selzam H, eds. Adapted

physical activity: an interdisciplinary approach.

Proceedings of the 7th International Symposium;

1989 Jun; Berlin. New York: Springer-Verlag;

1990. p. 93-9.

Stuberg WA. Considerations related to weight-bearing

programs in children with developmental

disabilities. Phys Ther 1992 Jan;72(1):35-40.

Subotnick SI, Block AJ. Retrocalcaneal problems.

Clin Podiatr Med Surg 1990 Apr;7(2):323-32.

Tscheuschner R, Rosenberger H. [Computer-assisted

optimization of gait assessment--biocybernetic

approach for an expert system for designing

prostheses]. Biomed Tech (Berlin) 1990;

35 Suppl 3:56-8. (Ger).

Vailas JC, Pink M. Biomechanical effects of

functional knee bracing. Practical implications.

Sports Med 1993 Mar;15(3):210-8.

Van Jaarsveld HW, Grootenboer HJ, De Vries J.

Accelerations due to impact at heel strike using

below-knee prosthesis. Prosthet Orthot Int 1990

Aug;14(2):63-6.

van Leeuwen JL, Speth LA, Daanen HA. Shock

absorption of below-knee prostheses: a comparison

between the SACH and the Multiflex foot.

J Biomech 1990;23(5):441-6.

Wang TK, Ju MS, Tsuei YG. Adaptative control of

above knee electro-hydraulic prosthesis. J Biomech

Eng 1992 Aug;114(3):421-4.

Waters RL, Tajyra HS, Adkins RH. Gait performance

after spinal cord injury. Clin Orthop 1993 Mar;

(288):87-96.

Waters RL, Yakura JS. The energy expenditure of

normal and pathologic gait. Crit Rev Phys Rehabil

Med 1989;1(3):183-209.

Waters RL, Yakura JS, Adkins R, Barnes G.

Determinants of gait performance following spinal

cord injury. Arch Phys Med Rehabil 1989 Nov;

70(12):811-8.

Weller C, Humphrey SJ, Kirollos C, Bowes SG,

Charlett A, Dobbs SM, Dobbs RJ. Gait on a

shoestring: falls and foot separation in

parkinsonism. Age Ageing 1992 Jul;21(4):242-4.

Wertsch JJ, Webster JG, Tompkins WJ. A portable

insole plantar pressure measurement system.

J Rehabil Res Dev 1992 Winter;29(1):13-8.

Willemsen ATM, Bloemhof F, Boom HBK.

Automatic stance-swing phase detection from

accelerometer data for peroneal nerve stimulation.

IEEE Trans Biomed Eng 1990 Dec;37(12):1201-8.

Winarski DJ, Pearson JR. First-order model for the

analysis of stump stresses for below-knee amputees.

J Biomech Eng 1990 Nov;112(4):475-8.

Winter DA. CNS stategies in human gait: implications

for FES control. Automedica 1989;11:163-74.

Wirta RW, Golbranson FL, Mason R, Calvo K.

Analysis of below-knee suspension systems: effect

on gait. J Rehabil Res Dev 1990 Fall;27(4):

385-96.

Wirta RW, Mason R, Calvo K, Golbranson FL. Effect

on gait using various prosthetic ankle-foot devices.

J Rehabil Res Dev 1991 Spring;28(2):13-24.

Wong AM, Tang FT, Wu SH, Chen CM. Clinical trial

of a low-temperature plastic anterior ankle foot

orthosis. Am J Phys Med Rehabil 1992 Feb;71(1):

41-3.

Wood JE, Meek SG, Jacobsen SC. Quantitation of

human shoulder anatomy for prosthetic arm control.

I. surface modelling. J Biomech 1989;22(3):

273-92.

Wood JE, Meek SG, Jacobsen SC. Quantitation of

human shoulder anatomy for prosthetic arm control-

-II. anatomy matrices. J Biomech 1989;22(4):

309-25.

Wynarsky GT, Schultz AB. Optimization of skeletal

configuration: studies of scoliosis correction

biomechanics. J Biomech 1991;24(8):721-32.

Yamaguchi GT. Feasibility and conceptual design of

functional neuromuscular stimulation systems for

the restoration of natural gait to paraplegics based

on dynamic musculoskeletal models [dissertation].

Palo Alto (CA): Stanford University; 1989. 264 p.

Yamaguchi GT, Zajac FE. Restoring unassisted

natural gait to paraplegics via functional

neuromuscular stimulation: a computer simulation

study. IEEE Trans Biomed Eng 1990 Sep;37(9):

886-902.

Yang L, Solomonidis SE, Spence WD, Paul JP. The

influence of limb alignment on the gait of above-

knee amputees. J Biomech 1991;24(11):981-97.

Scoliosis

Anciaux M, Lenaert A, Van Beneden ML, Blonde W,

Vercauteren M. Transcutaneous electrical

stimulation (TCES) for the treatment of adolescent

idiopathic scoliosis: preliminary results. Acta

Orthop Belg 1991;57(4):399-405.

Andrews G, MacEwen GD. Idiopathic scoliosis. An

11-year follow-up study of the role of the

Milwaukee brace in curve control and trunco-pelvic

alignment. Orthopedics 1989 Jun;12(6):809-16.

Appelgren G, Willner S. End vertebra angle--a

roentgenographic method to describe a scoliosis. A

follow-up study of idiopathic scoliosis treated with

the Boston brace. Spine 1990 Feb;15(2):71-4.

Arlet V, Rigault P, Padovani JP, Touzet P, Finidori G,

Guyonvarch G. [Scoliosis, spondylolysis and

lumbosacral spondylolisthesis. A study of their

association apropos of 82 cases in children and

adolescents]. Rev Chir Orthop 1990;76(2):118-27.

(Fre).

Boachie-Adjei O, Bradford DS. Vertebral column

resection and arthrodesis for complex spinal

deformities. J Spinal Disord 1991 Jun;4(2):

193-202.

Boulot J, Cahuzac JP, Clement JL, Gaubert J. CTM

orthesis for iodiopathic scoliosis. Ann Readapt

Med Phys 1990;33(3):291-301.

Brosnan H. Nursing management of the adolescent

with idiopathic scoliosis. Nurs Clin North Am

1991 Mar;26(1):17-31.

Cassella MC, Hall JE. Current treatment approaches

in the nonoperative and operative management of

adolescent idiopathic scoliosis. Phys Ther 1991

Dec;71(12):897-909.

Chase AP, Bader DL, Houghton GR. The

biomechanical effectiveness of the Boston brace in

the management of adolescent idiopathic scoliosis.

Spine 1989 Jun;14(6):636-42.

Dearolf WW 3d, Betz RR, Vogel LC, Levin J, Clancy

M, Steel HH. Scoliosis in pediatric spinal cord-

injured patients. J Pediatr Orthop 1990 Mar-Apr;

10(2):214-8.

del Pozo LJ, Merino FJ, Imaz M, Vilella J, Campos A.

[Dermatosis in a girl with an orthopedic corset].

Enferm Infecc Microbiol Clin 1990 Nov;8(9):584-5.

(Spa).

Denner F, Siegling CW, Franke J, Hochheim B.

[Personal experiences using the Ch:eneau brace].

Beitr Orthop Traumatol 1990 Jul;37(7):378-82.

(Ger).

Dickson JH, Erwin WD. Scoliosis. Crit Rev Phys

Rehabil Med 1989;1(2):77-95.

Djeddou N. Experience of treating scoliosis at the

Azur Plage medical centre. Ann Readapt Med

Phys 1989 Aug;32(4):321-30.

Durham JW, Moskowitz A, Whitney J. Surface

electrical stimulation versus brace in treatment of

idiopathic scoliosis. Spine 1990 Sep;15(9):888-92.

Edelmann P. Brace treatment in idiopathic scoliosis.

Acta Orthop Belg 1992;58 Suppl 1:85-90.

Federico DJ, Renshaw TS. Results of treatment of

idiopathic scoliosis with the Charleston bending

orthosis. Spine 1990 Sep;15(9):886-7.

Feldman MD, Bridwell KH, Sheridan JJ. Hyndman-

Schneider procedure for paraplegia caused by a

sharp, angular scoliosis: a case report and a review

of the literature. J Spinal Disord 1993 Feb;6(1):

76-82.

Ficner HB. Revision surgery for adult scoliosis patients.

Orthop Nurs 1993 Mar-Apr;12(2):23-32.

Focarile FA, Bonaldi A, Giarolo MA, Ferrari U, Zilioli

E, Ottaviani C. Effectiveness of nonsurgical

treatment for idiopathic scoliosis. Overview of

available evidence. Spine 1991 Apr;16(4):395-401.

Goldberg CJ, Dowling FE, Hall JE, Emans JB. A

statistical comparison between natural history of

idiopathic scoliosis and brace treatment in skeletally

immature adolescent girls. Spine 1993 Jun 1;18(7):

902-8.

Gunnoe BA. Adolescent idiopathic scoliosis. Orthop

Rev 1990 Jan;19(1):35-43.

Gunnoe BA. Adolescent idiopathic scoliosis.

Physician Assist 1990 Sep;14(9):66-7, 70, 72

passim.

Hart DL. Spinal immobility: braces and corsets. In:

Gould JA 3d, ed. Orthopaedic and sports physical

therapy. 2nd ed. St. Louis: Mosby; 1990.

p. 265-89.

Hoppenfeld S, Lopez RA, Molnar G. Plantar weight-

bearing pattern in idiopathic scoliosis. Spine 1991

Jul;16(7):757-60.

Irvin RE. Reduction of lumbar scoliosis by use of a

heel lift to level the sacral base [see comments].

J Am Osteopath Assoc 1991 Jan;91(1):34, 37-44.

Ishal VA. [Possibilities of conservative treatment of

scoliosis]. Ortop Travmatol Protez 1990 Mar;(3):

74-7. (Rus).

Kahanovitz N, Weiser S. The psychological impact of

idiopathic scoliosis on the adolescent female. A

preliminary multi-center study. Spine 1989 May;

14(5):483-5.

Kazmin AI, Belenkii VE, Cherkashov AM. [Electric

stimulation of spinal muscles during walking as a

method of the treatment of scoliosis]. Ortop

Travmatol Protez 1990 Nov;(11):1-5. (Rus).

Keim HA, Hensinger RN. Spinal deformities.

Scoliosis and kyphosis. Clin Symp 1989;41(4):

3-32.

Keller RB. Nonoperative treatment of adolescent

idiopathic scoliosis. Instr Course Lect 1989;38:

129-35.

Kennedy JD, Robertson CF, Hudson I, Phelan PD.

Effect of bracing on respiratory mechanics in mild

idiopathic scoliosis. Thorax 1989 Jul;44(7):548-53.

King HA. Orthotic management of idiopathic

scoliosis. Phys Med Rehabil Clin North Am 1992

Feb;3(1):45-55.

Korbelar P. [Basics of conservative therapy of

idiopathic scoliosis]. Cesk Pediatr 1989 May;44(5):

296-8. (Cze).

Labelle H, Dansereau J, Bellefleur C, Poitras B. [3-D

study of the immediate effect of the Boston brace

on the scoliotic lumbar spine]. Ann Chir

1992;46(9):814-20. (Fre).

Letts M, Rathbone D, Yamashita T, Nichol B, Keeler

A. Soft Boston orthosis in management of

neuromuscular scoliosis: a preliminary report.

J Pediatr Orthop 1992 Jul-Aug;12(4):470-4.

MacLean WE Jr, Green NE, Pierre CB, Ray DC.

Stress and coping with scoliosis: psychological

effects on adolescents and their families. J Pediatr

Orthop 1989 May-Jun;9(3):257-61.

Marchesi D, Rudeberg A, Aebi M. [Development in

conservatively treated scoliosis in patients with

myelomeningocele (patients of the years

1964-1977)]. Acta Orthop Belg 1991;57(4):390-8.

(Fre).

Mehta MH. The conservative management of Juvenile

Idiopathic Scoliosis. Acta Orthop Belg 1992;58

Suppl 1:91-7.

Moe JH. 38 years’ experience in scoliosis treatment.

Arch Putti Chir Organi Mov 1985;35:11-20. (Ita).

Montgomery F, Willner S. Prognosis of brace-treated

scoliosis. Comparison of the Boston and Milwaukee

methods in 244 girls. Acta Orthop Scand 1989

Aug;60(4):383-5.

Montgomery F, Willner S, Appelgren G. Long-term

follow-up of patients with adolescent idiopathic

scoliosis treated conservatively: an analysis of the

clinical value of progression. J Pediatr Orthop

1990 Jan-Feb;10(1):48-52.

Motte KM. Making a thoraco-lumbo-sacral orthosis.

Orthop Nurs 1991 Jul-Aug;10(4):59-62.

Mubarak SJ. Idiopathic scoliosis. Audio Dig Orthop

[audiocassette] 1992 Jan;15(1):Side A [presentation

1, 21 min.]. Accompanied by: 1 guide.

Mubarak SJ, Camp JF, Vuletich W, Wenger DR, Garfin

SR. Halo application in the infant. J Pediatr

Orthop 1989 Sep-Oct;9(5):612-4.

Ogilvie JW. Adult scoliosis: evaluation and

nonsurgical treatment. Instr Course Lect

1992;41:251-5.

Pfeiffer U, Hahnel H. [Use of the halo-gravitation-

extension in preoperative preparation in severe

scoliosis]. Beitr Orthop Traumatol 1990 Jul;37(7):

382-91. (Ger).

Piazza MR, Bassett GS. Curve progression after

treatment with the Wilmington brace for idiopathic

scoliosis. J Pediatr Orthop 1990 Jan-Feb;10(1):

39-43.

Pollock FE, Pollock FE Jr. Idiopathic scoliosis:

correction of lateral and rotational deformities using

the Cotrel-Dubousset spinal instrumentation system.

South Med J 1990 Feb;83(2):161-5.

Price CT, Scott DS, Reed FE Jr, Riddick MF.

Nighttime bracing for adolescent idiopathic

scoliosis with the Charleston bending brace.

Preliminary report. Spine 1990 Dec;15(12):1294-9.

Refsum HE, Naess-Andresen CF, Lange JE.

Pulmonary function and gas exchange at rest and

exercise in adolescent girls with mild idiopathic

scoliosis during treatment with Boston thoracic

brace. Spine 1990 May;15(5):420-3.

Ries MD, Ray S, Winter RB, Bowen JR. Scoliosis in

trisomy 18. Spine 1990 Dec;15(12):1281-4.

Rinsky LA. Advances in management of idiopathic

scoliosis. Hosp Pract (Off Ed) 1992 Apr 15;27(4):

49-55.

Schlenzka D, Ylikoski M, Poussa M. [Experiences

with lateral electric surface stimulation in the

treatment of idiopathic scoliosis]. Beitr Orthop

Traumatol 1990 Jul;37(7):373-8. (Ger).

Schultz AB. The use of mathematical models for

studies of scoliosis biomechanics. Spine 1991 Oct;

16(10):1211-6.

Scoloveno MA, Yarcheski A, Mahon NE. Scoliosis

treatment effects on selected variables among

adolescents. West J Nurs Res 1990 Oct;12(5):

601-15; discussion 615-8.

Seltsa K. Of spines, braces and steel rods. Med J

Aust 1992 Mar 2;156(5):354-5.

Sessa S, Dubousset J. [Cotrel-Dubousset

instrumentation in idiopathic scoliosis. Angular

results in 70 cases]. Rev Chir Orthop 1990;76(2):

112-7. (Fre).

Sombolos K, Kapetanos G, Kalogeras KT,

Christodoulou A, Chrousos GP, Symeonidis P.

Effect on atrial natriuretic peptide by bracing in

scoliosis. Boston brace removal studied in 10 cases.

Acta Orthop Scand 1991 Aug;62(4):379-82.

Stanton RP. Scoliosis evaluation and management.

Del Med J 1989 Dec;61(12):669-74.

Taylor TK, Cummine JL. Of spines, braces and steel

rods [letter]. Med J Aust 1992 May 18;156(10):

742.

Tloka VA, Savitskii VT, Krat IA, Ziabchenko IS,

Shvets VA. [Method of correction of spinal

deformity in children during the growth period].

Klin Khir 1990;(6):66-7. (Rus).

Tomory I. [Idiopathic scoliosis in adults]. Orv Hetil

1990 Aug 19;131(33):1799-801. (Hun).

Tomory I. [Significance of early conservative

treatment of idiopathic scoliosis in young children].

Magy Traumatol Orthop Helyreallito Sebesz 1991;

34(1):25-8. (Hun).

Torode IP. Of spines, braces and steel rods [letter].

Med J Aust 1992 Jul 20;157(2):141.

Toth L, Slechta J, Vlach O. [Personal experience with

the Milwaukee orthosis in the treatment of

idiopathic scoliosis]. Acta Chir Orthop Traumatol

Cech 1989 Apr;56(2):122-8. (Cze).

Weisz I, Jefferson RJ, Carr AJ, Turner-Smith AR,

McInerney A, Houghton GR. Back shape in brace

treatment of idiopathic scoliosis. Clin Orthop 1989

Mar;(240):157-63.

Willers U, Normelli H, Aaro S, Svensson O, Hedlund

R. Long-term resoults of Boston brace treatment

on vertebral rotation in idiopathic scoliosis. Spine

1993 Mar 15;18(4):432-5

Willner S. [Scoliosis--a review]. Nord Med 1990;

105(3):82-5. (Swe).

Womter RB. The Milwaukee Brace - 1992. J Assoc

Child Prosthet Orthot Clin 1992 Summer;27(1):

16-24.

Wynarsky GT, Schultz AB. Optimization of skeletal

configuration: studies of scoliosis correction

biomechanics. J Biomech 1991;24(8):721-32.

Wynarsky GT, Schultz AB. Trunk muscle activities in

braced scoliosis patients. Spine 1989 Dec;14(12):

1283-6.

Ylikoski M, Peltonen J, Poussa M. Biological factors

and predictability of bracing in adolescent

idiopathic scoliosis. J Pediatr Orthop 1989 Nov-

Dec;9(6):680-3.

Other Cervical & Lumbar

Vertebrae Disorders

Abitbol JJ, Botte MJ, Garfin SR, Akeson WH. The

treatment of multiple myeloma of the cervical spine

with a halo vest. J Spinal Disord 1989 Dec;2(4):

263-7.

Andersen J, Rostgaard-Christensen E. Progressive

noninfectious anterior vertebral fusion. J Bone

Joint Surg [Br] 1991 Sep;73(6):859-62.

Arlet V, Rigault P, Padovani JP, Touzet P, Finidori G,

Guyonvarch G. [Scoliosis, spondylolysis and

lumbosacral spondylolisthesis. A study of their

association apropos of 82 cases in children and

adolescents]. Rev Chir Orthop 1990;76(2):118-27.

(Fre).

Assessment and care of the patient with a neck

immobilizer [videocassette]. Houston: University of

Texas Health Science Center-Houston, UTHSC-H;

1992. 1 videocassette: 7 min., sound, color, 1/2 in.

(Orthopedic nursing series). Accompanied by: 1

guide.

Axelsson P, Johnsson R, Stromqvist B. Effect of

lumbar orthosis on intervertebral mobility. A

roentgen stereophotogrammetric analysis. Spine

1992 Jun;17(6):678-81.

Bailes JE, Hadley MN, Quigley MR, Sonntag VK,

Cerullo LJ. Management of athletic injuries of the

cervical spine and spinal cord. Neurosurgery 1991

Oct;29(4):491-7.

Ballock RT, Hajek PC, Byrne TP, Garfin SR. The

quality of magnetic resonance imaging, as affected

by the composition of the halo orthosis. A brief

note. J Bone Joint Surg [Am] 1989 Mar;71(3):

431-4.

Beavis A. Cervical orthoses. Prosthet Orthot Int 1989

Apr;13(1):6-13.

Benzel EC, Hadden TA, Saulsbery CM. A comparison

of the Minerva and halo jackets for stabilization of

the cervical spine. J Neurosurg 1989

Mar;70(3):411-4.

Benzel EC, Larson SJ. Postoperative stabilization of

the posttraumatic thoracic and lumbar spine: a

review of concepts and orthotic techniques.

J Spinal Disord 1989 Mar;2(1):47-51.

Benzel EC, Larson SJ, Kerk JJ, Millington PJ, Novak

SM, Falkner RH, Wenninger WJ. The

thermoplastic Minerva body jacket: a clinical

comparison with other cervical spine splinting

techniques. J Spinal Disord 1992 Sep;5(3):311-9.

Bernard PL, Chollet D, Peruchon E, Micallef JP.

Spine contraints in the paraplegic patient. Sci

Sports 1990;5(3):119-27.

Boachie-Adjei O, Bradford DS. Vertebral column

resection and arthrodesis for complex spinal

deformities. J Spinal Disord 1991 Jun;4(2):

193-202.

Burl MM, Williams JG, Nayak US. Effects of cervical

collars on standing balance. Arch Phys Med

Rehabil 1992 Dec;73(12):1181-5.

Burl MM, Williams JG, Nayak USL. The effect of

cervical collars on walking balance. Physiotherapy

1992 Jan;78(1):19-22.

Carroll SG, Bird SF, Brown DJ. Electrical stimulation

of the lumbrical muscles in an incomplete

quadriplegic patient: case report. Paraplegia 1992

Mar;30(3):223-6.

Chandler DR, Nemejc C, Adkins RH, Waters RL.

Emergency cervical-spine immobilization. Ann

Emerg Med 1992 Oct;21(10):1185-8.

Clayman DA, Murakami ME, Vines FS. Compatibility

of cervical spine braces with MR imaging: a study

of nine nonferrous devices. AJNR Am J

Neuroradiol 1990 Mar-Apr;11(2):385-90.

Cotler HB, Cotler JM, Alden ME, Sparks G, Biggs CA.

The medical and economic impact of closed

cervical spine dislocations. Spine 1990 Jun;15(6):

448-52.

Craig GR, Nielsen MS. Rigid cervical collars and

intracranial pressure. Intensive Care Med 1991;

17(8):504-5.

Cunliffe MW. Lumbar spinal orthoses: direct

moulding using thermoplastic mesh sheet. Br J

Occup Ther 1990 Jun;53(6):244-8.

de Ruiter M. Back to basics with ProFlex.

Ergonomics 1990 Mar;33(3):383-5.

Elizarov VG, Buslov IV, Gerasimov OR, Korolev AN.

[Compression-flexion fractures of lower thoracic

and lumbar vertebrae: causes of failure of the

reclination treatment and the ways of its

improvement]. Vestn Khir 1990 Jul;145(7):58-62.

(Rus).

Elizarov VG, Buslov IV, Gerasimov OR, Korolev AN.

[Long-term forced reclination in fractures of the

lower thoracic and lumbar vertebrae: its

biomechanical substantiation and results]. Sov Med

1990;(2):101-3. (Rus).

Enneking WF, Dunham W, Gebhardt MC, Malawar M,

Pritchard DJ. A system for the functional

evaluation of reconstructive procedures after

surgical treatment of tumors of the musculoskeletal

system. Clin Orthop 1993 Jan;(286):241-6.

Ernst E. [Does a supportive muscle corset: prevent

spinal complaints?]. Wien Med Wochenschr

1992;142(13):291-3. (Ger).

Evans DL, Bethem D. Cervical spine injuries in

children. J Pediatr Orthop 1989 Sep-Oct;9(5):

563-8.

Fisher SV. Cervical orthotics. Phys Med Rehabil Clin

North Am 1992 Feb;3(1):29-43.

Gaskill SJ, Marlin AE. Custom fitted thermoplastic

Minerva jackets in the treatment of cervical spine

instability in preschool age children. Pediatr

Neurosurg 1990-91;16(1):35-9.

Gavin TM, Boscardin JB, Patwardhan AG, Bunch WH,

Zindrick MR, Lorenz MA, Vrbos LA. Preliminary

results of orthotic treatment for chronic low back

pain. J Prosthet Orthot 1993 Jan;5(1):5-9.

Heary RF, Hunt CD, Krieger AJ, Antonio C,

Livingston DH. Acute stabilization of the cervical

spine by halo/vest application facilitates evaluation

and treatment of multiple trauma patients.

J Trauma 1992 Sep;33(3):445-51.

Helliwell PS, Wright V. What are the indications for

the use of a lumbar corset in low back pain? Br J

Rheumatol 1991 Feb;30(1):62.

Hierholzer G, Ludolph E. [Indications, choice of

procedure and results of conservative therapy of

spinal injuries]. Langenbecks Arch Chir Suppl

Kongressbd 1992:274-7. (Ger).

Holmstrom E, Moritz U. Effects of lumbar belts on

trunk muscle strength and endurance: a follow-up

study of construction workers. J Spinal Disord

1992 Sep;5(3):260-6.

Irvin RE. Reduction of lumbar scoliosis by use of a

heel lift to level the sacral base. J Am Osteopath

Assoc 1991 Jan;91(1):34, 37-44.

Johnson MW, Peckham PH. Evaluation of shoulder

movement as a command control source. IEEE

Trans Biomed Eng 1990 Sep;37(9):876-85.

Johnsson R. The use of orthoses in lumbar spine

fusion. Acta Orthop Scand Suppl 1993;251:92-3.

Kaplan SL, Rocco TP, Tun CG, Silverman DI, Kemper

AJ. Acute pulmonary edema following removal of

a spinal orthosis: an unusual complication of a halo

vest. Arch Phys Med Rehabil 1990 Mar;71(3):

255-7.

Karjalainen M, Aho AJ, Katevuo K. Painful spine

after stable fractures of the thoracic and lumbar

spine. What benefit from the use of extension

brace? Ann Chir Gynaecol 1991;80(1):45-8.

Lemons VR, Wagner FC Jr. Stabilization of subaxial

cervical spinal injuries. Surg Neurol 1993 Jun;

39(6):511-8

Lumbar support belts. J Occup Med 1992 Jul;34(7):

679-80.

Maiman D, Millington P, Novak S, Kerk J, Ellingsen J,

Wenninger W. The effect of the thermoplastic

Minerva body jacket on cervical spine motion.

Neurosurgery 1989 Sep;25(3):363-7; discussion

367-8.

Markley VJ, Shepperd JA. Corset supply and the

Hastings corset shop. Br J Occup Ther 1990 Apr;

53(4):155-7.

Marr J, Edmonds V. Cervical orthoses: the issue of

patient compliance. J Neurosci Nurs 1990 Apr;

22(2):104-7.

McGuire RA Jr. Protection of the unstable spine

during transport and early hospitalization. J Miss

State Med Assoc 1991 Aug;32(8):305-8.

McGuire RA, Degnan G, Amundson GM. Evaluation

of current extrication orthoses in immobilization of

the unstable cervical spine. Spine 1990 Oct;15(10):

1064-7.

Miller RA, Hardcastle P, Renwick SE. Lower spinal

mobility and external immobilization in the normal

and pathologic condition. Orthop Rev 1992 Jun;

21(6):753-7.

Nazaroff KS, Stanton JH, Magana KR, Kaufman RL.

Halo-body jacket immobilization in rheumatoid

arthritis patients with cervical myelopathy. Nurs

Clin North Am 1989 Mar;24(1):209-23.

North B, North C, Lee JL. Living in a halo. Am J

Nurs 1992 Apr;92(4):54-6. Published erratum

appears in Am J Nurs 1992 May;92(5):27.

Ohman K, Spaniol D. Halo immobilization: discharge

planning and patient education. J Neurosci Nurs

1990 Dec;22(6):351-7.

Olson B, Ustanko L. Self-care needs of patients in the

halo brace. Orthop Nurs 1990 Jan-Feb;9(1):27-33,

52. Published erratum appears in Orthop Nurs 1990

May-Jun;9(3):90.

Olson B, Ustanko L, Warner S. The patient in a halo

brace: striving for normalcy in body image and

self-concept. Orthop Nurs 1991 Jan-

Feb;10(1):44-50.

Patwardhan AG, Li SP, Gavin T, Lorenz M, Meade

KP, Zindrick M. Orthotic stabilization of

thoracolumbar injuries. A biomechanical analysis of

the Jewett hyperextension orthosis. Spine 1990 Jul;

15(7):654-61.

Pennie BH, Agambar LJ. Whiplash injuries. A trial of

early management. J Bone Joint Surg [Br] 1990

Mar;72(2):277-9.

Pettine KA, Salib RM, Walker SG. External electrical

stimulation and bracing for treatment of

spondylolysis. A case report. Spine 1993 Mar 15;

18(4):436-9.

Pope MH, Broman H, Hansson T. Factors affecting

the dynamic response of the seated subject.

J Spinal Disord 1990 Jun;3(2):135-42.

Pringle RG. Halo versus Minerva--which orthosis?

Paraplegia 1990 Jun;28(5):281-4.

Raven KA, Brugger CA. Hemicorporectomy: a

nursing challenge. Orthop Nurs 1992 Mar-Apr;

11(2):73-8.

Rao S, Patel A, Schildhauer T. Osteogenesis

imperfecta as a differential diagnosis of pathologic

burst fractures of the spine. A case report. Clin

Orthop 1993 Apr;(289):113-7.

Rosen PB, McSwain NE Jr, Arata M, Stahl S, Mercer

D. Comparison of two new immobilization

collars. Ann Emerg Med 1992 Oct;21(10):

1189-95.

Rowed DW. Management of cervical spinal cord

njury in ankylosing spondylitis: the intervertebral

disc as a cause of cord compression. J Neurosurg

1992 Aug;77(2):241-6.

Sakamoto H. [Cap brace: a new treatment for

newborn and infant congenital muscular torticollis].

Nippon Seikeigeka Gakkai Zasshi 1992 Nov;66(11):

1123-36. (Jpn).

Schlickewei W, Schutzhoff G, Kuner EH. [Early

functional treatment of fractures of the lower

thoracic and lumbar vertebrae with a 3-point brace].

Unfallchirurg 1991 Jan;94(1):40-4. (Ger).

Sears W, Fazl M. Prediction of stability of cervical

spine fracture managed in the halo vest and

indications for surgical intervention. J Neurosurg

1990 Mar;72(3):426-32.

Sherepo KM, Povarov LA. [Splint for immobilization

of patients with spinal injuries during

transportation]. Ortop Travmatol Protez 1991 Nov;

(11):42-3. (Rus).

Smith J, Tuel SM, Meythaler JM, Cross LL, Schuch JZ.

Prosthetic management of hemicorporectomy

patients: new approaches. Arch Phys Med Rehabil

1992 May;73(5):493-7.

Solot JA, Winzelberg GG. Clinical and radiological

evaluation of Vertebrace extrication collars.

J Emerg Med 1990 Jan-Feb;8(1):79-83.

Stillo JV, Stein AB, Ragnarsson KT. Low back

orthoses. Phys Med Rehabil Clin North Am 1992

Feb;3(1):57-94.

Thovez G, Castelli PG, Ferrari C, Siclari A, Schneider

L. [Halo vest in the treatment of fractures of the

upper cervical spine. Fractures of the epistropheus].

Minerva Med 1992 Dec;83(12 Suppl 1):83-7. (Ita).

Traynelis VC, Gold M. Cervical spine injury in an

air-bag-equipped vehicle. J Spinal Disord 1993

Feb;6(1):60-1.

Triggs KJ, Ballock RT, Byrne T, Garfin SR. Length

dependence of a halo orthosis on cervical

immobilization. J Spinal Disord 1993 Feb;6(1):

34-7.

von Gumppenberg S, Claudi B. [Conservative fracture

treatment of the cervical spine with halo fixation].

Aktuel Traumatol 1989 Apr;19(2):57-60. (Ger).

von Gumppenberg S, Vieweg J, Claudi B, Harms J.

[Primary management of fresh injuries of the

thoracic and lumbar vertebrae]. Aktuel Traumatol

1991 Dec;21(6):265-73. (Ger).

Walsh NE, Schwartz RK. The influence of

prophylactic orthoses on abdominal strength and

low back injury in the workplace. Am J Phys Med

Rehabil 1990 Oct;69(5):245-50. Comment in: Am J

Phys Med Rehabil 1991 Apr;70(2):111-2.

Waters RL, Tajyra HS, Adkins RH. Gait performance

after spinal cord injury. Clin Orthop 1993 Mar;

(288):87-96.

Willner SW. Test instrument for predicting the effect

of rigid braces in cases with low back pain.

Prosthet Orthot Int 1990 Apr;14(1):22-6.

Wolter D, Reimann B. [Possibilities and limits of

therapy of injuries of the cervical vertebrae with

halo fixation]. Unfallchirurgie 1989 Apr;15(2):

83-94. (Ger).

Wood S, Clapham L, Pickard JD. Medico-legal

collars--time for a consensus to agree to disagree

[editorial]. Br J Neurosurg 1990;4(4):247-8.

Zambelli PY, Dutoit M, Genton N. [Dorso-lumbar

spinal compression fractures in the child. Follow-up

at the termination of development]. Helv Chir Acta

1991 Jul;58(1-2):119-22. (Fre).

Other Fractures

Ahl T, Dalen N, Lundberg A, Bylund C. Early

mobilization of operated on ankle fractures.

Prospective controlled study of 40 biomalleolar

cases. Acta Orthop Scand 1993 Feb;64(1):95-9.

Assessment and care of the patient with a neck

immobilizer [videocassette]. Houston: University of

Texas Health Science Center at Houston, UT/TV;

1992. 1 videocassette: 7 min., sound, color, 1/2 in.

(Orthopedic nursing series; 1). Accompanied by: 1

guide.

Barth A. [Indications and technic of conservative

fracture treatment with a plastic arm splint with

velcro straps (brace)]. Zentralbl Chir 1990;115(4):

235-8. (Ger).

Berger A, Schaller E, Mailander P. Brachial plexus

injuries: an integrated treatment concept. Ann Plast

Surg 1991 Jan;26(1):70-6. Published erratum

appears in Ann Plast Surg 1991 Aug;27(2):194-5.

Blauth W, Ulrich HW, Hahne HJ. [Sense and

nonsense of knee orthosis]. Unfallchirurg 1990

May;93(5):221-7. (Ger).

Bora FW Jr, Culp RW, Osterman AL, Skirven T. A

flexible wrist splint. J Hand Surg [Am] 1989 May;

14(3):574-5.

Borrelli AH. A modification of digital splinting to

prevent neurovascular impairment. J Am Podiatr

Med Assoc 1989 Jan;79(1):34-5.

Botte MJ, Mason RD, Gellman H. Temporary orthosis

for the cast-immobilized thumb. J Hand Surg [Am]

1993 Jan;18(1):164-5.

Brennan MJ, Hayes S, Watson JT. Orthotics versus

casting in the management of lower extremity

sprains, fractures, and other common orthopaedic

problems. Contemp Orthop 1991 Jun;22(6):

683-713.

Camden P, Nade S. Fracture bracing the humerus.

Injury 1992;23(4):245-8.

Cheng JC, Cheung SS. Modified functional bracing in

the ambulatory treatment of femoral shaft fractures

in children. J Pediatr Orthop 1989 Jul-Aug;9(4):

457-62.

Cimino W, Ichtertz D, Slabaugh P. Early mobilization

of ankle fractures after open reduction and internal

fixation. Clin Orthop 1991 Jun;(267):152-6.

Conry MA. Orthomedics fracture bracing at LA

County USC Medical Center. J Prosthet Orthot

1992 Apr;4(3):151-6.

Cuxart A, Iborra J, Melendez M, Pages E. Physeal

injuries in myelomeningocele patients. Paraplegia

1992 Nov;30(11):791-4.

Dahl T, Gretheim OJ. [Closed functional treatment of

fractures of the ulnar shaft]. Tidsskr Nor

Laegeforen 1993 Mar 10;113(7):857-8. (Nor).

Delamarter R, Hohl M. The cast brace and tibial

plateau fractures. Clin Orthop 1989 May;(242):

26-31.

Elattrache N, Fadale PD, Fu FH. Thoracic spine

fracture in a football player. A case report. Am J

Sports Med 1993 Jan-Feb;21(1):157-60.

Foucher G, Greant P, Ehrler S, Buch N, Braun FM,

Michon J. [Role of orthosis in the treatment of

stiffness of the hand]. Chirurgie 1989;115(2):

100-5. (Fre).

Herndon JH. Distal radius fractures: nonsurgical

treatment options. Instr Course Lect 1993;42:

67-72.

Herkert F, Rufkin G. [Experiences with conservative

therapy of humerus shaft fractures]. Z Unfallchir

Versicherungsmed 1992;85(4):202-14. (Ger).

Jacobs LG. The landmine foot: its description and

management. Injury 1991 Nov;22(6):463-6.

King GJ, Schatzker J. Nonunion of a complex tibial

plateau fracture. J Orthop Trauma 1991;5(2):

209-12.

Kohlmeyer KM, Weber CG, Yarkony GM. A new

orthosis for central cord syndrome and brachial

plexus injuries. Arch Phys Med Rehabil 1990 Nov;

71(12):1006-9.

Korzh NA, Bilinskii PI. [Orthotic devices in the

treatment of injuries of the ankle joint]. Ortop

Travmatol Protez 1991 Apr;(4):5-10. (Rus).

Kruse DH. Leave the collar on [letter]. J Emerg Nurs

1990 Nov-Dec;16(6):376.

Kurer MH, Regan MW. Completely displaced

supracondylar fracture of the humerus in children.

A review of 1708 comparable cases. Clin Orthop

1990 Jul;(256):205-14.

Laporte JM, Berrettoni BA, Seitz WH Jr, Winsberg D,

Froimson AI. The figure-of-eight splint for

proximal interphalangeal joint volar plate injuries.

Orthop Rev 1992 Apr;21(4):457-62.

Lauritzen JB, Petersen MM, Lund B. Effect of

external hip protectors on hip fractures. Lancet

1993 Jan 2;341(8836):11-3.

Ledingham WM, Wytch R, Goring CC, Mathieson AB,

Wardlaw D. On immediate functional bracing of

Colles’ fracture. Injury 1991 May;22(3):197-201.

Levy J, Ward WT. Pediatric femur fractures: an

overview of treatment. Orthopedics 1993 Feb;

16(2):183-90.

Madden G. Orthotic management for osteochondritis

dissecans of the talar dome. J Prosthet Orthot 1989

Jan;1(2):72-5.

Magyari Z, Kadas I, Salacz T. [Management of lower

leg fractures by external fixators and thermoplastic

braces. Preliminary report]. Magy Traumatol

Orthop Helyreallito Sebesz 1992;35(1):55-60.

(Hun).

Magyari Z, Salacz T, Kadas I. [Management of upper

arm fractures using a thermoplastic functional

brace]. Magy Traumatol Orthop Helyreallito

Sebesz 1992;35(4):325-31. (Hun).

Maitra A, Sen B. The boxers fracture: a simple and

effective method of external splintage [letter]. Arch

Emerg Med 1990 Mar;7(1):52-4.

Maitra A, Sen B. Displaced boxers’ fractures: a

simple and effective method of external splintage.

Br J Clin Pract 1990 Sep;44(9):348-51.

Marsh JL, Nepola JV. External fixation for open tibia

fractures. A management strategy. Orthop Rev

1990 Mar;19(3):273-80.

Matsusue Y, Ueno T, Yamamuro T. Effective

treatment by orthosis of dislocation of the patella

associated with Down’s syndrome. A report of case.

Nippon Geka Hokan 1991 May 1;60(3):189-94.

McConnell EA. Applying an abduction pillow

correctly. Nursing 1992 Jun;22(6):22.

McConnell EA. Correctly positioning an arm sling.

Nursing 1991 Jul;21(7):70.

Milgrom C, Burr DB, Boyd RD, Robin GC, Higgins

WL, Radin EL. The effect of a viscoelastic

orthotic on the incidence of tibial stress fractures in

an animal model. Foot Ankle 1990 Apr;10(5):

276-9.

Moeller M. Splints versus casts [letter]. Postgrad

Med 1990 Feb 15;87(3):34.

Moir JS, Wytch R, Ashcroft GP, Neil G, Ross N,

Wardlaw D. Intracast pressure measurements in

Colles’ fractures. Injury 1991 Nov;22(6):446-50.

Mok DW, Good C. Non-operative management of

acute grade III medial collateral ligament injury of

the knee: a prospective study. Injury 1989 Sep;

20(5):277-80.

Muftakhidenov SB, Eleusizov AB, Briske VA. [A

splint for immobilization of the arm]. Ortop

Travmatol Protez 1989 Nov;(11):73-4. (Rus).

Murphy MS. An adjustable splint for forearm

supination. Am J Occup Ther 1990 Oct;44(10):

936-9.

Murtagh J. Fractured rib. Aust Fam Physician 1991

Apr;20(4):491.

Nawoczenski DA, Birke JA, Graham SL, Koziatek E.

The neuropathic foot--a management scheme: a

case report. Phys Ther 1989 Apr;69(4):287-91.

Naylor JR, Mulley GP. Surgical collars: a survey of

their prescription and use. Br J Rheumatol 1991

Aug;30(4):282-4.

Nolinske TL, Harlow ML, Russ JC. Orthotic

management of the neurologically involved upper

and lower-limb. In: Meyer PR. Surgery of spine

trauma. New York: Churchill Livingstone; 1989.

p. 305-40.

Oberlander MA, Seidman GD, Whitelaw GP.

Treatment of isolated ulnar shaft fractures with

functional bracing. Orthopedics 1993 Jan;16(1):

29-32.

Ofiaeli RO. Complications of methods of fracture

treatment used by traditional healers: a report of

three cases necessitating amputation at Ihiala,

Nigeria. Trop Doct 1991 Oct;21(4):182-3.

Ovechkin VS, Vasil’ev SF, Dorogan’ SD. [Prevention

and treatment of persistent contractures of the hand

after injuries of the ulnar and median nerves].

Vestn Khir 1990 Feb;144(2):112-3. (Rus).

Patel MR, Pearlman HS, Bassini L, Ravich S.

Fractures of the sesamoid bones of the thumb.

J Hand Surg [Am] 1990 Sep;15(5):776-81.

Pichora DR, McMurtry RY, Bell MJ. Gamekeepers

thumb: a prospective study of functional bracing.

J Hand Surg [Am] 1989 May;14(3):567-73.

Popsuishapka AK. [The functional treatment of

diaphyseal fractures of the femur]. Ortop

Travmatol Protez 1989 Sep;(9):74-7. (Rus).

Popsuishapka AK, Pavlenko SI. [Functional treatment

of diaphyseal fractures of the humerus using a

polyvic orthosis]. Ortop Travmatol Protez 1989

Jun;(6):24-9. (Rus).

Press JM, Wiesner SL. Prevention: conditioning and

orthotics. Hand Clin 1990 Aug;6(3):383-92.

Prokop LL. Upper-extremity rehabilitation:

conditioning and orthotics for the athlete and

performing artist. Hand Clin 1990 Aug;6(3):

517-24.

PTB cast, long-leg cast-braces, and hip spica casts

[videocassette]. United States: American Academy

of Orthopedic Surgeons; 1990. 1 videocassette: 16

min., sound, color, 1/2 in.

Pun WK, Chow SP, Fang D, Ip FK, Leong JC, Ng C.

A study of function and residual joint stiffness after

functional bracing of tibial shaft fractures. Clin

Orthop 1991 Jun;(267):157-63.

Racette WL. Clinical experience with functional

fracture bracing of the tibial diaphysis. J Prosthet

Orthot 1992 Apr;4(3):142-50.

Rader L, Tausch W. [Functional conservative

treatment of humerus shaft fracture with the plaster

brace]. Zentralbl Chir 1991;116(8):525-30. (Ger)

Redheffer GM, Bailey M. Assessing and splinting

fractures. Nursing 1989 Jun;19(6):51-9.

Reith HB, Mackowski M, Kozianka J, Kozuschek W.

[Early functional treatment of rupture of the fibular

ligament with a personally developed ankle splint].

Zentralbl Chir 1989;114(21):1396-400. (Ger).

Sanchez Zaplana I, Zaragoza Arnau M. [The Braun

and Braun-Bohler splints]. Rev Enferm 1990 Mar;

13(139):69-71, 73-4. (Spa).

Sarmiento A, Gersten LM, Sobol PA, Shankwiler JA,

Vangsness CT. Tibial shaft fractures treated with

functional braces. Experience with 780 fractures.

J Bone Joint Surg [Br] 1989 Aug;71(4):602-9.

Saunders SR. Physical therapy management of hand

fractures. Phys Ther 1989 Dec;69(12):1065-76.

Schindler A, Yaffe B, Chetrit A, Modan M, Engel J.

Factors influencing elbow arthrolysis. Ann Chir

Main Memb Super 1991;10(3):237-42.

Sennik VT. [Improvement of Vinogradov’s abduction

splint in the treatment of fractures of the humerus].

Ortop Travmatol Protez 1991 Aug;(8):53-4. (Rus).

Sennik VT, Mizak ST, Sukachev BA. [A modification

of Beler’s splint for the skeletal traction treatment

of diaphyseal fractures of the leg bones]. Voen

Med Zh 1989 Jul;(7):61. (Rus).

Shantharam SS. Tips of the trade #41. Modified

coaptation splint for humeral shaft fractures.

Orthop Rev 1991 Nov;20(11):1033, 1039.

Sharma VK, Jain AK, Gupta RK, Tyagi AK, Sethi PK.

Non-operative treatment of fractures of the humeral

shaft: a comparative study. J Indian Med Assoc

1991 Jun;89(6):157-60.

Shewring DJ, Beaudet M, Carvell JE. Reversed

dynamic slings: results of use in the treatment of

post-traumatic flexion contractures of the elbow.

Injury 1991 Sep;22(5):400-2.

Silfverskiold JP. Splinting tips. Postgrad Med 1989

Nov 1;86(6):185-8.

Simkin A, Leichter I, Giladi M, Stein M, Milgrom C.

Combined effect of foot arch structure and an

orthotic device on stress fractures. Foot Ankle

1989 Aug;10(1):25-9.

Smith RM, Emans JB, Miller J. Fracture of the

odontoid in a toddler. Injury 1992;23(5):352-3.

Smrcka V, Koprivova M. Rehabilitation in plastic

surgery. Splinting and positioning of flexor tendons

of the hand. Acta Chir Plast 1990;32(1):16-27.

Solgaard S, Bunger C, Slund K. Displaced distal

radius fractures. A comparative study of early

results following external fixation, functional

bracing in supination, or dorsal plaster

immobilization. Arch Orthop Trauma Surg 1990;

109(1):34-8.

Sollerman C, Abrahamsson SO, Lundborg G, Adalbert

K. Functional splinting versus plaster cast for

ruptures of the ulnar collateral ligament of the

thumb. A prospective randomized study of 63

cases. Acta Orthop Scand 1991 Dec;62(6):524-6.

Stuart PR, Brumby C, Smith SR. Comparative study

of functional bracing and plaster cast treatment of

stable lateral malleolar fractures. Injury 1989 Nov;

20(6):323-6.

Sunde D, Pearl R. A better sky hook: for hand

elevation. Ann Plast Surg 1990 Feb;24(2):189-90.

Szabo RM. Extra-articular fractures of the distal

radius. Orthop Clin NOrth Am 1993 Apr;24(2):

229-37.

Tscherne H, Wippermann B. [Functional therapy in

treatment of fractures and joint injuries]. Zentralbl

Chir 1990;115(16):997-1005. (Ger).

Tscherne H, Wippermann BW. [Conservative

treatment in fractures of the upper limb]. Chirurg

1990 Nov;61(11):752-60. (Ger).

Tylman D, Siwek W. Long-term results of functional

treatment in intraarticular knee fractures and

multifragment fractures of the shaft of femurs. Clin

Orthop 1991 Nov;(272):114-21.

Vaccaro AR, Kupcha PC, Salvo JP. Accurate

reduction and splinting of the common boxer’s

fracture. Orthop Rev 1990 Nov;19(11):994-6.

van Raay JJ, Logghe R, van der Werken C.

[Treatment of isolated ulnar shaft fractures using

Sarmiento’s method]. Ned Tijdschr Geneeskd 1989

Mar 11;133(10):507-9. (Dut).

Wadsworth TG. Colles’ fracture. BMJ 1990 Jul 28;

301(6745):192-4.

Whalen JL, Bishop AT, Linscheid RL. Nonoperative

treatment of acute hamate hook fractures. J Hand

Surg [Am] 1992 May;17(3):507-11.

Whitelaw GP, Wetzler MJ, Levy AS, Segal D,

Bissonnette K. A pneumatic leg brace for the

treatment of tibial stress fractures. Clin Orthop

1991 Sep;(270):301-5.

Winkler W. The role of orthotics in the rehabilitation

of patients with fracture of the calcaneum. Prosthet

Orthot Int 1989 Aug;13(2):70-5.

Wu SH. A belly gutter splint for proximal

interphalangeal joint flexion contracture. Am J

Occup Ther 1991 Sep;45(9):839-43.

Young R, Kersting R, Westermann K. [Sarmiento

function fracture treatment of the tibia].

Unfallchirurg 1989 Aug;92(8):394-8. (Ger).

Zagorski JB, Zych GA, Latta LL, Finnieston AR.

Orthotic design and application for functional

treatment of tibial shaft fractures. J Prosthet Orthot

1992 Apr;4(3):126-41.

Zander CL, Healy NL. Elbow flexion contractures

treated with serial casts and conservative therapy.

J Hand Surg [Am] 1992 Jul;17(4):694-7.

Zeegers AV, Van Raay JJ, van der Werken C. Ankle

fractures treated with a stabilizing shoe. Acta

Orthop Scand 1989 Oct;60(5):597-9.

Zwart S, Voorhoeve HW. [Functional treatment of

Colles’ fractures and the relationship between

anatomical recovery and function (letter)]. Ned

Tijdschr Geneeskd 1989 Jun 10;133(23):1189.

(Dut).

Zwipp H, Schievink B. Primary orthotic treatment of

ruptured ankle ligaments: a recommended

procedure. Prosthet Orthot Int 1992 Apr;16(1):

49-56.

Myelomeningocele & Spina Bifida

Beaty JH, Canale ST. Orthopaedic aspects of

myelomeningocele. J Bone Joint Surg [Am] 1990

Apr;72(4):626-30.

Berard C, Delmas MC, Locqueneux F, Vadot JP.

[Anti-calcaneus carbon fiber orthosis in children

with myelomeningocele]. Rev Chir Orthop 1990;

76(3):222-5. (Fre).

Berned Muller E, Nordwall A, von Wendt L. The

influence of scoliosis brace treatment on function in

children with myelomeningocele. Acta Paediatr

1992 Nov;81(11):925-8.

Butler C. Augmentative mobility: why do it? Phys

Med Rehabil Clin North Am 1991 Nov;2(4):

801-15.

Carstens C, Schmidt E, Fromm B, Schiltenwolf M.

[Results of surgical therapy of knee flexion

contractures in patients with myelomeningocele].

Z Orthop Ihre Grenzgeb 1992 May-Jun;130(3):

207-12. (Ger).

Cassinis A, Conti B, Redaelli T, Cosignani F,

Bartemucci G. [The multidisciplinary treatment of

children with spina bifida]. Riabilitazione 1991;

24(4):207-21. (Ita).

Charney EB, Melchionni JB, Smith DR. Community

ambulation by children with myelomeningocele and

high-level paralysis. J Pediatr Orthop 1991

Sep-Oct;11(5):579-82.

Correll J. The state of technical orthopaedics in spina

bifida. Z Kinderchir 1989 Dec;44 Suppl 1:8-10.

Cuxart A, Iborra J, Melendez M, Pages E. Physeal

injuries in myelomeningocele patients. Paraplegia

1992 Nov;30(11):791-4.

Diaz Llopid I, Bea Munoz M, Martinez Agullo E,

Lopez Martinez A, Garcia Aymerich V, Forner

Valero JC. Ambulation in patients with

myelomeningocele: a study of 1500 patients.

Paraplegia 1993 Jan;31(1):28-32.

Franks CA, Palisano RJ, Darbee JC. The effect of

walking with an assistive device and using a

wheelchair on school performance in students with

myelomeningocele. Phys Ther 1991 Aug;71(8):

570-7; discussion 577-9.

Hullin MG, Robb JE, Loudon IR. Ankle-foot orthosis

function in low-level myelomeningocele. J Pediatr

Orthop 1992 Jul-Aug;12(4):518-21.

Kahn DL. The reciprocation gait orthosis for children

with myelodysplasia. Phys Occup Ther Pediatr

1989;9(2):107-17.

Karmel-Ross K, Cooperman DR, Van Doren CL. The

effect of electrical stimulation on quadriceps

femoris muscle torque in children with spina bifida.

Phys Ther 1992 Oct;72(10):723-30.

Knutson LM, Clark DE. Orthotic devices for

ambulation in children with cerebral palsy and

myelomeningocele. Phys Ther 1991 Dec;71(12):

947-60.

Liptak GS, Shyrtleff DB, Bloss JW, Baltus-Hebert E,

Manitta P. Mobility aids for children with high-

level myelomeningocele: parapodium versus

wheelchair. Dev Med Child Neurol 1992 Sep;

34(9):787-96.

Marchesi D, Rudeberg A, Aebi M. [Development in

conservatively treated scoliosis in patients with

myelomeningocele (patients of the years

1964-1977)]. Acta Orthop Belg 1991;57(4):390-8.

(Fre).

Mazur JM, Shurtleff D, Menelaus M, Colliver J.

Orthopaedic management of high-level spina bifida.

Early walking compared with early use of a

wheelchair. J Bone Joint Surg [Am] 1989 Jan;

71(1):56-61.

McDonald CM, Jaffe KM, Mosca VS, Shurtleff DB.

Ambulatory outcome of children with

myelomeningocele: effect of lower extremity

muscle strength. Dev Med Child Neurol 1991

Jun;33(6):482-90.

Michael T, Doll B, Von Moers A, Scheffner D.

Dynamic orthoses for children with

meningomyelocele. In: Doll-Tepper G, Dahms C,

Doll B, von Selzam H, eds. Adapted physical

activity: an interdisciplinary approach. Proceedings

of the 7th International Symposium, 1989 Jun,

Berlin. New York: Springer-Verlag; 1990.

p. 475-81.

Moretto DF, Minkel JL, Cardi MD. Prosthetic/orthotic

management after recent hemipelvectomy for a

myelomeningocele patient. J Prosthet Orthot 1992

Winter;4(2):93-102.

O’Connell DG, Barnhart R, Parks L. Muscular

endurance and wheelchair propulsion in children

with cerebral palsy or myelomeningocele. Arch

Phys Med Rehabil 1992 Aug;73(8):709-11.

Phillips DP, Lindseth RE. Ambulation after transfer of

adductors, external oblique, and tensor fascia lata in

myelomeningocele. J Pediatr Orthop 1992

Nov-Dec;12(6):712-7.

Ryan KD, Ploski C, Emans JB. Myelodysplasia the

musculoskeletal problem: habilitation from infancy

to adulthood. Phys Ther 1991 Dec;71(12):935-46.

Schiltenwolf M, Carstens C, Bernd L.

[Myelomeningocele--what can be done? Aids for

evaluating rehabilitation from the orthopedic

viewpoint]. Geburtshilfe Frauenheilkd 1992 Aug;

52(8):449-53. (Ger).

Schiltenwolf M, Carstens C, Rohwedder J, Gr:undel E.

Results of orthotic treatment in children with

myelomeningocele. Eur J Pediatr Surg 1991 Dec;

1 Suppl 1:50-2.

Schmidt RA, Kogan BA, Tanagho EA.

Neuroprostheses in the management of incontinence

in myelomeningocele patients. J Urol 1990 Apr;

143(4):779-82.

Stallard J, Major R, Butler PB. The orthotic

ambulation performance of paraplegic

myelomeningocele children using the orlau

parawalker treatment system. Clin Rehabil 1991

May;5(2):111-4.

Taylor A, McNamara A. Ambulation status of adults

with myelomeningocoele. Z Kinderchir 1990 Dec;

45 Suppl 1:32-3.

Thomas SE, Mazur JM, Child ME, Supan TJ.

Quantitative evaluation of AFO use with

myelomeningocele children. Z Kinderchir 1989

Dec;44 Suppl 1:38-40.

Wright JG, Menelaus MB, Broughton NS, Shurtleff D.

Natural history of knee contractures in

myelomeningocele. J Pediatr Orthop 1991 Nov-

Dec;11(6):725-30.

Arthritis

Anderson EG. The rheumatoid foot: a sideways look.

Ann Rheum Dis 1990 Oct;49 Suppl 2:851-7.

Arthritis Health Professions Association. Hand splinting

for arthritis health professionals [audiocassette].

Atlanta: AHPA; 1988. 1 audiocassette; 1 7/8 ips.

Recorded at the concurrent session KK, May 23-28,

1988, Houston.

Bishop AT, Hench PK, Lacroix E, Millender LH, Opitz

JL. Keeping the rheumatoid hand working.

Patient Care 1991 Oct 30;25(17):74-8, 80, 85-6.

Bongi SM. A personalised splint for osteoarthritis.

Nurs Times 1992 Feb 12-18;88(7):46-7.

Budiman-Mak E, Conrad KJ, Roach KE. The Foot

Function Index: a measure of foot pain and

disability. J Clin Epidemiol 1991;44(6):561-70.

Calmels P, Pallot-Prades B, Alexandre C, Minaire P.

[The reeducation of the patient with rheumatoid

polyarthritis]. Servir 1989 Sep-Oct;37(5):306-9.

(Por).

Crosbie WJ, Nicol AC. Aided gait in rheumatoid

arthritis following knee arthroplasty. Arch Phys

Med Rehabil 1990 Apr;71(5):299-303.

Falconer J. Hand splinting in rheumatoid arthritis: a

perspective on current knowledge and directions for

research. Arthritis Care Res 1991 Jun;4(2):81-6.

Feinberg J. Effect of the arthritis health professional

on compliance with use of resting hand splints by

patients with rheumatoid arthritis. Arthritis Care

Res 1992 Mar;5(1):17-23.

Grocholski-Plescher B. ["Mobile occupational

therapy" for rheumatic patients: development of the

service, utilization and management with aids and

braces]. Z Rheumatol 1992;51 Suppl 1:35-40.

(Ger).

Herold DC, Palmer RG. Questionnaire study of the

use of surgical shoes prescribed in a rheumatology

outpatient clinic. J Rheumatol 1992 Oct;19(10):

1542-4.

Hicks JE. Rehabilitation and biomechanics. Curr

Opin Rheumatol 1990 Apr;2(2):320-6.

Hicks JE, Leonard JA Jr, Nelson VS, Fisher SV,

Esquenazi A. Prosthetics, orthotics, and assistive

devices. 4. Orthotic management of selected

disorders. Arch Phys Med Rehabil 1989 May;

70(5-S):S210-7.

Jurisson ML. Rehabilitation in rheumatic diseases.

What’s new. West J Med 1991 May;154(5):545-8.

Malcus Johnson P, Sandkvist G, Eberhardt K, Liang B,

Herrlin K. The usefulness of nocturnal resting

splints in the treatment of ulnar deviation of the

rheumatoid hand. Clin Rheumatol 1992 Mar;11(1):

72-5.

McKnight PT, Kwoh CK. Randomized, controlled

trial of compression gloves in rheumatoid arthritis.

Arthritis Care Res 1992 Dec;5(4):223-7.

Moncur C, Ward JR. Heat-moldable shoes for

management of forefoot problems in rheumatoid

arthritis. J Prosthet Orthot 1990 Dec;3(4):222-6.

Nazaroff KS, Stanton JH, Magana KR, Kaufman RL.

Halo-body jacket immobilization in rheumatoid

arthritis patients with cervical myelopathy. Nurs

Clin North Am 1989 Mar;24(1):209-23.

Neumann DA. Biomechanical analysis of selected

principles of hip joint protection. Arthritis Care

Res 1989 Dec;2(4):146-55.

Nordenskiold U. Elastic wrist orthoses. Reduction of

pain and increase in grip force for women with

rheumatoid arthritis. Arthritis Care Res 1990 Sep;

3(3):158-62.

Ouellette EA. The rheumatoid hand: orthotics as

preventative. Semin Arthritis Rheum 1991 Oct;

21(2):65-72.

Philips CA. Management of the patient with

rheumatoid arthritis. The role of the hand therapist.

Hand Clin 1989 May;5(2):291-309.

Philips CA. Rehabilitation of the patient with

rheumatoid hand involvement. Phys Ther 1989

Dec;69(12):1091-8.

Rey B. [Non-drug and non-surgical measures in

chronic polyarthritis]. Ther Umsch 1991 Sep;

48(9):624-31. (Ger).

Rhodes VJ. Physical therapy management of patients

with juvenile rheumatoid arthritis. Phys Ther 1991

Dec;71(12):910-9.

Rogers JC, Holm MB. Assistive technology device

use in patients with rheumatic disease: a literature

review. Am J Occup Ther 1992 Feb;46(2):120-7.

Rudicel S. Arthritis of the foot. Pinpointing the

disease process involved. Postgrad Med 1989

Sep 1;86(3):122-5, 128-9, 132.

Saito S, Saito M, Nishina T, Ohzono K, Ono K.

Long-term results of total hip arthroplasty for

osteonecrosis of the femoral head. A comparison

with osteoarthritis. Clin Orthop 1989 Jul;(244):

198-207.

Sauvain MJ, Brock D, Gerber NJ. [Foot problems in

chronic polyarthritis: shoe advice and foot care].

Ther Umsch 1991 Sep;48(9):640-4. (Ger).

Steadman AK, Netscher DT. A detachable thumb

spica for a rheumatoid brace. J Hand Surg [Am]

1991 May;16(3):564-6.

Swezey RL. Rheumatoid arthritis: the role of the

kinder and gentler therapies. J Rheumatol Suppl

1990 Nov;25:8-13.

Thompson JA, Jennings MB, Hodge W. Orthotic

therapy in the management of osteoarthritis. J Am

Podiatr Med Assoc 1992 Mar;82(3):136-9.

van der Hoeven H, van der Net J, Helders PJ, Keessen

W. [Physiotherapy and orthopedic treatment of

juvenile chronic arthritis]. Tijdschr Kindergeneeskd

1991 Oct;59(5):167-72. (Dut).

Entrapment Syndromes & Tendon

Disorders

Ashall G, Foster A. The cage splint: an added

protection for flexor tendon repair. J Hand Surg

[Br] 1989 Feb;14(1):128.

Barrett DS, Donell ST. Entrapment neuropathies: 1.

Upper limb. Br J Hosp Med 1991 Aug;46(2):94-8.

Beck-Foehn M. [Occupationally-induced carpal tunnel

syndrome]. Nervenarzt 1992 Aug;63(8):467-72.

(Ger).

Browne EZ Jr, Ribik CA. Early dynamic splinting for

extensor tendon injuries. J Hand Surg [Am] 1989

Jan;14(1):72-6.

Burge PD, Brown M. Elastic band mobilisation after

flexor tendon repair; splint design and risk of

flexion contracture. J Hand Surg [Br] 1990 Nov;

15(4):443-8.

Chow JA, Dovelle S, Thomes LJ, Ho PK, Saldana J.

A comparison of results of extensor tendon repair

followed by early controlled mobilisation versus

static immobilisation. J Hand Surg [Br] 1989 Feb;

14(1):18-20.

Chow SP, Stephens MM, Ngai WK, So YC, Pun WK,

Chu M, Crosby C. A splint for controlled active

motion after flexor tendon repair. Design,

mechanical testing, and preliminary clinical results.

J Hand Surg [Am] 1990 Jul;15(4):645-51.

Dovelle S, Heeter PK. The Washington Regimen:

rehabilitation of the hand following flexor tendon

injuries. Phys Ther 1989 Dec;69(12):1034-40.

Enzenauer RJ, Nordstrom DM. Anterior interosseous

nerve syndrome associated with forearm band

treatment of lateral epicondylitis. Orthopedics 1991

Jul;14(7):788-90.

Fillion PL. Treatment of lateral epicondylitis. Am J

Occup Ther 1991 Apr;45(4):340-3.

Gerbino PG 2d, Saldana MJ, Westerbeck P, Schacherer

TG. Complications experienced in the

rehabilitation of zone I flexor tendon injuries with

dynamic traction splinting. J Hand Surg [Am]

1991 Jul;16(4):680-6.

Horii E, Lin GT, Cooney WP, Linscheid RL, An KN.

Comparative flexor tendon excursion after passive

mobilization: an in vitro study. J Hand Surg [Am]

1992 May;17(3):559-66.

Hung LK, Chan A, Chang J, Tsang A, Leung PC.

Early controlled active mobilization with dynamic

splintage for treatment of extensor tendon injuries.

J Hand Surg [Am] 1990 Mar;15(2):251-7.

Kaplan SJ, Glickel SZ, Eaton RG. Predictive factors

in the non-surgical treatment of carpal tunnel

syndrome. J Hand Surg [Br] 1990 Feb;15(1):

106-8.

Kortman, B. Patient recall and understanding of

instructions concerning splints following a zone 2

flexor tendon repair. Aust Occup Ther J 1992 Jun;

39(2):5-11.

Kraft S, Serex AM, Cavin B, Isoz J. [Lesions of zone

II flexor tendons: splints and rehabilitation]. Helv

Chir Acta 1992 Jan;58(4):451-3. (Fre).

Kruger VL, Kraft GH, Deitz JC, Ameis A, Polissar L.

Carpal tunnel syndrome: objective measures and

splint use. Arch Phys Med Rehabil 1991 Jun;

72(7):517-20.

Kruger VL, Veer L, Nicholls LA. A modified ulnar

gutter wrist splint for the treatment of carpal tunnel

syndrome. Can J Occup Ther 1992 Aug;59(3):

159-62.

Mandel S. Overuse syndrome in musicians. When

playing an instrument hurts. Postgrad Med 1990

Aug;88(2):111-4.

May EJ, Silfverskiold KL, Sollerman CJ. Controlled

mobilization after flexor tendon repair in zone II: a

prospective comparison of three methods. J Hand

Surg [Am] 1992 Sep;17(5):942-52.

Newport ML, Blair WF, Steyers CM Jr. Long-term

results of extensor tendon repair. J Hand Surg

[Am] 1990 Nov;15(6):961-6.

Newport ML, Shukla A. Electrophysiologic basis of

dynamic extensor splinting. J Hand Surg [Am]

1992 Mar;17(2):272-7.

Percival NJ, Sykes PJ. Flexor pollicis longus tendon

repair: a comparison between dynamic and static

splintage. J Hand Surg [Br] 1989 Nov;14(4):412-5.

Rider BA. Carpal tunnel syndrome rehabilitation. Crit

Rev Phys Rehabil Med 1991;3(1):27-57.

Saldana MJ, Choban S, Westerbeck P, Schacherer TG.

Results of acute zone III extensor tendon injuries

treated with dynamic extension splinting. J Hand

Surg [Am] 1991 Nov;16(6):1145-50.

Saldana MJ, Chow JA, Gerbino P 2d, Westerbeck P,

Schacherer TG. Further experience in

rehabilitation of zone II flexor tendon repair with

dynamic traction splinting. Plast Reconstr Surg

1991 Mar;87(3):543-6.

Saleh M, Marshall PD, Senior R, MacFarlane A. The

Sheffield splint for controlled early mobilisation

after rupture of the calcaneal tendon. A prospective,

randomised comparison with plaster treatment.

J Bone Joint Surg [Br] 1992 Mar;74(2):206-9.

Seror P. [Orthosis as treatment of ulnar nerve

compression at the elbow. Preliminary results in 22

patients (letter)]. Presse Med 1991 Dec 14;20(43):

2214-5. (Fre).

Siegert JJ, Cooney WP, Dobyns JH. Management of

simple camptodactyly. J Hand Surg [Br] 1990

May;15(2):181-9.

Stewart KM. Review and comparison of current

trends in the postoperative management of tendon

repair. Hand Clin 1991 Aug;7(3):447-60.

Tubiana R. Carpal tunnel syndrome: some views on

its management. Ann Chir Main Memb Super

1990;9(5):325-30.

Valembois B, Moutet F, Hoel G. [Shearing splints].

Ann Chir Main 1989;8(2):176-8. (Fre).

Werntz JR, Chesher SP, Breidenbach WC, Kleinert HE,

Bissonnette MA. A new dynamic splint for

postoperative treatment of flexor tendon injury.

J Hand Surg [Am] 1989 May;14(3):559-66.

Witczak JW, Masear VR, Meyer RD. Triggering of

the thumb with de Quervain’s stenosing

tendovaginitis. J Hand Surg [Am] 1990 Mar;15(2):

265-8.

Witt J, Pess G, Gelberman RH. Treatment of de

Quervain tenosynovitis. A prospective study of the

results of injection of steroids and immobilization

in a splint. J Bone Joint Surg [Am] 1991

Feb;73(2):219-22.

Zwipp H, Thermann H, Sudkamp N, Tscherne H,

Milbradt H, Reimer P, Heintz P. [An innovative

concept for primary functional treatment of Achilles

tendon rupture]. Sportverletz Sportschaden 1990

Mar;4(1):29-35. (Ger).

Cerebral Palsy

Angelo J. Comparison of three computer scanning

modes as an interface method for persons with

cerebral palsy. Am J Occup Ther 1992 Mar;46(3):

217-22.

Binder H, Eng GD. Rehabilitation management of

children with spastic diplegic cerebral palsy. Arch

Phys Med Rehabil 1989 Jun;70(6):482-9.

Brown JK. Too few cooks: too many cooks

[editorial]. Dev Med Child Neurol 1992 Jul;34(7):

565-6.

Butler PB, Thompson N, Major RE. Improvement in

walking performance of children with cerebral

palsy: preliminary results. Dev Med Child Neurol

1992 Jul;34(7):567-76.

Cahan LD, Adams JM, Perry J, Beeler LM.

Instrumented gait analysis after selective dorsal

rhizotomy. Dev Med Child Neurol 1990 Dec;

32(12):1037-43.

Clarke AM, Redden JF. Management of hip posture

in cerebral palsy. J R Soc Med 1992 Mar;85(3):

150-1.

Goodman G, Bazyk S. The effects of a short thumb

opponens splint on hand function in cerebral palsy:

a single-subject study. Am J Occup Ther 1991

Aug;45(8):726-31.

Greiner BM, Czerniecki JM, Deitz JC. Gait

parameters of children with spastic diplegia: a

comparison of posterior and anterior walkers. Arch

Phys Med Rehabil 1993 Apr;74(4):381-5.

Hanson CJ, Jones LJ. Gait abnormalities and

inhibitive casts in cerebral palsy. Literature review.

J Am Podiatr Med Assoc 1989 Feb;79(2):53-9.

Harryman SE. Lower-extremity surgery for children

with cerebral palsy: physical therapy management.

Phys Ther 1992 Jan;72(1):16-24.

Herman L, Herman B. Elena and her technology.

Except Parent 1989 Oct;19(7):35-6.

Hopkins BP. The development of a symmetrical hip

orthosis. Physiother 1992 Jun;78(6):428-32.

Inglis S, Gibbett K. Custom designed stroller inserts

for young children with cerebral palsy. Aust Occup

Ther J 1991;38(3):147-53.

Knutson LM, Clark DE. Orthotic devices for

ambulation in children with cerebral palsy and

myelomeningocele. Phys Ther 1991 Dec;71(12):

947-60.

Leonard CT, Hirschfeld H, Forssberg H. The

development of independent walking in children

with cerebral palsy. Dev Med Child Neurol 1991

Jul;33(7):567-77.

Levangie PK, Guihan MF, Meyer P, Stuhr K. Effect

of altering handle position of a rolling walker on

gait in children with cerebral palsy. Phys Ther

1989 Feb;69(2):130-4.

Logan L, Byers-Hinkley K, Ciccone CD. Anterior

versus posterior walkers: a gait analysis study. Dev

Med Child Neurol 1990 Dec;32(12):1044-8.

Lough LK. The effects of fixed and hinged ankle foot

orthoses on gait myoelectric activity and standing

joint alignment in children with cerebral palsy

[dissertation]. Iowa City (IA): University of Iowa;

1990. 223 p.

Mann DC, Hoffer MM. Flat foot in spastic cerebral

palsy. Semin Orthop 1989;4(4):277-88.

Marcinko DE, Azzolini TJ, Mariash SA. Enigma of

pediatric vertical talus deformity. J Foot Surg 1990

Sep-Oct;29(5):452-8.

Molnar GE. Rehabilitation in cerebral palsy. West J

Med 1991 May;154(5):569-72.

Mossberg KA, Linton KA, Friske K. Ankle-foot

orthoses: effect on energy expenditure of gait in

spastic diplegic children. Arch Phys Med Rehabil

1990 Jun;71(7):490-4.

Myhr U, von Wendt L. Improvement of functional

sitting position for children with cerebral palsy [see

comments]. Dev Med Child Neurol 1991 Mar;

33(3):246-56.

Nwaobi OM, Sussman MD. Electromyographic and

force patterns of cerebral palsy patients with

windblown hip deformity. J Pediatr Orthop 1990

May-Jun;10(3):382-8.

O’Connell DG, Barnhart R, Parks L. Muscular

endurance and wheelchair propulsion in children

with cerebral palsy or myelomeningocele. Arch

Phys Med Rehabil 1992 Aug;73(8):709-11.

Okawa A, Kajiura I, Hiroshima K. Physical

therapeutic and surgical management in spastic

diplegia. A Japanese experience. Clin Orthop 1990

Apr;(253):38-44.

Phillips WE, Audet M. Use of serial casting in the

management of knee joint contractures in an

adolescent with cerebral palsy. Phys Ther 1990

Aug;70(8):521-3.

Radwin RG, Vanderheiden GC, Lin ML. A method

for evaluating head-controlled computer input

devices using Fitts’ law. Hum Factors 1990 Aug;

32(4):423-38.

Reid DT, Sochaniwskyj A. Influences of a hand

positioning device on upper-extremity control of

children with cerebral palsy. Int J Rehabil Res

1992;15(1):15-29.

Rose SA, Ounpuu S, DeLuca PA. Strategies for the

assessment of pediatric gait in the clinical setting.

Phys Ther 1991 Dec;71(12):961-80.

Schaars AH, Hendriksen H, Toornend JL, Zilvold G.

Orthotic management of the lower extremity in

cerebral palsy. Lower extremity orthoses in cerebral

palsy. J Rehabil Sci 1990 Dec;3(4):113-7.

Stewart H, Noble G, Seeger BR. Isometric joystick: a

study of control by adolescents and young adults

with cerebral palsy. Aust Occup Ther J 1992 Mar;

39(1):33-9.

Stezala D. Application of computer method in

motorial stimulation of children with cerebral palsy.

Biomed Tech (Berlin) 1990;35 Suppl 2:84-5.

Sussman M. Orthopaedic treatment of spastic diplegia:

role of early postoperative mobilization. Audio Dig

Orthop [audiocassette] 1989 Feb;12(2):Sides A & B

[presentation 1, 40 min.]. Accompanied by: 1

guide.

Thompson-Rangel T, Smith S, Griner D. Customized

walker adaptions for a child with cerebral palsy.

J Assoc Child Prosthet Orthot Clin 1992 Winter;

27(3):97-103.

Weber D. Use of the Hinged AFO for children with

spastic cerebral palsy and midfoot instability.

J Assoc Child Prosthet Orthot Clin 1991

Spring-1990 Winter;25(3-4):61-5.

Wheelchair propulsion by class II athletes with cerebral

palsy: a quantitative look. Palaestra 1991 Spring;

7(3):12.

Congenital Hip & Knee Disorders

Atar D, Lehman WB, Grant AD. Pavlik harness

pathology. Isr J Med Sci 1991 Jun;27(6):325-30.

Atar D, Lehman WB, Tenenbaum Y, Grant AD. Pavlik

harness versus Frejka splint in the treatment of

developmental dysplasia of the hip: bicenter study.

J Pediatr Orthop 1993 May-Jun;13(3):311-3.

Bensahel H, Dal Monte A, Hjelmstedt A, Bjerkreim I,

Wientroub S, Matasovic T, Porat S, Bialik V.

Congenital dislocation of the knee. J Pediatr

Orthop 1989 Mar-Apr;9(2):174-7.

Bernau A. [The T:ubingen hip flexion splint in the

treatment of hip dysplasia]. Z Orthop 1990 Jul-

Aug;128(4):432-5. (Ger).

Bull MJ, Stroup KB, Feller N. Information needs of

parents of a child in a Pavlik harness [letter].

Orthop Nurs 1988 Sep-Oct;7(5):12.

Chevalier J, Cordonnier D, Vinchon B, Bayart M.

[First-choice orthopedic treatment in congenital hip

dislocations discovered after walking age]. Acta

Orthop Belg 1990;56(1 Pt B):217-27. (Fre).

Corbett D. Information needs of parents of a child in

a Pavlik harness. Orthop Nurs 1988 Mar-Apr;7(2):

20-3.

Curry LC, Gibson LY. Congenital hip dislocation: the

importance of early detection and comprehensive

treatment. Nurse Pract 1992 May;17(5):49-55.

Dunn PM. Complications of splintage in congenital

dislocation of the hip [letter]. Arch Dis Child 1992

Apr;67(4):568.

el Andaloussi M, Harouchi A, Refass A, Lazrak F,

Bennani S. [Neonatal treatment of congenital hip

dislocation using an abduction pillow]. Acta

Orthop Belg 1990;56(1 Pt A):149-54. (Fre).

Fernandez-Palazzi F, Silva JR. Congenital dislocation

of the knee. Int Orthop 1990;14(1):17-9.

Fettweis E. Treatment of congenital dislocation of the

hip in a squatting position, Fettweis method. Acta

Orthop Belg 1990;56(1 Pt A):155-65.

Gardiner HM, Duncan AW. Radiological assessment

of the effects of splinting on early hip development:

results from a randomised controlled trial of

abduction splinting vs sonographic surveillance.

Pediatr Radiol 1992;22(3):159-62.

Gardiner HM, Dunn PM. Controlled trial of

immediate splinting versus ultrasonographic

surveillance in congenitally dislocatable hips.

Lancet 1990 Dec 22-29;336(8730):1553-6.

Glover SD, Benson MK. Iliotibial band contracture

after using the Pavlik harness. J Bone Joint Surg

[Br] 1989 May;71(3):535.

Harris IE, Dickens R, Menelaus MB. Use of the

Pavlik harness for hip displacements. When to

abandon treatment. Clin Orthop 1992 Aug;(281):

29-33.

Herring JA. Conservative treatment of congenital

dislocation of the hip in the newborn and infant.

Clin Orthop 1992 Aug;(281):41-7.

Hinderaker T, Rygh M, Uden A. The von Rosen

splint compared with the Frejka pillow. A study of

408 neonatally unstable hips. Acta Orthop Scand

1992 Aug;63(4):389-92.

Home Study Program. Congenital dysplasia of the hip.

AORN J 1989 Jun;49(6):1563-612.

Jani L. [Conservative treatment of hip dysplasia/hip

dislocation in infancy]. Z Orthop 1990 Jul-Aug;

128(4):361-4. (Ger).

Jones GT, Schoenecker PL, Dias LS. Developmental

hip dysplasia potentiated by inappropriate use of the

Pavlik harness. J Pediatr Orthop 1992 Nov-Dec;

12(6):722-6.

Kramer J, Schleberger R, Steffen R. Closed reduction

by two-phase skin traction and functional splinting

in mitigated abduction for treatment of congenital

dislocation of the hip. Clin Orthop 1990 Sep;(258):

27-32.

Kuliev AM, Kuliev RA. [A splint for the treatment of

congenital hip dislocation]. Ortop Travmatol Protez

1990 May;(5):50-1. (Rus).

Langkamer VG, Clarke NM, Witherow P.

Complications of splintage in congenital dislocation

of the hip. Arch Dis Child 1991 Nov;66(11):

1322-5.

Ley CC, Villar RN, Ronen A. Splinting for CDH:

temporary splinting for the neonate. Prosthet

Orthot Int 1990 Aug;14(2):85-6.

Lotem M. Use of the Pavlik harness in congenital

dislocation of the hip [letter. J Bone Joint Surg

[Am] 1991 Mar;73(3):472.

McHale KA, Corbett D. Parental noncompliance with

Pavlik harness treatment of infantile hip problems.

J Pediatr Orthop 1989 Nov-Dec;9(6):649-52.

Mitani S, Oda K, Tanabe G. Prediction for prognosis

from radiologic measurements of patients treated

with the Pavlik harness for congenital dislocation of

the hip. J Pediatr Orthop 1993 May-Jun;13(3):

303-10.

Naumann T, Zahniel K. Comparing the rate of

femoral head necrosis of two different treatments of

congenital dislocation of the hip. J Pediatr Orthop

1990 Nov-Dec;10(6):780-5.

Otto KB, Baars GW, Nieder E. [Alloarthroplastic

treatment of congenital hip dysplasia]. Orthopade

1989 Nov;18(6):470-82. (Ger).

Pavlik A. The functional method of treatment using a

harness with stirrups as the primary method of

conservative therapy for infants with congenital

dislocation of the hip. 1957 [classical article]. Clin

Orthop 1992 Aug;(281):4-10.

Pavlik A. Stirrups as an aid in the treatment of

congenital dysplasias of the hip in children. By

Arnold Pavlik, 1950 [classical article]. J Pediatr

Orthop 1989 Mar-Apr;9(2):157-9.

Polanuer PA, Harcke HT, Bowen JR. Effective use of

ultrasound in the management of congenital

dislocation and/or dysplasia of the hip. Clin Orthop

1990 Mar;(252):176-81.

Rombouts JJ, Kaelin A. Inferior (obturator)

dislocation of the hip in neonates. A complication

of treatment by the Pavlik harness. J Bone Joint

Surg [Br] 1992 Sep;74(5):708-10.

Schaming D, Gorry M, Soroka K, Catullo ME. When

babies are born with orthopedic problems. RN

1990 Apr;53(4):62-7.

Schneider E, Niethard FU, Lukoschek M. [Congenital

hip dysplasia]. Dtsch Krankenpflegez 1990 Nov;

43(11):812-6. (Ger).

Shoppee K. Developmental dysplasia of the hip.

Orthop Nurs 1992 Sep-Oct;11(5):30-6.

Speers AT, Speers M. Care of the infant in a Pavlik

harness. Pediatr Nurs 1992 May-Jun;18(3):229-32,

252.

Staheli LT. Management of congenital hip dysplasia.

Pediatr Ann 1989 Jan;18(1):24, 26-7, 29-32.

Staheli LT. Managing hip dysplasia. Audio Dig Orthop

[audiocassette] 1990 Nov;13(11):Side A

[presentation 1, 17 min.]. Accompanied by: 1

guide.

Steffen R, Schleberger R, Fett H. [Ultrasound control

of the repositioning of hip dislocation in a child in

the unstable phase of splint retention (Hanausek

position)]. Z Orthop 1990 Jan-Feb;128(1):83-9.

(Ger).

Stromqvist B, Sunden G. CDH diagnosed at 2 to 12

months of age--treatment and results. J Pediatr

Orthop 1989 Mar-Apr;9(2):208-12.

Suzuki S. Ultrasound and the Pavlik harness in CDH.

J Bone Jt Surg Br 1993 May;75(3):483-7.

Suzuki S, Yamamuro T. Avascular necrosis in

patients treated with the Pavlik harness for

congenital dislocation of the hip. J Bone Jt Surg

(Am) 1990 Jul;72(7):1048-55.

Teloken M. Current concepts review. Reduction of

congenital dislocation of the hip [letter]. J Bone

Joint Surg [Am] 1992 Dec;74(10):1579.

Theodorou SD. Conservative treatment of congenital

dislocation of the hip in infants 1 to 9 months of

age. Acta Orthop Belg 1990;56(1 Pt A):167-75.

Theodorou SD, Gerostathopoulos N. Congenital

dislocation of the hip. Observations on the early

diagnosis and results of treatment with an abduction

brace in infants two to nine months of age in

Greece. Clin Orthop 1989 Sep;(246):22-9.

Thom H. [Prevention of hip dislocation in children

with spastic paralysis by using a specific

therapeutic wheelchair]. Rehabilitation (Stuttg)

1991 Aug;30(3):109-15. (Ger).

Tonnis D. Ischemic necrosis as a complication of

treatment of C.D.H. Acta Orthop Belg 1990;

56(1 Pt A):195-206.

Touzet P, Chaumien JP, Rigault P, Padovani JP.

[Pavlik’s harness in congenital hip dislocation

before the first birthday]. Acta Orthop Belg

1990;56(1 Pt A):141-7. (Fre).

Tredwell SJ, Davis LA. Prospective study of

congenital dislocation of the hip. J Pediatr Orthop

1989 Jul-Aug;9(4):386-90.

Tucci JJ, Kumar SJ, Guille JT, Rubbo ER. Late

acetabular dysplasia following early successful

Pavlik harness treatment of congenital dislocation

of the hip. J Pediatr Orthop 1991 Jul-Aug;11(4):

502-5.

Vaucher D, Dutoit M, Anderegg A. [Early diagnosis

and ambulatory treatment of congenital dislocation

of the hip]. Rev Med Suisse Romande 1990 Mar;

110(3):265-70. (Fre).

Viere RG, Birch JG, Herring JA, Roach JW, Johnston

CE. Use of the Pavlik harness in congenital

dislocation of the hip. An analysis of failures of

treatment. J Bone Jt Surg (Am) 1990 Feb;72(2):

238-34.

Osteogenesis Imperfecta

Bender LH. Part 2. Osteogenesis imperfecta. Orthop

Nurs 1991 Jul-Aug;10(4):23-32.

Binder H, Conway A, Gerber LH. Rehabilitation

approaches to children with osteogenesis

imperfecta: a ten-year experience. Arch Phys Med

Rehabil 1993 Apr;74(4):386-90.

Gerber LH, Binder H, Weintrob J, Grange DK, Shapiro

J, Fromherz W, Berry R, Conway A, Nason S,

Marini J. Rehabilitation of children and infants

with osteogenesis imperfecta. A program for

ambulation. Clin Orthop 1990 Feb;(251):254-62.

Rao S, Patel A, Schildhauer T. Osteogenesis

imperfecta as a differential diagnosis of pathologic

burst fractures of the spine. A case report. Clin

Orthop 1993 Apr;(289):113-7.

Slongo T, Kehrer B, Braga S, Rudeberg A.

[Experiences with the early treatment of

osteogenesis imperfecta]. Z Kinderchir 1989 Oct;

44(5):293-6. (Ger).

Legg-Calv�-Perthes Disease

Dostal M, Hradil J, Mihal V, Andresova S. [A

distraction abduction apparatus for treatment of

Calv�-Legg-Perthes disease]. Acta Chir Orthop

Traumatol Cech 1989 Dec;56(6):516-21. (Cze).

Dunst RM. Legg-Calv�-Perthes disease. Orthop Nurs

1990 Mar-Apr;9(2):18-27.

Fackler CD. Nonsurgical treatment of Legg-Calv�-

Perthes disease. Instr Course Lect 1989;38:305-8.

Herring JA, Williams JJ, Neustadt JN, Early JS.

Evolution of femoral head deformity during the

healing phase of Legg-Calv�-Perthes disease.

J Pediatr Orthop 1993 Jan-Feb;13(1):41-5.

Martinez AG, Weinstein SL, Dietz FR. The weight-

bearing abduction brace for the treatment of Legg-

Perthes disease. J Bone Joint Surg [Am] 1992 Jan;

74(1):12-21.

Meehan PL, Angel D, Nelson JM. The Scottish Rite

abduction orthosis for the treatment of Legg-Perthes

disease. A radiographic analysis. J Bone Joint Surg

[Am] 1992 Jan;74(1):2-12.

Mukherjee A, Fabry G. Evaluation of the prognostic

indices in Legg-Calv�-Perthes disease: statistical

analysis of 116 hips. J Pediatr Orthop 1990

Mar-Apr;10(2):153-8.

Rejholec M, Vosatka J, Sadil K. [Conservative

containment in the treatment of Legg-Calv�-Perthes

disease]. Acta Chir Orthop Traumatol Cech 1990

Apr;57(2):178-84. (Cze).

Savvidis E, Loer F. [A treatment principle with

questionable effectiveness in Perthes disease].

Z Orthop Ihre Grenzgeb 1992 Mar-Apr;130(2):

120-4. (Ger).

Stearns ZR, Lacassie Y, MacEwen GD. Perthes-like

disease and the tricho-rhino-phalangeal syndromes:

the first black patient. Orthopedics 1990 Apr;

13(4):468-73.

Stein V, Horner K. [The abduction orthosis, a

therapeutic variant in Perthes’ disease]. Beitr

Orthop Traumatol 1990 Apr;37(4):242-5. (Ger).

Tamura K. [Selection of containment treatment for

Legg-Calv�-Perthes disease]. Nippon Seikeigeka

Gakkai Zasshi 1991 Nov;65(11):1152-61. (Jpn).

Yrjonen T. Prognosis in Perthes disease after

noncontainment treatment. 106 hips followed for

28-47 years. Acta Orthop Scand 1992 Oct;63(5):

523-6.

Clubfoot, Flatfoot, & Other Foot

Disorders

Alexander IJ, Campbell KR. Dynamic assessment of

foot mechanics as an adjunct to orthotic

prescription. In: Donatelli R, Wolf SL, eds.

Biomechanics of the foot and ankle. Philadelphia:

F.A. Davis; 1990. p. 148-52. (Contemporary

perspectives in rehabilitation; vol. 3).

Anthony RJ. The manufacture and use of the functional

foot orthosis. Basel; New York: Karger; 1991.

219 p.

Arzhannikova EE, Shikhmagomedov AA. [Providing

orthotic devices to children with diseases of the

ankle joint]. Ortop Travmatol Protez 1990 Feb;(2):

55-6. (Rus).

Beaty JH, Canale ST. Orthopaedic aspects of

myelomeningocele. J Bone Joint Surg [Am] 1990

Apr;72(4):626-30.

Bensahel H, Guillaume A, Czukonyi Z, Desgrippes Y.

Results of physical therapy for idiopathic clubfoot:

a long-term follow-up study. J Pediatr Orthop 1990

Mar-Apr;10(2):189-92.

Bergmann JN. History and mechanical control of heel

spur pain. Clin Podiatr Med Surg 1990 Apr;7(2):

243-59.

Birke JA, Novick A, Graham SL, Coleman WC,

Brasseaux DM. Methods of treating plantar ulcers.

Phys Ther 1991 Feb;71(2):116-22.

Blake RL, Ferguson H. Extrinsic rearfoot posts.

J Am Podiatr Med Assoc 1992 Apr;82(4):202-7.

Blake RL, Ferguson H. Foot orthosis for the severe

flatfoot in sports. J Am Podiatr Med Assoc 1991

Oct;81(10):549-55.

Blanco JS, Herring JA. Congenital Chopart

amputation. A functional assessment. Clin Orthop

1990 Jul;(256):14-21.

Blauth W, Hippe P. The surgical treatment of partial

tibial deficiency and ankle diastasis. Prosthet

Orthot Int 1991 Aug;15(2):127-30.

Bowker JH. Medical and surgical considerations in

the care of patients with insensate dyvascular feet.

J Prosthet Orthot 1991 Fall;4(1):23-30.

Brantingham JW, Snyder WR, Michaud T. Morton’s

neuroma. J Manip Physiol Ther 1991;14(5):

317-22.

Budiman-Mak E, Conrad KJ, Roach KE. The Foot

Function Index: a measure of foot pain and

disability. J Clin Epidemiol 1991;44(6):561-70.

Caselli MA, Cohen-Sobel E, Thompson J, Adler J,

Gonzalez L. Biomechanical management of

children and adolescents with Down syndrome.

J Am Podiatr Med Assoc 1991 Mar;81(3):119-27.

Chantelau E, Kushner T, Spraul M. How effective is

cushioned therapeutic footwear in protecting

diabetic feet? A clinical study. Diabetic Med 1990

May;7(4):355-9.

Chu T. Three-dimensional finite element stress

analysis of a polymeric orthotic device:

biomechanics of the ankle-foot orthosis

[dissertation]. Akron (OH): University of Akron;

1992. 258 p.

Cohen J, Cowell HR. Corrective shoes [editorial].

J Bone Joint Surg [Am] 1989 Jul;71(6):799.

Cornwall MW, McPoil TG. Effect of rearfoot posts in

reducing forefoot forces. A single-subject design.

J Am Podiatr Med Assoc 1992 Jul;82(7):371-4.

Corrective Shoes and Inserts as Treatment for Flexible

Flatfoot in Infants and Children [letter]. J Bone

Joint Surg [Am] 1989 Jul;71(6):953-4.

Corrective shoes and inserts as treatment for flexible

flatfoot in infants and children [letter]. J Bone

Joint Surg [Am] 1990 Mar;72(3):470-3.

Davidson MR, Copoloff JA. Neuromas of the heel.

Clin Podiatr Med Surg 1990 Apr;7(2):271-88.

Donatelli R, Wooden M. Biomechanical orthotics. In:

Donatelli R, Wolf SL, eds. Biomechanics of the

foot and ankle. Philadelphia: F.A. Davis; 1990.

p. 193-216. (Comprehensive perspectives in

rehabilitation; vol. 3).

Donatto KC, Rightor N, D’Ambrosia R. Custom-

molded orthotics in postoperative hallux valgus

immobilization. Orthopedics 1992 Apr;15(4):

449-51.

Eng JJ, Pierrynowski MR. Evaluation of soft foot

orthotics in the treatment of patellofemoral pain

syndrome. Phys Ther 1993 Feb;73(2):62-8;

discussion 68-70.

Exner GU. [Current aspects of treatment for clubfoot

in infants and young children]. Schweiz Rundsch

Med Prax 1990 Nov 20;79(47):1452-6. (Ger).

Ferguson H, Raskowsky M, Blake RL, Denton JA.

TL-61 versus Rohadur orthoses in heel spur

syndrome. J Am Podiatr Med Assoc 1991 Aug;

81(8):439-42.

Flat feet in children [letter]. BMJ 1990 Dec 8;

301(6764):1330-1.

Gaynor R, Hake D, Spinner SM, Tomczak RL. A

comparative analysis of conservative versus surgical

treatment of Morton’s neuroma. J Am Podiatr Med

Assoc 1989 Jan;79(1):27-30.

Grant AD, Atar D, Lehman WB. Ilizarov technique in

correction of foot deformities: a preliminary report.

Foot Ankle 1990 Aug;11(1):1-5.

Hicks JE, Leonard JA Jr, Nelson VS, Fisher SV,

Esquenazi A. Prosthetics, orthotics, and assistive

devices. 4. Orthotic management of selected

disorders. Arch Phys Med Rehabil 1989 May;

70(5-S):S210-7.

Holmes GB Jr, Timmerman L. A quantitative

assessment of the effect of metatarsal pads on

plantar pressures. Foot Ankle 1990 Dec;11(3):

141-5.

Ikeda K. Conservative treatment of idiopathic

clubfoot. J Pediatr Orthop 1992 Mar-Apr;12(2):

217-23.

Jaivin JS, Bishop JO, Braly WG, Tullos HS.

Management of acquired adult dropfoot. Foot

Ankle 1992 Feb;13(2):98-104.

Jay RM, Schoenhaus HD. Hyperpronation control

with a dynamic stabilizing innersole system. J Am

Podiatr Med Assoc 1992 Mar;82(3):149-53.

Jones DC. Foot orthoses. Instr Course Lect 1993;42:

219-24.

Keessen W, van der Eijken JW, Diepstraten AF. [The

treatment of congenital clubfoot in The

Netherlands; results of a survey among orthopedic

surgeons]. Ned Tijdschr Geneeskd 1992 Aug

29;136(35):1710-2. (Dut).

Kudriavtsev VA, Kiselev AL, Kozlov DI, Kaluzhskaia

MO, Matveeva EG. [Orthopedic devices for

footwear in flatness of the anterior part of the foot].

Ortop Travmatol Protez 1991 Sep;(9):28-31. (Rus).

Kudriavtsev VA, Rozhkov AV, Ogorodnikov VI.

[Insertable orthopedic devices in the treatment of

flatness of the anterior section of the foot and

valgus deviation of the great toe]. Ortop Travmatol

Protez 1990 Sep;(9):9-11. (Rus).

Larsen K, Holstein P, Deckert T. Limb salvage in

diabetics with foot ulcers. Prosthet Orthot Int 1989

Aug;13(2):100-3.

Lehmann JF, de Lateur BJ. Lower extremity orthotics.

In: Kottke FJ, Lehman JF. Krusen’s handbook of

physical medicine and rehabilitation. 4th ed.

Philadelphia: Saunders; 1990. p. 602-46.

Levitz SJ, Dykyj D. Improvements in the design of

viscoelastic heel orthoses. A clinical study. J Am

Podiatr Med Assoc 1990 Dec;80(12):653-6.

Lieberson S, Mendes DG. Congenital hallux valgus.

Orthopedics 1991 May;14(5):588-94.

Lofvenberg R, Karrholm J. The influence of an ankle

orthosis on the talar and calcaneal motions in

chronic lateral instability of the ankle. A

stereophotogrammetric analysis. Am J Sports Med

1993 Mar-Apr;21(2):224-30.

Lord M, Foulston J. Clinical trial of a computer-aided

system for orthopaedic shoe upper design. Prosthet

Orthot Int 1991 Apr;15(1):11-7.

Mann DC, Hoffer MM. Flat foot in spastic cerebral

palsy. Semin Orthop 1989;4(4):277-88.

Marcinko DE, Azzolini TJ, Mariash SA. Enigma of

pediatric vertical talus deformity. J Foot Surg 1990

Sep-Oct;29(5):452-8.

McPoil TG Jr, Adrian M, Pidcoe P. Effects of foot

orthoses on center-of-pressure patterns in women.

Phys Ther 1989 Feb;69(2):149-54.

Michaud TC. Foot orthoses and other forms of

conservative foot care. Baltimore : Williams &

Wilkins; 1993.

Mills JA, Menelaus MB. Hallux varus. J Bone Joint

Surg [Br] 1989 May;71(3):437-40.

Novick A, Birke JA, Hoard AS, Brasseauz DM,

Broussard JB, Hawkins ES. Rigid orthoses for the

insensitive foot: the rigid-relief orthosis. J Prosthet

Orthot 1991 Fall;4(1):31-40.

Novick A, Kelley DL. Position and movement

changes of the foot with orthotic intervention

during the loading response of gait. J Orthop

Sports Phys Ther 1990;11(7):301-12.

Novick A, Stone J, Birke JA, Brasseaux, Broussard JB,

Hoard AS, Hawkins ES. Reduction of plantar

pressure with the rigid relief orthosis. J Am

Podiatr Med Assoc 1993 Mar;83(3):115-22.

Ohsawa S, Ikeda S, Tanaka S, Takahashi T, Takeuchi

T, Utsunomiya M, Ueno R, Ohkura M, Ito Y,

Katagi Y, et al. A new model of plastic ankle foot

orthosis (FAFO (II)) against spastic foot and genu

recurvatum. Prosthet Orthot Int 1992 Aug;16(2):

104-8.

Pal’gov KA, Idrisova RS. [Functional treatment of

congenital clubfoot in infants]. Ortop Travmatol

Protez 1990 Nov;(11):57-8. (Rus).

Philps JW. The functional foot orthosis. Edinburgh:

Churchill Livingstone; 1990. 180 p.

Reinherz RP. Varus-rotated fifth digits are frequently

observed during podopediatric examination

[editorial]. J Foot Surg 1991 Sep-Oct;30(5):

429-30.

Ruttimann B. [Orthopedic technical and surgical

measures in the diabetic foot]. Ther Umsch 1990

Jan;47(1):63-70. (Ger).

Sanner WH. The functional foot orthosis prescription.

In: Jay RM, ed. Current therapy in podiatric

surgery. Philadelphia: Decker; 1989. p. 302-14.

Schaars AH, Postema K. Conservative treatment of

foot deformities in Duchenne Muscular Dystrophy.

J Rehabil Sci 1990 Jun;3(2):49-52.

Schaming D, Gorry M, Soroka K, Catullo ME. When

babies are born with orthopedic problems. RN

1990 Apr;53(4):62-7.

Schepsis AA, Leach RE, Gorzyca J. Plantar fasciitis.

Etiology, treatment, surgical results, and review of

the literature. Clin Orthop 1991 May;(266):185-96.

Staheli LT. Lower positional deformity in infants and

children: a review. J Pediatr Orthop 1990 Jul-Aug;

10(4):559-63.

Staheli LT. Shoes for children: a review. Pediatrics

1991 Aug;88(2):371-5.

Stephens MM. Congenital talipes equinovarus

[editorial]. Ir Med J 1990 Jun;83(2):48-9.

Stromqvist B, Johnsson R, Jonsson K, Sunden G.

Early intensive treatment of clubfoot. 75 feet

followed for 6-11 years. Acta Orthop Scand 1992

Apr;63(2):183-8.

Subotnick SI, Block AJ. Retrocalcaneal problems.

Clin Podiatr Med Surg 1990 Apr;7(2):323-32.

Tax HR. Conservative treatment of flatfoot in the

newborn. Clin Podiatr Med Surg 1989 Jul;6(3):

521-36.

Taylor TL. Idiopathic flexible flatfoot in the

adolescent. Clin Podiatr Med Surg 1989 Jul;6(3):

537-53.

Ullman BC, Brncic M. Orthotic and pedorthotic

management of the diabetic foot. In: Sammarco GJ,

ed. The foot in diabetes. Malvern (PA): Lea &

Febiger; 1991. p. 207-24.

Viladot A. Surgical treatment of the child’s flatfoot.

Clin Orthop 1992 Oct;(283):34-8.

Vitek M, Kerkoc P. [Treatment of positional

anomalies of the foot with a functional supportive

inlay]. Z Orthop 1989 Jan-Feb;127(1):15-21. (Ger).

Vosatka J, Vrbicky B. [Technical orthopedic care of

the diseased and deformed foot]. Acta Chir Orthop

Traumatol Cech 1989 Jul;56(4):365-73. (Cze).

Wapner KL, Sharkey PF. The use of night splints for

treatment of recalcitrant plantar fasciitis. Foot

Ankle 1991 Dec;12(3):135-7.

Wenger DR, Mauldin D, Speck G, Morgan D, Lieber

RL. Corrective shoes and inserts as treatment for

flexible flatfoot in infants and children. J Bone

Joint Surg [Am] 1989 Jul;71(6):800-10.

White FJ. Orthotics. In: Drennan JC, ed. Child’s foot

and ankle. New York: Raven Press; 1992.

p. 71-96.

Wientroub S, Khermosh O. A new orthosis for the

management of clubfoot and other foot and leg

deformities in infancy and early childhood.

J Pediatr Orthop 1991 Jul-Aug;11(4):485-7.

Wooden MJ. Biomechanical evaluation for functional

orthotics. In: Donatelli R, Wolf SL, eds.

Biomechanics of the foot and ankle. Philadelphia:

F.A. Davis; 1990. p. 131-47. (Contemprary

perspectives in rehabilitation; vol. 3).

Wu KK. Foot orthoses: principles and clinical

applications. Baltimore: Williams & Wilkins; 1990.

379 p.

Wu UC, Press J. Prosthetics and rehabilitation in the

diabetic amputee. In: Sammarco GJ, ed. The foot in

diabetes. Malvern (PA): Lea & Febiger; 1991.

p. 194-206.

Yale JF. The conservative treatment of adult flexible

flatfoot. Clin Podiatr Med Surg 1989 Jul;6(3):

555-60.

Yamamoto H, Furuya K. Treatment of congenital club

foot with a modified Denis Browne splint. J Bone

Joint Surg [Br] 1990 May;72(3):460-3.

Yamamoto H, Okumura S, Morita S, Obata K, Furuya

K. Surgical correction of foot deformities after

stroke. Clin Orthop 1992 Sep;(282):213-8.

Rett Syndrome

Aron M. The use and effectiveness of elbow splints in

the Rett syndrome. Brain Dev 1990;12(1):162-3.

Kubas ES. Use of splints to develop hand skills in a

woman with Rett syndrome. Am J Occup Ther

1992 Apr;46(4):364-8.

Sharpe PA. Comparative effects of bilateral hand

splints and an elbow orthosis on stereotypic hand

movements and toy play in two children with Rett

syndrome. Am J Occup Ther 1992 Feb;46(2):

134-40.

Sharpe PA, Ottenbacher KJ. Use of an elbow restraint

to improve finger-feeding skills in a child with Rett

syndrome]. Am J Occup Ther 1990 Apr;44(4):

328-32.

Tuten H, Miedaner J. Effect of hand splints on

stereotypic hand behavior of girls with Rett

syndrome: a replication study. Phys Ther 1989

Dec;69(12):1099-103.

Wenberg SJ. The term restraints is archaic [letter].

Am J Occup Ther 1991 Jan;45(1):86.

Diabetes

Birke JA, Novick A, Graham SL, Coleman WC,

Brasseaux DM. Methods of treating plantar ulcers.

Phys Ther 1991 Feb;71(2):116-22.

Black JR. Management of diabetic plantar ulcers with

a walking brace. A clinical trial. J Am Podiatr

Med Assoc 1990 Mar;80(3):156-7.

Bowker JH. Medical and surgical considerations in

the care of patients with insensate dyvascular feet.

J Prosthet Orthot 1991 Fall;4(1):23-30.

Chantelau E, Kushner T, Spraul M. How effective is

cushioned therapeutic footwear in protecting

diabetic feet? A clinical study. Diabetic Med 1990

May;7(4):355-9.

De Luccia N, Pinto MA, Guedes JP, Albers MT.

Rehabilitation after amputation for vascular disease:

a follow-up study. Prosthet Orthot Int 1992 Aug;

16(2):124-8.

Larsen K, Holstein P, Deckert T. Limb salvage in

diabetics with foot ulcers. Prosthet Orthot Int 1989

Aug;13(2):100-3.

Miault D, Brun JP, Duupre JC, Pill M, Miault P,

Deschamps E, Priollet P, Laurian C, Fichelle JM,

Cormier JM, [Foot equipment of diabetic

arteriopathy]. J Mal Vasc 1993;18(1):42-6. (Fre).

Michael JW, Isbell MA, Harrelson JM. Orthotic-

management of diabetic neuropathic arthropathy.

J Prosthet Orthot 1991 Fall;4(1):45-55.

Nawoczenski DA, Birke JA, Graham SL, Koziatek E.

The neuropathic foot--a management scheme: a

case report. Phys Ther 1989 Apr;69(4):287-91.

Novick A, Birke JA, Hoard AS, Brasseauz DM,

Broussard JB, Hawkins ES. Rigid orthoses for the

insensitive foot: the rigid-relief orthosis. J Prosthet

Orthot 1991 Fall;4(1):31-40.

Ruttimann B. [Orthopedic technical and surgical

measures in the diabetic foot]. Ther Umsch 1990

Jan;47(1):63-70. (Ger).

Ullman BC, Brncic M. Orthotic and pedorthotic

management of the diabetic foot. In: Sammarco GJ,

ed. The foot in diabetes. Malvern (PA): Lea &

Febiger; 1991. p. 207-24.

Wu UC, Press J. Prosthetics and rehabilitation in the

diabetic amputee. In: Sammarco GJ, ed. The foot in

diabetes. Malvern (PA): Lea & Febiger; 1991.

p. 194-206.

Zhu H. In-shoe plantar pressure distribution under

sensate and insensate feet [dissertation]. Milwaukee

(WI): Marquette University; 1991. 103 p.

Leprosy

Antia NH. Plastic footwear for leprosy. Lepr Rev

1990 Mar;61(1):73-8.

Birke JA, Novick A, Graham SL, Coleman WC,

Brasseaux DM. Methods of treating plantar ulcers.

Phys Ther 1991 Feb;71(2):116-22.

Bowker JH. Medical and surgical considerations in

the care of patients with insensate dyvascular feet.

J Prosthet Orthot 1991 Fall;4(1):23-30.

Kulkarni VN, Antia NH, Mehta JM. Newer designs in

foot-wear for leprosy patients. Indian J Lepr 1990

Oct-Dec;62(4):483-7.

Meanley S. Rehabilitation engineering and leprosy in

Nepal: a personal view. J Med Eng Technol 1992

Jul-Aug;16(4):165-9.

Novick A, Birke JA, Hoard AS, Brasseaux DM,

Broussard JB, Hawkins ES. Rigid orthoses for the

insensitive foot: the rigid-relief orthosis. J Prosthet

Orthot 1991 Fall;4(1):31-40.

Shah A, Saluja K. Rehabilitation in Hansen’s disease.

Int Disabil Stud 1991 Oct-Dec;13(4):125-33.

Vulliet F, Tschibangu P. [Treatment and rehabilitation

of disabilities caused by leprosy at a rural hospital

(Kapolowe, Zaire)]. Acta Leprol 1990;7(3):225-8.

(Fre).

Watts HG. Management of common Third World

orthopaedic problems: paralytic poliomyelitis,

tuberculosis of bones and joints, Hansen’s disease

(leprosy), and chronic osteomyelitis. Instr Course

Lect 1992;41:471-8.

Yawalkar S, Shah A, Ganapati R, Yan LB, Zhang GC,

Chen H, Westmacott K, Osterwalder W. Modulan

grip-aids for leprosy patients. Int J Lepr Other

Mycobact Dis 1992 Jun;60(2):250-4.

Burns

Ader PB, Nadel E, Wingate L. A survey of

postoperative elbow immobilization approaches.

J Burn Care Rehabil 1992 May-Jun;13(3):365-70.

A better splint for the burned hand. Emergency Med

1989 Jun 30;21(12):66, 68.

Bhattacharya S, Bhatnagar SK, Chandra R. Postburn

contracture of the neck--our experience with a new

dynamic extension splint. Burns 1991 Feb;17(1):

65-7.

Cheng JC. Dynamic pressure therapy for scars in the

finger web spaces. J Hand Surg [Am] 1991 Jan;

16(1):176-7.

Dobner DL. A prosthetic harness adaptation. Arch

Phys Med Rehabil 1990 May;71(6):436-8.

Fletchall S, Hickerson WL. Early upper-extremity

prosthetic fit in patients with burns. J Burn Care

Rehabil 1991 May-Jun;12(3):234-6.

Fletchall S, Tran T, Ungaro V, Hickerson W.

Updating upper extremity temporary prosthesis:

thermoplastics. J Burn Care Rehabil 1992

Sep-Oct;13(5):584-6.

Harden NG, Luster SH. Rehabilitation considerations

in the care of the acute burn patient. Crit Care

Nurs Clin North Am 1991 Jun;3(2):245-53.

Hicks JE, Leonard JA Jr, Nelson VS, Fisher SV,

Esquenazi A. Prosthetics, orthotics, and assistive

devices. 4. Orthotic management of selected

disorders. Arch Phys Med Rehabil 1989 May;

70(5-S):S210-7.

Howell JW. Management of the acutely burned hand

for the nonspecialized clinician. Phys Ther 1989

Dec;69(12):1077-90.

Kaufman T, Newman RA, Weinberg A, Wexler MR.

The Kerlix tongue-depressor splint for skin-grafted

areas in burned children. J Burn Care Rehabil

1989 Sep-Oct;10(5):462-3.

Kealey GP, Chang P, Laubenthal KN, Jensen KL.

Physical therapy: a vital aspect of burn care. Crit

Rev Phys Rehabil Med 1991;2(4):227-42.

LaStayo P, Flowers K. Correction: torque and the

quantification of joint stiffness [letter]. J Burn Care

Rehabil 1992 Jan-Feb;13(1):118-9.

Leman CJ. Splints and accessories following burn

reconstruction. Clin Plast Surg 1992 Jul;19(3):

721-31.

Luster SH, Patterson PE, Cioffi WG, Mason AD Jr,

McManus WF, Pruitt BA Jr. An evaluation device for quantifying joint stiffness in the burned hand.

J Burn Care Rehabil 1990 Jul-Aug;11(4):312-7.

Nabizadeh SA, Hardee TB, Towler MA, Chen VT,

Edlich RF. Technical considerations in the

selection and performance of walkers. J Burn Care

Rehabil 1993 Mar-Apr;14(2 Pt 1):182-8.

Puddicombe BE, Nardone MA. Rehabilitation of the

burned hand. Hand Clin 1990 May;6(2):281-92.

Roberts L, Alvarado MI, McElroy K, Rutan RL,

Robson MC, Herndon DN. Analysis of materials

for splinting of the thermally injured patient.

J Burn Care Rehabil 1991 May-Jun;12(3):268-9.

Ross BW, Krilov MA. A patellar-tendon-bearing

orthosis used in pediatric burn rehabilitation. Arch

Phys Med Rehabil 1992 Oct;73(10):950-2.

Schnebly WA, Ward RS, Warden GD, Saffle JR. A

nonsplinting approach to the care of the thermally

injured patient. J Burn Care Rehabil 1989

May-Jun;10(3):263-6.

Schwanholt C, Daugherty MB, Gaboury T, Warden

GD. Splinting the pediatric palmar burn. J Burn

Care Rehabil 1992 Jul-Aug;13(4):460-4.

van Straten O. A dynamic mouth splint for the patient

with facial burns. J Burn Care Rehabil 1991

Mar-Apr;12(2):174-6.

van Straten O. An unusual positioning pillow for use

with burns. J Burn Care Rehabil 1991 Mar-Apr;

12(2):170-1.

van-Straten O, Atar D, Ben-Yakar Y. Rehabilitation

of the hand after an explosion injury. Am J Occup

Ther 1991 Oct;45(10):937-40.

van Straten O, Shemesh Y, Rosenberg L. Modern

static splinting for an age-old problem--burns.

J Burn Care Rehabil 1991 Mar-Apr;12(2):172-4.

Ward RS. The rehabilitation of burn patients. Crit

Rev Phys Rehabil Med 1991;2(3):121-38.

Ward RS, Hayes-Lundy C, Schnebly WA, Saffle JR.

Prosthetic use in patients with burns and associated

limb amputations. J Burn Care Rehabil 1990

Jul-Aug;11(4):361-4.

Ward RS, Schnebly WA, Kravitz M, Warden GD,

Saffle JR. Have you tried the sandwich splint? A

method of preventing hand deformities in children.

J Burn Care Rehabil 1989 Jan-Feb;10(1):83-5.

Wright MP, Taddonio TE, Prasad JK, Thomson PD.

The microbiology and cleaning of thermoplastic

splints in burn care. J Burn Care Rehabil 1989

Jan-Feb;10(1):79-83.

Multiple Sclerosis & Other

Neuromuscular Disorders

al-Turaiki MHS. Poliomyelitis and orthotic

management at riyadh medical rehabilitation centre:

a retrospective study. J Prosthet Orthot 1989 Jan;

1(2):76-81.

Aston JW Jr. Post-polio syndrome. An emerging

threat to polio survivors. Postgrad Med 1992 Jul;

92(1):249-56, 260.

Bach JR, Zeelenberg AP, Winter C. Wheelchair-

mounted robot manipulators. Long term use by

patients with Duchenne muscular dystrophy. Am J

Phys Med Rehabil 1990 Apr;69(2):55-9.

Bowker JH. Neurological aspects of prosthetic/orthotic

practice. J Prosthet Orthot 1993 Apr;5(2):55-8.

Brooke MH, Fenichel GM, Griggs RC, Mendell JR,

Moxley R, Florence J, King WM, Pandya S,

Robison J, Schierbecker J, et al. Duchenne

muscular dystrophy: patterns of clinical progression

and effects of supportive therapy. Neurology 1989

Apr;39(4):475-81.

Dean E. Clinical decision making in the management

of the late sequelae of poliomyelitis. Phys Ther

1991 Oct;71(10):752-61.

Fisher SV. Spinal orthoses. In: Kottke FJ, Lehman JF.

Krusen’s handbook of physical medicine and

rehabilitation. 4th ed. Philadelphia: Saunders; 1990.

p. 593-601.

Guidera KJ, Smith S, Raney E, Frost J, Pugh L, Griner

D, Ogden JA. Use of the reciprocating gait

orthosis in myelodysplasia. J Pediatr Orthop 1993

May-Jun;13(3):341-8.

Harlow ML, Russ JC, Nolinske TL, et al. Orthotic

management of the spine. In: Meyer PR. Surgery of

spine trauma. New York: Churchill Livingstone;

1989. p. 279-304.

Heckmatt J, Rodillo E, Dubowitz V. Management of

children: pharmacological and physical. Br Med

Bull 1989 Jul;45(3):788-801.

Hsu JD, Furumasu J. Gait and posture changes in the

Duchenne muscular dystrophy child. Clin Orthop

1993 Mar;(288):122-5.

Langlois S, MacKinnon JR, Pederson L. Hand splints

and cerebral spasticity: a review of the literature.

Can J Occup Ther 1989 Jun;56(3):113-9.

Langlois S, Pederson L, MacKinnon JR. The effects

of splinting on the spastic hemiplegic hand: report

of a feasibility study. Can J Occup Ther 1991 Apr;

58(1):17-25.

Lord J, Behrman B, Varzos N, Cooper D, Lieberman

JS, Fowler WM. Scoliosis associated with

Duchenne muscular dystrophy. Arch Phys Med

Rehabil 1990 Jan;71(1):13-7.

Massagli TL. Spasticity and its management in

children. Phys Med Rehabil Clin North Am 1991

Nov;2(4):867-89.

Moreau C. [Myopathies]. Rev Infirm 1989 Nov;

39(18):27-31. (Fre).

Ricks NR, Eilert RE. Effects of inhibitory casts and

othoses on bony alignment of foot and ankle during

weight-bearing in children with spasticity. Dev

Med Child Neurol 1993 Jan;35(1):11-6.

Sauter WF, Bush G, Sommerville J. A single case

study: myoelectrically controlled exoskeletal

mobilizer for amyotrophic lateral sclerosis (ALS)

patients. Prosthet Orthot Int 1989 Dec;13(3):145-8.

Schaars AH, Postema K. Conservative treatment of

foot deformities in Duchenne Muscular Dystrophy.

J Rehabil Sci 1990 Jun;3(2):49-52.

Stallard J, Henshaw JH, Lomas B, Poiner R. The

ORLAU VCG (variable centre of gravity) swivel

walker for muscular dystrophy patients. Prosthet

Orthot Int 1992 Apr;16(1):46-8.

Waring WP, Maynard F, Grady W, Grady R, Boyles C.

Influence of appropriate lower extremity orthotic

management on ambulation, pain, and fatigue in a

postpolio population. Arch Phys Med Rehabil 1989

May;70(5):371-5.

Paralysis

-General

Andrews BJ, Cobelli C, Mariani L. Rule based

control of hybrid FES orthoses. In: Cobelli C,

Mariani L, eds. Modelling and control in

biomedical systems: selected papers from the 1st

IFAC Symposium; 1988 Apr 6-8; Venice, Italy.

New York: Pergamon Press; 1989. p. 287-94.

Baskin LS, Schmidt RA. Bladder rehabilitation with

dorsal rhizotomy and ventral neuroprosthesis.

Paraplegia 1992 Nov;30(11):783-7.

Charney EB, Melchionni JB, Smith DR. Community

ambulation by children with myelomeningocele and

high-level paralysis. J Pediatr Orthop 1991

Sep-Oct;11(5):579-82.

Closson JB, Toerge JE, Ragnarsson KT, Parsons KC,

Lammertse DP. Rehabilitation in spinal cord

disorders. 3. Comprehensive management of spinal

cord injury. Arch Phys Med Rehabil 1991 Mar;

72(4-S):S298-308.

Embrey DG, Yates L, Mott DH. Effects of neuro-

developmental treatment and orthoses on knee

flexion during gait: a single-subject design. Phys

Ther 1990 Oct;70(10):626-37.

Enzenauer RJ, Nordstrom DM. Anterior interosseous

nerve syndrome associated with forearm band

treatment of lateral epicondylitis. Orthopedics 1991

Jul;14(7):788-90.

Handa Y, Hoshimiya N, Kim Y, Spelman FA.

Multichannel FES for motor control of the disabled.

In: Kim Y, Spelman FA, eds. Images of the twenty-

first century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Vol. 3. Piscataway (NJ): IEEE; 1989.

p. 1002-3.

Handa Y, Ohkubo K, Hoshimiya N. A portable multi-

channel FES system for restoration of motor

function of the paralyzed extremities. Automedica

1989;11:221-31.

Hoshimiya N, Handa Y. A master-slave type multi-

channel functional electrical stimulation (FES)

system for the control of the parlyzed extremities.

Automedica 1989;11:209-20.

Huckstep RL. Appropriate surgery and appliances for

patients with deformities and paralysis in

developing countries. Instr Course Lect

1992;41:461-9.

Kilgore KL. Optimization and automation of stimulus

mpa synthesis for upper extremity fns [dissertation].

Cleveland: Case Western Reserve University; 1991.

198 p.

Kilgore KL, Peckham PH, Keith MW, Thrope GB.

Electrode characterization for functional application

to upper extremity FNS. IEEE Trans Biomed Eng

1990 Jan;37(1):12-21.

Lehmann JF, De Lateur BJ, Price R. Ankle foot

orthoses for paresis and paralysis. Phys Med

Rehabil Clin North Am 1992 Feb;3(1):139-59.

Lehmann JF, De Lateur BJ, Price R. Knee ankle foot

orthoses for paresis and paralysis. Phys Med

Rehabil Clin North Am 1992 Feb;3(1):161-83.

Parry CB. Orthotics and rehabilitation after extensive

upper limb paralysis. Hand Clin 1989 Feb;5(1):

97-105.

Peckham PH, Creasey GH. Neural prostheses: clinical

applications of functional electrical stimulation in

spinal cord injury. Paraplegia 1992 Feb;30(2):

96-101.

Petrofsky JS, Smith J. A combined computer-

controlled walking and exercise system. J Clin Eng

1991 May-Jun;16(3):223-35.

Phillips CA. Modify the disability--not just the

environment [editorial]. Automedica 1989;11(1-3):

1-3.

Phillips CA, Hendershot D, Elzayat S, Granek H,

Granek M, Kim Y, Spelman FA. A systems

approach to physician prescribed FES ambulation.

In: Kim Y, Spelman FA, eds. Images of the twenty-

first century. Proceedings of the 1th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; Nov 9-12;

Seattle, WA. Vol. 5. Piscataway (NJ): IEEE; 1989.

p. 1492-3.

Phillips CA, Koubek RJ, Hendershot DM. Walking

while using a sensory tactile feedback system:

potential use with a functional electrical

stimulation orthosis. J Biomed Eng 1991

Mar;13(2):91-6.

Pollack SF, Axen K, Spielholz N, Levin N, Haas F,

Ragnarsson KT. Aerobic training effects of

electrically induced lower extremity exercises in

spinal cord injured people. Arch Phys Med Rehabil

1989 Mar;70(3):214-9.

Popovic D, Tomovic R, Schwirtlich L. Hybrid

assistive system--the motor neuroprosthesis. IEEE

Trans Biomed Eng 1989 Jul;36(7):729-37.

Popovic DB. Dynamics of the self-fitting modular

orthosis. IEEE Trans Robot Autom 1990 Apr;6(2):

200-7.

Pringle RG. Halo versus Minerva--which orthosis?

Paraplegia 1990 Jun;28(5):281-4.

Prochazka A, Davis LA. Clinical experience with

reinforced, anchored intramuscular electrodes for

functional neuromuscular stimulation. J Neurosci

Methods 1992 May;42(3):175-84.

Ragnarsson KT. Functional electrical stimulation and

suppression of spasticity following spinal cord

injury. Bull N Y Acad Med 1992 Mar-Apr;68(2):

351-64.

Schiltenwolf M, Carstens C, Bernd L.

[Myelomeningocele--what can be done? Aids for

evaluating rehabilitation from the orthopedic

viewpoint]. Geburtshilfe Frauenheilkd 1992 Aug;

52(8):449-53. (Ger).

Schiltenwolf M, Carstens C, Rohwedder J, Gruendel E.

Results of orthotic treatment in children with

myelomeningocele. Eur J Pediatr Surg 1991 Dec;

1 Suppl 1:50-2.

Shepherd CC, Ruzicka SH. Tenodesis brace use by

persons with spinal cord injuries. Am J Occup

Ther 1991 Jan;45(1):81-3.

Shields RK, Cook TM. Lumbar support thickness:

effect on seated buttock pressure in individuals with

and without spinal cord injury. Phys Ther 1992

Mar;72(3):218-26.

Stein RB, Capaday C. [Improvement of prostheses

and orthotic aids for the handicapped using electric

stimulation and the registration of bioelectric

signals]. Union Med Can 1990 May-Jun;119(3):

102-8. (Fre).

Stein RB, Peckham PH, Popovic DB, eds. Neural

prostheses: replacing motor function after disease or

disability. New York: Oxford University Press;

1992. 345 p.

Truong XT. Bracing for serratus anterior palsy [letter].

Arch Phys Med Rehabil 1993 Apr;74(4):447.

Vossius G. [Possibilities of functional

electrostimulation in clinical use]. Biomed Tech

(Berlin) 1990;35 Suppl 3:115-7. (Ger).

Vossius G, Hollander HJ, Frech R. [Functional

electrostimulation in spasticity]. Biomed Tech

(Berlin) 1990;35 Suppl 3:118-9. (Ger).

Waters RL, Yakura JS, Adkins R, Barnes G.

Determinants of gait performance following spinal

cord injury. Arch Phys Med Rehabil 1989 Nov;

70(12):811-8.

Whittle MW, Cochrane GM, Chase AP, Copping AV,

Jefferson RJ, Staples DJ, Fenn PT, Thomas DC.

A comparative trial of two walking systems for

paralysed people. Paraplegia 1991 Feb;29(2):

97-102.

Yarkony GM, Jaeger RJ, Roth E, Kralj AR, Quintern J.

Functional neuromuscular stimulation for standing

after spinal cord injury. Arch Phys Med Rehabil

1990 Mar;71(3):201-6.

Yarkony GM, Roth EJ, Cybulski GR, Jaeger RJ.

Neuromuscular stimulation in spinal cord injury. II:

Prevention of secondary complications. Arch Phys

Med Rehabil 1992 Feb;73(2):195-200.

-Stroke & hemiplegia

Bogataj U, Gros N, Malezic M, Kelih B, Kljajic M,

Acimovic R. Restoration of gait during two to

three weeks of therapy with multichannel electrical

stimulation. Phys Ther 1989 May;69(5):319-27.

Brims J, Lynch T, Isaac TC. Appliance for hemiplegic

patients [letter]. Br J Gen Pract 1992

Jan;42(354):41.

Brooke MM, de Lateur BJ, Diana-Rigby GC, Questad

KA. Shoulder subluxation in hemiplegia: effects

of three different supports. Arch Phys Med Rehabil

1991 Jul;72(8):582-6.

Chu T. Three-dimensional finite element stress

analysis of a polymeric orthotic device:

biomechanics of the ankle-foot orthosis

[dissertation]. Akron (OH): University of Akron;

1992. 258 p.

Cioni B, Meglio M, Zamponi A. Effect of spinal cord

stimulation on motor performances in hemiplegics.

Stereotact Funct Neurosurg 1989;52(1):42-52.

Cron L, Sprigle S. Clinical evaluation of the Hemi

Wheelchair Cushion. Am J Occup Ther 1993 Feb;

47(2):141-4.

de Vries J. Evaluation of lower leg orthosis use

following cerebro-vascular accident. Int J Rehabil

Res 1991;14(3):239-43.

Diamond MF, Ottenbacher KJ. Effect of a tone-

inhibiting dynamic ankle-foot orthosis on stride

characteristics of an adult with hemiparesis. Phys

Ther 1990 Jul;70(7):423-30.

Dittmer DK, McArthur-Turner DE, Jones IC.

Orthotics in stroke. Phys Med Rehabil 1993 Feb;

7(1):161-78.

Egan JM. An aid for the management of shoulder

pain in hemiplegia. Br J Occup Ther 1990

Sep;53(9):362-4.

Esquenazi A, Hirai B. Assessment of gait and orthotic

prescription. Phys Med Rehabil Clin North Am

1991 Aug;2(3):473-85.

Hesse S, Platz T, Mauritz KH. [Indications for

optimal use of orthoses in the treatment of

hemiparetic patients]. Biomed Tech (Berlin) 1990;

35 Suppl 3:52-3. (Ger).

Johnstone M. Current advances in the use of pressure

splints in the management of adult hemiplegia.

Physiotherapy 1989 Jul;75(7):381-4.

Koop SE, Gage JR. [Treatment of deformities of the

locomotor system in hemiplegia]. Orthopade 1992

Sep;21(5):293-300. (Ger).

Kotzki N, Pelissier J, Dusotoit C, Toulemonde M,

Codine P, Enjalbert M, Daures P, Simon L.

Preventive processes of shoulder hand syndrome in

bedridden hemiplegic patients: Evaluation of three

processes. Ann Readapt Med Phys 1991;34(4):

351-5.

Kraft GH, Fitts SS, Hammond MC. Techniques to

improve function of the arm and hand in chronic

hemiplegia. Arch Phys Med Rehabil 1992 Mar;

73(3):220-7.

Langlois S, Pederson L, MacKinnon JR. The effects

of splinting on the spastic hemiplegic hand: report

of a feasibility study. Can J Occup Ther 1991 Apr;

58(1):17-25.

Lee S, Agah A, Bekey G. IROS: an intelligent

rehabilitative orthotic system for cerebrovascular

accident. In: 1990 IEEE International Conference

on Systems, Man and Cybernetics Conference

Proceedings; 1990 Nov 4-7; Los Angeles, CA. New

York: IEEE; 1990. p. 815-9.

Mandel AR, Nymark JR, Balmer SJ, Grinnell DM,

O’Riain MD. Electromyographic versus rhythmic

positional biofeedback in computerized gait

retraining with stroke patients. Arch Phys Med

Rehabil 1990 Aug;71(9):649-54.

Marsolais EB, Kim Y, Spelman FA. FNS application

for restoring function in stroke patients. In: Kim Y,

Spelman FA, eds. Images of the twenty-first

century. Proceedings of the Annual International

Conference of the IEEE Engineering in Medicine

and Biology Society; 1989 Nov 9-12; Seattle, WA.

Vol. 3. New York: IEEE; 1989. p. 829-30.

Milczarek JJ, Kirby RL, Harrison ER, MacLeod DA.

Standard and four-footed canes: their effect on the

standing balance of patients with hemiparesis.

Arch Phys Med Rehabil 1993 Mar;74(3):281-5.

Mueller K, Cornwall M, McPoil T, Mueller D,

Barnwell J. Effect of a tone-inhibiting dynamic

ankle-foot orthosis on the foot-loading pattern of a

hemiplegic adult: a preliminary study. J Prosthet

Orthot 1992 Winter;4(2):86-92.

O’Connell PG, Gnatz S. Hemiplegia and amputation:

rehabilitation in the dual disability. Arch Phys Med

Rehabil 1989 Jun;70(6):451-4.

Poole JL, Whitney SL, Hangeland N, Baker C. The

effectiveness of inflatable pressure splints on motor

function in stroke patients. Occup Ther J Res 1990

Nov-Dec;10(6):360-6.

Ragnarsson KT. Functional electrical stimulation and

suppression of spasticity following spinal cord

injury. Bull N Y Acad Med 1992 Mar-Apr;68(2):

351-64.

Reding MJ, McDowell FH. Focused stroke

rehabilitation programs improve outcome. Arch

Neurol 1989 Jun;46(6):700-1.

Robichaud JA, Agostinucci J, Vander Linden DW.

Effect of air-splint application on soleus muscle

motoneuron reflex excitability in nondisabled

subjects and subjects with cerebrovascular

accidents. Phys Ther 1992 Mar;72(3):176-83;

discussion 183-5.

Sankey RJ, Anderson DM, Young JA. Characteristics

of ankle-foot orthoses for management of the

spastic lower limb. Dev Med Child Neurol 1989

Aug;31(4):466-70.

Scherling E, Johnson H. A tone-reducing wrist--hand

orthosis. Am J Occup Ther 1989 Sep;43(9):

609-11.

Smith LE. Restoration of volitional limb movement of

hemiplegics following patterned functional electrical

stimulation. Percept Mot Skills 1990 Dec;

71(3 Pt 1):851-61.

Stefanovska A, Vodovnik L, Gros N, Rebersek S,

Acimovic-Janezic R. FES and spasticity. IEEE

Trans Biomed Eng 1989 Jul;36(7):738-45.

Sullivan BE, Rogers SL. Modified Bobath sling with

distal support. Am J Occup Ther 1989 Jan;43(1):

47-9.

Sullivan MJL, Heisel B, Lemaire E, Martel G, Grinnell

D. Utilization of orthotic devices in stroke

patients: a comparison of out-reach and institution

based services. Can J Rehabil 1990 Sep;4(1):

47-50.

Takami M, Fukui K, Saitou S, Sugiyama I, Terayama

K. Application of a shape memory alloy to hand

splinting. Prosthet Orthot Int 1992 Apr;16(1):

57-63.

Webster JS, Cottam G, Gouvier WD, Blanton P, Beissel

GF, Wofford J. Wheelchair obstacle course

performance in right cerebral vascular accident

victims. J Clin Exp Neuropsychol 1989

Mar;11(2):295-310.

Willemsen ATM, Bloemhof F, Boom HBK.

Automatic stance-swing phase detection from

accelerometer data for peroneal nerve stimulation.

IEEE Trans Biomed Eng 1990 Dec;37(12):1201-8.

Wong AM, Tang FT, Wu SH, Chen CM. Clinical trial

of a low-temperature plastic anterior ankle foot

orthosis. Am J Phys Med Rehabil 1992 Feb;71(1):

41-3.

Yamamoto H, Okumura S, Morita S, Obata K, Furuya

K. Surgical correction of foot deformities after

stroke. Clin Orthop 1992 Sep;(282):213-8.

-Paraplegia

Abbas JJ, Chizeck HJ. Feedback control of coronal

plane hip angle in paraplegic subjects using

functional neuromuscular stimulation. IEEE Trans

Biomed Eng 1991 Jul;38(7):687-98.

Andrews BJ, Barnett RW, Phillips GF, Kirkwood CA,

Donaldson N, Rushton DN, Perkins TA. Rule-

based control of a hybrid FES orthosis for assisting

paraplegic locomotion. Automedica 1989;11:

175-99.

Arnold PB, McVey PP, Farrell WJ, Deurloo TM,

Grasso AR. Functional electric stimulation: its

efficacy and safety in improving pulmonary

function and musculoskeletal fitness. Arch Phys

Med Rehabil 1992 Jul;73(7):665-8.

Bajd T, Kralj A, Turk R, Benko H. Symmetry of FES

responses in the lower extremities of paraplegic

patients. J Biomed Eng 1990 Sep;12(5):415-8.

Bajd T, Kralj A, Turk R, Benko H, Sega J. Use of

functional electrical stimulation in the rehabilitation

of patients with incomplete spinal cord injuries.

J Biomed Eng 1989 Mar;11(2):96-102.

Banta JV, Bell KJ, Muik EA, Fezio J. Parawalker:

energy cost of walking. Eur J Pediatr Surg 1991

Dec;1 Suppl 1:7-10.

Barbenel JC, Paul JP. Bioengineering developments

for paraplegic patients. Paraplegia 1992 Jan;

30(1):61-4.

Barnett RW. Paraplegic standing and reciprocal gait

using a floor reaction hybrid F.E.S. orthosis

[dissertation]. Glasgow (UK): University of

Strathclyde; 1990. 174 p.

Bierling-Sorensen F, Ryde H, Bojsen-Moller F, Lyquist

E. Shock absorbing material on the shoes of long

leg braces for paraplegic walking. Prosthet Orthot

Int 1990 Apr;14(1):27-32.

Block JE, Steinbach LS, Friedlander AL, Steiger P,

Ellis W, Morris JM, Genant HK. Electrically-

stimulated muscle hypertrophy in paraplegia:

assessment by quantitative CT. J Comput Assist

Tomogr 1989 Sep-Oct;13(5):852-4.

Borges G, Ferguson K, Kobetic R. Development and

operation of portable and laboratory electrical

stimulation systems for walking in paraplegic

subjects. IEEE Trans Biomed Eng 1989 Jul;36(7):

798-801.

Bowker P, Messenger N, Ogilvie C, Rowley DI.

Energetics of paraplegic walking. J Biomed Eng

1992 Jul;14(4):344-50.

Bremner LA, Sloan KE, Day RE, Scull ER, Ackland T.

A clinical exercise system for paraplegics using

functional electrical stimulation. Paraplegia 1992

Sep;30(9):647-55.

Carroll SG, Triolo RJ, Chizeck HJ, Kobetic R,

Marsolais EB. Tetanic responses of electrically

stimulated paralyzed muscle at varying interpulse

intervals. IEEE Trans Biomed Eng 1989

Jul;36(7):644-53. Published erratum appears in

IEEE Trans Biomed Eng 1989 Nov;36(11):1143.

Cooley WC, Melkonian G, Moses C, Moeschler JB.

Autosomal dominant familial spastic paraplegia:

description of a large New England family and a

study of management. Dev Med Child Neurol

1990 Dec;32(12):1098-104.

Crosbie WJ, Nicol AC. Reciprocal aided gait in

paraplegia. Paraplegia 1990 Jul;28(6):353-63.

Debnath N, Anand A, Guha SK. Electrical current

distribution analysis for functional electrical

stimulation (FES) of paraplegics. Automedica

1989;11(1-3):5-13;

Durfee WK, Hausdorff JM. Regulating knee joint

position by combining electrical stimulation with a

controllable friction brake. Ann Biomed Eng 1990;

18(6):575-96.

Edwards BG, Marsolais EB. Energy costs of

ambulation with reciprocal gait orthosis, electrical

stimulation, long leg braces and hybrids: A case

study. Clin Kinesiol 1990;44(2):43-7.

Edwards BG, Marsolais EB. Metabolic responses to

arm ergometry and functional neuromuscular

stimulation. J Rehabil Res Dev 1990 Spring;

27(2):107-13; discussion 113-4.

Engen T. Lightweight modular orthosis. Prosthet

Orthot Int 1989 Dec;13(3):125-9.

Ewins DJ. Investigation into the restoration of simple

standing and walking function for mid-low thoracic

paraplegics through the use of electrical stimulation

[dissertation]. Claverton Down (UK): University of

Bath; 1990. 447 p.

Ezenwa BN, Glaser RM, Couch W, Figoni SF, Rodgers

MM. Adaptive control of functional

neuromuscular stimulation-induced knee extension

exercise. J Rehabil Res Dev 1991 Fall;28(4):1-8.

Feldman MD, Bridwell KH, Sheridan JJ. Hyndman-

Schneider procedure for paraplegia caused by a

sharp, angular scoliosis: a case report and a review

of the literature. J Spinal Disord 1993 Feb;6(1):

76-82.

Fujita K, Noguchi T, Minamitani H, Tomatsu T.

[Feedback control method for paraplegic standing

by functional electrical stimulation]. Trans Inst

Electr Inf Commun Eng;1992 Apr;J75D-II(4):

791-8. (Jpn).

Granat MH, Heller BW, Nicol DJ, Baxendale RH,

Andrews BJ. Improving limb flexion in FES gait

using the flexion withdrawal response for the spinal

cord injured person. J Biomed Eng 1993 Jan;15(1):

51-6.

Graupe D. EMG pattern analysis for patient-

responsive control of FES in paraplegics for

walker-supported walking. IEEE Trans Biomed

Eng 1989 Jul;36(7):711-9.

Hatwell MS, Oderkerk BJ, Sacher CA, Inbar GF. The

development of a model reference adaptive

controller to control the knee joint of paraplegics.

IEEE Trans Automat Control 1991 Jun;36(6):

683-91

Hausdorff JM, Durfee WK. Open-loop position

control of the knee joint using electrical stimulation

of the quadriceps and hamstrings. Med Biol Eng

Comput 1991 May;29(3):269-80.

Hirokawa S. [Energy consumption of paraplegics-

ambulation-relation between the application of

functional electrical stimulation and energy

consumption]. Jpn J Med Electr Biol Eng 1991

Mar;29(1):1-8. (Jpn).

Hirokawa S, Grimm M, Le T, Solomonow M, Baratta

RV, Shoji H, D’Ambrosia RD. Energy

consumption in paraplegic ambulation using the

reciprocating gait orthosis and electric stimulation

of the thigh muscles. Arch Phys Med Rehabil 1990

Aug;71(9):687-94.

Hjeltnes N, Lannem A. Functional neuromuscular

stimulation in 4 patients with complete paraplegia.

Paraplegia 1990 May;28(4):235-43.

Hong C, San Luis EB, Chung S. Follow up study on

the use of leg braces issued to spinal cord injury

patients. Paraplegia 1990;28(3):172-7.

Hooker SP, Figoni SF, Glaser RM, Rodgers MM,

Ezenwa BN, Faghri PD. Physiologic responses to

prolonged electrically stimulated leg-cycle exercise

in the spinal cord injured. Arch Phys Med Rehabil

1990 Oct;71(11):863-9.

Hooker SP, Figoni SF, Rodgers MM, Glaser RM,

Mathews T, Suryaprasad AG, Gupta SC.

Physiologic effects of electrical stimulation leg

cycle exercise training in spinal cord injured

patients. Arch Phys Med Rehabil 1992 May;73(5):

470-6.

Ichie M, Handa T, Handa Y, Hoshimiya N, Naito A,

Ushikoshi K, Fukamachi H, Yajima M, Ito T, Kim

Y, Spelman FA. Control of locomotion by multi-

channel portable FES system. In: Kim Y, Spelman

FA, eds. Images of the twenty-first century.

Proceedings of the 11th Annual International

Conference of the IEEE Engineering in Medicine

and Biology Society; 1989 Nov 9-12; Seattle, WA.

Vol. 3. New York: IEEE; 1989. p. 1018-9.

Isakov E, Douglas R, Berns P. Ambulation using the

reciprocating gait orthosis and functional electrical

stimulation. Paraplegia 1992 Apr;30(4):239-45.

Jaeger RJ, Yarkony GM, Roth EJ, Lovell L.

Estimating the user population of a simple electrical

stimulation system for standing. Paraplegia 1990

Oct;28(8):505-11.

Jaeger RJ, Yarkony GM, Smith RM. Standing the

spinal cord injured patient by electrical stimulation:

refinement of a protocol for clinical use. IEEE

Trans Biomed Eng 1989 Jul;36(7):720-8.

Jefferson RJ, Whittle MW. Performance of three

walking orthoses for the paralysed: a case study

using gait analysis. Prosthet Orthot Int 1990 Dec;

14(3):103-10.

Kemp M. Comment on: the energetics of paraplegic

walking [letter]. J Biomed Eng 1993 Jan;15(1):83.

Kent HO. Vannini-Rizzoli stabilizing orthosis (boot):

preliminary report on a new ambulatory aid for

spinal cord injury. Arch Phys Med Rehabil 1992

Mar;73(3):302-7.

Khang G, Zajac FE. Paraplegic standing controlled by

functional neuromuscular stimulation: Part I--

computer model and control-system design. IEEE

Trans Biomed Eng 1989 Sep;36(9):873-84.

Khang G, Zajac FE. Paraplegic standing controlled by

functional neuromuscular stimulation: Part II--

Computer simulation studies. IEEE Trans Biomed

Eng 1989 Sep;36(9):885-94.

Kirkwood CA, Granat MH, Andrews BJ.

Measurement of sway when using hand supports.

Med Biol Eng Comput 1991 Nov;29(6):601-2.

Kirtley C. Control of functional electrical stimulation

with extended physiological proprioception

[dissertation]. Glasgow (UK): University of

Strathclyde; 1989. 167 p.

Kirtley C, Andrews BJ. Control of functional

electrical stimulation with extended physiological

proprioception. J Biomed Eng 1990 May;12(3):

183-8.

Limbird TJ, Stills M, Elliott D, Wharton G. Lower

extremity telescopic orthosis for immediate fitting

in paraplegia. Orthopedics 1989 Jun;12(6):851-4.

Lyles M, Munday J. Report on the evaluation of the

Vannini-Rizzoli Stabilizing Limb Orthosis.

J Rehabil Res Dev 1992 Spring;29(2):77-104.

McKenna ME, McCarthy C. Acute care of the patient

with spinal cord injury. CONA J 1989 Spring;

11(1):5-10.

Mulder AJ, Hermens HJ, Janssen F, Zilvold G. A

low-cost FES exercise bicycle for training

paraplegics at home. J Med Eng Technol 1989

Jan-Apr;13(1-2):90-2.

Mulder AJ, Veltink PH, Boom HB. On/off control in

FES-induced standing up: a model study and

experiments. Med Biol Eng Comput 1992 Mar;

30(2):205-12.

Mulder AJ, Veltink PH, Boom HB, Zilvold G. Low-

level finite state control of knee joint in paraplegic

standing. J Biomed Eng 1992 Jan;14(1):3-8.

Nash RS, Davy MS, Orpwood R, Swain ID.

Development of a wheelchair-mounted folding

standing frame. J Biomed Eng 1990 May;12(3):

189-92.

Nene AV, Jennings SJ. Hybrid paraplegic locomotion

with the ParaWalker using intramuscular

stimulation: a single subject study. Paraplegia 1989

Apr;27(2):125-32.

Nene AV, Jennings SJ. Physiological cost index of

paraplegic locomotion using the ORLAU

ParaWalker. Paraplegia 1992 Apr;30(4):246-52.

Nene AV, Patrick JH. Energy cost of paraplegic

locomotion with the ORLAU ParaWalker.

Paraplegia 1989 Feb;27(1):5-18.

Oderkerk BJ, Inbar GF. Walking cycle recording and

analysis for FNS-assisted paraplegic walking. Med

Biol Eng Comput 1991 Jan;29(1):79-83.

Ogilvie C, Bowker P, Rowley DI. The physiological

benefits of paraplegia orthotically aided walking.

Paraplegia 1993 Feb;31(2):111-5.

Peckham PH, Creasey GH. Neural prostheses: clinical

applications of functional electrical stimulation in

spinal cord injury. Paraplegia 1992 Feb;30(2):

96-101.

Pentland WE, Twomey LT. The weight-bearing upper

extremity in women with long term paraplegia.

Paraplegia 1991 Oct;29(8):521-30.

Pessenhofer H, Sauseng N, Kohla B, Hermann M.

[Wheelchair ergometry: technical principles and

practical applications]. Biomed Tech (Berlin) 1990;

35 Suppl 2:201-2. (Ger).

Petrofsky JS, Smith JB. Physiologic costs of

computer-controlled walking in persons with

paraplegia using a reciprocating-gait orthosis. Arch

Phys Med Rehabil 1991 Oct;72(11):890-6.

Phillips CA. Electrical muscle stimulation in

combination with a reciprocating gait orthosis for

ambulation by paraplegics. J Biomed Eng 1989

Jul;11(4):338-44.

Phillips CA. Functional electrical rehabilitation:

technological restoration after spinal cord injury.

New York: Springer-Verlag; 1991. 209 p.

Phillips CA, Hendershot DM. A systems approach to

medically prescribed functional electrical

stimulation. Ambulation after spinal cord injury.

Paraplegia 1991 Oct;29(8):505-13.

Phillips CA, Hendershot DM, Koubek RJ. Technology

transfer of a system for medically prescribed FES

walking exercise. J Clin Eng 1992 Jan-

Feb;17(1):69-77.

Pohlman RL, Gayle GW, Davis GM, Glaser RM.

Metabolic responses to maximal arm crank and

wheelchair ergometry in male paraplegics. Clin

Kinesiol 1989;43(4):89-95.

Pons DJ, Vaughan CL, Jaros GG. Cycling device

powered by the electrically stimulated muscles of

paraplegics. Med Biol Eng Comput 1989 Jan;

27(1):1-7.

Quintern J, Minwegen P, Mauritz KH. Control

mechanisms for restoring posture and movements in

paraplegics. Prog Brain Res 1989;80:489-502;

discussion 479-80.

Rabischong E, Sgarbi F, Rabischong P, Detriche JM,

Pinguet N, Riwan A. Control and command of a

six degrees of freedom active electrical orthosis for

paraplegic patient. In: Towards a new frontier of

applications: IROS ’90: proceedings of the IEEE

International Workshop on Intelligent Robots and

Systems ’90; 1990 Jul 3-6; Ibaraki, Japan. Vol. 2.

New York: IEEE; 1990. p. 987-91.

Rabischong P, Weber JL, Rabischong E, Micallef JP,

Peruchon E, Gilbert B, Jullian JM, Kim Y, Spelman

FA. Computer-aided locomotion by implanted

electrical stimulation (CALIES project). In: Kim

Y, Spelman FA, eds. Images of the twenty-first

century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Vol. 3. Piscataway (NJ): IEEE; 1989.

p. 985.

Solomonow M, Baratta R, Hirokawa S, Rightor N,

Walker W, Beaudette P, Shoji H, D’Ambrosia R.

The RGO Generation II: muscle stimulation

powered orthosis as a practical walking system for

thoracic paraplegics. Orthopedics 1989

Oct;12(10):1309-15. Published erratum appears in

Orthopedics 1989 Dec;12(12):1522.

Stallard J, Major R, Butler PB. The orthotic

ambulation performance of paraplegic

myelomeningocele children using the orlau

parawalker treatment system. Clin Rehabil 1991

May;5(2):111-4.

Stallard J, Major RE, Patrick JH. A review of the

fundamental design problems of providing

ambulation for paraplegic patients. Paraplegia 1989

Feb;27(1):70-5.

Veterans Administration Medical Center (Salt Lake

City, Utah Regional Learning Resources Service.

Energy cost of ambulation in paraplegia:

comparison of various orthotic management

strategies [videocassette]. Washington (DC):

Veterans Administration; 1988. 1 videocassette: 46

min., sound, color, 1/2 in.

Wahle H. [Ten years follow-up of post-discharge

training status of 50 patients with complete

paraplegia]. Rehabilitation (Stuttg) 1991 Feb;

30(1):3-13. (Ger).

Wells CL, Hooker SP. The spinal injured athlete.

Adapt Phys Activ Q 1990 Jul;7(3):265-85.

Which orthosis? [editorial]. Lancet 1989 Sep 23;

2(8665):721.

Willemsen AT, Frigo C, Boom HB. Lower extremity

angle measurement with accelerometers--error and

sensitivity analysis. IEEE Trans Biomed Eng 1991

Dec;38(12):1186-93.

Yamaguchi GT. Feasibility and conceptual design of

functional neuromuscular stimulation systems for

the restoration of natural gait to paraplegics based

on dynamic musculoskeletal models [dissertation].

Palo Alto (CA): Stanford University; 1989. 264 p.

Yamaguchi GT, Zajac FE. Restoring unassisted

natural gait to paraplegics via functional

neuromuscular stimulation: a computer simulation

study. IEEE Trans Biomed Eng 1990 Sep;37(9):

886-902.

Yarkony GM, Jaeger RJ, Roth E, Kralj AR, Quintern J.

Functional neuromuscular stimulation for standing

after spinal cord injury. Arch Phys Med Rehabil

1990 Mar;71(3):201-6.

-Quadriplegia

Abitbol JJ, Botte MJ, Garfin SR, Akeson WH. The

treatment of multiple myeloma of the cervical spine

with a halo vest. J Spinal Disord 1989 Dec;2(4):

263-7.

Akazawa K, Makikawa M, Kawamura J, Aoki H.

Functional neuromuscular stimulation system using

an implantable hydroxyapatite connector and a

microprocessor-based portable stimulator. IEEE

Trans Biomed Eng 1989 Jul;36(7):746-53.

Arnold PB, McVey PP, Farrell WJ, Deurloo TM,

Grasso AR. Functional electric stimulation: its

efficacy and safety in improving pulmonary

function and musculoskeletal fitness. Arch Phys

Med Rehabil 1992 Jul;73(7):665-8.

Belkin L. How rationing will really work. Med Econ

1993 Mar 22;70(6):160-1, 165-8, 171-2 passim.

Boyer JJ. Are tenodesis splints cost efficient? [letter].

Am J Occup Ther 1990 Sep;44(9):857-8.

Carroll SG, Bird SF, Brown DJ. Electrical stimulation

of the lumbrical muscles in an incomplete

quadriplegic patient: case report. Paraplegia 1992

Mar;30(3):223-6.

Crago PE, Lemay M, Kim Y, Spelman FA. Active

regulation of grasp stiffness in neuroprosthesis for

restoration of hand function in quadriplegics. In:

Kim Y, Spelman FA, eds. Images of the twenty-

first century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Vol. 3. Piscataway (NJ): IEEE; 1989.

p. 902-3.

Cruickshank DA, O’Neill DL. Upper extremity

inhibitive casting in a boy with spastic quadriplegia.

Am J Occup Ther 1990 Jun;44(6):552-5.

Durfee WK, Mariano TR, Zahradnik JL. Simulator for

evaluating shoulder motion as a command source

for FES grasp restoration systems. Arch Phys Med

Rehabil 1991 Dec;72(13):1088-94.

Engen T. Lightweight modular orthosis. Prosthet

Orthot Int 1989 Dec;13(3):125-9.

Ezenwa BN, Reynolds DB, Rowley BA.

Characterization of the lower limb of quadriplegics

for the design of a controller for funtional electrical

stimulation. Automedica 1989;11(1-3):43-52.

Figoni SF. Exercise responses and quadriplegia. Med

Sci Sports Exerc 1993 Apr;25(4):433-41.

Garber SL, Gregorio TL. Upper extremity assistive

devices: assessment of use by spinal cord-injured

patients with quadriplegia. Am J Occup Ther 1990

Feb;44(2):126-31.

Hammel J, Hall K, Lees D, Leifer L, Van der Loos M,

Perkash I, Crigler R. Clinical evaluation of a

desktop robotic assistant. J Rehabil Res Dev 1989

Summer;26(3):1-16.

Hammel JM, Van der Loos HF, Perkash I. Evaluation

of a vocational robot with a quadriplegic employee.

Arch Phys Med Rehabil 1992 Jul;73(7):683-93.

Hammell KRW. Occupational therapy in the

management of high level quadriplegia. Br J

Occup Ther 1991 Sep;54(9):333-40.

Handa Y, Handa T, Ichie M, Murakami H, Hoshimiya

N, Ishikawa S, Ohkubo K. Functional electrical

stimulation (FES) systems for restoration of motor

function of paralyzed muscles--versatile systems

and a portable system. Front Med Biol Eng

1992;4(4):241-55.

Hokken W, Kalkman S, Blanken WC, van Asbeck FW.

A dynamic pronation orthosis for the C6 tetraplegic

arm. Arch Phys Med Rehabil 1993 Jan;74(1):

104-5.

Hooker SP, Figoni SF, Glaser RM, Rodgers MM,

Ezenwa BN, Faghri PD. Physiologic responses to

prolonged electrically stimulated leg-cycle exercise

in the spinal cord injured. Arch Phys Med Rehabil

1990 Oct;71(11):863-9.

Hoshimiya N, Naito A, Yajima M, Handa Y. A

multichannel FES system for the restoration of

motor functions in high spinal cord injury patients:

a respiration-controlled system for multijoint upper

extremity. IEEE Trans Biomed Eng 1989 Jul;

36(7):754-60.

Ikzkovich M, Catz A, Ona I. A new double-purpose

device for elbow extension in tetraplegia with

paralysis below C5. Paraplegia 1993 Feb;31(2):

116-8.

Johnson MW, Peckham PH. Evaluation of shoulder

movement as a command control source. IEEE

Trans Biomed Eng 1990 Sep;37(9):876-85.

Keith MW, Peckham PH, Thrope GB, Buckett JR,

Stroh KC, Menger V. Functional neuromuscular

stimulation neuroprostheses for the tetraplegic hand.

Clin Orthop 1988 Aug;(233):25-33.

Keith MW, Peckham PH, Thrope GB, Stroh KC, Smith

B, Buckett JR, Kilgore KL, Jatich JW.

Implantable functional neuromuscular stimulation in

the tetraplegic hand. J Hand Surg [Am] 1989 May;

14(3):524-30.

Kilgore KL, Peckham PH, Thrope GB, Keith MW,

Gallaher-Stone KA. Synthesis of hand grasp using

functional neuromuscular stimulation. IEEE Trans

Biomed Eng 1989 Jul;36(7):761-70.

Kirtley C. Control of functional electrical stimulation

with extended physiological proprioception

[dissertation]. Glasgow (UK): University of

Strathclyde; 1989. 167 p.

Kirtley C, Andrews BJ. Control of functional

electrical stimulation with extended physiological

proprioception. J Biomed Eng 1990 May;12(3):

183-8.

Krajnik SR, Bridle MJ. Hand splinting in

quadriplegia: current practice. Am J Occup Ther

1992 Feb;46(2):149-56.

Lyles M, Munday J. Report on the evaluation of the

Vannini-Rizzoli Stabilizing Limb Orthosis.

J Rehabil Res Dev 1992 Spring;29(2):77-104.

Maeda CJ, Baydur A, Waters RL, Adkins RH. The

effect of the halovest and body position on

pulmonary function in quadriplegia. J Spinal

Disord 1990 Mar;3(1):47-51.

McDowell CL, Rago TA, Gonzalez SM. Tetraplegia.

Hand Clin 1989 Aug;5(3):343-8.

Miller LJ, Peckham PH, Keith MW. Elbow extension

in the C5 quadriplegic using functional

neuromuscular stimulation. IEEE Trans Biomed

Eng 1989 Jul;36(7):771-80.

Nathan RH. FNS of the upper limb: targeting the

forearm muscles for surface stimulation. Med Biol

Eng Comput 1990 May;28(3):249-56.

Nathan RH. An FNS-based system for generating

upper limb function in the C4 quadriplegic. Med

Biol Eng Comput 1989 Nov;27(6):549-56.

Nathan RH, Ohry A. Upper limb functions regained

in quadriplegia: a hybrid computerized

neuromuscular stimulation system. Arch Phys Med

Rehabil 1990 May;71(6):415-21.

Nemunaitis GA, Herbison GJ. Cosmetic, functional,

independent: self-help aids. Arch Phys Med

Rehabil 1991 Apr;72(5):334-5.

Petrillo DK, Wooden VM, Kraft-Fine C, Siegal SG,

Cioschi HM. How to equip the quadriplegic

patient. Contin Care 1990 Nov;9(11):24-8, 35.

Phillips CA. Functional electrical stimulation and

lower extremity bracing for ambulation exercise of

the spinal cord injured individual: a medically

prescribed system. Phys Ther 1989 Oct;69(10):

842-9.

Phillips CA. An interactive system of electronic

stimulators and gait orthosis for walking in the

spinal cord injured. Automedica 1989;11:247-61.

Phillips CA, Hendershot DM. Functional electrical

stimulation and reciprocating gait orthosis for

ambulation exercise in a tetraplegic patient: a case

study. Paraplegia 1991 May;29(4):268-76.

Phillips CA, Hendershot DM. A systems approach to

medically prescribed functional electrical

stimulation. Ambulation after spinal cord injury.

Paraplegia 1991 Oct;29(8):505-13.

Phillips CA, Hendershot DM, Koubek RJ. Technology

transfer of a system for medically prescribed FES

walking exercise. J Clin Eng 1992 Jan-

Feb;17(1):69-77.

Reidy K, Crozier KS. Refusing treatment during

rehabilitation. A model for conflict resolution.

West J Med 1991 May;154(5):622-3.

Riso RR, Ignagni AR, Keith MW. Cognitive feedback

for use with FES upper extremity neuroprostheses.

IEEE Trans Biomed Eng 1991 Jan;38(1):29-38.

Seeger BR, Law D, Creswell JE, Stern LM, Potter G.

Functional electrical stimulation for upper limb

strengthening in traumatic quadriplegia. Arch Phys

Med Rehabil 1989 Sep;70(9):663-7.

Smith BT, Mulcahey MJ, Triolo RJ, Betz RR. The

application of a modified neuroprosthetic hand

system in a child with a C7 spinal cord injury. Case

report. Paraplegia 1992 Aug;30(8):598-606.

Takami M, Fukui K, Saitou S, Sugiyama I, Terayama

K. Application of a shape memory alloy to hand

splinting. Prosthet Orthot Int 1992 Apr;16(1):

57-63.

Wells CL, Hooker SP. The spinal injured athlete.

Adapt Phys Activ Q 1990 Jul;7(3):265-85.

Wijman CA, Stroh KC, Van Doren CL, Thrope GB,

Peckham PH, Keith MW. Functional evaluation of

quadriplegic patients using a hand neuroprosthesis.

Arch Phys Med Rehabil 1990 Dec;71(13):1053-7.

Other Uses

Akamatsu N, Hamada Y, Kohno H, Siddiqi NA.

Osteofibrous dysplasia of the tibia treated by

bracing. Int Orthop 1992;16(2):180-4.

Beynnon BD, Pope MH, Wertheimer CM, Johnson RJ,

Fleming BC, Nichols CE, Howe JG. The effect of

functional knee-braces on strain on the anterior

cruciate ligament in vivo. J Bone Joint Surg [Am]

1992 Oct;74(9):1298-312.

Bresnahan PJ, Lubert MA. The Tibial Torsion

Transformer. J Am Podiatr Med Assoc 1992 Jan;

82(1):42-4.

Choi IH, Kumar SJ, Bowen JR. Amputation or limb-

lengthening for partial or total absence of the

fibula. J Bone Joint Surg [Am] 1990

Oct;72(9):1391-9.

Cool JC. Biomechanics of orthoses for the subluxed

shoulder. Prosthet Orthot Int 1989 Aug;13(2):90-6.

Corea JR, Sankaran-Kutty M. Lobster claw leg.

J Bone Joint Surg [Br] 1989 Nov;71(5):861.

Cunliffe MW. An adjustable thermoplastic knee brace,

directly moulded and colour coordinated. Br J

Occup Ther 1992 Nov;55(11):430-4.

Delepine G, Delepine N, Lewertowski JM. [Knee

prostheses for tumors]. Rev Prat 1991 Jun 1;

41(16):1465-71. (Fre).

Farmer MR. Controlling anterior tibial displacement

under static load: a comparison of two braces

[letter]. Orthopedics 1989 Mar;12(3):354-6.

Gajiwala KJ, Sams SB, Pandya N, Wagh A. A new

dynamic lumbrical simulating splint for claw hand

deformity. Plast Reconstr Surg 1991 Jan;87(1):

170-3.

Gottschalk F. CAT-CAM above-knee prostheses and

the effect on functional rehabilitation [letter]. Clin

Orthop 1990 Jun;(255):310-2.

Greene WB. Infantile tibia vara. Instr Course Lect

1993;42:525-38.

Greene WB. Infantile tibia vara. J Bone Joint Surg

[Am] 1993 Jan;75(1):130-43.

McCaw ST. Leg length inequality. Implications for

running injury prevention. Sports Med 1992 Dec;

14(6):422-9.

Meyer PE, Petersen D. [Compensation in leg length

inequality with orthopedic shoe measures].

Orthopade 1992 Jun;21(3):174-83. (Ger).

Ott JW, Clancy WG Jr. Functional knee braces.

Orthopedics 1993 Feb;16(2):171-5; discussion

175-6.

Racette WL. Clinical experience with functional

fracture bracing of the tibial diaphysis. J Prosthet

Orthot 1992 Apr;4(3):142-50.

Romero PW, Rice J. Clinical suggestions. Clinical use

of the knee hyperextension block orthosis. Pediatr

Phys Ther 1992 Winter;4(4):205-7.

Uhlig R. [Technical orthopedic compensation of leg

length inequality]. Orthopade 1992 Jun;21(3):

184-96. (Ger).

Vailas JC, Pink M. Biomechanical effects of

functional knee bracing. Practical implications.

Sports Med 1993 Mar;15(3):210-8.

Zagorski JB, Zych GA, Latta LL, Finnieston AR.

Orthotic design and application for functional

treatment of tibial shaft fractures. J Prosthet Orthot

1992 Apr;4(3):126-41.

CLINICAL ASSESSMENT &

EFFECTIVENESS

Ahl T, Dalen N, Lundberg A, Bylund C. Early

mobilization of operated on ankle fractures.

Prospective controlled study of 40 biomalleolar

cases. Acta Orthop Scand 1993 Feb;64(1):95-9.

Arlet V, Rigault P, Padovani JP, Touzet P, Finidori G,

Guyonvarch G. [Scoliosis, spondylolysis and

lumbosacral spondylolisthesis. A study of their

association apropos of 82 cases in children and

adolescents]. Rev Chir Orthop 1990;76(2):118-27.

(Fre).

Atar D, Lehman WB, Tenenbaum Y, Grant AD. Pavlik

harness versus Frejka splint in the treatment of

developmental dysplasia of the hip: bicenter study.

J Pediatr Orthop 1993 May-Jun;13(3):311-3.

Axelsson P, Johnsson R, Stromqvist B. Effect of

lumbar orthosis on intervertebral mobility. A

roentgen stereophotogrammetric analysis. Spine

1992 Jun;17(6):678-81.

Barber EL. Strength and range-of-motion examination

skills for the clinical orthotist. J Prosthet Orthot

1993 Apr;5(2):49-51.

Bensahel H, Dal Monte A, Hjelmstedt A, Bjerkreim I,

Wientroub S, Matasovic T, Porat S, Bialik V.

Congenital dislocation of the knee. J Pediatr

Orthop 1989 Mar-Apr;9(2):174-7.

Berenter R, Morris J, Yee B. Bilateral congenital

absence of the fibula. J Am Podiatr Med Assoc

1990 Jun;80(6):325-8.

Blauth W, Hippe P. The surgical treatment of partial

tibial deficiency and ankle diastasis. Prosthet

Orthot Int 1991 Aug;15(2):127-30.

Bowker JH. Neurological aspects of prosthetic/orthotic

practice. J Prosthet Orthot 1993 Apr;5(2):55-8.

Budiman-Mak E, Conrad KJ, Roach KE. The Foot

Function Index: a measure of foot pain and

disability. J Clin Epidemiol 1991;44(6):561-70.

Burl MM, Williams JG, Nayak US. Effects of cervical

collars on standing balance. Arch Phys Med

Rehabil 1992 Dec;73(12):1181-5.

Calmels P, Escafit M, Domenach M, Minaire P.

Posturographic evaluation of the proprioceptive

effect of ankle orthoses in healthy volunteers. Int

Disabil Stud 1991 Apr-Jun;13(2):42-5.

Charney EB, Melchionni JB, Smith DR. Community

ambulation by children with myelomeningocele and

high-level paralysis. J Pediatr Orthop 1991

Sep-Oct;11(5):579-82.

Chase AP, Bader DL, Houghton GR. The

biomechanical effectiveness of the Boston brace in

the management of adolescent idiopathic scoliosis.

Spine 1989 Jun;14(6):636-42.

Closson JB, Toerge JE, Ragnarsson KT, Parsons KC,

Lammertse DP. Rehabilitation in spinal cord

disorders. 3. Comprehensive management of spinal

cord injury. Arch Phys Med Rehabil 1991 Mar;

72(4-S):S298-308.

Conry MA. Orthomedics fracture bracing at LA

County USC Medical Center. J Prosthet Orthot

1992 Apr;4(3):151-6.

Craig GR, Nielsen MS. Rigid cervical collars and

intracranial pressure. Intensive Care Med 1991;

17(8):504-5.

Cron L, Sprigle S. Clinical evalualtion of the Hemi

Wheelchair Cushion. Am J Occup Ther 1993 Feb;

47(2):141-4.

Cunliffe MW. Lumbar spinal orthoses: direct

moulding using thermoplastic mesh sheet. Br J

Occup Ther 1990 Jun;53(6):244-8.

Curry LC, Gibson LY. Congenital hip dislocation: the

importance of early detection and comprehensive

treatment. Nurse Pract 1992 May;17(5):49-55.

Dean E. Clinical decision making in the management

of the late sequelae of poliomyelitis. Phys Ther

1991 Oct;71(10):752-61.

Durham JW, Moskowitz A, Whitney J. Surface

electrical stimulation versus brace in treatment of

idiopathic scoliosis. Spine 1990 Sep;15(9):888-92.

Edelstein JE. Orthotic assessment and management. In:

O’Sullivan SB, Schmitz TJ. Physical rehabilitation:

assessment and treatment. 2nd ed. Philadelphia:

F.A. Davis; 1988. p. 589-614.

Ellis J. Selection and use of orthotic devices. Sports

Med Dig 1992 Jan;14(1):1-2.

Embrey DG, Yates L, Mott DH. Effects of neuro-

developmental treatment and orthoses on knee

flexion during gait: a single-subject design. Phys

Ther 1990 Oct;70(10):626-37.

Eng JJ, Pierrynowski MR. Evaluation of soft foot

orthotics in the treatment of patellofemoral pain

syndrome. Phys Ther 1993 Feb;73(2):62-8;

discussion 68-70.

Ernst E. [Does a supportive muscle corset: prevent

spinal complaints?]. Wien Med Wochenschr 1992;

142(13):291-3. (Ger).

Esquenazi A, Hirai B. Assessment of gait and orthotic

prescription. Phys Med Rehabil Clin North Am

1991 Aug;2(3):473-85.

Feinberg J. Effect of the arthritis health professional

on compliance with use of resting hand splints by

patients with rheumatoid arthritis. Arthritis Care

Res 1992 Mar;5(1):17-23.

Feuerbach JW, Grabiner MD. Effect of the aircast on

unilateral postural control: amplitude and frequency

variables. J Orthop Sports Phys Ther 1993 Mar;

17(3):149-54.

Fisher FR. Assistive devices in rehabilitation: a time

for a change. Can J Rehabil 1991 Winter;5(2):

67-9.

Garber SL, Gregorio TL. Upper extremity assistive

devices: assessment of use by spinal cord-injured

patients with quadriplegia. Am J Occup Ther 1990

Feb;44(2):126-31.

Gardiner HM, Dunn PM. Controlled trial of

immediate splinting versus ultrasonographic

surveillance in congenitally dislocatable hips.

Lancet 1990 Dec 22-29;336(8730):1553-6.

Glover SD, Benson MK. Iliotibial band contracture

after using the Pavlik harness. J Bone Joint Surg

[Br] 1989 May;71(3):535.

Gould N, Moreland M, Alvarez R, Trevino S, Fenwick

J. Development of the child’s arch. Foot Ankle

1989 Apr;9(5):241-5.

Guin P, Hudson A, Gallo J. The efficacy of six heel

pressure reducing devices. Decubitus 1991 Aug;

4(3):15-6, 18, 20 passim.

Holmes GB Jr, Timmerman L. A quantitative

assessment of the effect of metatarsal pads on

plantar pressures. Foot Ankle 1990 Dec;11(3):

141-5.

Hong C, San Luis EB, Chung S. Follow up study on

the use of leg braces issued to spinal cord injury

patients. Paraplegia 1990;28(3):172-7.

Koop SE, Gage JR. [Treatment of deformities of the

locomotor system in hemiplegia]. Orthopade 1992

Sep;21(5):293-300. (Ger).

Lehmann JF, De Lateur BJ, Price R. Ankle foot

orthoses for paresis and paralysis. Phys Med

Rehabil Clin North Am 1992 Feb;3(1):139-59.

Montgomery F, Willner S. Prognosis of brace-treated

scoliosis. Comparison of the Boston and Milwaukee

methods in 244 girls. Acta Orthop Scand 1989

Aug;60(4):383-5.

Moraros J, Hodge W. Orthotic survey. Preliminary

results. J Am Podiatr Med Assoc 1993 Mar;83(3):

139-48.

Mukherjee A, Fabry G. Evaluation of the prognostic

indices in Legg-Calv�-Perthes disease: statistical

analysis of 116 hips. J Pediatr Orthop 1990

Mar-Apr;10(2):153-8.

Nene AV, Kim Y, Spelman FA. An assessment of the

ORLAU ParaWalker-electrical stimulation hybrid

orthosis. In: Kim Y, Spelman FA, eds. Images of

the twenty-first century. Proceedings of the 11th

Annual International Conference of the IEEE

Engineering in Medicine and Biology Society; 1989

Nov 9-12; Seattle, WA. Vol 3. Piscataway (NJ):

IEEE; 1989. p. 1016-7.

Olaogun MOB, Abereoje OK, Obajuluwa VA.

Forward upward leading step test for the clinical

evaluation of locomotor ability. Clin Rehabil 1989

Feb;3(1):41-5.

Patterson K, Michael S. Correcting the sitting posture

of a person with a hindquarter amputation. Aust

Occup Ther J 1991 Mar;38(1):237-40.

Pratt DJ. Long term comparison of some shock

attenuating insoles. Prosthet Orthot Int 1990 Aug;

14(2):59-62.

Pringle RG. Halo versus Minerva--which orthosis?

Paraplegia 1990 Jun;28(5):281-4.

Pun WK, Chow SP, Fang D, Ip FK, Leong JC, Ng C.

A study of function and residual joint stiffness after

functional bracing of tibial shaft fractures. Clin

Orthop 1991 Jun;(267):157-63.

Racette WL. Clinical experience with functional

fracture bracing of the tibial diaphysis. J Prosthet

Orthot 1992 Apr;4(3):142-50.

Regalbuto MA, Rovick JS, Walker PS. The forces in

a knee brace as a function of hinge design and

placement. Am J Sports Med 1989 Jul-Aug;17(4):

535-43.

Rine RR, Ward J, Lindeblad S, Blaker K, Higbie-Smith

T, Verdin A, Gropper M. Comparison of the

effects of ankle-foot orthoses on gait and standing

posture in children with lower extremity spasticity.

In: Woollacott M, Horak F, eds. Posture and gait:

control mechanisms, 1992. Proceedings of the 11th

International Symposium of the Society for Postural

and Gait Research; 1992; Portland, OR. Vol. 2.

Portland (OR): University of Oregon; 1992.

p. 415-8.

Romero PW, Rice J. Clinical suggestions. Clinical use

of the knee hyperextension block orthosis. Pediatr

Phys Ther 1992 Winter;4(4):205-7.

Rosen PB, McSwain NE Jr, Arata M, Stahl S, Mercer

D. Comparison of two new immobilization

collars. Ann Emerg Med 1992 Oct;21(10):

1189-95.

Sanner WH. The functional foot orthosis prescription.

In: Jay RM, ed. Current therapy in podiatric

surgery. Philadelphia: Decker; 1989. p. 302-14.

Tucci JJ, Kumar SJ, Guille JT, Rubbo ER. Late

acetabular dysplasia following early successful

Pavlik harness treatment of congenital dislocation

of the hip. J Pediatr Orthop 1991 Jul-Aug;11(4):

502-5.

Whittle MW, Cochrane GM, Chase AP, Copping AV,

Jefferson RJ, Staples DJ, Fenn PT, Thomas DC.

A comparative trial of two walking systems for

paralysed people. Paraplegia 1991 Feb;29(2):

97-102.

Willers U, Normelli H, Aaro S, Svensson O, Hedlund

R. Long-term results of Boston brace treatment on

vertebral rotation in idiopathic scoliosis. Spine

1993 Mar 15;18(4):432-5.

Wooden MJ. Biomechanical evaluation for functional

orthotics. In: Donatelli R, Wolf SL, eds.

Biomechanics of the foot and ankle. Philadelphia:

F.A. Davis; 1990. p. 131-47. (Contemprary

perspectives in rehabilitation; vol. 3).

ADVERSE EFFECTS

Ahl T, Dalen N, Lundberg A, Bylund C. Early

mobilization of operated on ankle fractures.

Prospective controlled study of 40 biomalleolar

cases. Acta Orthop Scand 1993 Feb;64(1):95-9.

Atar D, Lehman WB, Grant AD. Pavlik harness

pathology. Isr J Med Sci 1991 Jun;27(6):325-30.

Dec KL, Vasquez BR. The Vannini-Rissoli orthosis: a

unique case of thoracic outlet syndrome. Arch

Phys Med Rehabil 1993 Apr;74(4):441-4.

del Pozo LJ, Merino FJ, Imaz M, Vilella J, Campos A.

[Dermatosis in a girl with an orthopedic corset].

Enferm Infecc Microbiol Clin 1990 Nov;8(9):584-5.

(Spa).

Dunn PM. Complications of splintage in congenital

dislocation of the hip [letter]. Arch Dis Child 1992

Apr;67(4):568.

Enzenauer RJ, Nordstrom DM. Anterior interosseous

nerve syndrome associated with forearm band

treatment of lateral epicondylitis. Orthopedics 1991

Jul;14(7):788-90.

Focarile FA, Bonaldi A, Giarolo MA, Ferrari U, Zilioli

E, Ottaviani C. Effectiveness of nonsurgical

treatment for idiopathic scoliosis. Overview of

available evidence. Spine 1991 Apr;16(4):395-401.

Golay W, Lunsford T, Lunsford BR, Greenfield J.

The effect of malleolar prominence on

polypropylene afo rigidity and buckling. J Prosthet

Orthot 1989 Jul;1(4):231-41.

Jones GT, Schoenecker PL, Dias LS. Developmental

hip dysplasia potentiated by inappropriate use of the

Pavlik harness. J Pediatr Orthop 1992 Nov-Dec;

12(6):722-6.

Kaplan SL, Rocco TP, Tun CG, Silverman DI, Kemper

AJ. Acute pulmonary edema following removal of

a spinal orthosis: an unusual complication of a halo

vest. Arch Phys Med Rehabil 1990 Mar;71(3):

255-7.

Langkamer VG, Clarke NM, Witherow P.

Complications of splintage in congenital dislocation

of the hip [see comments]. Arch Dis Child 1991

Nov;66(11):1322-5.

Levine JM, Gross J. Atypical locations of pressure

sores: presentation of two cases. Decubitus 1989

Nov;2(4):44-6.

O’Neill DB, Zarins B, Gelberman RH, Keating TM,

Louis D. Compression of the anterior interosseous

nerve after use of a sling for dislocation of the

acromioclavicular joint. A report of two cases.

J Bone Joint Surg [Am] 1990 Aug;72(7):1100-2.

Odderson IR, Jaffe KM, Sleicher CA, Price R, Kropp

RJ. Gel wheelchair cushions: a potential cold

weather hazard. Arch Phys Med Rehabil 1991

Nov;72(12):1017-20.

Owens C. Necrosis of the skin over the metacarpal as

a result of functional fracture-bracing. A report of

three cases [letter]. J Bone Joint Surg [Am] 1991

Jun;73(5):789.

Rombouts JJ, Kaelin A. Inferior (obturator)

dislocation of the hip in neonates. A complication

of treatment by the Pavlik harness. J Bone Joint

Surg [Br] 1992 Sep;74(5):708-10.

Rook JL, Green RF, Purgliese GN, Silane M.

Thrombosis of axillary-femoral bypass secondary to

prosthesis suspension belt. Arch Phys Med Rehabil

1989 Jul;70(7):559-61.

PROSTHETIC DEVICES

OVERVIEW

al-Turaiki MH, al-Falahi LA. Prosthetics and

orthotics: a survey of centres in the Kingdom of

Saudi Arabia. Prosthet Orthot Int 1992 Apr;16(1):

38-45.

American Board for Certification in Orthotics and

Prosthetics, Inc. 1992 registry of the American

Board for Certification in Orthotics and Prosthetics.

Alexandria (VA): The Board; 1992. 199 p.

American Occupational Therapy Association, Practice

Division. Orthotics, prosthetics: information packet

[bibliography]. Rockville (MD): The Association;

[1989]. 126 p.

American Orthotic and Prosthetic Association. The

illustrated guide to orthotics and prosthetics: O &

P’s comprehensive guide to Medicare codes and

reimbursement. Alexandria (VA): The Association;

1992- .

Artificial body parts [videocassette]. Princeton (NJ):

Films for the Humanities; 1989. 1 videocassette: 26

min., sound, color, 1/2 in.

Banyard R. Artificial limb and appliance centres.

Health Manpow Manage 1989 Jul;15(1):13-5.

Bardot A. L’Appareillage en orthopedie: membres

inferieurs de l’enfant: amputes pour arteriopathie

des membres inferieurs de l’adulte. Montpellier

(France): Sauramps Medical; 1990. 157 p. (Fre).

Baumgartner R. [Amputation, prosthetics and

rehabilitation of tumor patients]. In: Venbrocks R,

ed. Jahrbuch der orthopadie 1991/1992. Zulpich

(Germany): Biermann Verlag; 1991. p. 111-24.

(Ger).

Baumgartner R, Botta P. Amputation und

Prothesenversorgung der unteren Extremitat:

Indikationsstellung, Operative Technik,

Nachbehandlung, Prothesenversorgung,

Gangschulung, Rehabilitation. Stuttgart (Germany):

Enke; 1989. 303 p. (Ger).

Becker HM. [Current state of amputation surgery].

Langenbecks Arch Chir Suppl Ii Verh Dtsch Ges

Forsch Chir 1989:623-5. (Ger).

Becker HM, Neufeldt KH, Furgani P, Niedermeier H.

[Current status of amputation surgery]. Zentralbl

Chir 1990;115(14):857-63. (Ger).

Boccolini F. Reabilitacao: amputados, amputacoes,

proteses. Sao Paulo (Brazil): Robe; 1990. 254 p.

(Por).

Bowker JH. Critical choices: the art of prosthesis

prescription. In: Bowker JH, Michael JW, eds.

Atlas of limb prosthetics: surgical, prosthetic, and

rehabilitation principles. 2nd ed. St. Louis: Mosby

Year Book; 1992. p. 717-20.

Bowker JH, Michael JW, eds. Atlas of limb prosthetics:

surgical, prosthetic, and rehabilitation principles.

2nd ed. St. Louis: Mosby Year Book; 1992. 930 p.

Calvo KE, Michael JW. Prosthetics. In: Nickel VL,

Botte MJ, eds. Orthopaedic rehabilitation. 2nd ed.

New York: Churchill Livingstone; 1992. p. 127-37.

Childress DS. Hector Kay, Alan Kay, and the future

of prosthetics and orthotics (Hector Kay Memorial

Lecture). J Assoc Child Prosthet Orthot Clin 1989

Summer-Autumn;24(2-3):40-6.

Cobb JW. Models for delivery of prosthetic services

to geriatric patients. Top Geriatr Rehabil 1992 Sep;

8(1):59-63.

Colburn J, Ibbotson V. Amputation. In: Turner A,

Foster M, Johnson SE, eds. Occupational therapy

and physical dysfunction: principles, skills, and

practice. Edinburgh: Churchill Livingstone; 1992. p.

627-53.

Cole WG. Orthotics and prosthetics in the management

of limb inequality. In: Menelaus MB, ed.

Management of limb inequality. Edinburgh:

Churchill Livingstone; 1991. p. 59-70.

A compendium of rehabilitation technology research

supported by NIDRR: national workshop on

rehabilitation technology; 1990 Oct 3-4;

Washington, DC. Washington (DC): Electronic

Industries Foundation, Rehabilitation Center; 1990.

278 p.

Connolly K. Artificial limb cosmesis design: a study

of materials and production methods for improved

performance [dissertation]. Guildford (UK):

University of Surrey; 1990. 310 p.

Cotter DH. Artificial limbs. Br Med J (Clin Res Ed)

1988 Apr 23;296(6630):1185-7.

Edelstein JE. Prosthetic assessment and management.

In: O’Sullivan SB, Schmitz TJ. Physical

rehabilitation: assessment and treatment. 2nd ed.

Philadelphia: F.A. Davis; 1988. p. 407-33.

Esquenazi A, Leonard JA Jr, Meier RH 3d, Hicks JE,

Fisher SV, Nelson VS. Prosthetics, orthotics, and

assistive devices. 3. Prosthetics. Arch Phys Med

Rehabil 1989 May;70(5-S):S206-9.

Evans DG, Thakker Y, Donnai D. Heredity and

dysmorphic syndromes in congenital limb

deficiencies. Prosthet Orthot Int 1991 Aug;15(2):

70-7.

Ewerbeck V, Koster G. [Basic principles of

amputation surgery. Surgical strategy, postoperative

treatment and provision of prostheses]. Dtsch

Krankenpflegez 1989 Mar;42(3):142-6. (Ger).

Federal supply catalog. Section IX. Prosthetic

Distribution Center centrally managed items.

Washington (DC): Dept. of Veterans Affairs, Office

of Acquisition and Materiel Management; 1991.

220 p.

Friedmann LW. Prosthetics. Phys Med Rehabil Clin

North Am 1991 May;2(2):i-iii,1-436.

Fyfe NC. An audit of amputation levels in patients

referred for prosthetic rehabilitation. Prosthet

Orthot Int 1990 Aug;14(2):67-70.

Garrett JF. Technology overseas. In: Technology for

the future decade. RESNA ’89: proceedings of the

12th annual conference; 1989 Jun 25-30; New

Orleans, LA. Washington (DC): RESNA Press;

1989. p. 34.

Goldberg B. The orthopaedist as prosthetic team

leader: getting the best for your patient from the

team. Instr Course Lect 1990;39:353-4.

Gregory-Dean A. Amputations: statistics and trends.

Ann R Coll Surg Engl 1991 May;73(3):137-42.

Gyorki JR. Enabling the disabled. Mach Des 1991

Nov 7;63(22):108-13.

Ham R, Cotton LT. Limb amputation: from aetiology

to rehabilitation. London: Chapman & Hall; 1991.

229 p. (Therapy in practice series; no. 23).

Ham RO, Roberts CV, Luff R. A five-year review of

referrals for prosthetic treatment in England, Wales

and Northern Ireland, 1981-85. Health Trends

1989 Feb;21(1):3-6.

Huber JH. Instructing college students in use of

wheelchair and prosthetics. Palaestra 1989 Winter;

5(2):41-6.

Huckstep RL. Appropriate surgery and appliances for

patients with deformities and paralysis in

developing countries. Instr Course Lect

1992;41:461-9.

James WV. Principles of limb fitting and prostheses.

Ann R Coll Surg Engl 1991 May;73(3):158-62.

Jones D, Smart H, Hughes J. A bibliographic database

and information retrieval system in prosthetics and

orthotics. Health Bull (Edinb) 1991

Jul;49(4):277-84.

Jones LE. Prosthetic limb use in Australia 1981-1985

under the Free Limb Scheme. Prosthet Orthot Int

1989 Aug;13(2):76-81.

Jones LE, Lipson A. The care of the limb deficient

child in Australia. Prosthet Orthot Int 1991

Aug;15(2):140-2.

Keal EE. Spare artificial legs [letter]. BMJ 1990

Jan 20;300(6718):195.

Keetarut S. Spare artificial legs. BMJ 1989 Nov 18;

299(6710):1260.

Kejer AN, Roschkow AW, Schtscherbina KK.

[Creation of a weight-bearing leg stump and the

fitting for a prosthesis]. Z Orthop 1990 Nov-Dec;

128(6):632-6. (Ger).

Krebs DE. Prosthetics and orthotics. In: Scully RM,

Barnes MR, Canfield JS, et al., eds. Physical

therapy. Philadelphia: Lippincott; 1989.

p. 998-1051.

Kybard P. Prosthetics lead the way. Electron Wirel

World 1989 Feb;95(1636):176-7.

Lane JM, Kroll MA, Rossbach PG. New advances

and concepts in amputee management after

treatment for bone and soft-tissue sarcomas. Clin

Orthop 1990 Jul;(256):22-8.

Leonard JA Jr, Esquenazi A, Fisher SV, Hicks JE,

Meier RH 3d, Nelson VS. Prosthetics, orthotics,

and assistive devices. 1. General concepts. Arch

Phys Med Rehabil 1989 May;70(5-S):S195-201.

Limb M, Calnan M. Artificial limbs: a real need.

Health Serv J 1990 Nov 15;100(5227):1696-7.

Medicare program; carrier jurisdiction for claims for

durable medical equipment, prosthetics, orthotics

and supplies (DMEPOS) and other issues involving

suppliers, and criteria and standards for evaluating

regional DMEPOS carriers--HCFA. Final rule with

comment period. Fed Regist 1992 Jun 18;57(118):

27290-308.

Nelson VS, Leonard JA Jr, Fisher SV, Esquenazi A,

Hicks JE. Prosthetics, orthotics, and assistive

devices. 2. Specialized seating and assistive devices.

Arch Phys Med Rehabil 1989 May;70(5-S):S202-5.

NERAC, Inc. (Tolland, CT). Biomedical equipment:

artificial organs and prostheses (latest citations from

Information Services in Mechanical Engineering

Database) [bibliography]. Springfield (VA): NTIS;

1992 Oct. 195 citations minimun. PB93851400XSP.

(Supercedes PB90867805).

NERAC, Inc. (Tolland, CT). Limb and hip prostheses

(latest citations from the U.S. Patent Database)

[bibliography]. Springfield (VA): NTIS; 1992 Dec.

250 citations. PB93856862. (Supercedes

PB90868274).

NERAC, Inc. (Tolland, CT). Multifunctional artificial

limbs. January 1976 - November 1985. A

bibliography from INSPEC: Information Services for the Physics and Engineering Communities

Database. Springfield (VA): NTIS; 1990 May. 182

p. 229 citations. PB90868613XSP.

NERAC, Inc. (Tolland, CT). Multifunctional artificial

limbs; latest citations from the INSPEC:

Information Services for the Physics and

Engineering Communities Database. December

1985 - April 1992 [bibliography]. Springfield (VA):

NTIS; 1992 Jun. 188 citations. PB92855428XSP.

NERAC, Inc. (Tolland, CT). Prosthetic devices and

materials: biocompatibility: bibliography from the

BioBusiness database. Springfield (VA): NTIS;

1992 Jun. 250 citations. PB9285422231.

(Supercedes PB90865452).

Nicholas JJ, Robinson LR, Schulz R, Blair C, Aliota R,

Hairston G. Problems experienced and perceived

by prosthetic patients. J Prosthet Orthot 1993 Jan;

5(1):16-9.

Nielsen CC. A survey of amputees: functional level

and life satisfaction, information needs, and the

prosthetist’s rolee. J Prosthet Orthot 1991 Spring;

3(3):125-9.

Nihon Seikei Geka Gakkai; Nihon Rihabiriteshon

Igakki, et al. Gishi sogu shoho manyuaru. Tokyo:

Igaku Shoin; 1990. 143 p. (Jpn).

Nihon Seikei Geka Gakkai, Nihon Rihabiriteshon

Igakkai Dai 3-han. Gishi sogu no chekku pointo.

Tokyo: Igaku Shoin; c1987, 1989. 291 p. (Jpn).

Novotny MP, Childress DS. Northwestern University

initiates prosthetics/orthotics information and

education resource. J Assoc Child Prosthet Orthot

Clin 1989 Spring;24(1):1-5.

Orpwood RD. Design methodology for aids for the

disabled. J Med Eng Technol 1990 Jan-Feb;14(1):

2-10.

Paul JP, Barbenel JC, Courtney JM, Kenedi RM, eds.

Progress in bioengineering: Strathclyde

bioengineering seminars: proceedings of an

International Seminar held on the Occasion of the

25th Anniversary of the Strathclyde Bioengineering

Unit; 1988 Sep; Glasgow, Scotland. New York: A.

Hilger; 1989. 299 p.

Pedretti LW, Pasquinelli S. Amputations and

prosthetics. In: Pedretti LW, Zoltan B.

Occupational therapy: practice skills for physical

dysfunction. 3rd ed. St. Louis: Mosby; 1990.

p. 419-44.

Phillips CA, ed. Effective upper & lower extremity

prostheses. New York: Gordon & Breach Science

Publ.; 1989. 276 p. (Automedica; v.11, no.1-3).

Pike AC, Nattress LW Jr. The changing role of the

amputee in the rehabilitation process. Phys Med

Rehabil Clin North Am 1991 May;2(2):405-14.

Polymeric prosthetic devices and materials: January

1970 - May 1989 :bibliography from U.S. Patent

Database. Springfield (VA): NTIS; 1989 Jun.

114 p. 257 citations. PB89863245XSP.

Presperin JJ, ed. Capitalizing on technology:

proceedings of the RESNA 13th annual conference;

1990 Jun 15-20; Washington, DC. Washington

(DC): RESNA Press; 1990. 445 p.

Presperin JJ, ed. Technology for the next decade.

RESNA ’89: proceedings of the 12th annual

conference; 1989 Jun 25-30; New Orleans, LA.

Washington: RESNA Press; 1989 Jun. 481 p.

Prosthetic devices. January 1974 - December 1989:

bibliography from International Aerospace Abstracts

database. Springfield (VA): NTIS; 1990 Mar. 78 p.

174 citations. PB90862600XSP.

Rehabilitation R & D progress reports 1988. J Rehabil

Res Dev 1989 Feb;25 Suppl:1-419.

Rehabilitation R&D progress reports 1989. J Rehabil

Res Dev 1990 Feb;26 Suppl:1-509.

Rehabilitation R&D progress reports 1990. J Rehabil

Res Dev 1991 Winter;28(1):1-535.

RESNA ’90: capitalizing on technology for people with

disabilities. Proceedings of the 13th annual

conference; 1990 Jun 15-20; Washington, DC.

Washington (DC): RESNA Press; 1990. 445 p.

RESNA ’91: technology for the nineties. Proceedings of

the 14th annual conference; 1991 Jun 21-26;

Kansas City, MO. Washington (DC): RESNA

Press; 1991. 442 p.

RESNA ’92: technology for consumers. Proceedings of

the 15th annual conference; 1992 Jun 6-11;

Toronto, Canada. Washington (DC): RESNA Press;

1992. 657 p.

Sabolich J. Sabolich Prosthetic and Research Center

documentary [videocassette]. Oklahoma City: The

Center; 1992. 1 videocassette: 120 min., sound,

color, 1/2 in.

Shin DY. Advances in rehabilitation technology.

Introduction. Adv Clin Rehabil 1990;3:3-9.

Shurr DG, Cook TM. Prosthetics & orthotics. Norwalk

(CT): Appleton & Lange; 1990. 225 p.

Snell F. Bringing prosthetics into the 21st century.

J Ark Med Soc 1992 Dec;89(7):337-8.

Stelarc. Prosthetics, robotics and remote existence:

postevolutionary strategies. Leonardo 1991;24(5):

591-5.

Symposium: Amputations and artificial limbs. Clin

Orthop 1990 Jul;(256):1-86.

United States Congress, Senate, Committee on

Veterans’ Affairs. Oversight on VA prosthetics

and special disabilities programs : hearing

101-1043; before the Committee on Veterans’

Affairs, United States Senate, One Hundred First

Congress, second session, June 7, 1990.

Washington (DC): U.S. Government Printing

Office; 1990. 398 p.

University of Strathcylde, National Centre for Training

and Education in Prosthetics and Orthotics

(Scotland), RECAL Information Services. RECAL

thesaurus: prosthetics, orthotics, and rehabilitation.

Glasgow (UK): RECAL Information Services;

1988. 209 p.

Walsh NE, Lancaster JL, Faulkner VW, Rogers WE.

A computerized system to manufacture prostheses

for amputees in developing countries. J Prosthet

Orthot 1989 Apr;1(3):165-81.

Ward RS, Hayes-Lundy C, Schnebly WA, Saffle JR.

Prosthetic use in patients with burns and associated

limb amputations. J Burn Care Rehabil 1990

Jul-Aug;11(4):361-4.

Watanabe H. [Recent research in prosthetics and

orthotics]. Nippon Seikeigeka Gakkai Zasshi 1991

Apr;65(4):271-5. (Jpn).

Watts HG. Differences between a child and an adult

amputee. Contemp Orthop 1992 Jan;24(1):33-40.

Williamson VC. Amputation of the lower extremity:

an overview. Orthop Nurs 1992 Mar-Apr;11(2):

55-65.

Wilson AB Jr. Limb prosthetics. 6th ed. New York:

Demos; 1989. 122 p.

DESIGN & MATERIALS

Ai-Kah S, Chee-Kiong S, Lau WS. Method for the

design and analysis of a non-linear anisotropic

lower limb prosthetic socket. J Biomed Eng 1990

Nov;12(6):470-6.

Amirova EK, Efimov VA, Kuzhekin AP, Lunina NV,

Slepchenko AN, Ul’ianov SV, Khanukaev AS,

Shakhnazarov MM, Shakhnazarova IV, Shishkin

BV. [An expert system for choosing prostheses for

the lower extremities (hip) and assessing the quality

of the prosthesis. I.]. Med Tekh 1991 May-Jun;

(3):26-31. (Rus).

Amirova EK, Efimov VA, Kuzhekin AP, Lunina NV,

Slepchenko AN, Ul’ianov SV, Khanukaev AS,

Shakhnazarov MM, Shakhnazarova IV, Shishkin

BV. [Expert system of choosing lower limb (thigh)

prosthesis and diagnosis of the quality of

prosthetics (II)]. Med Tekh 1991 Nov-

Dec;(6):5-12. (Rus).

Banzinger E. Surlyn socket designs for the young

child. J Assoc Child Prosthet Orthot Clin 1989

Spring;24(1):12-3.

Bergamasco M, Salsedo F, Dario P. Shape memory

alloy micromotors for direct-drive actuation of

dexterous artificial hands. Sensors Actuators 1989

May 3;17(1-2):115-9. Paper presented at:

EUROSENSORS II, the 4th Symposium on Sensors

and Actuators; 1989 May 3; Enschede, Netherlands.

Besser MP. An investigation of the stump-socket

interface of the patellar-tendon bearing below-knee

prosthesis [dissertation]. Philadelphia: Drexel

University; 1991. 84 p.

Bok SH, Bhattacharjee A, Nee AY, Pho RW, Teoh SH,

Lim SY. Computer-Aided Design and Computer-

Aided Manufacture (CAD-CAM) applications in

cosmetic below-elbow prostheses. Ann Acad Med

Singapore 1990 Sep;19(5):699-705.

Boone DA, Burgess EM. Automated fabrication of

mobility aids: clinical demonstration of the ucl

computer aided socket design system. J Prosthet

Orthot 1989 Apr;1(3):187-90.

Brant JE. Technical note: a device to assist in the

alignment and finishing of the syme’s prosthesis.

J Prosthet Orthot 1991 Winter;3(2):100-5.

Cappa AJ. The below-knee bypass prosthesis.

J Prosthet Orthot 1992 Apr;4(3):166-70.

Carlson JM, French J. Knee orthoses for valgus

protection. Experiments on 11 designs with related

analyses of orthosis length and rigidity. Clin

Orthop 1989 Oct;(247):175-92.

Carlson LE, Heim R. Holding assist for a voluntary-

closing prosthetic prehensor. ASME Dyn Syst

Control Div Publ 1989;17:79-87.

Carrico F. Rapid anthropometry for cad/cam design in

prosthetics and orthotics. In: Technology for the

future decade. RESNA ’89: proceedings of the 12th

annual conference; 1989 Jun 25-30; New Orleans,

LA. Washington (DC): RESNA Press; 1989.

p. 157-8.

Chappell PH, Kyberd PJ. Prehensile control of a hand

prosthesis by a microcontroller. J Biomed Eng

1991 Sep;13(5):363-9.

Childress DS, Krick H, Heckathorne CW, Uellendahl J.

Positive-locking components and hybrid fitting

concepts for persons with high level bilateral arm

amputations. In: Technology for the future decade.

RESNA ’89: proceedings of the 12th annual

conference; 1989 Jun 25-30; New Orleans, LA.

Washington (DC): RESNA Press; 1989. p. 296-7.

Connolly K. Artificial limb cosmesis design: a study

of materials and production methods for improved

performance [dissertation]. Guildford (UK):

University of Surrey; 1990. 310 p.

Czerniecki JM, Gitter A, Munro C. Joint moment and

muscle power output characteristics of below knee

amputees during running: the influence of energy

storing prosthetic feet. J Biomech 1991;

24(1):63-75. Published erratum appears in

J Biomech 1991;24(3-4):271-2.

Daley TL, Scott RN, Parker PA, Lovely DF. Operator

performance in myoelectric control of a

multifunction prosthesis stimulator. J Rehabil Res

Dev 1990 Winter;27(1):9-20.

Dalsey R, Gomez W, Seitz WH Jr, Dick HM, Hutnick

G, Akdeniz R. Myoelectric prosthetic replacement

in the upper-extremity amputee. Orthop Rev 1989

Jun;18(6):697-702.

DiAngelo DJ, Winter DA, Ghista DN, Newcombe WR.

Performance assessment of the Terry Fox jogging

prosthesis for above-knee amputees. J Biomech

1989;22(6-7):543-58.

Dietzen CJ, Harshberger J, Pidikiti RD. Suction sock

suspension for above-knee prostheses. J Prosthet

Orthot 1991 Winter;3(2):90-3.

Dixon P. Rehabilitation resources in certain Islamic

countries [letter]. Prosthet Orthot Int 1990 Dec;

14(3):145.

Dobner DL. A prosthetic harness adaptation. Arch

Phys Med Rehabil 1990 May;71(6):436-8.

Edelstein JE. Current choices in prosthetic feet. Crit

Rev Phys Rehabil Med 1991;2(4):213-26.

Ehrler S, Buch-Jaeger N. [Hand prosthesis.

Conception and surveillance]. Soins Chir 1991

May;(123):34-6. (Fre).

Erhart C, Barnsteiner KH. [Possibilities with provision

of temporary prostheses]. Dtsch Krankenpflegez

1989 Mar;42(3):150-3. (Ger).

Esquenazi A, Leonard JA Jr, Meier RH 3d, Hicks JE,

Fisher SV, Nelson VS. Prosthetics, orthotics, and

assistive devices. 3. Prosthetics. Arch Phys Med

Rehabil 1989 May;70(5-S):S206-9.

Esquenazi A, Torres MM. Prosthetic feet and ankle

mechanisms. Phys Med Rehabil Clin North Am

1991 May;2(2):299-309.

Faulkner VW, Walsh NE. Computer designed

prosthetic socket from analysis of computed

tomography data. J Prosthet Orthot 1989 Apr;

1(3):154-64.

Fillauer CE, Pritham CH, Fillauer KD. Evolution and

development of the silicone suction socket (3s) for

below-knee prostheses. J Prosthet Orthot 1989 Jan;

1(2):99-103.

Fletchall S, Tran T, Ungaro V, Hickerson W.

Updating upper extremity temporary prosthesis:

thermoplastics. J Burn Care Rehabil 1992

Sep-Oct;13(5):584-6.

Gard SA, Childress DS, Heckathorne CW.

Micropower, strain-gauge sampling circuit for

prosthetic limb applications. Med Biol Eng

Comput 1992 Mar;30(2):243-7.

Greenberg SL, Dudgeon BJ, Libby AK, Jaffee KM.

Transition from a voluntary opening to a voluntary

closing terminal device: case report. J Assoc Child

Prosthet Orthot Clin 1990 Spring;25(1):6-8.

Guha SK, Anand S, Sharma J. Foot-controlled

artificial arm with complementary activation by

body power. Automedica 1989;11:201-7.

Guha SK, Chaudhry KK. A practical approach to

multifunctional above knee prosthesis. Automedica

1989;11:233-45.

Guttenberg U, Rogoll G, Vossius G. [Measuring force

distribution of the hand surface in grasping].

Biomed Tech (Berlin) 1989;34 Suppl:157-8. (Ger).

Haberman LJ. The garden state tri-wall expansion

socket system (tess). J Prosthet Orthot 1989 Jul;

1(4):213-9.

Haberman LJ, Bedetto RA, Colodney EJ. Silicone-

only suspension (SOS) for the above-knee amputee.

J Prosthet Orthot 1992 Winter;4(2):76-85.

Hays RD, Leimkuehler JP, Miknevich MA, Troyer D.

An alternative bent-knee prosthesis. Arch Phys

Med Rehabil 1992 Nov;73(11):1118-21.

Heckathorne CW. Characterization of a force-sensitive

resistive transducer for application to prosthesis

control. In: Technology for the future decade.

RESNA ’89: proceedings of the 12th annual

conference; 1989 Jun 25-30; New Orleans, LA.

Washington (DC): RESNA Press; 1989. p. 224-5.

Heckathorne CW. Manipulation in unstructured

environments: extended physiological

proprioception, position control, and arm

prostheses. Paper presented at: International

Conference on Rehabilitation Robotics; 1990.

[15 p.].

Heimke G. Biomaterials highlights. V. Percutaneous

amputation stump extensions. Adv Mater 1990

Apr;2(4):189-91.

The Henry Ford Hospital cosmetic foot prosthesis

[videocassette]. Park Ridge (IL): American

Academy of Orthopedic Surgeons; [1991]. 1

videocassette: 8 min., 18 sec., sound, color, 1/2 in.

Credits: Kent K. Wu.

Hillstrom HJ. Robust intent recognition for the control

of myoelectric lower limb prosthesis [dissertation].

Philadelphia: Drexel University; 1989. 137 p.

Hiraiwa A, Shimohara K, Tokunaga Y. EMG pattern

analysis and classification by neural network. In:

1989 IEEE International Conference on Systems,

Man and Cybernetics. Conference proceedings;

1989 Nov 14-17; Cambridge, MA. Vol. 3. New

York: IEEE; 1989. p. 1113-5.

Hirons RR, Williams KB, Amor RF, Day HJ. The

prosthetic treatment of lower limb deficiency.

Prosthet Orthot Int 1991 Aug;15(2):112-6.

Houghton A, Allen A, Luff R, McColl I.

Rehabilitation after lower limb amputation: a

comparative study of above-knee, through-knee and

Gritti-Stokes amputations. Br J Surg 1989 Jun;

76(6):622-4.

Houston VL. Considerations in optical digitization of

lower limb segments for prosthetics CADS/CAM.

In: Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 153-4.

Houston VL, Burgess EM, Childress DS, Lehneis HR,

Mason CP, Garbarini MA, LaBlanc KP, Boone DA,

Chan RB, Harlan JH, et al. Automated fabrication

of mobility aids (AFMA): below-knee CASD/CAM

testing and evaluation program results. J Rehabil

Res Dev 1992 Fall;29(4):78-124.

International Society for the Study of Custom

Prostheses. San Francisco, USA, October 17-19,

1991. Abstracts. J Bone Joint Surg [Br] 1992;

74 Suppl 2:161-89.

Ishal VA. [Rubber hinges in prostheses]. Ortop

Travmatol Protez 1991 Jul;(7):54-5. (Rus).

Jungmichel D, Neubert G, Kortmann U. [A new

prosthetic smooth wall shaft]. Beitr Orthop

Traumatol 1990 Oct;37(10):580-3. (Ger).

Kabra SG. Articulated cadaveric bones as a structural

endoskeleton in an ankle-foot prosthesis: a

preliminary report. J Rehabil Res Dev 1990

Winter;27(1):43-52.

Kabra SG, Narayanan R. Ankle-foot prosthesis with

articulated human bone endoskeleton: force-

deflection and fatigue study. J Rehabil Res Dev

1991 Summer;28(3):13-22.

Kato A, Ito K, Ito M. [Compliant motion of ultrasonic

motor by phase difference control]. Trans Soc Instr

Control Eng 1991;27(11):1290-5 (Jpn).

Kohler P, Lindh L, Netz P. Comparison of CAD-

CAM and hand made sockets for PTB prostheses.

Prosthet Orthot Int 1989 Apr;13(1):19-24.

Krouskop TA, Malinauskas M, Williams J, Barry PA,

Muilenburg AL, Winningham DJ. A computerized

method for the design above-knee prosthetic

socketse. J Prosthet Orthot 1989 Apr;1(3):131-8.

Kruit J, Cool JC. Body-powered hand prosthesis with

low operating power for children. J Med Eng

Technol 1989 Jan-Apr;13(1-2):129-33.

Kyberd PJ. Algorithmic control of a multifunction

hand prosthesis [dissertation]. Highfield (UK):

University of Southampton; 1990.

Lancaster JL, Walsh N, Faulkner V. Basic theory,

design, and preliminary evaluation of a laser

scanner for shape sensing below-the-knee amputees.

Med Phys 1990 Mar-Apr;17(2):305-10.

Lancaster JL, Walsh N, Faulkner V. Evaluation of a

laser scanner for shape sensing btk amputees. In:

Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 155-6.

Lange LR. The Lange silicone partial foot prosthesis.

J Prosthet Orthot 1991 Fall;4(1):56-62.

Lasudry N, Warzee G, Van Rolleghem J. [Image

processing and use of CAD in prosthesis

manufacturing]. Onde Electr 1991 Jul-Aug;71(4):

45-8 (Fre).

LeBlanc M. Current evaluation of hydraulics to

replace the cable force transmission system for

body-powered upper-limb prostheses. Assist

Technol 1990;2(3):101-7.

Levesque C, Gauthie-Gagnon C, Fillauer KD. An

improved downhill skiing prosthesis. J Prosthet

Orthot 1989 Jan;1(2):104-9.

Levesque C, Gauthier-Gagnon C, Beauregard M. An

endoskeletal hip disarticulation prosthesis for the

toddler. J Prosthet Orthot 1991 Spring;3(3):120-4.

Lilja M, Johansson T, Oberg T. Movement of the tibial

end in a PTB prosthesis socket: a sagittal X-ray

study of the PTB prosthesis. Prosthet Orthot Int

1993 Apr;17(1):21-6.

Madden M. Fabricating the spiral and hemi-spiral

orthosis using a composite lay-up technique.

J Prosthet Orthot 1991 Winter;3(2):94-9.

Madigan RR, Fillauer KD. 3-S prosthesis: a

preliminary report. J Pediatr Orthop 1991

Jan-Feb;11(1):112-7.

Masi J, Nelson T, Skewes E. Active ventilation of

above- and below-knee prosthetic devices. In:

Proceedings of the 16th Annual Northeast

Bioengineering Conference; 1990 Mar 26-27; State

College, PA. New York: IEEE; 1990. p. 25-6.

Mathews D, Burgess E, Boone D. The all-terrain foot.

J Prosthet Orthot 1993 Jan;5(1):29-30.

Meadows CB, Stallard J, Wright D, Gordon L, Major

RE, Jones N. The Edinburgh-ORLAU prosthetic

system to provide reciprocal locomotion in children

and adults with complete transverse lower limb

deficiency. Prosthet Orthot Int 1990 Dec;14(3):

111-6.

Meanley S. The development of a prototype patella

tendon bearing prosthesis using high-density

polyethylene piping (the drainpipe leg). Proc Inst

Mech Eng [H] 1991;205(2):121-3.

Mehdan M. Tactile sensing for automata and

prosthesis [dissertation]. London: Council for

National Academic Awards; 1989. 290 p.

Merlette J. Springlite foot: a composite material

engineer’s approach to design. J Assoc Child

Prosthet Orthot Clin 1989 Winter;24(4):86- .

Michael JW. Current concepts in above-knee socket

design. Instr Course Lect 1990;39:373-8.

Michael JW. New developments in prosthetic feet for

sports and recreation. Palaestra 1989 Winter;5(2):

21-2, 32, 34-5.

Michael JW. Reflections on cad/cam in prosthetics

and orthotics. J Prosthet Orthot 1989 Apr;1(3):

116-21.

Michael JW, Gailey RS, Bowker JH. New

developments in recreational prostheses and

adaptive devices for the amputee. Clin Orthop

1990 Jul;(256):64-75.

Michael JW, Perry CD, Whitfield ML, Ferment RP.

Technical note: simplified alignment of articulations

to positive models. J Prosthet Orthot 1993 Jan;

5(1):31-3.

Moran BJ, Buttenshaw P, Mulcahy M, Robinson KP.

Through-knee amputation in high-risk patients with

vascular disease: indications, complications and

rehabilitation. Br J Surg 1990 Oct;77(10):1118-20.

Nakamura T, Hatano E. Process of development and

application of porous plastic to prosthetic sockets.

J Prosthet Orthot 1989 Jul;1(4):202-10.

Neff G. [Prosthetic management of amputees].

Langenbecks Arch Chir Suppl Ii Verh Dtsch Ges

Forsch Chir 1989:655-6. (Ger).

NERAC, Inc. (Tolland, CT). Limb and hip prostheses

(latest citations from the U.S. Patent Database)

[bibliography]. Springfield (VA): NTIS; 1992 Dec.

250 citations. PB93856862. (Supercedes

PB90868274).

Oberg K, Kofman J, Karisson A, Lindstrom B, Sigblad

G. The Capod system - a Scandinavian

CAD/CAM system for prosthetic sockets.

J Prosthet Orthot 1989 Apr;1(3):139-48.

Patil KM, Chakraborty JK. Analysis of a new

polycentric above-knee prosthesis with a pneumatic

swing phase control. J Biomech 1991;24(3-4):

223-33.

Patton JG, Shida-Tokeshi J, Setoguchi Y. Prosthetic

components for children. Phys Med Rehabil 1991

Jun;5(2):245-64;

Peeraer L, Tilley K, Van der Perre G. A computer-

controlled knee prosthesis: a preliminary report.

J Med Eng Technol 1989 Jan-Apr;13(1-2):134-5.

Perry J, Auuappa E, Torburn L. Elastic response feet

[letter]. J Rehabil Res Dev 1992 Spring;29(2):137.

Phillips CA. Modify the disability--not just the

environment [editorial]. Automedica 1989;11(1-3):

1-3.

Pho RW, Lim SY, Pereira BP. Computer applications

in orthopaedics. Ann Acad Med Singapore 1990

Sep;19(5):691-8.

Pinelli P. [Designing prostheses for elite athletes of

the Federation Francaise Handisport]. Cinesiologie

1989 Nov-Dec;128:343-5. (Fre).

Pinzur MS, Littooy F, Osterman H, Schwartz D. A

safe, pre-fabricated, immediate postoperative

prosthetic limb system for rehabilitation of below-

knee amputations. Orthopedics 1989 Oct;12(10):

1343-5.

Polymeric prosthetic devices and materials: January

1970 - May 1989: bibliography from U.S. Patent

Database. Springfield (VA): NTIS; 1989 Jun.

114 p. 257 citations. PB89863245XSP.

Pritham CH. Biomechanics and shape of the above-

knee socket considered in light of the ischial

containment concept. Prosthet Orthot Int 1990 Apr;

14(1):9-21.

Pritham CH. Special considerations: emerging trends in

lower-limb prosthetics: research and development.

In: Bowker JH, Michael JW, eds. Atlas of limb

prosthetics: surgical, prosthetic, and rehabilitation

principles. St. Louis: Mosby Year Book; 1992.

p. 655-61.

Proctor S, LeBlanc M. Clinical evaluation of a new

design prosthetic prehensor. J Prosthet Orthot 1991

Winter;3(2):79-83.

Prosthetic devices. January 1974 - December 1989:

bibliography from International Aerospace Abstracts

database. Springfield (VA): NTIS; 1990 Mar. 78p.

174 citations. PB90862600XSP.

Quesada P, Skinner HB. Analysis of a below-knee

patellar tendon-bearing prosthesis: a finite element

study. J Rehabil Res Dev 1991 Summer;28(3):

1-12.

Radocy B. Prosthetic control biomechanics and

voluntary closing prehensors: technical note.

J Assoc Child Prosthet Orthot Clin 1990

Spring;25(1):9-10.

Reynolds DP, Lord M. Interface load analysis for

computer-aided design of below-knee prosthetic

sockets. Med Biol Eng Comput 1992 Jul;30(4):

419-26.

Riechmann ME, Pappas M, Findley T, Jain S, Hodgins

J, Fox MD, Epstein MAF, Davis RB, Alward TM.

Computer-aided design and computer-aided

manufacturing of below-knee prosthetics. In:

Proceedings of the 17th Annual Northeast

Bioengineering Conference; 1991 Apr 4-5;

Hartford, CT. New York: IEEE; 1991. p. 154-5.

Rooney JE, Pinzur MS. An easy-to-fabricate

temporary syme’s prosthesis. J Prosthet Orthot

1989 Jul;1(4):211-2.

Rothschild V. Technical note: a casting and

modification method for the narrow m.l. socket.

J Prosthet Orthot 1989 Jul;1(4):199-201.

Rothschild VR, Fox JR, Michael JW, Rothschild RJ,

Playfair G. Clinical experience with total

thermoplastic lower limb prosthesese. J Prosthet

Orthot 1990 Fall;3(1):51-4.

Russell DL. An analysis of constrained motions in

manipulation [dissertation]. Cambridge (MA):

Massachusetts Institute of Technology; 1990.

Ryder RA. Occupational therapy for a patient with a

bilateral Krukenberg amputation. Am J Occup

Ther 1989 Oct;43(10):689-91.

Saadah ES. Swimming devices for below-knee

amputees. Prosthet Orthot Int 1992 Aug;16(2):

140-1.

Saadah ESM. Rehabilitation of a below-knee amputee

with a diving limb. Clin Rehabil 1989 Aug;3(3):

249-51.

Sabolich J. Sabolich Prosthetic and Research Center

documentary [videocassette]. Oklahoma City: The

Center; 1992. 1 videocassette: 120 min., sound,

color, 1/2 in.

Sanders JE, Daly CH, Boone DA, Donaldson TF. An

angular alignment measurement device for

prosthetic fitting. Prosthet Orthot Int 1990 Dec;

14(3):143-4.

Saunders CG, Bannon M, Sabiston RM, Panych L,

Jenks SL, Wood IR, Raschke S. The canfit

system: shape management technology for

prosthetic and orthotic applications. J Prosthet

Orthot 1989 Apr;1(3):122-30.

Schmaman J, Carr L. Acrylic resin finger prosthesis.

J Hand Surg [Br] 1992 Dec;17(6):673-4.

Sears HH. Approaches to prescription of body

powered and myoelectric prostheses. Phys Med

Rehabil Clin North Am 1991 May;2(2):361-71.

Sears HH. Special considerations: trends in upper-

extremity prosthetics development. In: Bowker JH,

Michael JW, eds. Atlas of limb prosthetics:

surgical, prosthetic, and rehabilitation principles. St.

Louis: Mosby Year Book; 1992. p. 345-56.

Sears HH, Shaperman J. Proportional myoelectric

hand control: an evaluation. Am J Phys Med

Rehabil 1991 Feb;70(1):20-8.

Sethi PK. The Knud Jansen lecture. Technological

choices in prosthetics and orthotics for developing

countries. Prosthet Orthot Int 1989 Dec;13(3):

117-24.

Shaperman J, Setoguchi Y. The CAPP terminal

device, size 2: a new alternative for adolescents and

adults. Prosthet Orthot Int 1989 Apr;13(1):25-8.

Sidles JA, Boone DA, Harlan JS, Burgess EM.

Rectification maps: a new method for describing

residual limb and socket shapes. J Prosthet Orthot

1989 Apr;1(3):149-53.

Silver-Thorn MB. Prediction and experimental

verification of residual limb/prosthetic socket

interface pressures for below-knee amputees

[dissertation]. Evanston (IL): Northwestern

University; 1991. 424 p.

Smirnova LM, Kozlov AA, Iankovskii VM, Rozhkov

AV. [Thermovision in the evaluation of the

quality of fitting of acceptable intake sockets of

shin prostheses]. Ortop Travmatol Protez 1990

Sep;(9):14-6. (Rus).

Smith HG. Technical note: latex bonding of model

build-ups. J Prosthet Orthot 1992 Apr;4(3):175.

Smith J, Tuel SM, Meythaler JM, Cross LL, Schuch JZ.

Prosthetic management of hemicorporectomy

patients: new approaches. Arch Phys Med Rehabil

1992 May;73(5):493-7.

Snell F. Bringing prosthetics into the 21st century.

J Ark Med Soc 1992 Dec;89(7):337-8.

Soh AK, Soh CK, Lau WS. Method for the design

and analysis of a non-linear anisotropic lower limb

prosthetic socket. J Biomed Eng 1990 Nov;12(6):

470-6.

Stam HJ. The geriatric prosthesis as metaphor: a

clinical note. Prosthet Orthot Int 1992 Aug;16(2):

137-9.

Thurston AJ, Rastorfer J, Burian H, Beasley AW. The

Flek-shin: a composite material for use in flexible

shank below-knee prostheses. Prosthet Orthot Int

1989 Aug;13(2):97-9.

Topper AK, Fernie GR. An evaluation of computer

aided design of below-knee prosthetic sockets.

Prosthet Orthot Int 1990 Dec;14(3):136-42.

Torres-Moreno R, Foort J, Morrison JB, Saunders CG.

A reference shape library for computer aided socket

design in above-knee prostheses. Prosthet Orthot

Int 1989 Dec;13(3):130-9.

Torres-Moreno R, Morrison JB, Cooper D, Saunders

CG, Foort J. A computer-aided socket design

procedure for above-knee prostheses. J Rehabil

Res Dev 1992 Summer;29(3):35-44.

Torres-Moreno R, Saunders CG, Foort J, Morrison JB.

Computer-aided design and manufacture of an

above-knee amputee socket. J Biomed Eng 1991

Jan;13(1):3-9.

Tscheuschner R, Rosenberger H. [Computer-assisted

optimization of gait assessment--biocybernetic

approach for an expert system for designing

prostheses]. Biomed Tech (Berlin) 1990;

35 Suppl 3:56-8. (Ger).

Unsworth A. Tribology of human and artificial joints.

Proc Inst Mech Eng [H] 1991;205(3):163-72.

Van de Veen PG. An investigation of design criteria

of modular endoskeletal lower limbprostheses

[dissertation]. Enschede (Netherlands): Twente

University of Technology; 1989.

van Jaarsveld HW, Grootenboer HJ, de Vries J,

Koopman HF. Stiffness and hysteresis properties

of some prosthetic feet. Prosthet Orthot Int 1990

Dec;14(3):117-24.

Vossberg A. The choice of prosthetic and orthotic

technique for less developed countries: analysis and

perspectives in Colombia. Prosthet Orthot Int 1988

Aug;12(2):96-100.

Walsh NE, Lancaster JL, Faulkner VW, Rogers WE.

A computerized system to manufacture prostheses

for amputees in developing countries. J Prosthet

Orthot 1989 Apr;1(3):165-81.

Walta HA. Handleiding onderarmprothese met open

fitting: theorie, aanmeten en fabricage. [Manual for

forearm prosthesis with open fitting]. Delft

(Netherlands): Technische Hogeschool Delft; 1989.

86 p. (Dut).

Walta HA, Ariese P, Cool JC. Ergonomic socket

design for congenital below elbow amputated

children. J Rehabil Sci 1989 Mar;2(1):19-24.

Wang TK, Ju MS, Tsuei YG. Adaptative control of

above knee electro-hydraulic prosthesis. J Biomech

Eng 1992 Aug;114(3):421-4.

Watts HG. Special features of estimating leg length

discrepancies in limb-deficient children. J Assoc

Child Prosthet Orthot Clin 1992 Summer;27(1):

35-9.

Wing DC, Hittenberger DA. Energy-storing prosthetic

feet. Arch Phys Med Rehabil 1989 Apr;70(4):

330-5.

Wirta RW, Mason R, Calvo K, Golbranson FL. Effect

on gait using various prosthetic ankle-foot devices.

J Rehabil Res Dev 1991 Spring;28(2):13-24.

Zeman BD, Prakash AS, Adler R. Prosthetic legs

revisited [letter]. Med J Aust 1990 Jan 1;152(1):

54-5.

USES

Geriatric Applications

Baker PA, Hewison SR. Gait recovery pattern of

unilateral lower limb amputees during

rehabilitation. Prosthet Orthot Int 1990 Aug;14(2):

80-4.

Becker HM. [Current state of amputation surgery].

Langenbecks Arch Chir Suppl Ii Verh Dtsch Ges

Forsch Chir 1989:623-5. (Ger).

Chan KM, Tan ES. Use of lower limb prosthesis

among elderly amputees. Ann Acad Med

Singapore 1990 Nov;19(6):811-6.

Cobb JW. Models for delivery of prosthetic services

to geriatric patients. Top Geriatr Rehabil 1992 Sep;

8(1):59-63.

Collin C. Rehabilitation of elderly people with

prostheses [letter]. BMJ 1991 Jun 1;302(6788):

1336.

Debogorski J. Initial preprosthetic evaluation of the

elderly amputee. Top Geriatr Rehabil 1990 Dec;

6(2):65-8.

Gailey RS Jr. Recreational pursuits for elders with

amputation. Top Geriatr Rehabil 1992 Sep;8(1):

39-58.

Geiger CM. The utilization of assistive devices by

patients discharged from an acute rehabilitation

setting. Phys Occup Ther Geriatr 1990;9(1):3-25.

Hanspal RS, Fisher K. Assessment of cognitive and

psychomotor function and rehabilitation of elderly

people with prostheses. BMJ 1991 Apr 20;

302(6782):940. Published erratum appears in BMJ

1991 May 18;302(6786):1182.

Hubbard WA. Rehabilitation outcomes for elderly

lower limb amputees. Aust J Physiother 1989;

35(4):219-24.

Jackson-Wyatt O. Age-related changes in amputee

rehabilitation. Top Geriatr Rehabil 1992 Sep;8(1):

1-12.

Lavan J. Rehabilitation of the elderly amputee.

Ir Med J 1991 Oct;84(3):91-3. Published erratum

appears in Ir Med J 1992 Jun;85(2):42.

Marmann C. [The geriatric amputee after release from

successful rehabilitation]. Chirurg 1992 Oct;

63(10):suppl 204-5. (Ger).

Nissen SJ, Newman WP. Factors influencing

reintegration to normal living after amputation.

Arch Phys Med Rehabil 1992 Jun;73(6):548-51.

Putziger J, Kiene S, Sauer D. [Under the thigh

amputation according to Bruckner]. Zentralbl Chir

1989;114(15):998-1005. (Ger).

Ruskin AP, Rosner H, Saperstein H. Bent-knee

prosthesis. Geriatrics 1970 Jul;25(7):109-14.

Sinclair AM. Occupational therapy and the lower limb

amputee in Western Australia. Br J Occup Ther

1991 Feb;54(2):69-71.

Sioson ER. The elderly amputee with severe chronic

obstructive pulmonary disease. Case reports. J Am

Geriatr Soc 1990 Jan;38(1):51-2.

Stam HJ. The geriatric prosthesis as metaphor: a

clinical note. Prosthet Orthot Int 1992 Aug;16(2):

137-9.

Tucker NJ. Wheelchair walking. Geriatr Nurs (New

York) 1991 Jan-Feb;12(1):37.

Wilson AB Jr. Limb prosthetics. 6th ed. New York:

Demos; 1989. Special considerations in the

treatment of eldely amputees; p. 103-4.

Wolf E, Lilling M, Ferber I, Marcus J. Prosthetic

rehabilitation of elderly bilateral amputees. Int J

Rehabil Res 1989;12(3):271-8.

Zijp EM, Rasenberg EM, van den Bosch JS.

[Rehabilitation of nursing home patients with a leg

amputation. A retrospective study]. Tijdschr

Gerontol Geriatr 1992 Apr;23(2):54-9. (Dut).

Pediatric Applications

Abstracts from the Scientific Program presented at the

Annual Meeting of the Association of Children’s

Prosthetic-Orthotic Clinics at Blythedale Children’s

Hospital, Valhalla, New York, June 7-9, 1990.

J Assoc Child Prosthet Orthot Clin 1990 Fall;

25(2):26-47.

Abstracts from the scientific program presented at the

annual meeting of the Association of Children’s

Prosthetic-Orthotic Clinics at Shriner’s Hospital for

Crippled Children, Portland, Oregon, May 1-4,

1991. J Assoc Child Prosthet Orthot Clin 1991

Summer;26(1):1-41.

Abstracts from the Scientific Program presented at the

Annual Meeting of the Association of Children’s

Prosthetic-Orthotic Clinics at St. Louis, Missouri on

June 10-13, 1992. J Assoc Child Prosthet Orthot

Clin 1992 Fall;27(2):1-68.

Abstracts from the Scientific Program presented at the

1989 Annual Meeting. J Assoc Child Prosthet

Orthot Clin 1989 Summer-Autumn;14(2-3):26-39.

Ashley RK, Vallier GT, Skinner SR. Gait analysis in

pediatric lower extremity amputees. Orthop Rev

1992 Jun;21(6):745-9.

Ballance R, Wilson BN, Harder JA. Factors affecting

myoelectric prosthetic use and wearing patterns in

the juvenile unilateral below elbow amputee. Can J

Occup Ther 1989 Jun;56(3):132-7.

Banzinger E, Harding A. Aqua Flex: a pediatric all-

plastic prosthetic knee system. J Assoc Child

Prosthet Orthot Clin 1991 Fall;26(2):53-5.

Banzinger E. Surlyn socket designs for the young

child. J Assoc Child Prosthet Orthot Clin 1989

Spring;24(1):12-3.

Banzinger E, Beuachamp RD. Congenital amelia:

prenatal diagnosis and postnatal prosthetic fitting.

J Assoc Child Prosthet Orthot Clin 1989

Summer-Autumn;24(2-3):47-50.

Barker L, et al. Improved positioning for enhanced

development: case study. J Assoc Child Prosthet

Orthot Clin 1991 Spring-1990 Winter;25(3-4):61-5.

Bartlett DJ. Testing gait efficiency of limb-deficient

children using the physiological cost index.

J Assoc Child Prosthet Orthot Clin 1989

Summer-Autumn;24(2-3):51-2.

Baumgartner R. [Congenital limb abnormalities:

amputate or not amputate?]. Rehabilitation (Stuttg)

1990 Feb;29(1):4-11. (Ger).

Berke GM, Nielsen CC. Establishing parameters

affecting the use of myoelectric prostheses in

children: a preliminary investigation. J Prosthet

Orthot 1991 Summer;3(4):162-7.

Cammack S. Integration of pediatric amputees and

their parents with an adult amputee support group.

J Assoc Child Prosthet Orthot Clin 1989 Spring;

24(1):6-7.

Campbell JH. Reciprocating gait orthosis with linear

bearing. J Assoc Child Prosthet Orthot Clin 1990

Spring;25(1):2-5.

Carlson L. Promoting sports for young amputees.

Physician Sportsmed 1991 Jun;19(6):17-8.

Choi IH, Kumar SJ, Bowen JR. Amputation or limb-

lengthening for partial or total absence of the

fibula. J Bone Joint Surg [Am] 1990

Oct;72(9):1391-9.

Clinic members of the Association of Children’s

Prosthetics-Orthotics Clinics. J Assoc Child

Prosthet Orthot Clin 1989 Spring;24(1):14-22.

Cook AM, Liu KM, Hoseit P. Robotic arm use by

very young motorically disabled children. Assist

Technol 1990;2(2):51-7.

Correll J. The state of technical orthopaedics in spina

bifida. Z Kinderchir 1989 Dec;44 Suppl 1:8-10.

Cummings DR, Knapp SL. Lower limb pediatric

prosthetics: general considerations and philosphy.

J Prosthet Orthot 1992 Jul;4(4):196-206.

Curran B, Hambrey R. The prosthetic treatment of

upper limb deficiency. Prosthet Orthot Int 1991

Aug;15(2):82-7.

Day HJ. The ISO/ISPO classification of congenital

limb deficiency. Prosthet Orthot Int 1991 Aug;

15(2):67-9.

Derhaag MMC, Schoorl PM, Derhaag PJF.

Personality development in one handed children

treated with a myoelectrically controlled prosthesis.

J Rehabil 1990 Jul-Sep;56(3):25-9.

DiCowden M. Pediatric rehabilitation: special patients,

special needs. J Rehabil 1990 Jul-Sep;56(3):13-7.

Edelstein JE, Berger N. Performance comparison

among children fitted with myoelectric and body-

powered hands. Arch Phys Med Rehabil 1993 Apr;

74(4):376-80.

Engsberg JR, et al. Comparison of effort between

below-knee amputee and normal children. J Assoc

Child Prosthet Orthot Clin 1991 Fall;26(2):46-52.

Engsberg JR, Aldridge KC, Harder JA. Lower limb

intersegmental forces for below-knee amputee

children during standing. Prosthet Orthot Int 1991

Dec;15(3):185-91.

Engsberg JR, Allinger TL, Harder JA. Standing

pressure distribution for normal and below-knee

amputee children. Prosthet Orthot Int 1989 Dec;

13(3):152-5.

Engsberg JR, Lee AG, Patterson JL, Harder JA.

External loading comparisons between able-bodied

and below-knee-amputee children during walking.

Arch Phys Med Rehabil 1991 Aug;72(9):657-61.

Engsberg JR, Lee AG, Tedford KG, Harder Ja.

Normative ground reaction force data for able-

bodied and below-knee-amputee children during

walking. J Pediatr Orthop 1993 Mar-Apr;13(2):

69-73.

Engsberg JR, MacIntosh BR, Harder JA. Comparison

of effort between children with and without below-

knee amputation. J Assoc Child Prosthet Orthot

Clin 1990 Spring;25(1):15-22.

Engsberg JR, Tedford KG, Harder JA. Center of mass

location and segment angular orientation of below-

knee-amputee and able-bodied children during

walking. Arch Phys Med Rehabil 1992

Dec;73(12):1163-8.

Engsberg JR, Tedford KG, Harder JA, Mills JP.

Timing changes for stance, swing, and double

support in a recent below knee amputee child.

Pediatr Exerc Sci 1990 Aug;2(3):255-62.

Engsberg JR, Tedford KG, Springer MJN, Harder JA.

Technical note: weight distribution of below-knee

amputee and able-bodies children during standing.

Prosthet Orthot Int 1992 Dec;16(3):200-2.

Evans DG, Thakker Y, Donnai D. Heredity and

dysmorphic syndromes in congenital limb

deficiencies. Prosthet Orthot Int 1991

Aug;15(2):70-7.

Fernandez-Palazzi F, de Gutierrez DP, Paladino R.

The care of the limb deficient child in Venezuela.

Prosthet Orthot Int 1991 Aug;15(2):156-9.

Fielden RHN. Natural development of the

quadrimembral congenital amputee: a case report.

J Assoc Child Prosthet Orthot Clin 1991

Spring-1990 Winter;25(3-4):66-7.

Gendron BC, Andrew KL. The use of a rigid

removable dressing in a juvenile amputee: a case

report. J Assoc Child Prosthet Orthot Clin 1991

Fall;26(2):61-5.

Gosine RG, Harwin WS, Furby LJ, Jackson RD. An

intelligent end-effector for a rehabilitation robot.

J Med Eng Technol 1989 Jan-Apr;13(1-2):37-43.

Gover AM, McIvor J. Upper limb deficiencies in

infants and young children. Infant Young Child

1992 Jul;5(1):58-72.

Hermansson LM. Structured training of children fitted

with myoelectric prostheses. Prosthet Orthot Int

1991 Aug;15(2):88-92.

Hirons RR, Williams KB, Amor RF, Day HJ. The

prosthetic treatment of lower limb deficiency.

Prosthet Orthot Int 1991 Aug;15(2):112-6.

Holtz T, Marquardt E. [Provision of prostheses of

children with abnormalities of the extremities].

Dtsch Krankenpflegez 1989 Mar;42(3):165-71.

(Ger).

Hubbard S, Bush G, Kurtz I, Naumann S. Myolectric

prostheses for the limb deficient child. Phys Med

Rehabil Clin North Am 1991 Nov;2(4):847-66.

Jones LE, Lipson A. The care of the limb deficient

child in Australia. Prosthet Orthot Int 1991 Aug;

15(2):140-2.

Kakurai S, Kida M. The care of the limb deficient

child in Japan. Prosthet Orthot Int 1991 Aug;15(2):

146-51.

Kenan S, Bloom N, Lewis MM. Limb-sparing surgery

in skeletally immature patients with osteosarcoma.

The use of an expandable prosthesis. Clin Orthop

1991 Sep;(270):223-30.

Keolker T, Labhard SC. Hal gets a prosthesis.

J Assoc Child Prosthet Orthot Clin 1991

Spring-1990 Winter;25(3-4):68-70.

Kiely T. Laura’s story... osteogenic sarcoma...

amputation. Nurs Times 1989 Aug 23-29;85(34):

35-8.

Krebs DE, Edelstein JE, Thornby MA. Prosthetic

management of children with limb deficiencies.

Phys Ther 1991 Dec;71(12):920-34.

Kruger LM. Stubby prostheses in the rehabilitation of

infants and small children with bilateral lower limb

deficiencies. Rehabilitation (Stuttg) 1990 Feb;

29(1):12-5.

Kruit J, Cool JC. Body-powered hand prosthesis with

low operating power for children. J Med Eng

Technol 1989 Jan-Apr;13(1-2):129-33.

Kullmann L. [Treatment and rehabilitation of

dysmelic children]. Magy Traumatol Orthop

Helyreallito Sebesz 1989;32(2):99-106. (Hun).

Lester EL. New developments in prosthetics for

children. Audio Dig Orthop [audiocassette] 1990

Nov;13(11):Sides A & B [presentation 3, 18 min.].

Accompanied by: 1 guide.

Levesque C, Gauthier-Gagnon C, Beauregard M. An

endoskeletal hip disarticulation prosthesis for the

toddler. J Prosthet Orthot 1991 Spring;3(3):120-4.

The limb deficient child. ISPO symposium, Heidelberg,

August 1988. Prosthet Orthot Int 1991 Aug;15(2):

65-162.

Madigan RR, Fillauer KD. 3-S prosthesis: a

preliminary report. J Pediatr Orthop 1991

Jan-Feb;11(1):112-7.

Marquardt E. Special considerations: the multiple-limb-

deficient child. In: Bowker JH, Michael JW, eds.

Atlas of limb prosthetics: surgical, prosthetic, and

rehabilitation principles. St. Louis: Mosby Year

Book; 1992. p. 839-84.

Marquardt E, Fisk JR. Thalidomide children: thirty

years later. J Assoc Child Prosthet Orthot Clin

1992 Summer;27(1):3-10.

Mason KJ. Congenital orthopedic anomalies and their

impact on the family. Nurs Clin North Am 1991

Mar;26(1):1-16.

Michael J. Pediatric prosthetics and orthotics. In:

Hedman G, ed. Rehabilitation technology.

Binghamton (NY): Haworth Press; 1990. p. 123-46.

Michael J. Pediatric prosthetics and orthotics. Phys

Occup Ther Pediatr 1990;10(2):123-46.

Milner M, Naumann S, Literowich W, Martin M, Ryan

S, Sauter WF, Shein GF, Verburg G.

Rehabilitation engineering in pediatrics.

Pediatrician 1990;17(4):287-96.

Minnes PM, Stack DM. Research and practice with

congenital amputees: making the whole greater than

the sum of its parts. Int J Rehabil Res 1990;13(2):

151-60.

Novotny M, Swagman A. Caring for children with

orthotic/prosthetic needs. J Prosthet Orthot 1992

Jul;4(4):191-5.

Oglesby DG Jr, Tablada C. Lower limb deficiencies:

prosthetic and orthotic management. In: Bowker JH,

Michael JW, eds. Atlas of limb prosthetics:

surgical, prosthetic, and rehabilitation principles. St.

Louis: Mosby Year Book; 1992. p. 835-8.

Oppenheim WL. Fibular deficiency and the

indications for Syme’s amputation. Prosthet Orthot

Int 1991 Aug;15(2):131-6.

Page CJ, Messner DG. Special considerations: juvenile

amputees: sports and recreation program

development. In: Bowker JH, Michael JW, eds.

Atlas of limb prosthetics: surgical, prosthetic, and

rehabilitation principles. St. Louis: Mosby Year

Book; 1992. p. 901-7.

Patton JG. Developmental approach to pediatric

prosthetic evaluation and training. In: Meier RH 3d,

Atkins DJ, eds. Comprehensive management of the

upper-limb amputee. New York: Springer-Verlag;

1989. p. 137-49.

Patton JG. Upper-limb deficiencies: developmental

approach to pediatric upper-limb prosthetic training.

In: Bowker JH, Michael JW, eds. Atlas of limb

prosthetics: surgical, prosthetic, and rehabilitation

principles. St. Louis: Mosby Year Book; 1992.

p. 779-93.

Patton JG. Upper-limb prosthetic components for

children and teenagers. In: Meier RH 3d, Atkins

DJ, eds. Comprehensive management of the upper-

limb amputee. New York: Springer-Verlag; 1989. p.

99-120.

Patton JG, Shida-Tokeshi J, Setoguchi Y. Prosthetic

components for children. Phys Med Rehabil 1991

Jun;5(2):245-64;

Plettenburg DH. Electric versus pneumatic power in

hand prostheses for children. J Med Eng Technol

1989 Jan-Apr;13(1-2):124-8.

Setoguchi Y. Evaluation of the pediatric amputee. In:

Meier RH 3d, Atkins DJ, eds. Comprehensive

management of the upper-limb amputee. New York:

Springer-Verlag; 1989. p. 92-98.

Setoguchi Y. The management of the limb deficient

child and its family. Prosthet Orthot Int 1991 Aug;

15(2):78-81.

Shaperman J, Setoguchi Y, LeBlanc M. Upper limb

strength of young limb deficient children as a factor

in using body powered terminal devices - a pilot

study. J Assoc Child Prosthet Orthot Clin 1992

Winter;27(3):89-96.

Sharma VP. The care of the limb deficient child in

India. Prosthet Orthot Int 1991 Aug;15(2):143-5.

Sliman N, Mrabet A, Daghfous S, Douik M. The care

of the limb deficient child in north Africa. Prosthet

Orthot Int 1991 Aug;15(2):152-5.

Supan T. Upper-limb deficiencies: prosthetic and

orthotic management. In: Bowker JH, Michael JW,

eds. Atlas of limb prosthetics: surgical, prosthetic,

and rehabilitation principles. St. Louis: Mosby Year

Book; 1992. p. 761-6.

Svoboda J. Psychosocial considerations in pediatrics:

use of amputee dolls. J Prosthet Orthot 1992 Jul;

4(4):207-12.

Swagman A. Caring for limb-deficient children and

their families. MCN Am J Matern Child Nurs

1986 Jan-Feb;11(1):46-52.

Swagman A, et al. Family perceptions regarding

conversion surgery experiences. J Assoc Child

Prosthet Orthot Clin 1991 Spring-1990 Winter;

25(3-4):50-5.

Talbot D. Review artice: helping the limb-deficient

child deal with social reactions to physical

differences. J Assoc Child Prosthet Orthot Clin

1991 Spring-1990 Winter;25(3-4):76-80.

Tebbi CK, Petrilli AS, Richards ME. Adjustment to

amputation among adolescent oncology patients.

Am J Pediatr Hematol Oncol 1989 Fall;11(3):

276-80.

Thornby MA, Krebs DE. Bimanual skill development

in pediatric below elbow amputation: a multicenter,

cross sectional study. Arch Phys Med Rehabil

1992 Aug;73(8):697-702.

Tooms RE. The amputee. In: Morrissy RT, ed. Lovell

and Winter’s pediatric orthopaedics. 3rd ed. Vol. 2.

Philadelphia: Lippincott; 1990. p. 1023-70.

Trost FJ, Rowe D. Upper-limb deficiencies: externally

powered prosthese. In: Bowker JH, Michael JW,

eds. Atlas of limb prosthetics: surgical, prosthetic,

and rehabilitation principles. St. Louis: Mosby Year

Book; 1992. p. 767-78.

Tyc VL. Psychosocial adaptation of children and

adolescents with limb deficiencies: A review. Clin

Psychol Rev 1992;12(3):275-91.

Uellendahl J, Heckathorne CW, Krick H, Duff S,

Patwardhan AG, Li S, Gavin T, Lorenz M, Meade

KP, Logan GD, et al. Session 17: prosthetics and

orthotics. In: Capitalizing on technology:

proceedings of the RESNA 13th annual conference;

1990 Jun 15-20; Washington, DC. Washington

(DC): RESNA Press; 1990. p. 167-76.

van Lunteren A, van Lunteren-Gerritsen GHM. On

the use of prostheses by children with unilateral

congenital forearm defect. J Rehabil Sci 1989;2(1):

10-12.

Varni JW, Rubenfeld LA, Talbot D, Setoguchi Y.

Determinants of self esteem in children with

congenital/acquired limb deficiencies. J Dev Behav

Pediatr 1989 Feb;10(1):13-6.

Varni JW, Rubenfeld LA, Talbot D, Setoguchi Y.

Stress, social support, and depressive

symptomatology in children with

congenital/acquired limb deficiencies. J Pediatr

Psychol 1989 Dec;14(4):515-30.

Varni JW, Setoguchi Y. Correlates of perceived

physical appearance in children with

congenital/acquired limb deficiencies. J Dev Behav

Pediatr 1991 Jun;12(3):171-6.

Varni JW, Setoguchi Y. Psychosocial factors in the

management of children with limb deficiencies.

Phys Med Rehabil Clin North Am 1991 May;2(2):

395-404.

Varni JW, Setoguchi Y. Self-perceived physical

appearance in children and adolescents with

congenital/acquired limb deficiencies. J Assoc

Child Prosthet Orthot Clin 1991 Fall;26(2):56-60.

Varni JW, Setoguchi Y, Rappaport LR, Talbot D.

Effects of stress, social support, and self-esteem on

depression in children with limb deficiencies. Arch

Phys Med Rehabil 1991 Dec;72(13):1053-8.

Varni JW, Setoguchi Y, Rappaport LR, Talbot D.

Psychological adjustment and perceived social

support in children with congenital/acquired limb

deficiencies. J Behav Med 1992 Feb;15(1):31-44.

Vermeer A. Toward an interdisciplinary model for

movement rehabilitation of physically disabled

children. Appl Phys Activ Q 1989 Apr;6(2):

133-44.

Veth RP. IIB osteosarcoma. Current management,

local control, and survival statistics--The

Netherlands. Clin Orthop 1991 Sep;(270):67-71.

Walta HA. Esthetische haakprothese: ontwerp

[Esthetical hook prothesis: design]. Delft

(Netherlands): Technische Hogeschool Delft; 1989.

33 p. Available from: NTIS, Springfield, VA:

PB90263690XSP. (Dut).

Walta HA. Handleiding onderarmprothese met open

fitting: theorie, aanmeten en fabricage [Manual for

forearm prosthesis with open fitting]. Delft

(Netherlands): Technische Hogeschool Delft; 1989.

86 p. (Dut).

Watts HG. Differences between a child and an adult

amputee. Contemp Orthop 1992 Jan;24(1):33-40.

Watts HG. Special features of estimating leg length

discrepancies in limb-deficient children. J Assoc

Child Prosthet Orthot Clin 1992 Summer;27(1):

35-9.

Wilson AB Jr. Limb prosthetics. 6th ed. New York:

Demos; 1989. Special considerations in the

treatment of child amputees; p. 99-102.

Windorski J. Limb loss: a complication of septicemia

in children. J Assoc Child Prosthet Orthot Clin

1992 Winter;27(3):76-80.

Sports & Recreation

Couture LP, Dananberg HJ, Dinapoli DR, Velicky CP.

Gait analysis : the new yardstick for the 1990’s.

Ampsports 1991 Autumn;2(8):17, 19, 21.

Crocker P, Bouffard M. Coping and participation of

physically disabled adults in physical activity.

CAHPER J 1990 Nov-Dec;56(6):28-33.

Czerniecki JM, Gitter A. Insights into amputee

running. A muscle work analysis. Am J Phys Med

Rehabil 1992 Aug;71(4):209-18.

Czerniecki JM, Gitter A, Munro C. Joint moment and

muscle power output characteristics of below knee

amputees during running: the influence of energy

storing prosthetic feet. J Biomech 1991;24(1):

63-75. Published erratum appears in J Biomech

1991;24(3-4):271-2.

DiAngelo DJ, Winter DA, Ghista DN, Newcombe WR.

Performance assessment of the Terry Fox jogging

prosthesis for above-knee amputees. J Biomech

1989;22(6-7):543-58.

Directory of national recreation organizations. Except

Parent 1991 Oct-Nov;21(7):44.

Engsberg JR, Allinger TL. A function of the

talocalcaneal joint during running support. Foot

Ankle 1990 Oct;11(2):93-6.

Epps CH Jr, Bryant DD. Competitive and recreational

sports in children with limb deficiencies. J Assoc

Child Prosthet Orthot Clin 1992 Summer;27(1):

25-34.

Fallon K. The disabled athlete. In: Bloomfield J, et

al., eds. Textbook of science and medicine in sport.

Melbourne (Australia): Blackwell; 1992.

p. 488-511.

Gailey RS Jr. Recreational pursuits for elders with

amputation. Top Geriatr Rehabil 1992 Sep;8(1):

39-58.

Garvey RS. Individuals with amputations find

rehabilitation in competitive sports. J Rehabil 1989

Jan-Mar;55(1):19-20.

Hester R, Parks B. Teaching tennis to students with

disabilities. In: Grosse S, ed. Sport instruction for

individuals with disabilities: the best of practical

pointers. Reston (VA): American Alliance for

Health, Physical Education, Recreation and Dance;

1991. p. 202-16.

Huber JH. Instructing college students in use of

wheelchair and prosthetics. Palaestra 1989 Winter;

5(2):41-6.

Johnstone KS, Perrin JCS. Sports for the handicapped

child. Phys Med Rehabil 1991 Jun;5(2):331-50.

Kegel B. Special considerations: adaptations for sports

and recreation. In: Bowker JH, Michael JW, eds.

Atlas of limb prosthetics: surgical, prosthetic, and

rehabilitation principles. St. Louis: Mosby Year

Book; 1992. p. 623-54.

Knaus RL. Physiological and psychological benefits

of exercise for athletes with disabilities: an

interview with Gerorge Murray. J Osteopath Sports

Med 1989 Nov;3(4):25-7.

Latsis T. Able disableds. Competition lets up in ski

racing’s newest division. Skiing 1989 Sep;42(1):

286, 288.

Levesque C, Gauthie-Gagnon C, Fillauer KD. An

improved downhill skiing prosthesis. J Prosthet

Orthot 1989 Jan;1(2):104-9.

Luo YZ. Muscular exercises for myoelectric control

of artificial limbs. In: Kaneko M, ed. Fitness for

the aged, disabled, and industrial worker.

Champaign (IL): Human Kinetics Publishers; 1990.

p. 154-9.

Menke W, Bodem F, Casel J, Volkert R. A new lower

leg prosthesis with simulation device for the

achilles tendon. In: Johnson RJ, Mote CD, Binet

M, eds. Skiing trauma and safety: the 7th

International Symposium; 1987 May 10-16;

Chamonix-Mont-Blanc, France. Philadelphia:

American Society for Testing and Materials; 1989.

p. 160-6.

Mensch G. Exercise for amputees. In: Basmajian JV,

Wolf SL, eds. Therapeutic exercise. Baltimore:

Williams & Wilkins; 1990. p. 251-77.

Michael JW. New developments in prosthetic feet for

sports and recreation. Palaestra 1989 Winter;5(2):

21-2, 32, 34-5.

Michael JW, Gailey RS, Bowker JH. New

developments in recreational prostheses and

adaptive devices for the amputee. Clin Orthop

1990 Jul;(256):64-75.

Nunn CJ, Goodman S. Coaching amputee athletes.

Canberra (Australia): Australian Sports

Commission; 1992. 51 p.

O’Rourke M. A decade of amputee sport. Sport Rep

1991 Spring;11(3):9.

Page CJ, Messner DG. Special considerations: juvenile

amputees: sports and recreation program

development. In: Bowker JH, Michael JW, eds.

Atlas of limb prosthetics: surgical, prosthetic, and

rehabilitation principles. St. Louis: Mosby Year

Book; 1992. p. 901-7.

Pinelli P. [Designing prostheses for elite athletes of

the Federation Francaise Handisport]. Cinesiologie

1989 Nov-Dec;128:343-5. (Fre).

Porretta DL. Cerebral palsy, amputations, and other

orthopedic impairments. In: Winnick JP, ed.

Adapted physical education and sport. Champaign

(IL): Human Kinetics Publ.; 1990. p. 229-50.

Radocy B. Special considerations: upper-limb

prosthetic adaptations for sports and recreation. In:

Bowker JH, Michael JW, eds. Atlas of limb

prosthetics: surgical, prosthetic, and rehabilitation

principles. St. Louis: Mosby Year Book; 1992.

p. 325-44.

Rossbach P, et al. Aggressive aerobic conditioning for

amputees. J Assoc Child Prosthet Orthot Clin 1991

Spring-1990 Winter;25(3-4):56-8.

Saadah ES. Swimming devices for below-knee

amputees. Prosthet Orthot Int 1992 Aug;16(2):

140-1.

Saadah ESM. Rehabilitation of a below-knee amputee

with a diving limb. Clin Rehabil 1989 Aug;3(3):

249-51.

Senner V, Schaff P, Hauser W. A new artificial leg

for ski boot testing. In: Mote CD, Johnson RJ, eds.

Skiing trauma and safety: 8th International

Symposium; Riksgrasen, Sweden; 1989.

Philadelphia: ASTM; 1991. p. 200-7.

Shephard RJ. Fitness in special populations.

Champaign (IL): Human Kinetics Publishers; 1990.

350 p.

Sherrill C, Hinson M, Gench B, Kennedy SO, et al.

Self concepts of disabled youth athletes. Percept

Mot Skills 1990 Jun;70(3 Pt 2):1093-8.

Smith AW. A biomechanical analysis of amputee

athlete gait. Int J Sport Biomech 1990 Aug;6(3):

262-82.

Sport instruction for individuals with disabilities. The

best of practical pointers. Reston (VA): American

Alliance for Health, Physical Education, Recreation

and Dance; 1991. 321 p.

Thisse MO, Brugerolle B, Beis JM, Andre JM, Paquin

JM, Pailler D, Piera JB. Sports et appareillage des

amputes [Orthopedic equipment for amputee

athletes]. Cinesiologie (Paris) 1989 Nov-Dec;128:

335-41 (Fre).

Willis R. Jack Newton: a man no handicap can hold.

Aust Golf News 1991 Sep:2-3, 5.

Wilson AB Jr. Limb prosthetics. 6th ed. New York:

Demos; 1989. Sports and recreation for amputees;

p. 113-14.

Upper Extremity Amputees

-General

Atkins DJ, Meier RH, eds. Comprehensive management

of the upper-limb amputee. New York: Springer-

Verlag; 1989. 260 p.

Bender LF. Upper extremity prosthetics. In: Kottke FJ,

Lehman JF. Krusen’s handbook of physical

medicine and rehabilitation. 4th ed. Philadelphia:

Saunders; 1990. p. 1009-23.

Carlson LE, Radocy B, Marschall PD. Spectron 12

cable for upper-limb prostheses. J Prosthet Orthot

1991 Spring;3(3):130-41.

Curran B, Hambrey R. The prosthetic treatment of

upper limb deficiency. Prosthet Orthot Int 1991

Aug;15(2):82-7.

Daley TL, Scott RN, Parker PA, Lovely DF. Operator

performance in myoelectric control of a

multifunction prosthesis stimulator. J Rehabil Res

Dev 1990 Winter;27(1):9-20.

Dalsey R, Gomez W, Seitz WH Jr, Dick HM, Hutnick

G, Akdeniz R. Myoelectric prosthetic replacement

in the upper-extremity amputee. Orthop Rev 1989

Jun;18(6):697-702.

Datta D, Brain ND. Clinical applications of

myoelectrically-controlled prostheses. Crit Rev

Phys Rehabil Med 1992;4(3-4):215-39.

Durfee WK, Mariano TR, Zahradnik JL. Simulator for

evaluating shoulder motion as a command source

for FES grasp restoration systems. Arch Phys Med

Rehabil 1991 Dec;72(13):1088-94.

Edelstein JE. Preprosthetic management of patients

with lower or upper limb amputation. Phys Med

Rehabil Clin North Am 1991 May;2(2):285-97.

Fishman S, Berger N, Edelstein JE. ISNY flexible

sockets for upper-limb amputees. J Assoc Child

Prosthet Orthot Clin 1989 Spring;24(1):8-11.

Fletchall S, Hickerson WL. Early upper-extremity

prosthetic fit in patients with burns. J Burn Care

Rehabil 1991 May-Jun;12(3):234-6.

Fletchall S, Tran T, Ungaro V, Hickerson W.

Updating upper extremity temporary prosthesis:

thermoplastics. J Burn Care Rehabil 1992

Sep-Oct;13(5):584-6.

Gover AM, McIvor J. Upper limb deficiencies in

infants and young children. Infant Young Child

1992 Jul;5(1):58-72.

Hambrey RA, Withinshaw G. Electrically powered

upper limb prostheses: their development and

application. Br J Occup Ther 1990 Jan;53(1):7-11.

Ito K, Nagaoka H, Tsuji T, Kato A, Ito M. [An EMG

controlled prosthetic forearm with three degrees of

freedom using ultrasonic motors]. Trans Soc Instr

Control Eng 1991;27(11):1281-9. (Jpn).

Kejlaa G. [The course after amputation of upper

extremities with special reference to the use of

prostheses and social conditions]. Ugeskr Laeger

1991 Nov 18;153(47):3322-6. (Dan).

Kejlaa GH. The social and economic outcome after

upper limb amputation. Prosthet Orthot Int 1992

Apr;16(1):25-31.

Kermani MZ, Badie K, Kim Y, Spelman FA. An

intelligent strategy for motion interpretation in an

EMG-controlled prosthesis. In: Kim Y, Spelman

FA, eds. Images of the twenty-first century.

Proceedings of the 11th Annual International

Conference of the IEEE Engineering in Medicine

and Biology Society; 1989 Nov 9-12; Seattle, WA.

Vol. 5. Piscataway (NJ): IEEE; 1989. p. 1682-3.

Kinoshita T, Tamesada T. [The fundamental face

direction control system for shape memory alloy

robot (shoulder disarticulation prosthesis, Zizai 2)].

Robot 1992 Mar;85:70-6. (Jpn).

Kotova VP, Vasil’eva IuI, Vasil’ev SV. [Socio-

medical characteristics of patients with post-

amputation defects of the upper limbs]. Ortop

Travmatol Protez 1989 Jun;(6):57-60. (Rus).

LeBlanc M. Current evaluation of hydraulics to

replace the cable force transmission system for

body-powered upper-limb prostheses. Assist

Technol 1990;2(3):101-7.

Lehneis HR, Dickey R. Special considerations: fitting

and training the bilateral upper-limb amputee. In:

Bowker JH, Michael JW, eds. Atlas of limb

prosthetics: surgical, prosthetic, and rehabilitation

principles. St. Louis: Mosby Year Book; 1992.

p. 311-23.

Lovely DF, Stocke D, Scott RN. A computer-aided

myoelectric training system for young upper limb

amputees. J Microcomp Appl 1990 Jul;13(3):

245-59.

Luo YZ. Muscular exercises for myoelectric control

of artificial limbs. In: Kaneko M, ed. Fitness for

the aged, disabled, and industrial worker.

Champaign (IL): Human Kinetics Publishers; 1990.

p. 154-9.

Malick MH. Upper limb orthotics. Curr Opin Orthop

1990 Dec;1(3):450-4.

Marquardt E. The Heidelberg experience. In: Meier RH

3d, Atkins DJ, eds. Comprehensive management of

the upper-limb amputee. New York: Springer-

Verlag; 1989. p. 240-52.

Martini G, Vitangeli L, Assennato P, Drommi M.

[Problems and techniques of functional

rehabilitation of upper limb stump]. Clin Ter 1990

Jul 15;134(1):13-24. (Ita).

McDonnell PM, Scott RN, Dickison J, Theriault RA,

Wood B. Do artificial limbs become part of the

user? New evidence. J Rehabil Res Dev 1989

Spring;26(2):17-24.

Meek SG, Fetherston SJ. Comparison of signal-to-

noise ratio of myoelectric filters for prosthesis

control. J Rehabil Res Dev 1992 Fall;29(4):9-20.

Meek SG, Wood JE, Jacobsen SC. Model based,

multi muscle EMG control of upper extremity

prostheses. In: Winters JM, Woo SL, eds. Multiple

muscle systems: biomechanics and movement

organization. New York: Springer-Verlag; 1990. p.

360-76.

Nishikawa K, Kuribayashi K. Neural network

application to a discrimination system for EMG-

controlled prostheses. In: Intelligence for

Mechanical Systems: proceedings or IROS ’91.

IEEE/RSJ International Workshop on Intelligent

Robots and Systems ’91; 1991 Nov 3-5; Osaka,

Japan. Vol. 1. New York: IEEE; 1991. p. 231-6.

Patton JG. Developmental approach to pediatric

prosthetic evaluation and training. In: Meier RH 3d,

Atkins DJ, eds. Comprehensive management of the

upper-limb amputee. New York: Springer-Verlag;

1989. p. 137-49.

Patton JG. Upper-limb deficiencies: developmental

approach to pediatric upper-limb prosthetic training.

In: Bowker JH, Michael JW, eds. Atlas of limb

prosthetics: surgical, prosthetic, and rehabilitation

principles. St. Louis: Mosby Year Book; 1992.

p. 779-93.

Patton JG. Upper-limb prosthetic components for

children and teenagers. In: Meier RH 3d, Atkins

DJ, eds. Comprehensive management of the upper-

limb amputee. New York: Springer-Verlag; 1989. p.

99-120.

Phillips CA, ed. Effective upper & lower extremity

prostheses. New York: Gordon & Breach Science

Publ.; 1989. 276 p. (Automedica; v.11, no.1-3).

Repperger DE, Frazier JW, Goodyear C. Control

strategies with application to limb prostheses.

Automedica 1989;11:123-43.

Reyburn TV. The "Z: strap: harnessing modification

for patients with upper extremity amputations.

Arch Phys Med Rehabil 1991 Mar;72(3):250-2.

Roeschlein RA, Domholdt E. Factors related to

successful upper extremity prosthetic use. Prosthet

Orthot Int 1989 Apr;13(1):14-8.

Ryder RA. Occupational therapy for a patient with a

bilateral Krukenberg amputation. Am J Occup

Ther 1989 Oct;43(10):689-91.

Scott RN. Biomedical engineering in upper-limb

prosthetics. In: Meier RH 3d, Atkins DJ, eds.

Comprehensive management of the upper-limb

amputee. New York: Springer-Verlag; 1989.

p. 173-89.

Sears HH. Special considerations: trends in upper-

extremity prosthetics development. In: Bowker JH,

Michael JW, eds. Atlas of limb prosthetics:

surgical, prosthetic, and rehabilitation principles. St.

Louis: Mosby Year Book; 1992. p. 345-56.

Setoguchi Y. Evaluation of the pediatric amputee. In:

Meier RH 3d, Atkins DJ, eds. Comprehensive

management of the upper-limb amputee. New York:

Springer-Verlag; 1989. p. 92-98.

Shaperman J. Upper limb strength of young limb

deficient chldren as a factor in using body powered

terminal devices - a pilot study. J Assoc Child

Prosthet Orthot Clin 1992 Winter;27(3):89-96.

Spiegel SR. Adult myoelectric upper-limb prosthetic

training. In: Meier RH 3d, Atkins DJ, eds.

Comprehensive management of the upper-limb

amputee. New York: Springer-Verlag; 1989.

p. 60-71.

Steinke NM, Ostgard SE, Jensen OM, Nordentoft AM,

Sneppen O. [Thoraco-scapular amputation in

sarcomas of the shoulder girdle]. Ugeskr Laeger

1991 Sep 9;153(37):2555-7. (Dan).

Supan T. Upper-limb deficiencies: prosthetic and

orthotic management. In: Bowker JH, Michael JW,

eds. Atlas of limb prosthetics: surgical, prosthetic,

and rehabilitation principles. St. Louis: Mosby Year

Book; 1992. p. 761-6.

Trost FJ, Rowe D. Upper-limb deficiencies: externally

powered prosthese. In: Bowker JH, Michael JW,

eds. Atlas of limb prosthetics: surgical, prosthetic,

and rehabilitation principles. St. Louis: Mosby Year

Book; 1992. p. 767-78.

The use of upper extremity prostheses [videocassette].

[place unknown]: Art Heinze; 1988. 1

videocassette: 49 min., sound, color, 1/2 in.

van Dijk AJ. Congenital reduction deficiencies of the

upper extremities. Epidemiology and rehabilitation

services in the Netherlands. J Rehabil Sci 1990;

3(3):84-8.

Wilson AB Jr. Limb prosthetics. 6th ed. New York:

Demos; 1989. Prostheses for upper-limb amputees;

p. 69-90.

Zahradnik J. Shoulder movement as a command

control source for upper limb neural prostheses

[master’s thesis]. Cambridge (MA): Massachusetts

Institute of Technology; 1989.

-Arm & elbow

Abul-Haj CJ, Hogan N. Functional assessment of

control systems for cybernetic elbow prostheses--

Part I: Description of the technique. IEEE Trans

Biomed Eng 1990 Nov;37(11):1025-36.

Abul-Haj CJ, Hogan N. Functional assessment of

control systems for cybernetic elbow prostheses--

Part II: Application of the technique. IEEE Trans

Biomed Eng 1990 Nov;37(11):1037-47.

Asghar MA, Fallah A, Mikaili R. Control of the

electric motor in a cybernetic arm. Cybernet Syst

1991 Jan-Feb;22(1):119-34.

Bok SH, Bhattacharjee A, Nee AY, Pho RW, Teoh SH,

Lim SY. Computer-Aided Design and Computer-

Aided Manufacture (CAD-CAM) applications in

cosmetic below-elbow prostheses. Ann Acad Med

Singapore 1990 Sep;19(5):699-705.

Bruckner L, Krieghoff R, Arnold W, Schneider R.

[Experience with the reintroduction of the

Sauerbruch-Lebsche operation (Sauerbruch’s

kineplasty)]. Zentralbl Chir 1990;115(5):293-9.

(Ger).

Carlson LE, Radocy B, Marschall PD. Spectron 12

cable for upper-limb prostheses. J Prosthet Orthot

1991 Spring;3(3):130-41.

Castiello U, Stelmach GE. Generalized representation

of handwriting: evidence of effector independence.

Acta Psychol (Amst) 1993 Mar;82(1-3):53-68.

Cauquil C, Thaury MN, de Godebout J, Ster J, Ster F,

Bouzigues B, Ducros P. [Radio-carpal amputation

and prosthesis]. Ann Chir Main Memb Super

1992;11(1):69-73. (Fre).

Childress DS, Krick H, Heckathorne CW, Uellendahl J.

Positive-locking components and hybrid fitting

concepts for persons with high level bilateral arm

amputations. In: Technology for the future decade.

RESNA ’89: proceedings of the 12th annual

conference; 1989 Jun 25-30; New Orleans, LA.

Washington (DC): RESNA Press; 1989. p. 296-7.

Cook AM, Liu KM, Hoseit P. Robotic arm use by

very young motorically disabled children. Assist

Technol 1990;2(2):51-7.

Crandall RC, Hansen D. Clinical evaluations of a

voluntary-closing terminal device for below-elbow

amputees. J Assoc Child Prosthet Orthot Clin 1989

Winter;24(4):71-4.

Curran B, Hambrey R. The prosthetic treatment of

upper limb deficiency. Prosthet Orthot Int 1991

Aug;15(2):82-7.

Daley TL, Scott RN, Parker PA, Lovely DF. Operator

performance in myoelectric control of a

multifunction prosthesis stimulator. J Rehabil Res

Dev 1990 Winter;27(1):9-20.

Dalsey R, Gomez W, Seitz WH Jr, Dick HM, Hutnick

G, Akdeniz R. Myoelectric prosthetic replacement

in the upper-extremity amputee. Orthop Rev 1989

Jun;18(6):697-702.

Datta D, Kingston J, Ronald J. Myoelectric prostheses

for below-elbow amputees: the Trent experience.

Int Disabil Stud 1989 Oct-Dec;11(4):167-70.

Dobner DL. A prosthetic harness adaptation. Arch

Phys Med Rehabil 1990 May;71(6):436-8.

Dowling R, Laine B. Improving mobility of a patient

with a left below elbow prosthesis and right

hemiparesis. Clin Kinesiol 1991 Spring;45(1):

19-21.

Fletchall S, Hickerson WL. Early upper-extremity

prosthetic fit in patients with burns. J Burn Care

Rehabil 1991 May-Jun;12(3):234-6.

Ghez C, Gordon J, Ghilardi MF, Christakos CN,

Cooper SE. Roles of proprioceptive input in the

programming of arm trajectories. Cold Spring Harb

Symp Quant Biol 1990;55:837-47.

Guha SK, Anand S, Sharma J. Foot-controlled

artificial arm with complementary activation by

body power. Automedica 1989;11:201-7.

Heckathorne CW. Characterization of a force-sensitive

resistive transducer for application to prosthesis

control. In: Technology for the future decade.

RESNA ’89: proceedings of the 12th annual

conference; 1989 Jun 25-30; New Orleans, LA.

Washington (DC): RESNA Press; 1989. p. 224-5.

Heckathorne CW. Manipulation in unstructured

environments: extended physiological

proprioception, position control, and arm

prostheses. Paper presented at: International

Conference on Rehabilitation Robotics; 1990.

[15 p.].

Hillman M, Jepson J. Evaluation of a robotic

workstation for the disabled. J Biomed Eng 1992

May;14(3):187-92.

Hillman MR, Pullin GM, Gammie AR, Stammers CW,

Orpwood RD. Development of a robot arm and

workstation for the disabled. J Biomed Eng 1990

May;12(3):199-204.

Howell R, et al (Ohio State University, Columbus). A

prototype robotic arm for use by severely

orthopedically handicapped students. Final report.

Washington (DC): Office of Special Education and

Rehabilitative Services; 1989 Dec. 102 p.

Available from: ERIC, Arlington, VA; ED346 664,

EC301 276.

Ito K, Nagaoka H, Tsuji T, Kato A, Ito M. [An EMG

controlled prosthetic forearm with three degrees of

freedom using ultrasonic motors]. Trans Soc Instr

Control Eng 1991;27(11):1281-9 (Jpn).

Ito K, Tsuji T, Kato A, Ito M. Limb-function

discrimination using EMG signals by neural

network and application to prosthetic forearm

control. In: 1991 IEEE International Joint

Conference Neural Network; 1991 Nov 18-21;

Singapore. Vol. 2. New York: IEEE; 1991.

p. 1214-9.

Kato A, Ito K, Ito M. [Compliant motion of ultrasonic

motor by phase difference control]. Trans Soc Instr

Control Eng 1991;27(11):1290-5 (Jpn).

Kelly MF, Parker PA, Scott RN. The application of

neural networks to myoelectric signal analysis: a

preliminary study. IEEE Trans Biomed Eng 1990

Mar;37(3):221-30.

Kermani MZ, Badie K, Kim Y, Spelman FA. An

intelligent strategy for motion interpretation in an

EMG-controlled prosthesis. In: Kim Y, Spelman

FA, eds. Images of the twenty-first century.

Proceedings of the 11th Annual International

Conference of the IEEE Engineering in Medicine

and Biology Society; 1989 Nov 9-12; Seattle, WA.

Vol. 5. Piscataway (NJ): IEEE; 1989. p. 1682-3.

Kishinchandani RS. Quantitative assessment of above-

elbow prosthetic control [masters thesis]. Boston:

Massachusetts General Hospital Institute of Health

Professions; 1991. 121 p.

LeBlanc M. Current evaluation of hydraulics to

replace the cable force transmission system for

body-powered upper-limb prostheses. Assist

Technol 1990;2(3):101-7.

McDonnell PM, Scott RN, Dickison J, Theriault RA,

Wood B. Do artificial limbs become part of the

user? New evidence. J Rehabil Res Dev 1989

Spring;26(2):17-24.

Megahed SM. Automatic algebraic computation of

basic kinematic equations of tree structure robot

arms: application to human arms. J Eng Med

1991;205(H3):135-43.

Phillippe-Auguste JS, Gibbons DT. Simulation and

modelling of a microcomputer controlled above-

elbow prosthesis. Automedica 1989;11(1-3):

99-109.

Prout W. The New York electric elbow. The New York

prehension actuator, and the NU-VA synergetic

prehensor. In: Meier RH 3d, Atkins DJ, eds.

Comprehensive management of the upper-limb

amputee. New York: Springer-Verlag; 1989.

p. 221-6.

Rahman T. Control of a prosthetic arm using

coordinated movements of the shoulder

[dissertation]. Philadelphia: Drexel University;

1991. 155 p.

Romm S. Arms by design: from antiquity to the

Renaissance. Plast Reconstr Surg 1989 Jul;84(1):

158-63.

Sauter WF. The use of electric elbows in the

rehabilitation of children with upper limb

deficiencies. Prosthet Orthot Int 1991 Aug;

15(2):93-5.

Scharer C. A learning man-machine interface for an

artificial arm. In: Intelligence for Mechanical

Systems: proceedings of IROS ’91. IEEE/RSJ

International Workshop on Intelligent Robots and

Systems ’91; 1991 Nov 3-5; Osaka, Japan. Vol. 1.

New York: IEEE; 1991. p. 227-30;

Sears HH, Andrew JT, Jacobsen SC. Experience with

the Utah arm, hand and terminal device. In: Meier

RH 3d, Atkins DJ, eds. Comprehensive

management of the upper-limb amputee. New York:

Springer-Verlag; 1989. p. 194-210.

Thornby MA, Krebs DE. Bimanual skill development

in pediatric below elbow amputation: a multicenter,

cross sectional study. Arch Phys Med Rehabil

1992 Aug;73(8):697-702.

Uellendahl J, Heckathorne CW, Krick H, Duff S,

Patwardhan AG, Li S, Gavin T, Lorenz M, Meade

KP, Logan GD, et al. Session 17: prosthetics and

orthotics. In: Capitalizing on technology:

proceedings of the RESNA 13th annual conference;

1990 Jun 15-20; Washington, DC. Washington

(DC): RESNA Press; 1990. p. 167-76.

van Lunteren A, van Lunteren-Gerritsen GHM. On

the use of prostheses by children with unilateral

congenital forearm defect. J Rehabil Sci 1989;2(1):

10-12.

Vincenzi C, Cameli N, Vassilopoulou A, Tosti A.

Allergic contact dermatitis due to benzoyl peroxide

in an arm prosthesis. Contact Dermatitis 1991 Jan;

24(1):66-7.

Walta HA. Handleiding onderarmprothese met open

fitting: theorie, aanmeten en fabricage. [Manual for

forearm prosthesis with open fitting]. Delft

(Netherlands): Technische Hogeschool Delft; 1989.

86 p. (Dut).

Wiegner AW. Can basic science help improve arm

function in C5 tetraplegia? J Am Paraplegia Soc

1993 Apr;16(2):75.

Williams TW 3d. Use of the Boston elbow for high-

level amputees. In: Meier RH 3d, Atkins DJ, eds.

Comprehensive management of the upper-limb

amputee. New York: Springer-Verlag; 1989.

p. 211-20.

Wirta RW, Taylor DR, Finley FR. Pattern-recognition

arm prosthesis: a historical perspective-a final

report. Bull Prosthet Res 1978 Fall:8-35.

Wood JE, Meek SG, Jacobsen SC. Quantitation of

human shoulder anatomy for prosthetic arm control.

I. surface modelling. J Biomech 1989;22(3):

273-92.

Wood JE, Meek SG, Jacobsen SC. Quantitation of

human shoulder anatomy for prosthetic arm control-

II. anatomy matrices. J Biomech 1989;22(4):

309-25.

Zahradnik J. Shoulder movement as a command control

source for upper limb neural prostheses [master’s

thesis]. Cambridge (MA): Massachusetts Institute of

Technology; 1989.

Zarii KM, Motamedy A, Hashemi RM, Zajc B, Solina

F. An approach to redundancy cancelling in order

to use a single chip processor for IAV evaluation

in cybernetic arm. In: 6th Mediterranean

Electrotechnical Conference Proceedings; 1991 May

22-24; Ljublijana, Slovenia. Vol. 1. New York:

IEEE; 1991. p. 744-7.

-Hand

Akazawa, K., Hayashi, Y. [Estimation of

neuromuscular control system dynamics for

development of myoelectric hand prosthesis.]

Trans Inst Electron Inf Commun Eng D-II 1990

Feb;J73D-II(2):257-65. (Jpn).

Alison A, Mackinnon SE. Evaluation of digital

prostheses. J Hand Surg [Am] 1992 Sep;17(5):

923-6.

Ballance R, Wilson BN, Harder JA. Factors affecting

myoelectric prosthetic use and wearing patterns in

the juvenile unilateral below elbow amputee. Can J

Occup Ther 1989 Jun;56(3):132-7.

Beasley RW, de Beze GM. Prosthetic replacements

for the thumb. Hand Clin 1992 Feb;8(1):63-9.

Beasley RW, de Beze GM. Prosthetic substitution for

fingernails. Hand Clin 1990 Feb;6(1):105-10;

discussion 111.

Bergamasco M, Salsedo F, Dario P. Shape memory

alloy micromotors for direct-drive actuation of

dexterous artificial hands. Paper presented at:

EUROSENSORS II, the 4th Symposium on Sensors

and Actuators; 1989 May 3; Enschede, Netherlands.

Sensors Actuators 1989 May 3;17(1-2):115-9.

Bergman K, Ornholmer L, Zackrisson K, Thyberg M.

Functional benefit of an adaptive myoelectric

prosthetic hand compared to a conventional

myoelectric hand. Prosthet Orthot Int 1992 Apr;

16(1):32-7.

Blinov BV, Kharitonenko DA. [A device for "finger"

spreading after forearm stump splitting]. Ortop

Travmatol Protez 1990 Sep;(9):53-4. (Rus).

Bok SH, Bhattacharjee A, Nee AY, Pho RW, Teoh SH,

Lim SY. Computer-Aided Design and Computer-

Aided Manufacture (CAD-CAM) applications in

cosmetic below-elbow prostheses. Ann Acad Med

Singapore 1990 Sep;19(5):699-705.

Boldyrev AI, Mendelevich IA, Lepilova OI.

[Evaluation of residual function of the hand in its

defects]. Ortop Travmatol Protez 1989 Jul;(7):

34-6. (Rus).

Campbell GS, Gow D, Hooper G. Low cost cosmetic

hand prostheses. J Hand Surg [Br] 1992 Apr;17(2):

201-3.

Carlson LE, Heim R. Holding assist for a voluntary-

closing prosthetic prehensor. ASME Dyn Syst

Control Div Publ 1989;17:79-87.

Cauquil C, Thaury MN, de Godebout J, Ster J, Ster F,

Bouzigues B, Ducros P. [Radio-carpal amputation

and prosthesis]. Ann Chir Main Memb Super

1992;11(1):69-73. (Fre).

Chappell PH, Kyberd PJ. Prehensile control of a hand

prosthesis by a microcontroller. J Biomed Eng

1991 Sep;13(5):363-9.

Crago PE, Lemay M, Kim Y, Spelman FA. Active

regulation of grasp stiffness in neuroprosthesis for

restoration of hand function in quadriplegics. In:

Kim Y, Spelman FA, eds. Images of the twenty-

first century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Vol. 3. Piscataway (NJ): IEEE; 1989.

p. 902-3.

Crago PE, Nakai RJ, Chizeck HJ. Feedback regulation

of hand grasp opening and contact force during

stimulation of paralyzed muscle. IEEE Trans

Biomed Eng 1991 Jan;38(1):17-28.

Crandall RC, Hansen D. Clinical evaluations of a

voluntary-closing terminal device for below-elbow

amputees. J Assoc Child Prosthet Orthot Clin 1989

Winter;24(4):71-4.

Curran B, Hambrey R. The prosthetic treatment of

upper limb deficiency. Prosthet Orthot Int 1991

Aug;15(2):82-7.

Daley TL, Scott RN, Parker PA, Lovely DF. Operator

performance in myoelectric control of a

multifunction prosthesis stimulator. J Rehabil Res

Dev 1990 Winter;27(1):9-20.

Datta D, Kingston J, Ronald J. Myoelectric prostheses

for below-elbow amputees: the Trent experience.

Int Disabil Stud 1989 Oct-Dec;11(4):167-70.

Derhaag MMC, Schoorl PM, Derhaag PJF.

Personality development in one handed children

treated with a myoelectrically controlled prosthesis.

J Rehabil 1990 Jul-Sep;56(3):25-9.

Duncan RM. Basic principles of splinting the hand.

Phys Ther 1989 Dec;69(12):1104-16.

Edelstein JE, Berger N. Performance comparison

among children fitted with myoelectric and body-

powered hands. Arch Phys Med Rehabil 1993 Apr;

74(4):376-80.

Ehrler S, Buch-Jaeger N. [Hand prosthesis.

Conception and surveillance]. Soins Chir 1991

May;(123):34-6. (Fre).

Elsley RK. Adaptive control of prosthetic limbs using

neural networks. In: Caudill M, ed. IJCNN

International Joint Conference on Neural Networks;

1990 Jan 15-19; Washington, DC. Vol. 2. Hillsdale

(NJ): Lawrence Erlbaum Associates; 1990.

p. 771-6.

Guttenberg U, Rogoll G, Vossius G. [Measuring force

distribution of the hand surface in grasping].

Biomed Tech (Berlin) 1989;34 Suppl:157-8. (Ger).

Hines AE, Crago PE, Kim Y, Spelman FA.

Assessment of neuroprosthetic hand grasp by

combined force and position tracking. In: Kim Y,

Spelman FA, eds. Images of the twenty-first

century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Vol. 5. Piscataway (NJ): IEEE; 1989.

p. 1481-2.

Hines AE, Owens NE, Crago PE. Assessment of

input-output properties and control of

neuroprosthetic hand grasp. IEEE Trans Biomed

Eng 1992 Jun;39(6):61-23.

Iberall T, Torras C, MacKenzie C, Kohonen T,

Fogelman-Soulie F. Parameterizing prehension: a

mathematical model of opposition space. In:

Kohonen T, Fogelman-Soulie F, eds. Cognitiva 90.

At the crossroads of artificial intelligence, cognitive

science and neuroscience. Proceedings of the 3rd

Cognitiva Symposium; 1990 Nov 20-23, Madrid,

Spain. Amsterdam; New York: North-Holland;

Elsevier Science Publ.; 1991. p. 635-42.

Iwasawa M, Matsuo K, Hirose T, Sakaguchi Y.

Improvement in the surgical results of treatment of

duplicated thumb by preoperative splinting. J Hand

Surg [Am] 1989 Nov;14(6):941-5.

Keith MW, Peckham PH, Thrope GB, Buckett JR,

Stroh KC, Menger V. Functional neuromuscular

stimulation neuroprostheses for the tetraplegic hand.

Clin Orthop 1988 Aug;(233):25-33.

Keith MW, Peckham PH, Thrope GB, Stroh KC, Smith

B, Buckett JR, Kilgore KL, Jatich JW.

Implantable functional neuromuscular stimulation in

the tetraplegic hand. J Hand Surg [Am] 1989 May;

14(3):524-30.

Kilgore KL. Optimization and automation of stimulus

mpa synthesis for upper extremity fns [dissertation].

Cleveland: Case Western Reserve University; 1991.

198 p.

Kilgore KL, Peckham PH, Keith MW, Thrope GB.

Electrode characterization for functional application

to upper extremity FNS. IEEE Trans Biomed Eng

1990 Jan;37(1):12-21.

Kilgore KL, Peckham PH, Thrope GB, Keith MW,

Gallaher-Stone KA. Synthesis of hand grasp using

functional neuromuscular stimulation. IEEE Trans

Biomed Eng 1989 Jul;36(7):761-70.

Knox E. Slip detection and automatic grasping for and

externally powered prehensor [master’s thesis].

Chicago: Northwestern University; 1990.

Kruger LM, Fishman S. Myoelectric and body-

powered prostheses. J Pediatr Orthop 1993

Jan-Feb;13(1):68-75.

Kruit J, Cool JC. Body-powered hand prosthesis with

low operating power for children. J Med Eng

Technol 1989 Jan-Apr;13(1-2):129-33.

Kulkarni JR. Partial hand prostheses: a clinic profile.

Br J Occup Ther 1990 May;53(5):200-1.

Kybard P. Prosthetics lead the way. Electron Wirel

World 1989 Feb;95(1636):176-7.

Kyberd PJ. Algorithmic control of a multifunction

hand prosthesis [dissertation]. Highfield (UK):

University of Southampton; 1990.

Kyberd PJ, Chappell PH. Characterization of an

optical and acoustic touch and slip sensor for

autonomous manipulation. Measur Sci Technol

1992 Oct;3(10):969-75.

Kyberd PJ, Chappell PH. Object-slip detection during

manipulation using a derived force vector.

Mechatron 1992 Feb;2(1):1-13.

LeBlanc M, Setoguchi Y, Shaperman J, Carlson L.

Mechanical work efficiencies of body-powered

prehensors for young children. J Assoc Child

Prosthet Orthot Clin 1992 Winter;27(3):70-5.

Meghdari A, Arefi M, Mahmoudian M, Hamza MH.

Biomechanical aspects of the Sharif artificial hand.

In: Hamza MH, ed. Computers and Advanced

Technology in Medicine, Healthcare and

Bioengineering: proceedings of the IASTED

International Symposium; 1990 Aug 15-17; Hawaii.

Anaheim (CA): ACTA Press; 1990. p. 32-6.

Mehdan M. Tactile sensing for automata and

prosthesis [dissertation]. London: Council for

National Academic Awards; 1989. 290 p.

Nader M. The artificial substitution of missing hands

with myoelectrical prostheses. Clin Orthop 1990

Sep;(258):9-17.

Patterson PE, Katz JA. Design and evaluation of a

sensory feedback system that provides grasping

pressure in a myoelectric hand. J Rehabil Res Dev

1992 Winter;29(1):1-8.

Plettenburg DH. Electric versus pneumatic power in

hand prostheses for children. J Med Eng Technol

1989 Jan-Apr;13(1-2):124-8.

Proctor S, LeBlanc M. Clinical evaluation of a new

design prosthetic prehensor. J Prosthet Orthot 1991

Winter;3(2):79-83.

Putzi R. Myoelectric partial-hand prosthesis.

J Prosthet Orthot 1992 Winter;4(2):103-8.

Radocy B. Prosthetic control biomechanics and

voluntary closing prehensors: technical note.

J Assoc Child Prosthet Orthot Clin 1990 Spring;

25(1):9-10.

Reinkensmeyer DJ, Lum PS, Lehman SL. Human

control of a simple two-hand grasp. Biol Cybern

1992;67(6):553-64.

Schmaman J, Carr L. Acrylic resin finger prosthesis.

J Hand Surg [Br] 1992 Dec;17(6):673-4.

Sears HH, Andrew JT, Jacobsen SC. Experience with

the Utah arm, hand and terminal device. In: Meier

RH 3d, Atkins DJ, eds. Comprehensive

management of the upper-limb amputee. New York:

Springer-Verlag; 1989. p. 194-210.

Shaperman J, Setoguchi Y. The CAPP terminal

device, size 2: a new alternative for adolescents and

adults. Prosthet Orthot Int 1989 Apr;13(1):25-8.

Slack M, Berbrayer D. A myoelectrically controlled

wrist-hand orthosis for brachia plexus injury: a case

study. J Prosthet Orthot 1992 Apr;4(3):171-4.

Stansfield SA. (Sandia National Labs., Albuquerque,

NM). Connectionist and neural net

implementations of a robotic grasp generator.

Washington (DC): U.S. Department of Energy;

1992 Jan 6. Report No.: SAND911746C,

CONF9204711. Contract No.: AC0476DP00789. 15

p. Available from: NTIS, Springfield, VA.;

DE92006832XSP. Paper presented at: International

Society for Optical Engineering (SPIE) conference;

1992 Apr 20; Orlando, FL.

Stansfield SA. (Sandia National Labs., Albuquerque,

NM). Experiments in robotic sensori-motor

control during grasp. Washington (DC): U.S.

Department of Energy; 1991 Sep 6. Report No.:

SAND911379. Contract No.: AC0476DP00789.

21 p. Available from: NTIS, Springfield, VA.;

DE92005384XSP.

Stansfield SA. (Sandia National Labs., Albuquerque,

NM). Expert system for automated robotic

grasping. Washington (DC): U.S. Department of

Energy; 1990 May 10. Report No.:

SAND901200CExtdAbst, CONF9011011. Contract

No.: AC0476DO00789. 13 p. Available from:

NTIS, Springfield, VA.; DE90010820SXP. Paper

presented at: American Nuclear Society winter

meeting; 1990 Nov 11-15; Washington, DC.

Stansfield SA. (Sandia National Labs., Albuquerque,

NM). Haptic system for a multifingered hand.

Washington (DC): U.S. Department of Energy;

1990. Report No.: SAND902001C, CONF9104511.

Contract No.: AC0476DP00789. 25p. Available

from: NTIS, Springfield, VA.; DE90017044XSP.

Paper presented at: IEEE robotics and automation

conference; 1991 Apr 7-12; Sacremento, CA.

Swanson AB, DeGroot Swanson G. [Krukenberg-

plasty in young patients]. Rehabilitation (Stuttg)

1990 Feb;29(1):19-24. (Ger).

Thrope G, Stroh K, Baco A (Case Western Reserve

University, Veterans Administration Medical

Center). Standardized object test for quantitative

assessment of hand grasp function using the

C.W.R.U. upper extremity neuroprosthesis. In:

Technology for the next decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 181-2.

Walta HA, Ariese P, Cool JC. Ergonomic socket

design for congenital below elbow amputated

children. J Rehabil Sci 1989 Mar;2(1):19-24.

Walta JA (Technische Hogeschool Delft. Faculteit der

Werktuigbouwkunde en Maritieme Techniek).

Esthetische haakprothese: ontwerp [Esthetical hook

prothesis: design]. Delft (Netherlands): The

Hogeschool; 1989. 33 p. PB90263690XSP. (Dut).

Wijman CA, Stroh KC, Van Doren CL, Thrope GB,

Peckham PH, Keith MW. Functional evaluation of

quadriplegic patients using a hand neuroprosthesis.

Arch Phys Med Rehabil 1990 Dec;71(13):1053-7.

Lower Extremity Amputees

-General

Ai-Kah S, Chee-Kiong S, Lau WS. Method for the

design and analysis of a non-linear anisotropic

lower limb prosthetic socket. J Biomed Eng 1990

Nov;12(6):470-6.

Amirova EK, Efimov VA, Kuzhekin AP, Lunina NV,

Slepchenko AN, Ul’ianov SV, Khanukaev AS,

Shakhnazarov MM, Shakhnazarova IV, Shishkin

BV. [An expert system for choosing prostheses for

the lower extremities (hip) and assessing the quality

of the prosthesis. I.]. Med Tekh 1991 May-Jun;

(3):26-31. (Rus).

Amirova EK, Efimov VA, Kuzhekin AP, Lunina NV,

Slepchenko AN, Ul’ianov SV, Khanukaev AS,

Shakhnazarov MM, Shakhnazarova IV, Shishkin

BV. [Expert system of choosing lower limb (thigh)

prosthesis and diagnosis of the quality of

prosthetics (II)]. Med Tekh 1991 Nov-

Dec;(6):5-12. (Rus).

Ashley RK, Vallier GT, Skinner SR. Gait analysis in

pediatric lower extremity amputees. Orthop Rev

1992 Jun;21(6):745-9.

Bagley AM, Skinner HB. Progress in gait analysis in

amputees: a special review. Crit Rev Phys Rehabil

Med 1991;3(2):101-20.

Baker PA, Hewison SR. Gait recovery pattern of

unilateral lower limb amputees during

rehabilitation. Prosthet Orthot Int 1990 Aug;14(2):

80-4.

Bansal VP, Harmit S. Monomelic macrodystrophia

lipomatosa. A case report. Int Orthop 1989;13(1):

77-9.

Blohmke F, Nader M, eds. Otto Bock prosthetic

compendium: lower extremity prostheses. Berlin:

Schiele & Schoe; 1989. 96 p.

Chan KM, Tan ES. Use of lower limb prosthesis

among elderly amputees. Ann Acad Med

Singapore 1990 Nov;19(6):811-6.

Connolly K. Artificial limb cosmesis design: a study

of materials and production methods for improved

performance [dissertation]. Guildford (UK):

University of Surrey; 1990. 310 p.

Cummings DR, Knapp SL. Lower limb pediatric

prosthetics: general considerations and philosphy.

J Prosthet Orthot 1992 Jul;4(4):196-206.

Cupo M. Application of rehabilitation engineering for

a bilateral hemipelvectomy amputee with chronic

sacral decubitus ulcers. Clin Kinesiol 1991 Spring;

45(1):22-5.

Datta D, Nair PN, Payne J. Outcome of prosthetic

management of bilateral lower-limb amputees.

Disabil Rehabil 1992 Apr-Jun;14(2):98-102.

De Luccia N, Pinto MA, Guedes JP, Albers MT.

Rehabilitation after amputation for vascular disease:

a follow-up study. Prosthet Orthot Int 1992 Aug;

16(2):124-8.

Dohler K, de Neve W. [Rehabilitation of leg

amputees]. Z Arztl Fortbild (Jena) 1989;83(19):

949-51. (Ger).

Edelstein JE. Preprosthetic management of patients

with lower or upper limb amputation. Phys Med

Rehabil Clin North Am 1991 May;2(2):285-97.

Ehrlich R, Garlick D, Ninio M. Electromyographic

activity in walking subjects with and without

prosthetic devices. In: Woollacott M, Horak F, eds.

Posture and gait: control mechanisms, 1992.

Proceedings of the 11th International Symposium of

the Society for Postural and Gait Research;

Portland, OR. Vol. 2. Portland (OR): University of

Oregon; 1992. p. 369-71.

Folsom D, King T, Rubin JR. Lower-extremity

amputation with immediate postoperative prosthetic

placement. Am J Surg 1992 Oct;164(4):320-2.

Friedmann LW. Rehabilitation of the lower extremity

amputee. In: Kottke FJ, Lehman JF. Krusen’s

handbook of physical medicine and rehabilitation.

4th ed. Philadelphia: Saunders; 1990. p. 1024-69.

Gailey RS Jr, Clark CR. Physical therapy management

of adult lower-limb amputees. In: Bowker JH,

Michael JW, eds. Atlas of limb prosthetics:

surgical, prosthetic, and rehabilitation principles. St.

Louis: Mosby Year Book; 1992. p. 569-97.

Gruman G, Michael JW. Translumbar amputation

(hemicorporectomy): prosthetic considerations. In:

Bowker JH, Michael JW, eds. Atlas of limb

prosthetics: surgical, prosthetic, and rehabilitation

principles. St. Louis: Mosby Year Book; 1992.

p. 563-8.

Hagberg E, Berlin K, Renstrom P. Function after

through-knee as compared to above-knee and

below-knee amputation. Prosthet Orthot Int 1992

Dec;16(3):168-73.

Hillstrom HJ. Robust intent recognition for the control

of myoelectric lower limb prosthesis [dissertation].

Philadelphia: Drexel University; 1989. 137 p.

Hirons RR, Williams KB, Amor RF, Day HJ. The

prosthetic treatment of lower limb deficiency.

Prosthet Orthot Int 1991 Aug;15(2):112-6.

Houston VL. Considerations in optical digitization of

lower limb segments for prosthetics CADS/CAM.

In: Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 153-4.

Hubbard WA. Rehabilitation outcomes for elderly

lower limb amputees. Aust J Physiother 1989;

35(4):219-24.

Jain AS, Stewart CP. Tumour related lower limb

amputation: a 23 year experience. Prosthet Orthot

Int 1989 Aug;13(2):82-5.

James WV. Principles of limb fitting and prostheses.

Ann R Coll Surg Engl 1991 May;73(3):158-62.

Jonas HP, Ott W, Morscher M. [Amputation and

prosthetic replacement of the lower extremities in

arterial occlusive diseases]. Vasa Suppl 1992;37:

68-70. (Ger).

Karacoloff LA, Hammersley CS, Schneider FJ. Lower

extremity amputation: a guide to functional

outcomes in physical therapy management. 2nd ed.

Gaithersburg (MD): Aspen Publishers; 1992. 254 p.

Kegel B. Special considerations: adaptations for sports

and recreation. In: Bowker JH, Michael JW, eds.

Atlas of limb prosthetics: surgical, prosthetic, and

rehabilitation principles. St. Louis: Mosby Year

Book; 1992. p. 623-54.

Kejer AN, Roschkow AW, Schtscherbina KK.

[Creation of a weight-bearing leg stump and the

fitting for a prosthesis]. Z Orthop 1990 Nov-Dec;

128(6):632-6. (Ger).

Kirby RL, Chari VR. Prostheses and the forward

reach of sitting lower-limb amputees. Arch Phys

Med Rehabil 1990 Feb;71(2):125-7.

Kruger LM. Stubby prostheses in the rehabilitation of

infants and small children with bilateral lower limb

deficiencies. Rehabilitation (Stuttg) 1990 Feb;

29(1):12-5.

Lavan J. Rehabilitation of the elderly amputee. Ir Med

J 1991 Oct;84(3):91-3. Published erratum appears

in Ir Med J 1992 Jun;85(2):42.

Levesque C, Gauthier-Gagnon C, Beauregard M. An

endoskeletal hip disarticulation prosthesis for the

toddler. J Prosthet Orthot 1991 Spring;3(3):120-4.

Lower-limb prosthetics. [New York]: New York

University, Post-Graduate Medical School,

Prosthetics and Orthotics; 1990. 255 p.

May BJ. Preprosthetic management for lower extremity

amputation. In: O’Sullivan SB, Schmitz TJ.

Physical rehabilitation: assessment and treatment.

2nd ed. Philadelphia: F.A. Davis; 1988.

p. 385-405.

McElroy GK, Hubbard WA. Strategy of gait re-

education for amputees. In: Proceedings of the

18th National Biennial Conference of ACHPER

(Australian Council for Health, Physical Education

and Recreation); 1991; Perth, Australia. Vol. 2.

Hindmarsh (Australia): ACHPER; 1991. p. 441-8.

Meadows CB, Stallard J, Wright D, Gordon L, Major

RE, Jones N. The Edinburgh-ORLAU prosthetic

system to provide reciprocal locomotion in children

and adults with complete transverse lower limb

deficiency. Prosthet Orthot Int 1990 Dec;14(3):

111-6.

Medhat A, Huber PM, Medhat MA. Factors that

influence the level of activities in persons with

lower extremity amputation. Rehabil Nurs 1990

Jan-Feb;15(1):13-8.

Moore TJ, Barron J, Hutchinson F 3d, Golden C, Ellis

C, Humphries D. Prosthetic usage following major

lower extremity amputation. Clin Orthop 1989

Jan;(238):219-24.

Moran BJ, Buttenshaw P, Mulcahy M, Robinson KP.

Through-knee amputation in high-risk patients with

vascular disease: indications, complications and

rehabilitation. Br J Surg 1990 Oct;77(10):1118-20.

Murdoch G, Donovan RG. Amputation surgery and

lower limb prosthetics. Oxford: Blackwell Scientific

Publications; 1988. 470 p.

Neff G. [Prosthetic management of amputees].

Langenbecks Arch Chir Suppl Ii Verh Dtsch Ges

Forsch Chir 1989:655-6. (Ger).

Nissan M. The initiation of gait in lower limb

amputees: some related data. J Rehabil Res Dev

1991 Spring;28(2):1-12.

Nissen SJ, Newman WP. Factors influencing

reintegration to normal living after amputation.

Arch Phys Med Rehabil 1992 Jun;73(6):548-51.

O’Connell PG, Gnatz S. Hemiplegia and amputation:

rehabilitation in the dual disability. Arch Phys Med

Rehabil 1989 Jun;70(6):451-4.

Oglesby DG Jr, Tablada C. Lower limb deficiencies:

prosthetic and orthotic management. In: Bowker JH,

Michael JW, eds. Atlas of limb prosthetics:

surgical, prosthetic, and rehabilitation principles. St.

Louis: Mosby Year Book; 1992. p. 835-8.

Oppenheim WL. Fibular deficiency and the

indications for Syme’s amputation. Prosthet Orthot

Int 1991 Aug;15(2):131-6.

Padula PA, Friedmann LW. Amputee gait. Phys Med

Rehabil Clin North Am 1991 May;2(2):423-32.

Palma T, Hoyle D. Lower extremity amputation. Clin

Manage 1992 May-Jun;12(3):96-9.

Penington G, Warmington S, Hull S, Freijah N.

Rehabilitation of lower limb amputees and some

implications for surgical management. Aust N Z J

Surg 1992 Oct;62(10):774-9.

Phillips CA, ed. Effective upper & lower extremity

prostheses. New York: Gordon & Breach Science

Publ.; 1989. 276 p. (Automedica; vol. 11,

no. 1-3).

Pinzur MS. New concepts in lower-limb amputation

and prosthetic management. Instr Course Lect

1990;39:361-6.

Pinzur MS, Littooy F, Daniels J, Arney C, Reddy NK,

Graham G, Osterman H. Multidisciplinary

preoperative assessment and late function in

dysvascular amputees. Clin Orthop 1992 Aug;

(281):239-43.

Pohjolainen T, Alaranta H. Predictive factors of

functional ability after lower-limb amputation. Ann

Chir Gynaecol 1991;80(1):36-9.

Pohjolainen T, Alaranta H, Karkkainen M. Prosthetic

use and functional and social outcome following

major lower limb amputation. Prosthet Orthot Int

1990 Aug;14(2):75-9.

Pohjolainen T, Alaranta H, Wikstrom J. Primary

survival and prosthetic fitting of lower limb

amputees. Prosthet Orthot Int 1989 Aug;13(2):

63-9.

Porter D, Roberts VC. A review of gait assessment in

the lower limb amputee. Preparation Contractor part

1: temporal and kinematic analysis. Clin Rehabil

1989 Feb;3:65-74.

Pratt DJ. Three dimensional electrogoniometric study

of selected knee orthoses. Clin Biomech 1991;6(2):

67-72.

Pritham CH. Special considerations: emerging trends in

lower-limb prosthetics: research and development.

In: Bowker JH, Michael JW, eds. Atlas of limb

prosthetics: surgical, prosthetic, and rehabilitation

principles. St. Louis: Mosby Year Book; 1992. p.

655-61.

Raven KA, Brugger CA. Hemicorporectomy: a

nursing challenge. Orthop Nurs 1992 Mar-Apr;

11(2):73-8.

Reidy ME, Steen V, Nicholas JJ. Lower extremity

amputation in scleroderma. Arch Phys Med

Rehabil 1992 Sep;73(9):811-3.

Rothschild VR, Fox JR, Michael JW, Rothschild RJ,

Playfair G. Clinical experience with total

thermoplastic lower limb prosthesese. J Prosthet

Orthot 1990 Fall;3(1):51-4.

Rovetta A. A new technology with an old face and a

proud heritage. Mechatron 1991;1(2):117-26.

Rovetta A, Xia W. Biorobotics in a new artificial leg.

In: Proceedings of IROS ’90: IEEE International

Workshop on Intelligent Robots and Systems ’90:

towards a new frontier of applications; 1990 Jul

3-6; Ibaraki, Japan. Vol. 2. New York: IEEE; 1990.

p. 971-6.

Rovetta A, Xia W, Cosmi F. Realization of a

prosthesis of the lower limb: development of

kinematics. Robot Comput Integr Manuf 1991;

8(3):137-42.

Rozhkov AV, Shcherbina KK, Susliaev VG.

[Functional characteristics of the upper leg stumps

after knee joint disarticulation and prosthesis].

Ortop Travmatol Protez 1991 Jun;(6):29-33. (Rus).

Rozsos I, Kollar L, Kiss T, Tanto Z, Molnar L. [Data

on possibilities of rehabilitation of lower limb

amputees]. Orv Hetil 1991 Sep 15;132(37):2045-8.

(Hun).

Sabolich J. Prosthetic advances in lower extremity

amputation. Phys Med Rehabil Clin North Am

1991 May;2(2):415-22.

Sanders JE, Daly CH, Boone DA, Donaldson TF. An

angular alignment measurement device for

prosthetic fitting. Prosthet Orthot Int 1990 Dec;

14(3):143-4.

Sartoretti C. [Amputations of the lower extremity].

Helv Chir Acta 1991 Jul;58(1-2):235-8. (Ger).

Seliktar R, Mizrahi J, Vachranukunkiet T, Besser M,

Kuenzig D. Human performance with the

prosthetic devices and surgically modified skeletal

elements. Automedica 1989;11:145-62.

Sinclair AM. Occupational therapy and the lower limb

amputee in Western Australia. Br J Occup Ther

1991 Feb;54(2):69-71.

Siriwardena GJA, Bertrand PV. Factors influencing

rehabilitation of arteriosclerotic lower limb

amputees. J Rehabil Res Dev 1991 Summer;28(3):

35-44.

Skolimowski T, Ostrowska B. [Evaluation of results

of the prosthesis using after an amputation within

the lower limbs]. Postepy Rehabilitacji (Warsaw)

1990;4(3):13-9 (Pol).

Smith DG, Burgess EM, Zettl JH. Special

considerations: fitting and training the bilateral

lower-limb amputee. In: Bowker JH, Michael JW,

eds. Atlas of limb prosthetics: surgical, prosthetic,

and rehabilitation principles. St. Louis: Mosby Year

Book; 1992. p. 599-622.

Soh AK, Soh CK, Lau WS. Method for the design

and analysis of a non-linear anisotropic lower limb

prosthetic socket. J Biomed Eng 1990 Nov;12(6):

470-6.

Sooriakumaran S, Landham TL. The Klippel-

Trenaunay syndrome. J Bone Joint Surg [Br] 1991

Jan;73(1):169-70.

Stewart CP, Jain AS. Cause of death of lower limb

amputees. Prosthet Orthot Int 1992 Aug;16(2):

129-32.

Stewart CP, Jain AS, Ogston SA. Lower limb

amputee survival. Prosthet Orthot Int 1992 Apr;

16(1):11-8.

Van de Veen PG. An investigation of design criteria

of modular endoskeletal lower limbprostheses

[dissertation]. Enschede (Netherlands): Twente

University of Technology; 1989.

Van GH, Benichou M, Chiesa G, Lefevre B, Menager

D. [Care of amputations of the lower extremities].

Servir 1989 Jan-Feb;37(1):15-20. (Por).

Veth RP. IIB osteosarcoma. Current management,

local control, and survival statistics--The

Netherlands. Clin Orthop 1991 Sep;(270):67-71.

Williams RB, Porter D, Roberts VC, Regan JF.

Triaxial force transducer for investigating stresses at

the stump/socket interface. Med Biol Eng Comput

1992 Jan;30(1):89-96.

Wilson AB Jr. Limb prosthetics. 6th ed. New York:

Demos; 1989. Prostheses for lower-limb amputees;

p. 41-68.

Wolf E, Lilling M, Ferber I, Marcus J. Prosthetic

rehabilitation of elderly bilateral amputees. Int J

Rehabil Res 1989;12(3):271-8.

Zeman BD, Prakash AS, Adler R. Prosthetic legs

revisited [letter]. Med J Aust 1990 Jan 1;152(1):

54-5.

-Knee & above-knee

Aeyels B, Peeraer L, Vander Sloten J, Van der Perre

G. Development of an above-knee prosthesis

equipped with a microcomputer-controlled knee

joint: first test results. J Biomed Eng 1992 May;

14(3):199-202.

Angarami GR, Samaria CE. An efficient low cost

prosthetic structural system. J Prosthet Orthot 1989

Jan;1(2):86-91.

Banziger E, Harding A. Aqua Flex: a pediatric all-

plastic prosthetic knee system. J Assoc Child

Prosthet Orthot Clin 1991 Fall;26(2):53-5.

Cullen C, Flowers W. A robust, accurate load cell for

use in training above-knee amputees. J Biomech

Eng 1990 Feb;112(1):103-5.

de Bari A, Krajbich JI, Langer F, Hamilton EL,

Hubbard S. Modified Van Nes rotationplasty for

osteosarcoma of the proximal tibia in children [see

comments]. J Bone Joint Surg [Br] 1990 Nov;

72(6):1065-9.

Delepine G, Delepine N, Lewertowski JM. [Knee

prostheses for tumors]. Rev Prat 1991 Jun 1;

41(16):1465-71. (Fre).

DiAngelo DJ, Winter DA, Ghista DN, Newcombe WR.

Performance assessment of the Terry Fox jogging

prosthesis for above-knee amputees. J Biomech

1989;22(6-7):543-58.

Dickstein R, Halevy E, Meir H, Bigon R. Use of the

early walking aid as a geriatric prosthesis in the

community. J Prosthet Orthot 1989 Jan;1(2):110-5.

Dietzen CJ, Harshberger J, Pidikiti RD. Suction sock

suspension for above-knee prostheses. J Prosthet

Orthot 1991 Winter;3(2):90-3.

Eakin CL, Quesada PM, Skinner H. Lower-limb

proprioception in above-knee amputees. Clin

Orthop 1992 Nov;(284):239-46.

Flandry F, Beskin J, Chambers RB, Perry J, Waters RL,

Chavez R. The effect of the CAT-CAM above-

knee prosthesis on functional rehabilitation . Clin

Orthop 1989 Feb;(239):249-62.

Folsom D, King T, Rubin JR. Lower-extremity

amputation with immediate postoperative prosthetic

placement. Am J Surg 1992 Oct;164(4):320-2.

Foussereau J, Cavelier C, Protois JP, Deviller J.

Contact dermatitis from methyl methacrylate in an

above-knee prosthesis. Contact Dermatitis 1989

Jan;20(1):69-70.

Given JD. Development of a muttichannel time series

based transfer function model of the emg-torque

relationship for the control of an above-knee

prosthesis [dissertation]. Philadelphia: Drexel

University; 1990. 154 p.

Gottschalk F. CAT-CAM above-knee prostheses and

the effect on functional rehabilitation [letter]. Clin

Orthop 1990 Jun;(255):310-2.

Gregory E. Nursing practice management: Karen,

aged 15 years, has an above-the-knee amputation.

J Sch Nurs 1992 Feb;8(1):30, 32.

Guha SK, Chaudhry KK. A practical approach to

multifunctional above knee prosthesis. Automedica

1989;11:233-45.

Hale SA. Analysis of the swing phase dynamics and

muscular effort of the above-knee amputee for

varying prosthetic shank loads. Prosthet Orthot Int

1990 Dec;14(3):125-35.

Hale SA. The effect of walking speed on the joint

displacement patterns and forces and moments

acting on the above-knee amputee prosthetic leg.

J Prosthet Orthot 1991 Winter;3(2):59-78.

Hays RD, Leimkuehler JP, Miknevich MA, Troyer D.

An alternative bent-knee prosthesis. Arch Phys

Med Rehabil 1992 Nov;73(11):1118-21.

Hillstrom HJ. Robust intent recognition for the control

of myoelectric lower limb prosthesis [dissertation].

Philadelphia: Drexel University; 1989. 137 p.

Houghton A, Allen A, Luff R, McColl I.

Rehabilitation after lower limb amputation: a

comparative study of above-knee, through-knee and

Gritti-Stokes amputations. Br J Surg 1989 Jun;

76(6):622-4.

Jaegers SM, Vos LD, Rispens P, Hof AL. The

relationship between comfortable and most

metabolically efficient walking speed in persons

with unilateral above-knee amputation. Arch Phys

Med Rehabil 1993 May;74(5):521-5.

Kirby RL, Chari VR. Prostheses and the forward

reach of sitting lower-limb amputees. Arch Phys

Med Rehabil 1990 Feb;71(2):125-7.

Kolde G, Worheide J, Baumgartner R, Brocker EB.

Kaposi-like acroangiodermatitis in an above-knee

amputation stump. Br J Dermatol 1989 Apr;120(4):

575-80.

Krouskop TA, Malinauskas M, Williams J, Barry PA,

Muilenburg AL, Winningham DJ. A computerized

method for the design above-knee prosthetic

sockets. J Prosthet Orthot 1989 Apr;1(3):131-8.

Kruger LM. Stubby prostheses in the rehabilitation of

infants and small children with bilateral lower limb

deficiencies. Rehabilitation (Stuttg) 1990 Feb;

29(1):12-5.

Lilja M, Johansson T, Oberg T. Movement of the tibial

end in a PTB prosthesis socket: a sagittal X-ray

study of the PTB prosthesis. Prosthet Orthot Int

1993 Apr;17(1):21-6.

Lin JH, Chou YL, Ju MS, Sung YT. [Application and

evaluation of the VICON system in gait analysis].

Kao Hsiung I Hsueh Ko Hsueh Tsa Chih 1990 Jan;

6(1):6-11. (Chi).

Malinauskas M, Krouskop TA, Barry PA.

Noninvasive measurement of the stiffness of tissue

in the above-knee amputation limb. J Rehabil Res

Dev 1989 Summer;26(3):45-52.

Masi J, Nelson T, Skewes E. Active ventilation of

above- and below-knee prosthetic devices. In:

Proceedings of the 16th Annual Northeast

Bioengineering Conference; 1990 Mar 26-27; State

College, PA. New York: IEEE; 1990. p. 25-6.

Michael JW. Current concepts in above-knee socket

design. Instr Course Lect 1990;39:373-8.

Mitchell CA, Versluis TL. Management of an above

knee amputee with complex medical problems

using the CAT CAM prosthesis. Phys Ther 1990

Jun;70(6):389-93.

Mohan D, Sethi PK, Ravi R. Mathematical modelling

and field trials of an inexpensive endoskeletal

above-knee prosthesis. Prosthet Orthot Int 1992

Aug;16(2):118-23.

Parry M, Morrison JD. Use of the Femurett adjustable

prosthesis in the assessment and walking training of

new above-knee amputees. Prosthet Orthot Int

1989 Apr;13(1):36-8.

Patil KM, Chakraborty JK. Analysis of a new

polycentric above-knee prosthesis with a pneumatic

swing phase control. J Biomech 1991;24(3-4):

223-33.

Peeraer L, Aeyels B, Van der Perre G. Development

of EMG-based mode and intent recognition

algorithms for a computer-controlled above-knee

prosthesis. J Biomed Eng 1990 May;12(3):178-82.

Peeraer L, Tilley K, Van der Perre G. A computer-

controlled knee prosthesis: a preliminary report.

J Med Eng Technol 1989 Jan-Apr;13(1-2):134-5.

Pelisse F, Marie F, Richard P. The use of a

microprocessor for the partial assistance of a

prosthesis for above knee amputees. J Microcomp

Appl 1990 Apr;13(2):145-53.

Pohjolainen T. A clinical evaluation of stumps in

lower limb amputees. Prosthet Orthot Int 1991

Dec;15(3):178-84.

Popovic D, Oguztoreli MN, Stein RB. Optimal control

for the active above-knee prosthesis. Ann Biomed

Eng 1991;19(2):131-50.

Popovic D, Tomovic R, Tepavac D. Heuristic control

of locomotion. Publ Fac Electr Eng Univ Belgrade

1991;1:85-100.

Popovic D, Tomovic R, Tepavac D, Schwirtlich L.

Control aspects of active above-knee prosthesis. Int

J Man Mach Stud 1991 Dec;35(6):751-67.

Pritham CH. Biomechanics and shape of the above-

knee socket considered in light of the ischial

containment concept. Prosthet Orthot Int 1990 Apr;

14(1):9-21.

Ruskin AP, Rosner H, Saperstein H. Bent-knee

prosthesis. Geriatrics 1970 Jul;25(7):109-14.

Staros A, Rubin G. Prescription considerations in

modern above knee prosthetics. Phys Med Rehabil

Clin North Am 1991 May;2(2):311-24.

Torres-Moreno R, Foort J, Morrison JB, Saunders CG.

A reference shape library for computer aided socket

design in above-knee prostheses. Prosthet Orthot

Int 1989 Dec;13(3):130-9.

Torres-Moreno R, Morrison JB, Cooper D, Saunders

CG, Foort J. A computer-aided socket design

procedure for above-knee prostheses. J Rehabil

Res Dev 1992 Summer;29(3):35-44.

Torres-Moreno R, Saunders CG, Foort J, Morrison JB.

Computer-aided design and manufacture of an

above-knee amputee socket. J Biomed Eng 1991

Jan;13(1):3-9.

Visser-Meily JMA, Cluitmans JJM, Deckers JHM,

Rings F. Experiences of above-knee amputees

with an NML-socket in comparison with

Quadrilateral-socket. J Rehabil Sci 1992 Mar;5(1):

22-5.

Wang TK, Ju MS, Tsuei YG. Adaptative control of

above knee electro-hydraulic prosthesis. J Biomech

Eng 1992 Aug;114(3):421-4.

Webling DD, Fahrer M. Early bent knee prostheses:

ancestors of K9. Br Med J (Clin Res Ed) 1986

Dec 20-27;293(6562):1636-7.

Yang L, Solomonidis SE, Spence WD, Paul JP. The

influence of limb alignment on the gait of above-

knee amputees. J Biomech 1991;24(11):981-97.

-Below-knee

Alaranta H, Kinnunen A, Karkkainen M, Pohjolainen T,

Heliovaara M. Practical benefits of flex-foot in

below-knee amputees. J Prosthet Orthot 1991

Summer;3(4):179-81.

Andres RO, Stimmel SK. Prosthetic alignment effects

on gait symmetry: A case study. Clin Biomech

1990;5(2):88-96.

Angarami GR, Samaria CE. An efficient low cost

prosthetic structural system. J Prosthet Orthot 1989

Jan;1(2):86-91.

Barr AE, Siegel KL, Danoff JV, McGarvey CL 3d,

Tomasko A, Sable I, Stanhope SJ. Biomechanical

comparison of the energy-storing capabilities of

SACH and Carbon Copy II prosthetic feet during

the stance phase of gait in a person with below-

knee amputation. Phys Ther 1992

May;72(5):344-54.

Barth DG, Schumacher L, Sienko Thomas S. Gait

analysis and energy cost of below-knee amputees

wearing six different prosthetic feet. J Prosthet

Orthot 1992 Winter;4(2):63-76.

Besser MP. An investigation of the stump-socket

interface of the patellar-tendon bearing below-knee

prosthesis [dissertation]. Philadelphia: Drexel

University; 1991. 84 p.

Boone DA, Burgess EM. Automated fabrication of

mobility aids: clinical demonstration of the ucl

computer aided socket design system. J Prosthet

Orthot 1989 Apr;1(3):187-90.

Bordelon RL. Orthotics, shoes, and braces. Orthop

Clin North Am 1989 Oct;20(4):751-7.

Brant JE. Technical note: a device to assist in the

alignment and finishing of the syme’s prosthesis.

J Prosthet Orthot 1991 Winter;3(2):100-5.

Brodzka WK, Thornhill HL, Zarapkar SE, Malloy JA,

Weiss L. Long-term function of persons with

atherosclerotic bilateral below-knee amputation

living in the inner city. Arch Phys Med Rehabil

1990 Oct;71(11):895-900.

Brouwer BJ, Allard P, Labelle H. Running patterns of

juveniles wearing SACH and single-axis foot

components. Arch Phys Med Rehabil 1989 Feb;

70(2):128-34.

Bruckner L. A standardised trans-tibial amputation

method following chronic occlusive arterial disease.

Prosthet Orthot Int 1992 Dec;16(3):157-62.

Cappa AJ. The below-knee bypass prosthesis.

J Prosthet Orthot 1992 Apr;4(3):166-70.

Casilla JM, Michel C, Aurelle B, Becker F, Marcer I,

Schultz S, Didier JP. Transcutaneious oxygen

pressure. An effective measure for prosthesis fitting

on below-knee amputations. Am J Phys Med

Rehabil 1993 Feb;72(1):29-32.

Casilla JM, Aurelle B, Coget P, Becker F, Marcer I,

Didier JP. Transcutaneous oxygen tension. How to

choose prosthetics for below knee amputation. Ann

Readapt Med Phys 1990 Dec;33(6):553-61.

Chan KM, Tan ES. Use of lower limb prosthesis

among elderly amputees. Ann Acad Med

Singapore 1990 Nov;19(6):811-6.

Colborne GR, Naumann S, Longmuir PE, Berbrayer D.

Analysis of mechanical and metabolic factors in the

gait of congenital below knee amputees. A

comparison of the SACH and Seattle feet. Am J

Phys Med Rehabil 1992 Oct;71(5):272-8.

Condie DN, Stills ML. Partial-foot amputations:

prosthetic and orthotic management. In: Bowker JH,

Michael JW, eds. Atlas of limb prosthetics:

surgical, prosthetic, and rehabilitation principles. St.

Louis: Mosby Year Book; 1992. p. 277-91.

Corea JR, Sankaran-Kutty M. Lobster claw leg.

J Bone Joint Surg [Br] 1989 Nov;71(5):861.

Crouse SF, Lessard CS, Rhodes J, Lowe RC. Oxygen

consumption and cardiac response of short-leg and

long-leg prosthetic ambulation in a patient with

bilateral above-knee amputation: comparisons with

able-bodied men. Arch Phys Med Rehabil 1990

Apr;71(5):313-7.

Czerniecki JM, Gitter A. Prosthetic feet [letter]. Arch

Phys Med Rehabil 1989 Dec;70(13):918.

Czerniecki JM, Gitter A, Munro C. Joint moment and

muscle power output characteristics of below knee

amputees during running: the influence of energy

storing prosthetic feet. J Biomech 1991;24(1):

63-75. Published erratum appears in J Biomech

1991;24(3-4):271-2.

Donn JM, Porter D, Roberts VC. The effect of

footwear mass on the gait patterns of unilateral

below-knee amputees. Prosthet Orthot Int 1989

Dec;13(3):140-4.

Durance JP, Warren WK, Kerbel DB, Stroud TW.

Rehabilitation of below-knee amputees: factors

influencing outcome and costs in three programmes.

Int Disabil Stud 1989 Jul-Sep;11(3):127-32.

Edelstein JE. Current choices in prosthetic feet. Crit

Rev Phys Rehabil Med 1991;2(4):213-26.

Ehara Y, Beppu M, Nomura S, Kunimi Y, Takahashi S.

Energy storing property of so-called energy-storing

prosthetic feet. Arch Phys Med Rehabil 1993

Jan;74(1):68-72.

Engsberg JR, et al. Comparison of effort between

below-knee amputee and normal children. J Assoc

Child Prosthet Orthot Clin 1991 Fall;26(2):46-52.

Engsberg JR, Aldridge KC, Harder JA. Lower limb

intersegmental forces for below-knee amputee

children during standing. Prosthet Orthot Int 1991

Dec;15(3):185-91.

Engsberg JR, Allinger TL. A function of the

talocalcaneal joint during running support. Foot

Ankle 1990 Oct;11(2):93-6.

Engsberg JR, Allinger TL, Harder JA. Standing

pressure distribution for normal and below-knee

amputee children. Prosthet Orthot Int 1989 Dec;

13(3):152-5.

Engsberg JR, Clynch GS, Lee AG, Allan JS, Harder

JA. A CAD CAM method for custom below-knee

sockets. Prosthet Orthot Int 1992 Dec;16(3):183-8.

Engsberg JR, Lee AG, Patterson JL, Harder JA.

External loading comparisons between able-bodied

and below-knee-amputee children during walking.

Arch Phys Med Rehabil 1991 Aug;72(9):657-61.

Engsberg JR, Lee AG, Tedford KG, Harder Ja.

Normative ground reaction force data for able-

bodied and below-knee-amputee children during

walking. J Pediatr Orthop 1993 Mar-Apr;13(2):

69-73.

Engsberg JR, MacIntosh BR, Harder JA. Comparison

of effort between children with and without below-

knee amputation. J Assoc Child Prosthet Orthot

Clin 1990 Spring;25(1):15-22.

Ensberg JR, Springer M, Harder J. Quantifying

interface pressures in below-knee-amputees. J

Assoc Child Prosthet Orthot Clin 1992

Winter;27(3):81-8.

Engsberg JR, Tedford KG, Harder JA. Center of mass

location and segment angular orientation of below-

knee-amputee and able-bodied children during

walking. Arch Phys Med Rehabil 1992

Dec;73(12):1163-8.

Engsberg JR, Tedford KG, Harder JA, Mills JP.

Timing changes for stance, swing, and double

support in a recent below knee amputee child.

Pediatr Exerc Sci 1990 Aug;2(3):255-62.

Engsberg JR, Tedford KG, Springer MJN, Harder JA.

Technical note: weight distribution of below-knee

amputee and able-bodies children during standing.

Prosthet Orthot Int 1992 Dec;16(3):200-2.

Esquenazi A, Torres MM. Prosthetic feet and ankle

mechanisms. Phys Med Rehabil Clin North Am

1991 May;2(2):299-309.

Faulkner VW, Walsh NE. Computer designed

prosthetic socket from analysis of computed

tomography data. J Prosthet Orthot 1989 Apr;1(3):

154-64.

Fillauer CE, Pritham CH, Fillauer KD. Evolution and

development of the silicone suction socket (3s) for

below-knee prostheses. J Prosthet Orthot 1989 Jan;

1(2):99-103.

Folsom D, King T, Rubin JR. Lower-extremity

amputation with immediate postoperative prosthetic

placement. Am J Surg 1992 Oct;164(4):320-2.

Gitter A, Czerniecki JM, DeGroot DM.

Biomechanical analysis of the influence of

prosthetic feet on below-knee amputee walking.

Am J Phys Med Rehabil 1991 Jun;70(3):142-8.

Glaser RM, Davis GM. Wheelchair dependent

individuals. In: Franklin BA, et al., eds. Exercise

in modern medicine. Baltimore: Williams and

Wilkins; 1989. p. 237-67.

Haberman LJ. The garden state tri-wall expansion

socket system (tess). J Prosthet Orthot 1989 Jul;

1(4):213-9.

Hart TJ. Below-knee child amputee gait: dynamics of

an energy-storing prosthesis [dissertation]. Los

Angeles: University of California, Los Angeles;

1991. 140 p.

Heimke G. Biomaterials highlights. V. Percutaneous

amputation stump extensions. Adv Mater 1990

Apr;2(4):189-91.

The Henry Ford Hospital cosmetic foot prosthesis

[videocassette]. Park Ridge (IL): American

Academy of Orthopedic Surgeons; [1991]. 1

videocassette: 8 min., 18 sec., sound, color, 1/2 in.

Houston VL, Burgess EM, Childress DS, Lehneis HR,

Mason CP, Garbarini MA, LaBlanc KP, Boone DA,

Chan RB, Harlan JH, et al. Automated fabrication

of mobility aids (AFMA): below-knee CASD/CAM

testing and evaluation program results. J Rehabil

Res Dev 1992 Fall;29(4):78-124.

Hurley GR, McKenney R, Robinson M, Zadravec M,

Pierrynowski MR. The role of the contralateral

limb in below-knee amputee gait. Prosthet Orthot

Int 1990 Apr;14(1):33-42.

Isakov E, Mizrahi J, Ring H, Susak Z, Hakim N.

Standing sway and weight-bearing distribution in

people with below-knee amputations. Arch Phys

Med Rehabil 1992 Feb;73(2):174-8.

Isakov E, Mizrahi J, Susak Z, Onna I. A Swedish

knee-cage for stabilizing short below-knee stumps.

Prosthet Orthot Int 1992 Aug;16(2):114-7.

Jacobs LG. The landmine foot: its description and

management. Injury 1991 Nov;22(6):463-6.

Kabra SG. Articulated cadaveric bones as a structural

endoskeleton in an ankle-foot prosthesis: a

preliminary report. J Rehabil Res Dev 1990

Winter;27(1):43-52.

Kabra SG, Narayanan R. Ankle-foot prosthesis with

articulated human bone endoskeleton: force-

deflection and fatigue study. J Rehabil Res Dev

1991 Summer;28(3):13-22.

Kijkusol D. Simplified, low cost below-knee

prosthesis. Prosthet Orthot Int 1986 Aug;10(2):

96-8.

Kirby RL, Chari VR. Prostheses and the forward

reach of sitting lower-limb amputees. Arch Phys

Med Rehabil 1990 Feb;71(2):125-7.

Kohler P, Lindh L, Netz P. Comparison of CAD-

CAM and hand made sockets for PTB prostheses.

Prosthet Orthot Int 1989 Apr;13(1):19-24.

Lancaster JL, Walsh N, Faulkner V. Basic theory,

design, and preliminary evaluation of a laser

scanner for shape sensing below-the-knee amputees.

Med Phys 1990 Mar-Apr;17(2):305-10.

Lancaster JL, Walsh N, Faulkner V. Evaluation of a

laser scanner for shape sensing btk amputees. In:

Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 155-6.

Lange LR. The Lange silicone partial foot prosthesis.

J Prosthet Orthot 1991 Fall;4(1):56-62.

Levesque C, Gauthie-Gagnon C, Fillauer KD. An

improved downhill skiing prosthesis. J Prosthet

Orthot 1989 Jan;1(2):104-9.

Lilja M, Johansson T. Adherent cicatrix after below-

knee amputation. J Prosthet Orthot 1993 Apr;5(2):

65-6.

Macfarlane PA, Nielson DH, Shurr DG, Meier K.

Gait comparisons for below-knee amputees using a

flex-foot versus a conventional prosthetic foot.

J Prosthet Orthot 1991 Summer;3(4):150-61.

Macfarlane PA, Nielsen DH, Shurr DG, Meier K.

Perception of walking difficulty by below-knee

amputees using a conventional foot versus the flex-

foot. J Prosthet Orthot 1991 Spring;3(3):114-9.

Masi J, Nelson T, Skewes E. Active ventilation of

above- and below-knee prosthetic devices. In:

Proceedings of the 16th Annual Northeast

Bioengineering Conference; 1990 Mar 26-27; State

College, PA. New York: IEEE; 1990. p. 25-6.

Mathews D, Burgess E, Boone D. The all-terrain foot.

J Prosthet Orthot 1993 Jan;5(1):29-30.

Menard MR, McBride ME, Sanderson DJ, Murray DD.

Comparative biomechanical analysis of energy-

storing prosthetic feet. Arch Phys Med Rehabil

1992 May;73(5):451-8.

Menard MR, Murray DD. Subjective and objective

analysis of an energy-storing prosthetic foot.

J Prosthet Orthot 1989 Jul;1(4):220-30.

Merlette J. Springlite foot: a composite material

engineer’s approach to design. J Assoc Child

Prosthet Orthot Clin 1989 Winter;24(4):86- .

Michael JW. New developments in prosthetic feet for

sports and recreation. Palaestra 1989 Winter;5(2):

21-2, 32, 34-5.

Michael JW. Overview of prosthetic feet. Instr

Course Lect 1990;39:367-72.

Michael JW. Re: Below-knee amputee gait with

dynamic elastic response prosthetic feet: a pilot

study [letter]. J Rehabil Res Dev 1992 Winter;

29(1):x.

Michael JW, Perry CD, Whitfield ML, Ferment RP.

Technical note: simplified alignment of articulations

to positive models. J Prosthet Orthot 1993 Jan;

5(1):31-3.

Mizuno N, Aoyama T, Nakajima A, Kasahara T,

Takami T. Functional evaluation by gait analysis

of various ankle-foot assemblies used by below-

knee amputees. Prosthet Orthot Int 1992

Dec;16(3):174-82.

Oberg K, Kofman J, Karisson A, Lindstrom B, Sigblad

G. The capod system - a scandinavian cad/cam

system for prosthetic sockets. J Prosthet Orthot

1989 Apr;1(3):139-48.

Ozyalcin H, Sesli E. Temporary prosthetic fitting for

below-knee amputation. Prosthet Orthot Int 1989

Aug;13(2):86-9.

Padula PA, Friedmann LW. Amputee gait. Phys Med

Rehabil Clin North Am 1991 May;2(2):423-32.

Perry J, Auuappa E, Torburn L. Elastic response feet

[letter]. J Rehabil Res Dev 1992 Spring;29(2):137.

Pinzur MS, Asselmeier M, Smith D. Dynamic

electromyography in active and limited walking

below-knee amputees. Orthopedics 1991 May;

14(5):535-7; discussion 537-8.

Pinzur MS, Littooy F, Osterman H, Schwartz D. A

safe, pre-fabricated, immediate postoperative

prosthetic limb system for rehabilitation of below-

knee amputations. Orthopedics 1989 Oct;12(10):

1343-5.

Pinzur MS, Perona P, Patwardhan A, Havey R.

Loading of the contralateral foot in peripheral

vascular insufficiency below-knee amputees. Foot

Ankle 1991 Jun;11(6):368-71.

Pohjolainen T, Alaranta H. Predictive factors of

functional ability after lower-limb amputation. Ann

Chir Gynaecol 1991;80(1):36-9.

Prince F, Allard P, Therrien RG, McFadyen BJ.

Running gait impulse asymmetries in below-knee

amputees. Prosthet Orthot Int 1992 Apr;16(1):

19-24.

Purry NA, Hannon MA. How successful is below-

knee amputation for injury? Injury 1989 Jan;20(1):

32-6.

Quesada P, Skinner HB. Analysis of a below-knee

patellar tendon-bearing prosthesis: a finite element

study. J Rehabil Res Dev 1991 Summer;28(3):

1-12.

Ranu HS, Kim Y, Spelman FA. A quantitative

method of measuring the distribution of forces

under the different regions of the human foot:

during normal and abnormal gait. In: Kim Y,

Spelman FA, eds. Images of the twenty-first

century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Vol. 3. Piscataway (NJ): IEEE; 1989.

p. 824-5.

Report on the Evaluation of the VA/SEATTLE Ankle.

The Rehabilitation R&D Evaluation Unit,

Rehabilitation Research and Development Service,

Department of Veterans Affairs. J Rehabil Res Dev

1991 Spring;28(2):79-90.

Reynolds DP, Lord M. Interface load analysis for

computer-aided design of below-knee prosthetic

sockets. Med Biol Eng Comput 1992 Jul;30(4):

419-26.

Riechmann ME, Pappas M, Findley T, Jain S, Hodgins

J, Fox MD, Epstein MAF, Davis RB, Alward TM.

Computer-aided design and computer-aided

manufacturing of below-knee prosthetics. In:

Proceedings of the 17th Annual Northeast

Bioengineering Conference; 1991 Apr 4-5;

Hartford, CT. New York: IEEE; 1991. p.154-5.

Rine RR, Ward J, Lindeblad S, Blaker K, Higbie-Smith

T, Verdin A, Gropper M. Comparison of the

effects of ankle-foot orthoses on gait and standing

posture in children with lower extremity spasticity.

In: Woollacott M, Horak F, eds. Posture and gait:

control mechanisms, 1992. Proceedings of the 11th

International Symposium of the Society for Postural

and Gait Research; 1992; Portland, OR. Vol. 2.

Portland (OR): University of Oregon; 1992. p.

415-8.

Ruder GK. CAD CAM trans-tibial temporary

prosthesis: analysis and comparison with an

established technique. Prosthet Orthot Int 1992

Dec;16(3):185-95.

Saadah ES. Swimming devices for below-knee

amputees. Prosthet Orthot Int 1992 Aug;16(2):

140-1.

Saadah ESM. Rehabilitation of a below-knee amputee

with a diving limb. Clin Rehabil 1989 Aug;3(3):

249-51.

Sanders JE. Ambulation with a prosthetic limb:

mechanical stresses in amputated limMB tissues

[dissertation]. Seattle (WA): University of

Washington; 1991. 358 p.

Sanders JE, Daly CH, Burgess EM. Interface shear

stresses during ambulation with a below-knee

prosthetic limb. J Rehabil Res Dev 1992 Fall;

29(4):1-8.

Silver-Thorn MB. Prediction and experimental

verification of residual limb/prosthetic socket

interface pressures for below-knee amputees

[dissertation]. Evanston (IL): Northwestern

University; 1991. 424 p.

Smith AW. A biomechanical analysis of amputee

athlete gait. Int J Sport Biomech 1990 Aug;6(3):

262-82.

Snyder AJ, Robbins JM. Lower extremity amputations:

basis and outcome, a review of the literature.

J Foot Ankle Surg 1993 Jan-Feb;32(1):60-8.

Swanson VM. Below-knee polyethylene semi-rigid

dressing. J Prosthet Orthot 1993 Jan;5(1):10-5.

Thurston AJ, Rastorfer J, Burian H, Beasley AW. The

Flek-shin: a composite material for use in flexible

shank below-knee prostheses. Prosthet Orthot Int

1989 Aug;13(2):97-9.

Topper AK, Fernie GR. An evaluation of computer

aided design of below-knee prosthetic sockets.

Prosthet Orthot Int 1990 Dec;14(3):136-42.

Trost FJ. Energy-storing feet. J Assoc Child Prosthet

Orthot Clin 1989 Winter;24(4):82-5.

van Jaarsveld HW, Grootenboer HJ, De Vries J.

Accelerations due to impact at heel strike using

below-knee prosthesis. Prosthet Orthot Int 1990

Aug;14(2):63-6.

van Jaarsveld HW, Grootenboer HJ, de Vries J,

Koopman HF. Stiffness and hysteresis properties

of some prosthetic feet. Prosthet Orthot Int 1990

Dec;14(3):117-24.

van Leeuwen JL, Speth LA, Daanen HA. Shock

absorption of below-knee prostheses: a comparison

between the SACH and the Multiflex foot.

J Biomech 1990;23(5):441-6.

Weber D. Use of the Hinged AFO for children with

spastic cerebral palsy and midfoot instability.

J Assoc Child Prosthet Orthot Clin 1991

Spring-1990 Winter;25(3-4):61-5.

Winarski DJ, Pearson JR. First-order model for the

analysis of stump stresses for below-knee amputees.

J Biomech Eng 1990 Nov;112(4):475-8.

Wing DC, Hittenberger DA. Energy-storing prosthetic

feet [see comments]. Arch Phys Med Rehabil 1989

Apr;70(4):330-5.

Wirta RW, Golbranson FL, Mason R, Calvo K.

Analysis of below-knee suspension systems: effect

on gait. J Rehabil Res Dev 1990 Fall;27(4):

385-96.

Wirta RW, Mason R, Calvo K, Golbranson FL. Effect

on gait using various prosthetic ankle-foot devices.

J Rehabil Res Dev 1991 Spring;28(2):13-24.

Wu UC, Press J. Prosthetics and rehabilitation in the

diabetic amputee. In: Sammarco GJ, ed. The foot in

diabetes. Malvern (PA): Lea & Febiger: 1991.

p. 194-206.

MYOELECTRIC DEVICES

Abul-Haj CJ, Hogan N. Functional assessment of

control systems for cybernetic elbow prostheses--

Part I: Description of the technique. IEEE Trans

Biomed Eng 1990 Nov;37(11):1025-36.

Abul-Haj CJ, Hogan N. Functional assessment of

control systems for cybernetic elbow prostheses--

Part II: Application of the technique. IEEE Trans

Biomed Eng 1990 Nov;37(11):1037-47.

Akazawa, K. Neuromuscular control system and

hardware models. Adv Robot 1991;5(1):75-85.

Akazawa K, Hayashi Y. [Estimation of neuromuscular

control system dynamics for development of

myoelectric hand prosthesis]. Trans Inst Electron

Inf Commun Eng D-II 1990 Feb;J73D-II(2):

257-65. (Jpn).

Atkins DJ, Meier RH, eds. Comprehensive management

of the upper-limb amputee. New York: Springer-

Verlag; 1989. 260 p.

Ballance R, Wilson BN, Harder JA. Factors affecting

myoelectric prosthetic use and wearing patterns in

the juvenile unilateral below elbow amputee. Can J

Occup Ther 1989 Jun;56(3):132-7.

Banziger E. Protective mittens for myoelectric hands.

J Assoc Child Prosthet Orthot Clin 1991

Spring-1990 Winter;25(3-4):71-2.

Bergman K, Ornholmer L, Zackrisson K, Thyberg M.

Functional benefit of an adaptive myoelectric

prosthetic hand compared to a conventional

myoelectric hand. Prosthet Orthot Int 1992 Apr;

16(1):32-7.

Berke GM, Nielsen CC. Establishing parameters

affecting the use of myoelectric prostheses in

children: a preliminary investigation. J Prosthet

Orthot 1991 Summer;3(4):162-7.

Brenner CD. Electronic limbs for infants and pre-

school children. J Prosthet Orthot 1992 Jul;4(4):

184-90.

Castiello U, Stehlmach GE. Generalized representation

of handwriting: evidence of effector independence.

Acta Psychol (Amst) 1993 Mar;82(1-3):53-68.

Chappell PH, Kyberd PJ. Prehensile control of a hand

prosthesis by a microcontroller. J Biomed Eng

1991 Sep;13(5):363-9.

Daley TL, Scott RN, Parker PA, Lovely DF. Operator

performance in myoelectric control of a

multifunction prosthesis stimulator. J Rehabil Res

Dev 1990 Winter;27(1):9-20.

Dalsey R, Gomez W, Seitz WH Jr, Dick HM, Hutnick

G, Akdeniz R. Myoelectric prosthetic replacement

in the upper-extremity amputee. Orthop Rev 1989

Jun;18(6):697-702.

Datta D, Brain ND. Clinical applications of

myoelectricall-controlled prostheses. Crit Rev Phys

Rehabil Med 1992;4(3-4):215-39.

Datta D, Kingston J, Ronald J. Myoelectric prostheses

for below-elbow amputees: the Trent experience.

Int Disabil Stud 1989 Oct-Dec;11(4):167-70.

Derhaag MMC, Schoorl PM, Derhaag PJF.

Personality development in one handed children

treated with a myoelectrically controlled prosthesis.

J Rehabil 1990 Jul-Sep;56(3):25-9.

Edelstein JE, Berger N. Performance comparison

among children fitted with myoelectric and body-

powered hands. Arch Phys Med Rehabil 1993 Apr;

74(4):376-80.

Gard SA, Childress DS, Heckathorne CW.

Micropower, strain-gauge sampling circuit for

prosthetic limb applications. Med Biol Eng

Comput 1992 Mar;30(2):243-7.

Hambrey RA, Withinshaw G. Electrically powered

upper limb prostheses: their development and

application. Br J Occup Ther 1990 Jan;53(1):7-11.

Hermansson LM. Structured training of children fitted

with myoelectric prostheses. Prosthet Orthot Int

1991 Aug;15(2):88-92.

Hubbard S. The Toronto experience with pediatric

myoelectric training. In: Meier RH 3d, Atkins DJ,

eds. Comprehensive management of the upper-limb

amputee. New York: Springer-Verlag; 1989.

p. 190-3.

Hubbard S, Bush G, Kurtz I, Naumann S. Myolectric

prostheses for the limb deficient child. Phys Med

Rehabil Clin North Am 1991 Nov;2(4):847-66.

Hudgins BS. A new approach to multifunctional

myoelectric control [dissertation]. Fredericton

(Canada): University of New Brunswick; 1991.

Ito K, Nagaoka H, Tsuji T, Kato A, Ito M. [An EMG

controlled prosthetic forearm with three degrees of

freedom using ultrasonic motors]. Trans Soc Instr

Control Eng 1991;27(11):1281-9 (Jpn).

Ito K, Tsuji T, Kato A, Ito M. Limb-function

discrimination using EMG signals by neural

network and application to prosthetic forearm

control. In: 1991 IEEE International Joint

Conference Neural Network; 1991 Nov 18-21;

Singapore. Vol. 2. New York: IEEE; 1991.

p. 1214-9.

Kelly MF, Parker PA, Scott RN. The application of

neural networks to myoelectric signal analysis: a

preliminary study. IEEE Trans Biomed Eng 1990

Mar;37(3):221-30.

Kermani MZ, Badie K, Kim Y, Spelman FA. An

intelligent strategy for motion interpretation in an

EMG-controlled prosthesis. In: Kim Y, Spelman

FA, eds. Images of the twenty-first century.

Proceedings of the 11th Annual International

Conference of the IEEE Engineering in Medicine

and Biology Society; 1989 Nov 9-12; Seattle, WA.

Vol. 5. Piscataway (NJ): IEEE; 1989. p. 1682-3.

Kim Y, Spelman FA, eds. Images of the twenty-first

century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Piscataway (NJ): IEEE; 1989. 6 vols.

2087 p.

Kishinchandani RS. Quantitative assessment of above-

elbow prosthetic control [masters thesis]. Boston:

Massachusetts General Hospital Institute of Health

Professions; 1991. 121 p.

Kitzenmaier P, Boenick U. [Possibilities of

myoelectric control of artificial limb prostheses].

Biomed Tech (Berlin) 1992 Jul-

Aug;37(7-8):170-80. (Ger).

Knox E. Slip detection and automatic grasping for and

externally powered prehensor [master’s thesis].

Chicago: Northwestern University; 1990.

Kruger LM, Fishman S. Myoelectric and body-

powered prostheses. J Pediatr Orthop 1993

Jan-Feb;13(1):68-75.

Kyberd PJ, Mustapha N, Carnegie F, Chappell PH. A

clinical experience with a hierarchally controlled

myoelectric hand prosthesis with vibro-tactile

feedback. Prosthet Orthot Int 1993 Apr;17(1):

56-64.

Leingang AF. Myoelectrics for infants: sine qua non?

J Prosthet Orthot 1992 Jul;4(4):181-3.

Lester EL. New developments in prosthetics for

children. Audio Dig Orthop [audiocassette] 1990

Nov;13(11):Sides A & B [presentation 3, 18 min.].

Accompanied by: 1 guide.

Louison K. Evaluation of the improved algorithm for

optimizing level coded myoelectric systems

[masters thesis]. Fredericton (Canada): University

of New Brunswick; 1990. 118 p.

Lovely DF, Stocke D, Scott RN. A computer-aided

myoelectric training system for young upper limb

amputees. J Microcomp Appl 1990 Jul;13(3):

245-59.

Luo YZ. Muscular exercises for myoelectric control

of artificial limbs. In: Kaneko M, ed. Fitness for

the aged, disabled, and industrial worker.

Champaign (IL): Human Kinetics Publishers; 1990.

p. 154-9.

Malezic M, Bogataj U, Gros N, Decman I, Vrtacnik P,

Kljajic M, Acimovic-Janezic R. Application of a

programmable dual-channel adaptive electrical

stimulation system for the control and analysis of

gait. J Rehabil Res Dev 1992 Fall;29(4):41-53.

Mandel AR, Nymark JR, Balmer SJ, Grinnell DM,

O’Riain MD. Electromyographic versus rhythmic

positional biofeedback in computerized gait

retraining with stroke patients. Arch Phys Med

Rehabil 1990 Aug;71(9):649-54.

Manneschi V, Palmerio B, Pauluzzi P, Patrone P.

Contact dermatitis from myoelectric prostheses.

Contact Dermatitis 1989 Aug;21(2):116-7.

Marquardt E. The Heidelberg experience. In: Meier RH

3d, Atkins DJ, eds. Comprehensive management of

the upper-limb amputee. New York: Springer-

Verlag; 1989. p. 240-52.

Martins FL, Martins LS, Davin P. [A myoelectric

prosthesis for the forearm amputee]. Acta Med

Port 1989 Nov-Dec;2(6):297-301. (Por).

Meek SG, Fetherston SJ. Comparison of signal-to-

noise ratio of myoelectric filters for prosthesis

control. J Rehabil Res Dev 1992 Fall;29(4):9-20.

Meek SG, Wood JE, Jacobsen SC. Model based,

multi muscle EMG control of upper extremity

prostheses. In: Winters JM, Woo SL, eds. Multiple

muscle systems: biomechanics and movement

organization. New York: Springer-Verlag; 1990. p.

360-76.

Meghdari A, Arefi M, Mahmoudian M, Hamza MH.

Biomechanical aspects of the Sharif artificial hand.

In: Hamza MH, ed. Computers and Advanced

Technology in Medicine, Healthcare and

Bioengineering: proceedings of the IASTED

International Symposium; 1990 Aug 15-17; Hawaii.

Anaheim (CA): ACTA Press; 1990. p. 32-6.

Merletti R, Knaflitz M, DeLuca CJ. Electrically

evoked myoelectric signals. Crit Rev Biomed Eng

1992;19(4):293-340.

Nader M. The artificial substitution of missing hands

with myoelectrical prostheses. Clin Orthop 1990

Sep;(258):9-17.

NERAC, Inc. (Tolland, CT). Multifunctional artificial

limbs. January 1976 - November 1985. A

bibliography from INSPEC: Information Services

for the Physics and Engineering Communities

Database. Springfield (VA): NTIS; 1990 May.

182 p. 229 citations. PB90868613XSP.

NERAC, Inc. (Tolland, CT). Multifunctional artificial

limbs (latest citations from the INSPEC:

Information Services for the Physics and

Engineering Communities Database. December

1985 - April 1992) [bibliography]. Springfield

(VA): NTIS; 1992 Jun. 188 citations.

PB92855428XSP.

NERAC, Inc. (Tolland, CT). Myoelectric prostheses:

function, control, and electronic training aids (latest

citations from the INSPEC: Information Services

for the Physics and Engineering Communities

Database) [bibliography]. Springfield (VA): NTIS;

1992 Nov. 60 citations minimum. PB93854602XSP.

(Supercedes PB89859367XSP).

Nishikawa K, Kuribayashi K. Neural network

application to a discrimination system for EMG-

controlled prostheses. In: Intelligence for

Mechanical Systems: proceedings IROS ’91:

International Workshop on Intelligent Robots and

Systems ’91. Intelligence for Mechanical Systems;

1991 Nov 3-5; Osaka, Japan. Vol. 1. New York:

IEEE; 1991. p. 231-6.

Patterson D, et al. Acceptance rate of myoelectric

prosthesis. J Assoc Child Prosthet Orthot Clin

1991 Spring-1990 Winter;25(3-4):73-5.

Patterson PE, Katz JA. Design and evaluation of a

sensory feedback system that provides grasping

pressure in a myoelectric hand. J Rehabil Res Dev

1992 Winter;29(1):1-8.

Patton JG. Upper-limb prosthetic components for

children and teenagers. In: Meier RH 3d, Atkins

DJ, eds. Comprehensive management of the upper-

limb amputee. New York: Springer-Verlag; 1989. p.

99-120.

Phillippe-Auguste JS, Gibbons DT. Simulation and

modelling of a microcomputer controlled above-

elbow prosthesis. Automedica 1989;11(1-3):

99-109.

Plettenburg DH. Electric versus pneumatic power in

hand prostheses for children. J Med Eng Technol

1989 Jan-Apr;13(1-2):124-8.

Popovic DJ, ed. Advances in external control of human

extremities. Belgrade: Nauka; 1990. 616 p.

Prout W. The New York electric elbow. The New York

prehension actuator, and the NU-VA synergetic

prehensor. In: Meier RH 3d, Atkins DJ, eds.

Comprehensive management of the upper-limb

amputee. New York: Springer-Verlag; 1989.

p. 221-6.

Putzi R. Myoelectric partial-hand prosthesis.

J Prosthet Orthot 1992 Winter;4(2):103-8.

Repperger DE, Frazier JW, Goodyear C. Control

strategies with application to limb prostheses.

Automedica 1989;11:123-43.

Rydell N. [The myoelectric hand]. Lakartidningen

1980 Feb 27;77(9):758. (Swe).

Sauter WF. The use of electric elbows in the

rehabilitation of children with upper limb

deficiencies. Prosthet Orthot Int 1991 Aug;

15(2):93-5.

Sauter WF, Bush G, Sommerville J. A single case

study: myoelectrically controlled exoskeletal

mobilizer for amyotrophic lateral sclerosis (ALS)

patients. Prosthet Orthot Int 1989 Dec;13(3):145-8.

Scott RN. Biomedical engineering in upper-limb

prosthetics. In: Meier RH 3d, Atkins DJ, eds.

Comprehensive management of the upper-limb

amputee. New York: Springer-Verlag; 1989.

p. 173-89.

Scott RN. Feedback in myoelectric prostheses. Clin

Orthop 1990 Jul;(256):58-63.

Scott RN. Myoelectric control systems research at the

Bio-Engineering Institute, University of New

Brunswick. Med Prog Technol 1990 May;16(1-2):

5-10.

Scott RN, Parker PA, O’Neill PA, Morin EL. Criteria

for setting switching levels in myoelectric

prostheses. J Assoc Child Prosthet Orthot Clin

1990 Spring;25(1):11-4.

Sears HH. Approaches to prescription of body

powered and myoelectric prostheses. Phys Med

Rehabil Clin North Am 1991 May;2(2):361-71.

Sears HH, Andrew JT, Jacobsen SC. Experience with

the Utah arm, hand and terminal device. In: Meier

RH 3d, Atkins DJ, eds. Comprehensive

management of the upper-limb amputee. New York:

Springer-Verlag; 1989. p. 194-210.

Sears HH, Shaperman J. Proportional myoelectric

hand control: an evaluation. Am J Phys Med

Rehabil 1991 Feb;70(1):20-8.

Slack M, Berbrayer D. A myoelectrically controlled

wrist-hand orthosis for brachia plexus injury: a case

study. J Prosthet Orthot 1992 Apr;4(3):171-4.

Spiegel SR. Adult myoelectric upper-limb prosthetic

training. In: Meier RH 3d, Atkins DJ, eds.

Comprehensive management of the upper-limb

amputee. New York: Springer-Verlag; 1989.

p. 60-71.

Stein RB, Capaday C. [Improvement of prostheses

and orthotic aids for the handicapped using electric

stimulation and the registration of bioelectric

signals]. Union Med Can 1990 May-Jun;119(3):

102-8. (Fre).

Triolo RJ, Moskowitz GD. The experimental

demonstration of a multichannel time-series

myoprocessor: system testing and evaluation. IEEE

Trans Biomed Eng 1989 Oct;36(10):1018-27.

Triolo RJ, Moskowitz GD. The theoretical

development of a multichannel time-series

myoprocessor for simultaneous limb function

detection and muscle force estimation. IEEE Trans

Biomed Eng 1989 Oct;36(10):1004-17.

Trost FJ, Rowe D. Upper-limb deficiencies: externally

powered prosthese. In: Bowker JH, Michael JW,

eds. Atlas of limb prosthetics: surgical, prosthetic,

and rehabilitation principles. St. Louis: Mosby Year

Book; 1992. p. 767-78.

Williams TW 3d. One-muscle infant’s myoelectric

control. J Assoc Child Prosthet Orthot Clin 1989

Summer-Autumn;24(2-3):53-5.

Williams TW 3d. Use of the Boston elbow for high-

level amputees. In: Meier RH 3d, Atkins DJ, eds.

Comprehensive management of the upper-limb

amputee. New York: Springer-Verlag; 1989.

p. 211-20.

Zardoshti KM, Badie K, Gardin F, Mauri G, Filippini

M. An intelligent strategy for motion interpretation

in an EMG-controlled prosthesis: an application of

AI to biomedical engineering. In: Computational

Intelligence ’89. Proceedings of the 2nd

International Symposium; 1989 Sep 25-27; Milan,

Italy. Amsterdam: North Holland; 1990.

p. 197-203.

Zarii KM, Motamedy A, Hashemi RM, Zajc B, Solina

F. An approach to redundancy cancelling in order

to use a single chip processor for IAV evaluation

in cybernetic arm. In: 6th Mediterranean

Electrotechnical Conference Proceedings; 1991 May

22-24; Ljublijana, Slovenia. Vol. 1. New York:

IEEE; 1991. p. 744-7.

Zhang YT. Anaylsis of the myoelectric

communication channel [dissertation]. Fredericton

(NB): University of New Brunswick; 1990.

Zhang YT, Parker PA, Scott RN. Control performance

characteristics of myoelectric signal with additive

interference. Med Biol Eng Comput 1991

Jan;29(1):84-8.

Zhang YT, Parker PA, Scott RN. Study of the effects

of motor unit recruitment and firing statistics on

the signal-to-noise ratio of a myoelectric control

channel. Med Biol Eng Comput 1990 May;28(3):

225-31.

NEUROPROSTHETIC DEVICES

Agnew WF, McCreery DB, eds. Neural prostheses:

fundamental studies. Englewood Cliffs (NJ):

Prentice Hall; 1990. 322 p.

Baskin LS, Schmidt RA. Bladder rehabilitation with

dorsal rhizotomy and ventral neuroprosthesis.

Paraplegia 1992 Nov;30(11):783-7.

Chaffey NJ, Donaldson PEK. Controlling radio

frequency interference from neurological prostheses.

J Med Eng Technol 1991;15(2):78-83.

Chizeck HJ, Lan N, Palmieri LS, Crago PE. Feedback

control of electrically stimulated muscle using

simultaneous pulse width and stimulus period

modulation. IEEE Trans Biomed Eng 1991 Dec;

38(12):1224-34.

Crago PE, Lemay M, Kim Y, Spelman FA. Active

regulation of grasp stiffness in neuroprosthesis for

restoration of hand function in quadriplegics. In:

Kim Y, Spelman FA, eds. Images of the twenty-

first century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Vol. 3. Piscataway (NJ): IEEE; 1989.

p. 902-3.

Donaldson PE. Aspects of silicone rubber as an

encapsulant for neurological prostheses. Part 1.

Osmosis. Med Biol Eng Comput 1991 Jan;29(1):

34-9.

Elsley RK. Adaptive control of prosthetic limbs using

neural networks. In: Caudill M, ed. IJCNN

International Joint Conference on Neural Networks;

1990 Jan 15-19; Washington, DC. Vol. 2. Hillsdale

(NJ): Lawrence Erlbaum Associates; 1990.

p. 771-6.

Gruner JA, Mason CP. Nonlinear muscle recruitment

during intramuscular and nerve stimulation.

J Rehabil Res Dev 1989 Spring;26(2):1-16.

Hambrecht FT. Functional electrical stimulation: an

overview. PACE Pacing Clin Electrophysiol 1989

May;12(5):840-3.

Handa Y, Ohkubo K, Hoshimiya N. A portable multi-

channel FES system for restoration of motor

function of the paralyzed extremities. Automedica

1989;11:221-31.

Hatwell MS, Oderkerk BJ, Sacher CA, Inbar GF. The

development of a model reference adaptive

controller to control the knee joint of paraplegics.

Ieee Trans Automat Control.1991 Jun;36(6):683-91

Hines AE, Crago PE, Kim Y, Spelman FA.

Assessment of neuroprosthetic hand grasp by

combined force and position tracking. In: Kim Y,

Spelman FA, eds. Images of the twenty-first

century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Vol. 5. Piscataway (NJ): IEEE; 1989.

p. 1481-2.

Hines AE, Owens NE, Crago PE. Assessment of

input-output properties and control of

neuroprosthetic hand grasp. IEEE Trans Biomed

Eng 1992 Jun;39(6):61-23.

Hiraiwa A, Shimohara K, Tokunaga Y. EMG pattern

analysis and classification by neural network. In:

1989 IEEE International Conference on Systems,

Man and Cybernetics. Conference Proceedings;

1989 Nov 14-17; Cambridge, MA. Vol. 3. New

York: IEEE; 1989. p. 1113-5.

Hoshimiya N, Handa Y. A master-slave type multi-

channel functional electrical stimulation (FES)

system for the control of the parlyzed extremities.

Automedica 1989;11:209-20.

Ito K, Tsuji T, Kato A, Ito M. Limb-function

discrimination using EMG signals by neural

network and application to prosthetic forearm

control. In: 1991 IEEE International Joint

Conference Neural Network; 1991 Nov 18-21;

Singapore. Vol. 2. New York: IEEE; 1991.

p. 1214-9.

Keith MW, Peckham PH, Thrope GB, Buckett JR,

Stroh KC, Menger V. Functional neuromuscular

stimulation neuroprostheses for the tetraplegic hand.

Clin Orthop 1988 Aug;(233):25-33.

Keith MW, Peckham PH, Thrope GB, Stroh KC, Smith

B, Buckett JR, Kilgore KL, Jatich JW.

Implantable functional neuromuscular stimulation in

the tetraplegic hand. J Hand Surg [Am] 1989 May;

14(3):524-30.

Kelly MF, Parker PA, Scott RN. The application of

neural networks to myoelectric signal analysis: a

preliminary study. IEEE Trans Biomed Eng 1990

Mar;37(3):221-30.

Kilgore KL. Optimization and automation of stimulus

mpa synthesis for upper extremity fns [dissertation].

Cleveland: Case Western Reserve University; 1991.

198 p.

Letechipia JE, Peckham PH, Gazdik M, Smith B. In-

line lead connector for use with implanted

neuroprosthesis. IEEE Trans Biomed Eng 1991

Jul;38(7):707-9.

Nishikawa K, Kuribayashi K. Neural network

application to a discrimination system for EMG-

controlled prostheses. In: Intelligence for

Mechanical Systems. Proceedings IROS ’91:

IEEE/RSJ International Workshop on Intelligent

Robots and Systems ’91; 1991 Nov 3-5; Osaka,

Japan. Vol. 1. New York: IEEE; 1991. p. 231-6.

Nose Y. Neuroprostheses, lessons to be learned

[editorial]. Artif Organs 1989 Jun;13(3):181-2.

Paul JP, Barbenel JC, Courtney JM, Kenedi RM, eds.

Progress in Bioengineering: Strathclyde

bioengineering seminars: proceedings of an

International Seminar held on the Occasion of the

25th Anniversary of the Strathclyde Bioengineering

Unit; 1988 Sep; Glasgow, Scotland. Bristol (UK):

A. Hilger; 1989. 299 p.

Peckham PH, Creasey GH. Neural prostheses: clinical

applications of functional electrical stimulation in

spinal cord injury. Paraplegia 1992 Feb;30(2):

96-101.

Phillips CA. An interactive system of electronic

stimulators and gait orthosis for walking in the

spinal cord injured. Automedica 1989;11:247-61.

Popovic D, Tomovic R, Schwirtlich L. Hybrid

assistive system--the motor neuroprosthesis. IEEE

Trans Biomed Eng 1989 Jul;36(7):729-37.

Riso RR, Ignagni AR, Keith MW. Cognitive feedback

for use with FES upper extremity neuroprostheses.

IEEE Trans Biomed Eng 1991 Jan;38(1):29-38.

Schmidt RA, Kogan BA, Tanagho EA.

Neuroprostheses in the management of incontinence

in myelomeningocele patients. J Urol 1990 Apr;

143(4):779-82.

Siegel SW. Management of voiding dysfunction with

an implantable neuroprosthesis. Urol Clin North

Am 1992 Feb;19(1):163-70.

Simpson PK. Artificial neural systems: foundations,

paradigms, applications, and implementations. New

York: Pergamon Press; 1990. 209 p.

Smith BT, Mulcahey MJ, Triolo RJ, Betz RR. The

application of a modified neuroprosthetic hand

system in a child with a C7 spinal cord injury. Case

report. Paraplegia 1992 Aug;30(8):598-606.

Stansfield SA (Sandia National Labs., Albuquerque,

NM). Connectionist and neural net

implementations of a robotic grasp generator.

Washington (DC): U.S. Department of Energy;

1992 Jan 6. Report No.: SAND911746C,

CONF9204711. Contract No.: AC0476DP00789. 15

p. Available from: NTIS, Springfield, VA.;

DE92006832XSP. Paper presented at: International

Society for Optical Engineering (SPIE) conference;

1992 Apr 20; Orlando, FL.

Stein RB, Peckham PH, Popovic DB, eds. Neural

prostheses: replacing motor function after disease or

disability. New York: Oxford University Press;

1992. 345 p.

Terry R, Tarver WB, Zabara J. An implantable

neurocybernetic prosthesis system. Epilepsia 1990;

31 Suppl 2:S33-7.

Thrope G, Stroh K, Baco A (Case Western Reserve

University, Veterans Administration Medical

Center). Standardized object test for quantitative

assessment of hand grasp function using the

C.W.R.U. upper extremity neuroprosthesis. In:

Technology for the next decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 181-2.

Troyk PR, Schwan MA. Class E driver for

transcutaneous power and data link for implanted

electronic devices. Med Biol Eng Comput 1992

Jan;30(1):69-75.

Tupper CN, Gerhard GC, Buus S. Improved

prosthesis control via high resolution electro-tactile

feedback. In: Proceedings of the 15th Annual

Northeast Bioengineering Conference; 1989 Mar

27-29; Boston, MA. New York: IEEE; 1989.

p. 39-40;

Tupper CN, Gerhard GC, Kim Y, Spelman FA.

Dynamic tracking delays using high resolution

electro-tactile feedback. In: Kim Y, Spelman FA,

eds. Images of the twenty-first century. Proceedings

of the 11th Annual International Conference of the

IEEE Engineering in Medicine and Biology

Society; 1989 Nov 9-12; Seattle, WA. Vol. 5.

Piscataway (NJ): IEEE; 1989. p. 1514-5.

Veltink PH, Rijkhoff NJM, Rutten WLC, Kaynak O.

Neural networks for reconstructing muscle

activation from external sensor signals during

human walking. In: Intelligent motion control.

Proceedings of the IEEE International Workshop;

1990; Twente University, Enschede, Netherlands.

Vol. 2. New York: IEEE; 1990. p. 469-73.

Wijman CA, Stroh KC, Van Doren CL, Thrope GB,

Peckham PH, Keith MW. Functional evaluation of

quadriplegic patients using a hand neuroprosthesis.

Arch Phys Med Rehabil 1990 Dec;71(13):1053-7.

Zahradnik J. Shoulder movement as a command control

source for upper limb neural prostheses [master’s

thesis]. Cambridge (MA): Massachusetts Institute of

Technology; 1989.

ROBOTIC DEVICES

Advances in rehabilitation technology. NSC-88. North

Sea Conference on Biomedical Engineering.

Maastricht, The Netherlands; Apr 13-15, 1988.

Proceedings. J Med Eng Technol 1989 Jan-Apr;

13(1-2):1-157.

Aeyels B, Peeraer L, Vander Sloten J, Van der Perre

G. Development of an above-knee prosthesis

equipped with a microcomputer-controlled knee

joint: first test results. J Biomed Eng 1992 May;

14(3):199-202.

Akazawa, K. Neuromuscular control system and

hardware models. Adv Robot 1991;5(1):75-85.

Alexander MA, Demasco PW, Gilbert M, Miller LJ,

Nelson MR, Shah A. Rehabilitation technology

for disabled children. Phys Med Rehabil 1991 Jun;

5(2):365-87;

Asghar MA, Fallah A, Mikaili R. Control of the

electric motor in a cybernetic arm. Cybernet Syst

1991 Jan-Feb;22(1):119-34.

Bach JR, Zeelenberg AP, Winter C. Wheelchair-

mounted robot manipulators. Long term use by

patients with Duchenne muscular dystrophy. Am J

Phys Med Rehabil 1990 Apr;69(2):55-9.

Bresler MI. The tamara system: integrated control of

mobility, communication, and environment. In:

Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 300-1.

Cook AM, Liu KM, Hoseit P. Robotic arm use by

very young motorically disabled children. Assist

Technol 1990;2(2):51-7.

Dijkers MP, deBear PC, Erlandson RF, Kristy K, Geer

DM, Nichols A. Patient and staff acceptance of

robotic technology in occupational therapy: a pilot

study. J Rehabil Res Dev 1991 Spring;28(2):33-44.

Espinosa C, Perkowski MA. Hierarchical Hough

transform for the vision system of the PSUBOT.

In: Northcon Conference Record; 1991 Oct 1-3;

Portland, OR. Los Angeles: Electronic Conventions

Management; 1991. p. 291-6.

Finlay PA. Medical robotics-why, what and when.

Industr Robot 1989 Mar;16(1):37-9.

Goodfellow J. Orthopaedic robotics. Third Annual

International Symposium on Custom-made

Prostheses. October 1990--Nice, France. J Bone

Joint Surg [Br] 1991 Mar;73(2):351.

Gosine RG, Harwin WS, Furby LJ, Jackson RD. An

intelligent end-effector for a rehabilitation robot.

J Med Eng Technol 1989 Jan-Apr;13(1-2):37-43.

Hammel J, Hall K, Lees D, Leifer L, Van der Loos M,

Perkash I, Crigler R. Clinical evaluation of a

desktop robotic assistant. J Rehabil Res Dev 1989

Summer;26(3):1-16.

Hammel JM, Van der Loos HF, Perkash I. Evaluation

of a vocational robot with a quadriplegic employee.

Arch Phys Med Rehabil 1992 Jul;73(7):683-93.

Hammell KRW. Occupational therapy in the

management of high level quadriplegia. Br J

Occup Ther 1991 Sep;54(9):333-40.

Hausdorff JM, Horowitz DM, Carroll SS. Sensory

feedback and automated grasping for a vocational

robotic work station. In: Technology for the future

decade. RESNA ’89: proceedings of the 12th

annual conference; 1989 Jun 25-30; New Orleans,

LA. Washington (DC): RESNA Press; 1989. p.

183-4.

Heckathorne CW. Manipulation in unstructured

environments: extended physiological

proprioception, position control, and arm

prostheses. Paper presented at: the International

Conference on Rehabilitation Robotics; 1990.

[15 p.].

Hillman M. Rehabilitation robotics. Crit Rev Phys

Rehabil Med 1992;4(1-2):79-103.

Hillman M, Jepson J. Evaluation of a robotic

workstation for the disabled. J Biomed Eng 1992

May;14(3):187-92.

Hillman MR, Pullin GM, Gammie AR, Stammers CW,

Orpwood RD. Clinical experience in rehabilitation

robotics. J Biomed Eng 1991 May;13(3):239-43.

Hillman MR, Pullin GM, Gammie AR, Stammers CW,

Orpwood RD. Development of a robot arm and

workstation for the disabled. J Biomed Eng 1990

May;12(3):199-204.

Howell R, et al (Ohio State University, Columbus). A

prototype robotic arm for use by severely

orthopedically handicapped students. Final report.

Washington (DC): Office of Special Education and

Rehabilitative Services; 1989 Dec. 102 p.

Available from: ERIC, Arlington, VA; ED346 664,

EC301 276.

Huang CC. Biped robot with a vestibular system

[dissertation]. Blacksburg (VA): Virginia

Polytechnic Institute and State University; 1991.

150 p.

Iberall T, Torras C, MacKenzie C, Kohonen T,

Fogelman-Soulie F. Parameterizing prehension: a

mathematical model of opposition space. In:

Kohonen T, Fogelman-Soulie F, eds. Cognitiva 90.

At the crossroads of artificial intelligence, cognitive

science and neuroscience. Proceedings of the 3rd

Cognitiva Symposium; 1990 Nov 20-23, Madrid,

Spain. Amsterdam; New York: North-Holland;

Elsevier Science Publ.; 1991. p. 635-42.

Kato A, Ito K, Ito M. [Compliant motion of ultrasonic

motor by phase difference control]. Trans Soc Instr

Control Eng 1991;27(11):1290-5. (Jpn).

Kazerooni H, Kim Y, Spelman FA. Human/robot

interaction via the transfer of power and

information signals. In: Kim Y, Spelman FA, eds.

Images of the twenty-first century. Proceedings of

the 11th Annual International Conference of the

IEEE Engineering in Medicine and Biology

Society; 1989 Nov 9-12; Seattle, WA. Vol. 3.

Piscataway (NJ): IEEE; 1989. p. 908-9.

Kim Y, Spelman FA, eds. Images of the twenty-first

century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Piscataway (NJ): IEEE; 1989. 6 vols.

2087 p.

Kinoshita T, Tamesada T. [The fundamental face

direction control system for shape memory alloy

robot (shoulder disarticulation prosthesis, Zizai 2)].

Robot 1992 Mar;85:70-6. (Jpn).

Kybard P. Prosthetics lead the way. Electron Wirel

World 1989 Feb;95(1636):176-7.

Kyberd PJ. Algorithmic control of a multifunction

hand prosthesis [dissertation]. Highfield (UK):

University of Southampton; 1990.

Kyberd PJ, Chappell PH. Characterization of an

optical and acoustic touch and slip sensor for

autonomous manipulation. Measur Sci Technol

1992 Oct;3(10):969-75.

Kyberd PJ, Chappell PH. Object-slip detection during

manipulation using a derived force vector.

Mechatron 1992 Feb;2(1):1-13.

Lee S, Agah A, Bekey G. IROS: an intelligent

rehabilitative orthotic system for cerebrovascular

accident. In: 1990 IEEE International Conference

on Systems, Man and Cybernetics Conference

Proceedings; 1990 Nov 4-7; Los Angeles, CA. New

York: IEEE; 1990. p. 815-9.

Leung P. Robotics in rehabilitation. J Rehabil 1988

Oct-Dec;54(4):6-7.

Mayi D. An intelligent database for the PSUBOT: an

autonomous wheelchair robot. In: Northcon

Conference Record; 1991 Oct 1-3; Portland, OR.

Los Angeles: Electronic Conventions Management;

1991. p. 297-302.

Megahed SM. Automatic algebraic computation of

basic kinematic equations of tree structure robot

arms: application to human arms. J Eng Med 1991;

205(H3):135-43.

Mehdan M. Tactile sensing for automata and

prosthesis [dissertation]. London: Council for

National Academic Awards; 1989. 290 p.

NERAC, Inc. (Tolland, CT). Multifunctional artificial

limbs. January 1976 - November 1985. A

bibliography from INSPEC: Information Services

for the Physics and Engineering Communities

Database. Springfield (VA): NTIS; 1990 May.

182 p. 229 citations. PB90868613XSP.

NERAC, Inc. (Tolland, CT). Multifunctional artificial

limbs (latest citations from the INSPEC:

Information Services for the Physics and

Engineering Communities Database. December

1985 - April 1992) [bibliography]. Springfield

(VA): NTIS; 1992 Jun. 188 citations.

PB92855428XSP.

Ojala J, Inoue K, Sasaki K, Takamo M. Development

of an intelligent wheelchair using computer

graphics animation and simulation. Comput Graph

Forum 1991 Dec;10(4):285-95.

Orpwood RD. Design methodology for aids for the

disabled. J Med Eng Technol 1990 Jan-Feb;14(1):

2-10.

Perkowski MA, Sarabi A, Schafer I. Application of

orthogonal transforms in image processing. In:

Northcon Conference Record; 1991 Oct 1-3;

Portland, OR. Los Angeles: Electronic Conventions

Management; 1991. p. 303-9.

Pho RW, Lim SY, Pereira BP. Computer applications

in orthopaedics. Ann Acad Med Singapore 1990

Sep;19(5):691-8.

Popovic DB. Dynamics of the self-fitting modular

orthosis. IEEE Trans Robot Autom 1990 Apr;6(2):

200-7.

Prior SD. An electric wheelchair mounted robotic

arm--a survey of potential users. J Med Eng

Technol 1990 Jul-Aug;14(4):143-54.

Prior SD, Crochetiere WJ, Mahoney RM, Masanic C,

Milner M, Goldenberg AA, Apkarian J. Special

session 13: robotics invited papers. In: Capitalizing

on Technology: proceedings of the RESNA 13th

annual conference; 1990 Jun 15-20; Washington,

DC. Washington (DC): RESNA Press; 1990.

p. 297-302.

Pullin G, Gammie A. Current capabilities of

rehabilitation robots. J Biomed Eng 1991 May;

13(3):215-6.

Racz J, Wolczowski A. [Graphical simulation of

movement control of automatic wheel chair].

Pr Nauk Inst Cybernetyki Tech Politech Wroclawsk

1990;37:189-95. (Pol).

Regalbuto MA, Krouskop TA, Cheatham JB. Toward

a practical mobile robotic aid system for people with severe physical disabilities. J Rehabil Res

Dev 1992 Winter;29(1):19-26.

Rehabilitation R & D progress reports 1988. J Rehabil

Res Dev 1989 Feb;25 Suppl:1-419.

Rehabilitation R&D progress reports 1989. J Rehabil

Res Dev 1990 Feb;26 Suppl:1-509.

Rehabilitation R&D progress reports 1990. J Rehabil

Res Dev 1991 Winter;28(1):1-535.

Reinkensmeyer DJ, Lum PS, Lehman SL. Human

control of a simple two-hand grasp. Biol Cybern

1992;67(6):553-64.

Roth N. Bioengineering: science of the cyborg. Med

Instrum 1978 Sep-Oct;12(5):303.

Rovetta A. A new technology with an old face and a

proud heritage. Mechatron 1991;1(2):117-26.

Rovetta A, Xia W. Biorobotics in a new artificial leg.

In: Proceedings of IROS ’90: IEEE International

Workshop on Intelligent Robots and Systems ’90:

towards a new frontier of applications; 1990 Jul

3-6; Ibaraki, Japan. Vol. 2. New York: IEEE; 1990.

p. 971-6.

Rovetta A, Xia W, Cosmi F. Realization of a

prosthesis of the lower limb: development of

kinematics. Robot Comput Integr Manuf 1991;

8(3):137-42;

Russell DL. An analysis of constrained motions in

manipulation [dissertation]. Cambridge (MA):

Massachusetts Institute of Technology; 1990.

Scharer C. A learning man-machine interface for an

artificial arm. In: Intelligence for Mechanical

Systems. Proceedings IROS ’91: IEEE/RSJ

International Workshop on Intelligent Robots and

Systems ’91; 1991 Nov 3-5; Osaka, Japan. Vol. 1.

New York: IEEE; 1991. p. 227-30.

Smith D, Stanton K, Perkowski M. A distributed

processor ensemble methodology for the PSUBOT.

In: Northcon Conference Record; 1991 Oct 1-3;

Portland, OR. Los Angeles: Electronic Conventions

Management; 1991. p. 310-5.

Stansfield SA (Sandia National Labs., Albuquerque,

NM). Connectionist and neural net

implementations of a robotic grasp generator.

Washington (DC): U.S. Department of Energy;

1992 Jan 6. Report No.: SAND911746C,

CONF9204711. Contract No.: AC0476DP00789. 15

p. Available from: NTIS, Springfield, VA.;

DE92006832XSP. Paper presented at: International

Society for Optical Engineering (SPIE) conference;

1992 Apr 20; Orlando, FL.

Stansfield SA (Sandia National Labs., Albuquerque,

NM). Experiments in robotic sensori-motor

control during grasp. Washington (DC): U.S.

Department of Energy; 1991 Sep 6. Report No.:

SAND911379. Contract No.: AC0476DP00789. 21

p. Available from: NTIS, Springfield, VA.;

DE92005384XSP.

Stansfield SA (Sandia National Labs., Albuquerque,

NM). Expert system for automated robotic

grasping. Washington (DC): U.S. Department of

Energy; 1990 May 10. Report

No.:SAND9012000CExtdAbst, CONF9011011.

Contract NO.: AC0476DO00789. 13 p. Available

from: NTIS, Springfield, VA.; DE90010820XSP.

Paper presented at: American Nuclear Society

winter meeting; 1990 Nov 11-15; Washington, DC.

Stansfield SA (Sandia National Labs., Albuquerque,

NM). Haptic system for a multifingered hand.

Washington (DC): U.S. Department of Energy;

1990. Report No.: SAND902001C, CONF9104511.

Contract No.: AC0476DP00789. 25p. Available

from: NTIS, Springfield, VA.; DE90017044XSP.

Paper presented at: IEEE robotics and automation

conference; 1991 Apr 7-12; Sacremento, CA.

Stanton KB. PSUBOT: system overview and path

planning. In: Northcon Conference Record; 1991

Oct 1-3; Portland, OR. Los Angeles: Electronic

Conventions Management; 1991. p. 285-90.

Stanton KB, Sherman PR, Rohwedder ML, Fleskes CP,

Gray DR, Minh DT, Espinoza C, Mayui D, Ishaque

M, Perkowski MA, et al. PSUBOT-a voice-

controlled wheelchair for the handicapped. In:

Johnson RH, et al., eds. Proceedings of the 33rd

Midwest Symposium on Circuits and Systems; 1990

Aug 12-14; Calgary, Alberta, Canada. Vol. 2. New

York: IEEE; 1991. p. 669-72.

Stelarc. Prosthetics, robotics and remote existence:

postevolutionary strategies. Leonardo 1991;24(5):

591-5.

Treherne IM. Autonomous mobile robots: an aid for

the handicapped. In: IEE Colloquium on High-

Tech Help for the Handicapped; 1990 Apr 2;

London (UK). London: IEE; 1990. p. 46.

van Vliet P, Wing AM. A new challenge--robotics in

the rehabilitation of the neurologically motor

impaired. Phys Ther 1991 Jan;71(1):39-47.

Wu CH, Young KY, Hwang KS, Lehman S.

Voluntary movements for robotic control. IEEE

Control Syst Mag 1992 Feb;12(1):8-14.

CLINICAL ASSESSMENT &

EFFECTIVENESS

Baumgartner R. [Congenital limb abnormalities:

amputate or not amputate?]. Rehabilitation (Stuttg)

1990 Feb;29(1):4-11. (Ger).

Baumgartner R. [Rehabilitation following amputation].

Ther Umsch 1989 Jul;46(7):441-8. (Ger).

Bergman K, Ornholmer L, Zackrisson K, Thyberg M.

Functional benefit of an adaptive myoelectric

prosthetic hand compared to a conventional

myoelectric hand. Prosthet Orthot Int 1992 Apr;

16(1):32-7.

Berke GM, Nielsen CC. Establishing parameters

affecting the use of myoelectric prostheses in

children: a preliminary investigation. J Prosthet

Orthot 1991 Summer;3(4):162-7.

Boldyrev AI, Mendelevich IA, Lepilova OI.

[Evaluation of residual function of the hand in its

defects]. Ortop Travmatol Protez 1989 Jul;(7):

34-6. (Rus).

Bowker JH. Critical choices: the art of prosthesis

prescription. In: Bowker JH, Michael JW, eds.

Atlas of limb prosthetics: surgical, prosthetic, and

rehabilitation principles. St. Louis: Mosby Year

Book; 1992. p. 717-20.

Bowker JH. Neurological aspects of prosthetic/orthotic

practice. J Prosthet Orthot 1993 Apr;5(2):55-8.

Brodzka WK, Thornhill HL, Zarapkar SE, Malloy JA,

Weiss L. Long-term function of persons with

atherosclerotic bilateral below-knee amputation

living in the inner city. Arch Phys Med Rehabil

1990 Oct;71(11):895-900.

Casillas JM, Aurelle B, Coget P, Becker F, Marcer I,

Didier JP. Transcutaneous oxygen tension. How to

choose prosthetics for below knee amputation. Ann

Readapt Med Phys 1990 Dec;33(6):553-61.

Chan KM, Tan ES. Use of lower limb prosthesis

among elderly amputees. Ann Acad Med

Singapore 1990 Nov;19(6):811-6.

Choi IH, Kumar SJ, Bowen JR. Amputation or limb-

lengthening for partial or total absence of the fibula

[see comments]. J Bone Joint Surg [Am] 1990

Oct;72(9):1391-9.

Datta D, Nair PN, Payne J. Outcome of prosthetic

management of bilateral lower-limb amputees.

Disabil Rehabil 1992 Apr-Jun;14(2):98-102.

De Luccia N, Pinto MA, Guedes JP, Albers MT.

Rehabilitation after amputation for vascular disease:

a follow-up study. Prosthet Orthot Int 1992 Aug;

16(2):124-8.

Debogorski J. Initial preprosthetic evaluation of the

elderly amputee. Top Geriatr Rehabil 1990 Dec;

6(2):65-8.

Dickstein R, Halevy E, Meir H, Bigon R. Use of the

early walking aid as a geriatric prosthesis in the

community. J Prosthet Orthot 1989 Jan;1(2):110-5.

Dowling R, Laine B. Improving mobility of a patient

with a left below elbow prosthesis and right

hemiparesis. Clin Kinesiol 1991 Spring;45(1):

19-21.

Durance JP, Warren WK, Kerbel DB, Stroud TW.

Rehabilitation of below-knee amputees: factors

influencing outcome and costs in three programmes.

Int Disabil Stud 1989 Jul-Sep;11(3):127-32.

Edelstein JE. Preprosthetic management of patients

with lower or upper limb amputation. Phys Med

Rehabil Clin North Am 1991 May;2(2):285-97.

Edelstein JE. Prosthetic assessment and management.

In: O’Sullivan SB, Schmitz TJ. Physical

rehabilitation: assessment and treatment. 2nd ed.

Philadelphia: F.A. Davis; 1988. p. 407-33.

Edelstein JE, Berger N. Performance comparison

among children fitted with myoelectric and body-

powered hands. Arch Phys Med Rehabil 1993 Apr;

74(4):376-80.

Edwards BG, Marsolais EB. Energy costs of

ambulation with reciprocal gait orthosis, electrical

stimulation, long leg braces and hybrids: A case

study. Clin Kinesiol 1990;44(2):43-7.

Epps CH Jr, Schneider PL. Treatment of hemimelias

of the lower extremity. Long-term results. J Bone

Joint Surg [Am] 1989 Feb;71(2):273-7.

Erhart C, Barnsteiner KH. [Possibilities with provision

of temporary prostheses]. Dtsch Krankenpflegez

1989 Mar;42(3):150-3. (Ger).

Flandry F, Beskin J, Chambers RB, Perry J, Waters RL,

Chavez R. The effect of the CAT-CAM above-

knee prosthesis on functional rehabilitation [see

comments]. Clin Orthop 1989 Feb;(239):249-62.

Folsom D, King T, Rubin JR. Lower-extremity

amputation with immediate postoperative prosthetic

placement. Am J Surg 1992 Oct;164(4):320-2.

Fyfe NC. An audit of amputation levels in patients

referred for prosthetic rehabilitation. Prosthet

Orthot Int 1990 Aug;14(2):67-70.

Gottschalk F. CAT-CAM above-knee prostheses and

the effect on functional rehabilitation [letter]. Clin

Orthop 1990 Jun;(255):310-2.

Hagberg E, Berlin K, Renstrom P. Function after

through-knee as compared to above-knee and below-knee amputation. Prosthet Orthot Int 1992

Dec;16(3):168-73.

Houghton A, Allen A, Luff R, McColl I.

Rehabilitation after lower limb amputation: a

comparative study of above-knee, through-knee and

Gritti-Stokes amputations. Br J Surg 1989 Jun;

76(6):622-4.

Jain AS, Stewart CP. Tumour related lower limb

amputation: a 23 year experience. Prosthet Orthot

Int 1989 Aug;13(2):82-5.

Kald A, Carlsson R, Nilsson E. Major amputation in a

defined population: incidence, mortality and results

of treatment. Br J Surg 1989 Mar;76(3):308-10.

Kirby RL, Chari VR. Prostheses and the forward

reach of sitting lower-limb amputees. Arch Phys

Med Rehabil 1990 Feb;71(2):125-7.

Lacroix R, Melzack R, Smith D, Mitchell N. Multiple

phantom limbs in a child. Cortex 1992 Sep;28(3):

503-7.

LeBlanc M, Setoguchi Y, Shaperman J, Carlson L.

Mechanical work efficiencies of body powered

prehensors for young children. J Assoc Child

Prosthet Orthot Clin 1992 Winter;27(3):70-5.

Lilja M, Johansson T. Adherent cicatrix after below-

knee amputation. J Prosthet Orthot 1993 Apr;5(2):

65-6.

Moore TJ, Barron J, Hutchinson F 3rd, Golden C, Ellis

C, Humphries D. Prosthetic usage following major

lower extremity amputation. Clin Orthop 1989

Jan;(238):219-24.

Patton JG. Developmental approach to pediatric

prosthetic evaluation and training. In: Meier RH 3d,

Atkins DJ, eds. Comprehensive management of the

upper-limb amputee. New York: Springer-Verlag;

1989. p. 137-49.

Pinzur MS, Littooy F, Daniels J, Arney C, Reddy NK,

Graham G, Osterman H. Multidisciplinary

preoperative assessment and late function in

dysvascular amputees. Clin Orthop 1992 Aug;

(281):239-43.

Pohjolainen T. A clinical evaluation of stumps in

lower limb amputees. Prosthet Orthot Int 1991

Dec;15(3):178-84.

Pohjolainen T, Alaranta H, Karkkainen M. Prosthetic

use and functional and social outcome following

major lower limb amputation. Prosthet Orthot Int

1990 Aug;14(2):75-9.

Pohjolainen T, Alaranta H, Wikstrom J. Primary

survival and prosthetic fitting of lower limb

amputees. Prosthet Orthot Int 1989 Aug;13(2):

63-9.

Proctor S, LeBlanc M. Clinical evaluation of a new

design prosthetic prehensor. J Prosthet Orthot 1991

Winter;3(2):79-83.

Purry NA, Hannon MA. How successful is below-

knee amputation for injury? Injury 1989 Jan;20(1):

32-6.

Quesada P, Skinner HB. Analysis of a below-knee

patellar tendon-bearing prosthesis: a finite element

study. J Rehabil Res Dev 1991 Summer;28(3):

1-12.

Sears HH. Approaches to prescription of body

powered and myoelectric prostheses. Phys Med

Rehabil Clin North Am 1991 May;2(2):361-71.

Sears HH, Shaperman J. Proportional myoelectric

hand control: an evaluation. Am J Phys Med

Rehabil 1991 Feb;70(1):20-8.

Setoguchi Y. Evaluation of the pediatric amputee. In:

Meier RH 3d, Atkins DJ, eds. Comprehensive

management of the upper-limb amputee. New York:

Springer-Verlag; 1989. p. 92-8.

Staros A, Rubin G. Prescription considerations in

modern above knee prosthetics. Phys Med Rehabil

Clin North Am 1991 May;2(2):311-24.

Stewart CP, Jain AS. Cause of death of lower limb

amputees. Prosthet Orthot Int 1992 Aug;16(2):

129-32.

Stewart CP, Jain AS, Ogston SA. Lower limb

amputee survival. Prosthet Orthot Int 1992 Apr;

16(1):11-8.

Stone LR, Keenan MA, Shin DY. Acquired limb loss

in patients with traumatic brain injury. Am J Phys

Med Rehabil 1990 Jun;69(3):135-9.

van Leeuwen JL, Speth LA, Daanen HA. Shock

absorption of below-knee prostheses: a comparison

between the SACH and the Multiflex foot.

J Biomech 1990;23(5):441-6.

Ward RS, Hayes-Lundy C, Schnebly WA, Saffle JR.

Prosthetic use in patients with burns and associated

limb amputations. J Burn Care Rehabil 1990

Jul-Aug;11(4):361-4.

Wirta RW, Mason R, Calvo K, Golbranson FL. Effect

on gait using various prosthetic ankle-foot devices.

J Rehabil Res Dev 1991 Spring;28(2):13-24.

ADVERSE EFFECTS

Baptista A, Barros MA, Azenha A. Allergic contact

dermatitis on an amputation stump. Contact

Dermatitis 1992 Feb;26(2):140-1.

Foussereau J, Cavelier C, Protois JP, Deviller J.

Contact dermatitis from methyl methacrylate in an

above-knee prosthesis. Contact Dermatitis 1989

Jan;20(1):69-70.

Kolde G, Worheide J, Baumgartner R, Brocker EB.

Kaposi-like acroangiodermatitis in an above-knee

amputation stump. Br J Dermatol 1989 Apr;120(4):

575-80.

Macfarlane AW, Yu RC, King CM. Contact

sensitivity to para-tertiary-butylcatechol in an

artificial limb. Contact Dermatitis 1990 Jan;22(1):

56-7.

Mahaisavariya B, Mahaisavariya P. Marjolin’s ulcer

complicating a poorly fabricated prosthesis. Injury

1991 Sep;22(5):423-4.

Manneschi V, Cipolla C, Govoni M, Patrone P. [Skin

pathology caused by the use of limb prostheses].

G Ital Dermatol Venereol 1989 Jul-Aug;124(7-8):

363-7. (Ita).

Manneschi V, Palmerio B, Pauluzzi P, Patrone P.

Contact dermatitis from myoelectric prostheses.

Contact Dermatitis 1989 Aug;21(2):116-7.

Nicholas JJ, Robinson LR, Schulz R, Blair C, Aliota R,

Hairston G. Problems experienced and perceived

by prosthetic patients. J Prosthet Orthot 1993 Jan;

5(1):16-9.

Romaguera C, Vilaplana J, Grimalt F, Ferrando J.

Contact sensitivity to meth(acrylates) in a limb

prosthesis. Contact Dermatitis 1989 Aug;21(2):

125.

Rook JL, Green RF, Purgliese GN, Silane M.

Thrombosis of axillary-femoral bypass secondary to

prosthesis suspension belt. Arch Phys Med Rehabil

1989 Jul;70(7):559-61.

Santucci B, Donati P, Cristaudo A, Cannistraci C,

Picardo M. Kaposi-like acro-angiodermatitis of

amputation stump caused by suction socket

prosthesis. Contact Dermatitis 1992 Aug;27(2):

131-2.

Vincenzi C, Cameli N, Vassilopoulou A, Tosti A.

Allergic contact dermatitis due to benzoyl peroxide

in an arm prosthesis. Contact Dermatitis 1991 Jan;

24(1):66-7.

OTHER MOBILITY AIDS

WHEELCHAIRS & OTHER

MOTORIZED AIDS

General

Arnold ME, Penn B. Expert systems and occupational

therapy. Br J Occup Ther 1990 Sep;53(9):365-8.

Belkin L. How rationing will really work. Med Econ

1993 Mar 22;70(6):160-1, 165-8, 171-2 passim.

Bergen AF. The prescriptive wheelchair: an orthotic

device. In: O’Sullivan SB, Schmitz TJ. Physical

rehabilitation: assessment and treatment. 2nd ed.

Philadelphia: F.A. Davis; 1988. p. 615-28.

Bergen AF, Presperin J, Tallman T. Positioning for

function: the wheelchair & other assistive

technologies. Valhalla (NY): Valhalla Rehabilitation

Publ.; 1990.

Beske F. Gutachten uber die nach dem Gesundheits-

Reform-Gesetz vorgeschriebene festbetragsregelung

fur rollstuhle. Kiel (Germany): Institut fur

Gesundheits-System-Forschung; 1989. 72 p. (Ger).

Bhambhani YN, Eriksson P, Steadward RD.

Reliability of peak physiological responses during

wheelchair ergometry in persons with spinal cord

injury. Arch Phys Med Rehabil 1991 Jul;72(8):

559-62.

Bhambhani YN, Holland LJ, Steadward RD. Maximal

aerobic power in cerebral palsied wheelchair

athletes: validity and reliability. Arch Phys Med

Rehabil 1992 Mar;73(3):246-52.

Blocker WP Jr. How to help your patient choose the

right wheelchair. Postgrad Med 1990 Oct;88(5):

243, 246, 251-2.

Britell CW. Physical parameters and speed of

wheeling associated with two specific wheelchairs

by individuals with spinal cord function [letter].

Am J Phys Med Rehabil 1991 Dec;70(6):338-9.

Britell CW. Wheelchair prescription. In: Kottke FJ,

Lehman JF. Krusen’s handbook of physical

medicine and rehabilitation. 4th ed. Philadelphia:

Saunders; 1990. p. 548-63.

Brown DD, Knowlton RG, Hamill J, Schneider TL,

Hetzler RK. Physiological and biomechanical

differences between wheelchair-dependent and able-

bodied subjects during wheelchair ergometry. Eur J

Appl Physiol 1990;60(3):179-82.

Brubaker C. Ergonometric considerations. J Rehabil

Res Dev Clin Suppl 1990;(2):37-48.

Brubaker CE, ed. Wheelchair IV: report of a

conference on the state-of-the art of powered

wheelchair mobility; 1988 Dec 7-9; Charlottesville,

VA. Washington (DC): RESNA Press; 1989.

139 p.

Burkett LN, Chisum J, Pierce J, Pomeroy K.

Increased dermal sensitivity over paralyzed muscle

after peak exercise. Adapt Phys Activ Q 1990;7(1):

67-73.

Calder CJ, Kirby RL. Fatal wheelchair-related

accidents in the United States. Am J Phys Med

Rehabil 1990 Aug;69(4):184-90.

Campbell F, Ross F. Disability: dealing with wheels.

Community Outlook 1990 Oct:23-6.

Canale I, Felici F, Marchetti M, Ricci B. Ramp

length/grade prescriptions for wheelchair dependent

individuals. Paraplegia 1991 Sep;29(7):479-85.

Cappozzo A, Felici F, Figura F, Marchetti M, Ricci B.

Prediction of ramp traversability for wheelchair

dependent individuals. Paraplegia 1991 Sep;29(7):

470-8.

Chase J, Bailey DM. Evaluating the potential for

powered mobility. Am J Occup Ther 1990 Dec;

44(12):1125-9.

Choosing a wheelchair system. J Rehabil Res Dev Clin

Suppl 1990;(2):1-116.

Clarke AM, Redden JF. Management of hip posture

in cerebral palsy. J R Soc Med 1992 Mar;85(3):

150-1.

Cock J. Life inside the shell: a needs survey of spinal

cord-injured wheelchair users in a black South

African township. Disabil Handicap Soc 1989;4(1):

3-20.

A compendium of rehabilitation technology research

supported by NIDRR: national workshop on

rehabilitation technology; 1990 Oct 3-4;

Washington, DC. Washington (DC): Electronic

Industries Foundation, Rehabilitation Center; 1990.

278 p.

Cooper RA. A systems approach to the modeling of

racing wheelchair propulsion. J Rehabil Res Dev

1990 Spring;27(2):151-62.

Cooper RA. Wheelchair racing sports science: a

review. J Rehabil Res Dev 1990 Summer;27(3):

295-312.

Crewe R. Standards of wheelchairs [letter]. BMJ

1989 Jul 1;299(6690):53-4.

Davis K. Toward greater mobility. Clin Manage 1991

May-Jun;11(3):24-30.

Deacon S. Wheelchair lifts: proper selection assures

user of a long-term investment. Contin Care 1991

Apr;10(4):30-1.

Deathe AB. Canes, crutches, walkers and wheelchairs:

a review of metabolic energy expenditure. Can J

Rehabil 1992 Summer;5(4):217-30.

Desmond K. Electric vehicles-quietly making

progress. IEEE Rev 1991 Apr 18;37(4):145-7.

DiGaudio KM, Msall ME. Guidelines for safe

transportation of children in wheelchairs. Am J Dis

Child 1991 Jun;145(6):653-5.

Directory of wheelchair manufacturers. Except Parent

1991 Mar;21(2):44.

Eckrich KM. Dynamic interface pressure between

seated users and their wheelchairs [dissertation].

Ames (IA): Iowa State University; 1991. 171 p.

Eckrich KM. A pneumatic bladder array for

measuring dynamic interface pressure between

seated users and their wheelchairs. Biomed Sci

Instrum 1991;27:135-40.

Fewster C. Wheelchair apartheid. Nurs Times 1990

Jun 6-12;86(23):49-51.

Frank TG, Abel EW. Measurement of the turning,

rolling and obstacle resistance of wheelchair castor

wheels. J Biomed Eng 1989 Nov;11(6):462-6.

Franklin BA, Swantek KI, Grais SL, Johnstone KS,

Gordon S, Timmis GC. Field test estimation of

maximal oxygen consumption in wheelchair users.

Arch Phys Med Rehabil 1990 Jul;71(8):574-8.

Garg A, Owen B, Beller D, Banaag J. A

biomechanical and ergonomic evaluation of patient

transferring tasks: wheelchair to shower chair and

shower chair to wheelchair. Ergonomics 1991 Apr;

34(4):407-19.

Gayle GW, Davis GM, Pohlman RL, Glaser RM.

Track wheelchair ergometry: effects of handrim

diameter on metabolic responses. In: Doll-Tepper

G, Dahms C, Doll B, von Selzam H, eds. Adapted

physical activity: an interdisciplinary approach.

Proceedings of the 7th International Symposium;

1989 Jun; Berlin. New York: Springer-Verlag;

1990. p. 101-7.

Golding JS, Nathan RH. A third world wheelchair.

Int Disabil Stud 1987;9(1):38-40.

Gou M. Automatic wheelchair inboard storing. In:

Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 1-2.

Grisell J. Turning and transferring the patient: good

body mechanics are essential [videocassette].

[Houston]: University of Texas Health Science

Center at Houston, School of Nursing; 1991.

1 videocassette: 13 min., 30 sec., sound, color,

1/2 in.

Ham R, Roberts VC. Standards of wheelchairs [letter].

BMJ 1989 Jun 3;298(6686):1522.

Hartridge M, Seeger BR. International wheelchair

standards: a study of costs and benefits. Assist

Technol 1990;2(4):117-23.

Hawley MS, Cudd PA, Wells JH, Wilson AJ, Judd PL.

Wheelchair-mounted integrated control systems for

multiply handicapped people. J Biomed Eng 1992

May;14(3):193-8.

Henke C. Power to the people. Rx Home Care 1989

Jul;11(7):26-9.

Hirschhorn BE. The relationship among school

accessibility, student locus-of-control and the

satisfaction of New York City high school

wheelchair users [dissertation]. New York: New

York University; 1992. 108 p.

Hotchkiss R. Wheelchair designs from the third

world: a radical change in cushion design. In:

Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 30-1.

Huber JH. Instructing college students in use of

wheelchair and prosthetics. Palaestra 1989 Winter;

5(2):41-6.

Hughes CJ. Biomechanics of wheelchair propulsion as

a function of seat position and user-chair interface

[dissertation]. Charlottesville (VA): University of

Virginia; 1990. 154 p.

Hughes CJ, Weimar WH, Sheth PN, Brubaker CE.

Biomechanics of wheelchair propulsion as a

function of seat position and user-to-chair interface.

Arch Phys Med Rehabil 1992 Mar;73(3):263-9.

Hutzler Y. [Wheelchair adaptation]. Harefuah 1993

Jan 15;124(2):89-94. (Heb).

Interacting with people in wheelchairs [videocassette].

[Los Angeles]: Medical Electronic Educational

Services, Vantage Point Productions; Hospital

Satellite Network; 1987. 1 videocassette: 29 min.,

sound, color with black & white, 1/2 in.

Johnson D. Restraints in the 90s. Make your own

chairbound alternatives! Geriatr Nurs (New York)

1991 Jan-Feb;12(1):18-9.

Johnson KM. What is the best transportation for a

person without head control? SCI Nurs 1992 Dec;

9(4):144.

Kamenetz HL. A brief history of the wheelchair.

J Hist Med Allied Sci 1969 Apr;24(2):205-10.

Katzmann RA. Transportation policy. Milbank Q

1991;69 Suppl 1-2:214-37.

Kauzlarich JJ. Wheelchair batteries. II: Capacity,

sizing, and life. J Rehabil Res Dev 1990 Spring;

27(2):163-70.

Kettle M, Rowley C, Chamberlain MA. A national

survey of wheelchair users. Clin Rehabil 1992;

6(1):67-73.

Klinger C, Boenick U. [A new procedure for

simulation of wheelchair operation]. Biomed Tech

(Berlin) 1990;35 Suppl 3:303-4. (Ger).

Kristen H. Rollstuhltechnik. Stuttgart (Germany):

Gentner Verlag; 1990. 108 p. (Ger).

Lennon S. Wheelchair transfer training in a stroke

patient with neglect: a single case study design.

Physiother Theory Pract 1991;7(1):51-5.

Letts RM. Principles of seating the disabled. Boca

Raton (FL): CRC Press; 1991. 384 p.

Lewis K. Inglis House: a wheelchair community.

J Long Term Care Adm 1992 Spring;20(1):8, 10-1.

Little J. Taking control of purchasing a wheelchair:

tips for parents about mobility equipment. Except

Parent 1991 Mar;21(2):36-8, 46, 50.

Lord J, Behrman B, Varzos N, Cooper D, Lieberman

JS, Fowler WM. Scoliosis associated with

Duchenne muscular dystrophy. Arch Phys Med

Rehabil 1990 Jan;71(1):13-7.

Luebben AJ, Young LJ. Retrofitting: an unnecessary

expense. In: Technology for the future decade.

RESNA ’89: proceedings of the 12th annual

conference: 1989 Jun 25-30; New Orleans, LA.

Washington (DC): RESNA Press; 1989. p. 304-5.

MacDonald ML, Kirby RL, Nugent ST, MacLeod DA.

Locomotor-respiratory coupling during wheelchair

propulsion. J Appl Physiol 1992 Apr;72(4):1375-9.

MacDonald MLE. Respiratory-locomotor coupling

during wheelchair propulsion [masters thesis].

Halifax (Canada): Dalhousie University; 1990.

217 p.

Marcotte P. Law student sues her school; wants more

accessibility with her wheelchair. ABA J 1989

Mar;75:26-7.

Martel G, Noreau L, Jobin J. Physiological responses

to maximal exercise on arm cranking and

wheelchair ergometer with paraplegics. Paraplegia

1991 Sep;29(7):447-56.

Martin GM, Gamble GL. Prescription writing in

physical medicine and rehabilitation. In: Kottke FJ,

Lehman JF. Krusen’s handbook of physical

medicine and rehabilitation. 4th ed. Philadelphia:

Saunders; 1990. p. 647-55.

Masse LC, Lamontagne M, O’Riain MD.

Biomechanical analysis of wheelchair propulsion

for various seating positions. J Rehabil Res Dev

1992 Summer;29(3):12-28.

Mattison PG, Hunter J, Spence S. Development of a

realistic method to assess wheelchair propulsion by

disabled people. Int J Rehabil Res 1989;12(2):

137-45.

Mayall JK, Desharnais G. Positioning in a wheelchair:

a guide for the professional caregivers of the

disabled adult. Thorofare (NJ): Slack; 1990. 110 p.

Mazur JM, Shurtleff D, Menelaus M, Colliver J.

Orthopaedic management of high-level spina bifida.

Early walking compared with early use of a

wheelchair. J Bone Joint Surg [Am] 1989 Jan;

71(1):56-61.

McClenneghen A. Reimbursing power wheelchairs:

what are the options? Contin Care 1990 Feb;9(2):

14-16, 33.

McDonald CM, Jaffe KM, Mosca VS, Shurtleff DB.

Ambulatory outcome of children with

myelomeningocele: effect of lower extremity

muscle strength. Dev Med Child Neurol 1991

Jun;33(6):482-90.

McFarland SR. Seeking information about wheelchair

evaluation: a call for action. J Rehabil Res Dev

Clin Suppl 1990;(2):86-7.

McLaurin CA, Axelson P. Wheelchair standards: an

overview. J Rehabil Res Dev Clin Suppl 1990;(2):

100-3.

McLaurin CA, Brubaker CE. Biomechanics and the

wheelchair. Prosthet Orthot Int 1991 Apr;15(1):

24-37.

McMahon M, Dudley NJ. General practitioners and

wheelchair prescribing. Br J Occup Ther 1992

May;55(5):183-5.

Medicare program; payment for customized

wheelchairs--HCFA. Interim final rule with

comment period. Fed Regist 1991 Dec 20;56(245):

65995-8.

Mulley GP. Standards of wheelchairs. BMJ 1989

May 6;298(6682):1198-9.

Norrgard L, Crimaldi E, Wylde M. AARP product

report on manual wheelchairs. Washington (DC):

American Association of Retired Persons; 1992.

Nowak E. Workspace for disabled people.

Ergonomics 1989 Sep;32(9):1077-88.

Ozer MN. A participatory planning process for

wheelchair selection. J Rehabil Res Dev Clin

Suppl 1990;(2):31-6.

Paquet JB. Wheelchair prescription. Clin Manage

1991 May-Jun;11(3):32-6.

Parziale JR. Standard v lightweight wheelchair

propulsion in spinal cord injured patients. Am J

Phys Med Rehabil 1991 Apr;70(2):76-80.

Pentland WE, Twomey LT. The weight-bearing upper

extremity in women with long term paraplegia.

Paraplegia 1991 Oct;29(8):521-30.

Pessenhofer H, Sauseng N, Kohla B, Hermann M.

[Wheelchair ergometry: technical principles and

practical applications]. Biomed Tech (Berlin) 1990;

35 Suppl 2:201-2. (Ger).

Petrillo DK, Wooden VM, Kraft-Fine C, Siegal SG,

Cioschi HM. How to equip the quadriplegic

patient. Contin Care 1990 Nov;9(11):24-28, 35.

Petter S. Mobility aids: motorized mobility. Nurs

Stand 1989 Jul 8;3(41):37-8.

Phillips L, Nicosia A. An overview ... with reflections

past and present of a consumer. J Rehabil Res Dev

Clin Suppl 1990;(2):1-7.

Plesko L. Heavy on the lightweights. Rx Homecare

1989 May;11(5):41-3.

Pohlman RL, Gayle GW, Davis GM, Glaser RM.

Metabolic responses to maximal arm crank and

wheelchair ergometry in male paraplegics. Clin

Kinesiol 1989;43(4):89-95.

Presperin JJ, ed. Capitalizing on technology:

proceedings of the RESNA 13th annual conference;

1990 Jun 15-20; Washington, DC. Washington

(DC): RESNA Press; 1990. 445 p.

Presperin JJ, ed. Technology for the next decade.

RESNA ’89: proceedings of the 12th annual

conference; 1989 Jun 25-30; New Orleans, LA.

Washington (DC): RESNA Press; 1989 Jun. 481 p.

Preventing wheelchair theft. Hosp Secur Saf Manage

1990 Nov;11(7):5-8.

Prosthetics Research and Development Center (US),

Office of Technology Transfer. Choosing a

wheelchair system. Washington (DC): Dept. of

Veterans Affairs, Veterans Health Services and

Research Administration, Rehabilitation Research

and Development Service, Prosthetics Research and

Development Center, Office of Technology

Transfer; 1990 Mar. 118 p. (J Rehabil Res Dev;

Clin Suppl no. 2).

Pullin G, Gammie A. Current capabilities of

rehabilitation robots. J Biomed Eng 1991 May;

13(3):215-6.

Radermacher M. [Our "Project Wheelchair."

Experiences in class--on the way in a wheelchair].

Krankenpflege (Frankf) 1989 Jan;43(1):43. (Ger).

Ragnarsson KT. Prescription considerations and a

comparison of conventional and lightweight

wheelchairs. J Rehabil Res Dev Clin Suppl 1990;

(2):8-16.

Reid M, Lawrie AT, Hunter J, Warren PM. The effect

of steering on the physiological energy cost of

wheelchair propulsion. Scand J Rehabil Med

1990;22(3):139-43.

RESNA ’90: capitalizing on technology for people with

disabilities. Proceedings of the 13th annual

conference; 1990 Jun 15-20; Washington, DC.

Washington (DC): RESNA Press; 1990. 445 p.

RESNA ’91: technology for the nineties. Proceedings of

the 14th annual conference; 1991 Jun 21-26;

Kansas City, MO. Washington (DC): RESNA

Press; 1991. 442 p.

RESNA ’92: technology for consumers. Proceedings of

the 15th annual conference; 1992 Jun 6-11;

Toronto, Canada. Washington (DC): RESNA Press;

1992. 657 p.

Rigger R. Design lines spotlight. A barrier-free house,

part 1. Paraplegia News 1989 Aug;43(8):39-42.

Robbins S. 9th annual survey of the lightweights... or,

how to solve the puzzle and find the right chair for

you. Sports Spokes 1991 Mar-Apr;16(6):22-50.

Robinson A, Anderson L. Use of the wheelchair in

encouraging mobility. Oncol Nurs Forum 1989

Jan-Feb;16(1):106.

Sadler C. Disability: wheelchair comfort. Community

Outlook 1989 Nov:4-8.

Samuelsson K, Larsson H, Tropp H. A wheelchair

ergometer with a device for isokinetic torque

measurement. Scand J Rehabil Med 1989;21(4):

205-8.

Samuelsson KA, Larsson H, Tropp HT. Power output

and propulsion technique in wheelchair driving. Int

J Rehabil Res 1991;14(1):76-81.

Sedlock DA, Knowlton RG, Fitzgerald PI. Circulatory

and metabolic responses of women to arm crank

and wheelchair ergometry. Arch Phys Med Rehabil

1990 Feb;71(2):97-100.

Shaw G. Wheelchair seat comfort for the

institutionalized elderly. Assist Technol 1991;3(1):

11-23.

Shaw G, Taylor SJ. A survey of wheelchair seating

problems of the institutionalized elderly. Assist

Technol 1991;3(1):5-10.

Singh G. Examination of wheelchair-bound patients

[letter]. Arch Ophthalmol 1989 Oct;107(10):1422.

Standards of wheelchairs [letter]. BMJ 1989 May 20;

298(6684):1382-3.

Stewart C. Living aids: wheelchair evaluation and

prescription. Nurs Stand 1992 Sep 23-29;7(1):

27-30.

Sweeney GM, Clarke AK. Gradients of portable

ramps [letter]. BMJ 1991 May 25;302(6787):1277.

Sweeney GM, Clarke AK, Harrison RA, Bulstrode SJ.

An evaluation of portable ramps. Br J Occup Ther

1989 Dec;52(12):473-5.

Sweeney GM, Harrison RA, Clarke AK. Portable

ramps for wheelchair users--an appraisal. Int

Disabil Stud 1989 Apr-Jun;11(2):68-70.

Taylor SJ, Monahan LC, Abraham FJ. A headband for

anterior head support. Am J Occup Ther 1989

Apr;43(4):261-2.

Thom H. [Prevention of hip dislocation in children

with spastic paralysis by using a specific

therapeutic wheelchair]. Rehabilitation (Stuttg)

1991 Aug;30(3):109-15. (Ger).

Toms J. Mobility and ambulatory aids. In: Scully RM,

Barnes MR, Canfield JS, et al., eds. Physical

therapy. Philadelphia: Lippincott; 1989. p. 1052-72.

Transfer techniques [videocassette]. Garden Grove

(CA): Medcom/Trainex; 1990. 2 videocassettes:

sound, color, 1/2 in. (Professional skills for the new

nursing assistant).

Traut L. Ergonomische Gestaltung der

Benutzerschnittstelle am Antriebssystem des

Greifreifenrollstuhls. Berlin; New York: Springer-

Verlag; 1989. 210 p. [Ger]

Tucker NJ. Wheelchair walking. Geriatr Nurs (New

York) 1991 Jan-Feb;12(1):37.

User experience network. Safe use of supplemental

oxygen with powered wheelchairs. Health Devices

1992 Aug;21(8):291.

van der Woude LH, Veeger HE, Rozendal RH,

Sargeant AJ. Optimum cycle frequencies in hand-

rim wheelchair propulsion. Wheelchair propulsion

technique. Eur J Appl Physiol 1989;58(6):625-32.

van Oers CAJM, van der Woude LHV, Roebroeck ME,

Rozendal RH. A failure diary for hand propelled

wheelchairs. J Rehabil Sci 1991;4(4):123-30.

van Ross E. Pushchairs. Prosthet Orthot Int 1991

Apr;15(1):46-50.

Veeger HE, Lute EM, Roeleveld K, van der Woude

LH. Differences in performance between trained

and untrained subjects during a 30-s sprint test in a

wheelchair ergometer. Eur J Appl Physiol 1992;

64(2):158-64.

Veeger HE, van der Woude LH, Rozendal RH. A

computerized wheelchair ergometer. Results of a

comparison study. Scand J Rehabil Med 1992;

24(1):17-23.

Veeger HEJ. Biomechanical aspects of manual

wheelchair propulsion [dissertation]. Amsterdam:

Free University; 1992 Feb 27.

Wahle H. [Ten years follow-up of post-discharge

training status of 50 patients with complete

paraplegia]. Rehabilitation (Stuttg) 1991 Feb;30(1):

3-13. (Ger).

Walsh M, Judd M. Long term immobility and self

care: the Orem nursing approach. Nurs Stand 1989

Jul 8;3(41):34-6.

Wang YT. Relationship between kinematic factors and

muscle activity during wheelchair propulsion

[dissertation]. Champaign (IL): University of

Illinois at Urbana-Champaign; 1991. 238 p.

Warren CG. Powered mobility and its implications.

J Rehabil Res Dev Clin Suppl 1990;(2):74-85.

Waters RL, Yakura JS. The energy expenditure of

normal and pathologic gait. Crit Rev Phys Rehabil

Med 1989;1(3):183-209.

Webster JS, Cottam G, Gouvier WD, Blanton P, Beissel

GF, Wofford J. Wheelchair obstacle course

performance in right cerebral vascular accident

victims. J Clin Exp Neuropsychol 1989

Mar;11(2):295-310.

Wheelchair inspection and cleaning [videocassette].

Austin (TX): Texas Department of Mental Health

and Mental Retardation, Richmond State School,

Staff Development; 1992. 1 videocassette: 7 min.,

sound, color, 1/2 in. Accompanied by: 1 guide.

Wheelchair navigation: a computer-aided primer.

Health Care (Don Mills) 1989 Nov-Dec;31(9):11-2,

14.

Wheelchair use and safety [videocassette]. Austin (TX):

Texas Department of Mental Health and Mental

Retardation, Richmond State School, Staff

Development; 1992. 1 videocassette: 11 min.,

sound, color, 1/2 in. Accompanied by: 1 guide.

Wilson AB Jr. How to select and use manual

wheelchairs. Topping (VA): Rehabilitation Press;

1992. 67 p.

Wilson AB Jr. Wheelchairs: a prescription guide. 2nd

ed. New York: Demos Publications; 1992. 96 p.

Wilson AB Jr, McFarland SR. Types of wheelchairs. J

Rehabil Res Dev Clin Suppl 1990;(2):104-16.

Yoshida K. [20 years on wheelchair: unpleasant

experiences at a rehabilitation center]. Kango 1991

May;43(6):148-54. (Jpn).

Yoshido K. [20 years in a wheelchair--first

hospitalization after traffic accident]. Kango 1991

Apr;43(5):119-26. (Jpn).

Design, Materials, Seating, &

Equipment Safety

Abdel-Moty E, Khalil TM. Computer-aided design

and analysis of the sitting workplace for the

disabled. Int Disabil Stud 1991 Oct-Dec;13(4):

121-4.

Abel EW, Frank TG. The design of attendant

propelled wheelchairs. Prosthet Orthot Int 1991

Apr;15(1):38-45.

Agren B, Turesson A, Rosengren V, Jonsson B. [The

use of electric wheelchairs can be probably further

extended]. Lakartidningen 1990 Jul 11;87(28-29):

2356-8. (Swe).

Alexander MA, Demasco PW, Gilbert M, Miller LJ,

Nelson MR, Shah A. Rehabilitation technology

for disabled children. Phys Med Rehabil 1991 Jun;

5(2):365-87;

Amundson JS, Amundson SG. A joystick controlled

wheelchair. Biomed Sci Instrum 1991;27:131-3.

Andrich M, Contardo R. An approach to mobility and

communication via seating: a case study. In:

Technology for the next decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA.Washington (DC):

RESNA Press; 1989. p. 298-9.

Anschutz JR. Chairsim: a power wheelchair simulator.

In: Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 353.

Antczak JM, Snell E. Quad comparator circuit. In:

Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 9-10.

Ashmead S, Hunting D. Tiller steering on wheelchairs

for children and adults with unequal arm function.

Physiotherapy 1990 Apr;76(4):262-3.

Automobile transportation: car seats, wheelchair

carriers, and van lifts. Except Parent 1989

May-Jun;19(4):28-33.

Axelson P, Castellano J. Take to the trails: everything

you ever wanted to know about off road

wheelchairs. Sports Spokes 1990 Jul-Aug;16(2):

20-4.

Aylor JH, Kauzlarich JJ. A user survey on backup

power for powered wheelchairs. Charlottesville

(VA): University of Virginia Rehabilitative

Engineering Center; 1991.

Aylor JH, Thacker JG, Johnson BW, Baldwin D, Lei

GM. Dependability modeling of electric

wheelchair systems. In: Technology for the future

decade. RESNA ’89: proceedings of the 12th

annual conference; 1989 Jun 25-30; New Orleans,

LA. Washington (DC): RESNA Press; 1989. p.

5-6.

Bach JR, Zeelenberg AP, Winter C. Wheelchair-

mounted robot manipulators. Long term use by

patients with Duchenne muscular dystrophy. Am J

Phys Med Rehabil 1990 Apr;69(2):55-9.

Banks LW. Heightening fan enjoyment: need a lift?

An invention helps spectators in wheelchairs follow

the action. Sports Illus 1991 Nov 25;75(23):28.

Bar CA. Evaluation of cushions using dynamic

pressure measurement. Prosthet Orthot Int 1991

Dec;15(3):232-40.

Becker DG, Washington BV, Devlin PM, Zook JE,

Edlich RF. Injury due to uncontrolled acceleration

of an electric wheelchair. J Emerg Med 1991

May-Jun;9(3):115-7.

Behrman AL. Factors in functional assessment.

J Rehabil Res Dev Clin Suppl 1990;(2):17-30.

Beringhause S, Rosen MJ, Huang S. Evaluation of a

damped joystick for people disabled by intention

tremor. In: Technology for the future decade.

RESNA ’89: proceedings of the 12th annual

conference; 1989 Jun 25-30; New Orleans, LA.

Washington (DC): RESNA Press; 1989. p. 41-2.

Bishop P. Variables of wheelchair position for athletes

with cerebral palsy and amputation. Palaestra 1990

Summer;6(4):59.

Blackstien-Adler S, Ryan S, Naumann S, Parnes P.

Development of an integrated wheelchair tray

system for augmentative communication. Assist

Technol 1990;2(4):142-50.

Bresler MI. The tamara system: integrated control of

mobility, communication, and environment. In:

Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 300-1.

Bresler MI. Vectorplane: an approach to contouring

powered mobility control. In: Technology for the

future decade. RESNA ’89: proceedings of the 12th

annual conference; 1989 Jun 25-30; New Orleans,

LA. Washington (DC): RESNA Press; 1989.

p. 13-4.

Brown KE, Inigo RM, Johnson BW. Design,

implementation, and testing of an adaptable optimal

controller for an electric wheelchair. IEEE Trans

Ind Appl 1990 Nov-Dec;26(6):1144-57.

Brubaker C. Ergonometric considerations. J Rehabil

Res Dev Clin Suppl 1990;(2):37-48.

Brubaker C, ed. Wheelchair IV: report of a conference

on the state-of-the-art of powered wheelchair

mobility, December 7-9, 1988; sponsored by

University of Virginia Rehabilitation Engineering

Center and National Institute on Disability and

Rehabilitation Research of the Department of

Education. Washington (DC): RESNA Press; 1989.

139 p.

Brubaker CH, Sprigle SH. Seating and wheelchairs.

Curr Opin Orthop 1990 Dec;1(3):445-9.

Bullard M, Clothiaux A. Use of dynamic tilt in space

to resolve conflicting clinical objectives, In:

Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 165-6.

Cheng DP. Semi-latched mode single switch

wheelchair interface. In: RESNA ’89: proceedings

of the 12th annual conference; 1989 Jun 25-30;

New Orleans, LA. Washington (DC): RESNA

Press; 1989. p. 11-2.

Chizinsky KA, Horstmann H, Koester DJ, Levine SP.

Modification of a proportional joystick to

incorporate accessory switch outputs. In:

Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 39-40.

Choate MJ. Infrared wheelchair controls. Biomed Sci

Instrum 1990;26:107-9.

Clarke AM, Redden JF. Management of hip posture

in cerebral palsy. J R Soc Med 1992 Mar;85(3):

150-1.

Colino S. To climb every mountain: these wheelchairs

are designed to put disabled athletes on trails once

reserved for off-road vehicles. Sports Illus 1992

May 4;76(17):6,10.

A compendium of rehabilitation technology research

supported by NIDRR: national workshop on

rehabilitation technology; 1990 Oct 3-4;

Washington, DC. Washington (DC): Electronic

Industries Foundation, Rehabilitation Center; 1990.

278 p.

Cooper RA. Force/energy optimization model for

wheelchair athletics. IEEE Trans Syst Man Cybern

1990 Mar-Apr;20(2):444-9.

Cooper RA. High-tech wheelchairs gain the

competitive edge. IEEE Eng Med Biol 1991 Dec;

10(4):49-55.

Cooper RA. An international track wheelchair with a

center of gravity directional controller. J Rehabil

Res Dev 1989 Spring;26(2):63-70.

Cooper RA. A new racing wheelchair front wheel

mounting mechanism. Palaestra 1990 Fall;6(5):

30-2.

Cooper RA. Racing wheelchair crown compensation.

J Rehabil Res Dev 1989 Winter;26(1):25-32.

Cooper RA. Racing wheelchair rear wheel alignment.

J Rehabil Res Dev 1989 Winter;26(1):47-50.

Cooper RA. System identification of human

performance parameters for competitive wheelchair

design [dissertation]. Santa Barbara (CA):

University of California, Santa Barbara; 1989.

261 p.

Cooper RA. Technology and wheelchair sports.

Newsl Natl Wheelchair Athlet Assoc 1990 Fall:

17-8.

Cooper RA, MacLeish M. Racing wheelchair roll

stability while turning: a simple model. J Rehabil

Res Dev 1992 Spring;29(2):23-30.

Crase N. The impulse. Sports Spokes 1989 Jul-Aug;

15(2):29-30, 32-3.

Cremers GB. Hybrid-powered wheelchair: a

combination of arm force and electrical power for

propelling a wheelchair. J Med Eng Technol 1989

Jan-Apr;13(1-2):142-8.

Crenshaw RP, Vistnes LM. A decade of pressure sore

research: 1977-1987. J Rehabil Res Dev 1989

Winter;26(1):63-74.

Crewe R. Standards of wheelchairs [letter]. BMJ

1989 Jul 1;299(6690):53-4.

Cronk SR, Hobson DA, Ellis GA. A low-cost data

acquisition system for measuring shear force and

center of gravity of wheelchair occupants. In:

RESNA ’89: proceedings of the 12th annual

conference; 1989 Jun 25-30; New Orleans, LA.

Washington (DC): RESNA Press; 1989. p. 81-2.

Davey K, Ross D, Simpson C. Development of a high

reliability, high efficiency curvilinear synchronous

wheelchair drive system. In: Technology for the

future decade. RESNA ’89: proceedings of the 12th

annual conference; 1989 Jun 25-30; New Orleans,

LA. Washington (DC): RESNA Press; 1989.

p. 7-8.

de Boer YA, Cambach W, Veeger HEJ, van der Woude

LHV. Wheelchair prototype testing: a new lever-

drive-system in comparison with existing propulsion

mechanisms. J Rehabil Sci 1992 Jun;5(2):38-43.

Deacon S. Wheelchair lifts: proper selection assures

user of a long-term investment. Contin Care 1991

Apr;10(4):30-1.

Deitz J, Jaffe KM, Wolf LS, Massagli TL, Anson D.

Pediatric power wheelchairs: evaluation of function

in the home and school environments. Assist

Technol 1991;3(1):24-31.

Desmond K. Electric vehicles-quietly making

progress. IEEE Rev 1991 Apr 18;37(4):145-7.

Dudley NJ. Wheelchair safety [letter]. Lancet 1993

Jan 23;341(8839):246.

Eckrich KM. Dynamic interface pressure between

seated users and their wheelchairs [dissertation].

Ames (IA): Iowa State University; 1991. 171 p.

Eckrich KM. A pneumatic bladder array for

measuring dynamic interface pressure between

seated users and their wheelchairs. Biomed Sci

Instrum 1991;27:135-40.

El-Shanawany MM. Operation of a car alternator as a

three-phase traction motor using microprocessor.

In: UPEC’89. Proceedings of the 24th University

Power Engineers Conference; 1989 Sep 19-20;

Belfast, Northern Ireland, U.K. Belfast (UK):

Queen’s University; 1989. p. 327-30.

Espinosa C, Perkowski MA. Hierarchical Hough

transform for the vision system of the PSUBOT.

In: Northcon Conference Record; 1991 Oct 1-3;

Portland, OR. Los Angeles: Electronic Conventions

Management; 1991. p. 291-6.

Eve L, Kinnear EML. Does the wheelchair fit? A

study of seating for adults with mental handicap.

Physiother 1989 Feb;75(2):72-6.

Factor E. The turtle: new wheelchair tracks on sand

and snow. Except Parent 1989 May-Jun;19(4):

52-3.

Fife SE, Roxborough LA, Armstrong RW, Harris SR,

Gregson JL, Field D. Development of a clinical

measure of postural control for assessment of

adaptive seating in children with neuromotor

disabilities. Phys Ther 1991 Dec;71(12):981-93.

Published erratum appears in Phys Ther 1992 Jan;

72(1):41.

Frank TG, Abel EW. Design and evaluation of

footrests for hospital wheelchairs. J Biomed Eng

1990 Jul;12(4):333-9.

Frank TG, Abel EW. Measurement of the turning,

rolling and obstacle resistance of wheelchair castor

wheels. J Biomed Eng 1989 Nov;11(6):462-6.

Franks CA, Palisano RJ, Darbee JC. The effect of

walking with an assistive device and using a

wheelchair on school performance in students with myelomeningocele. Phys Ther 1991 Aug;71(8):

570-7; discussion 577-9.

Fraser BA, Hensinger RN, Phelps JA. Physical

management of multiple handicaps: a professional’s

guide. 2nd ed. Baltimore: Paul H. Brookes Publ.;

1990. 337 p.

Garber SL, Dyerly LR. Wheelchair cushions for

persons with spinal cord injury: an update. Am J

Occup Ther 1991 Jun;45(6):550-4.

Garland LA, Dorion SL, Vietinghoff HE.

Development of a standard interface concept for

securing wheelchairs in accessible vehicles. Ottawa

(Canada): Centre for Studies on Aging; 1989.

118 p.

Garrett RE, Hartridge M, Seeger BR. Comparative

evaluation of chargers for wheelchair gel cell

batteries. Australas Phys Eng Sci Med 1990 Sep;

13(3):148-56.

Gayle GW, Davis GM, Pohlman RL, Glaser RM.

Track wheelchair ergometry: effects of handrim

diameter on metabolic responses. In: Doll-Tepper

G, Dahms C, Doll B, von Selzam H, eds. Adapted

physical activity: an interdisciplinary approach.

Proceedings of the 7th International Symposium;

1989 Jun; Berlin. New York: Springer-Verlag;

1990. p. 101-7.

Gayle GW, Pohlman RL, Glaser RM, Davis GM.

Cardiorespiratory and perceptual responses to arm

crank and wheelchair exercise using various

handrims in male paraplegics. Res Q Exerc Sport

1990 Sep;61(3):224-32.

George M. Wheel lock. Nurs Times 1992 Jan 1-7;

88(1):17.

Gilsdorf P, Patterson R, Fisher S. Thirty-minute

continuous sitting force measurements with

different support surfaces in the spinal cord injured

and able-bodied. J Rehabil Res Dev 1991

Fall;28(4):33-8.

Gilsdorf P, Patterson R, Fisher S, Appel N. Sitting

forces and wheelchair mechanics. J Rehabil Res

Dev 1990 Summer;27(3):239-46.

Golding JS, Nathan RH. A third world wheelchair.

Int Disabil Stud 1987;9(1):38-40.

Gordon J, Kauzlarich JJ, Thacker JG. Tests of two

new polyurethane foam wheelchair tires. J Rehabil

Res Dev 1989 Winter;26(1):33-46.

Gou M. Automatic wheelchair inboard storing. In:

Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 1-2.

Green EM, Nelham RL. Development of sitting

ability, assessment of children with a motor

handicap and prescription of appropriate seating

systems. Prosthet Orthot Int 1991 Dec;15(3):

203-16.

Hambrey RA, Withinshaw G. Electrically powered

upper limb prostheses: their development and

application. Br J Occup Ther 1990 Jan;53(1):7-11.

Harms M. Effect of wheelchair design on posture and

comfort of users. Physiotherapy 1990 May;76(5):

266-71.

Hawley MS, Cudd PA, Wells JH, Wilson AJ, Judd PL.

Wheelchair-mounted integrated control systems for

multiply handicapped people. J Biomed Eng 1992

May;14(3):193-8.

Henke C. Power to the people. Rx Home Care 1989

Jul;11(7):26-9.

Herzberg SR. Positioning the nursing home resident:

an issue of quality of life. Am J Occup Ther 1993

Jan;47(1):75-7.

Hobson DA. Comparative effects of posture on

pressure and shear at the body-seat interface.

J Rehabil Res Dev 1992 Fall;29(4):21-31.

Hughes CJ. Biomechanics of wheelchair propulsion as

a function of seat position and user-chair interface

[dissertation]. Charlottesville (VA): University of

Virginia; 1990. 154 p.

Hughes CJ, Weimar WH, Sheth PN, Brubaker CE.

Biomechanics of wheelchair propulsion as a

function of seat position and user-to-chair interface.

Arch Phys Med Rehabil 1992 Mar;73(3):263-9.

Hunt GM, Whitaker RH. A new device for self-

catheterisation in wheelchair-bound women. Br J

Urol 1990 Aug;66(2):162-3.

Hutzler Y. [Wheelchair adaptation]. Harefuah 1993

Jan 15;124(2):89-94. (Heb).

Inigo RM, Wagner J. An optical joystick for electric

wheelchairs. In: Technology for the future decade.

RESNA ’89: proceedings of the 12th annual

conference; 1989 Jun 25-30; New Orleans, LA.

Washington (DC): RESNA Press; 1989. p. 37-8.

Jelonkiewicz J, Jonsson A, Ferraris P. Design and

control of synchronous wheelchair drive. In: EPE

’91: the 4th European Conference on Power

Electronics and Applications; 1991 Sep 3-6;

Florence, Italy. Vol. 1. Torino (Italy): Litografia

GEDA; 1991. p. 121-4.

Johnson D. Restraints in the 90s. Make your own

chairbound alternatives! Geriatr Nurs (New York)

1991 Jan-Feb;12(1):18-9.

Jones CK. In search of power for the pediatric client.

Phys Occup Ther Pediatr 1990;10(2):47-68.

Kanyer B. Meeting the seating and mobility needs of

the client with traumatic brain injury. J Head

Trauma Rehabil 1992 Sep;7(3):81-93.

Kauzlarich JJ. Wheelchair batteries. II: Capacity,

sizing, and life. J Rehabil Res Dev 1990 Spring;

27(2):163-70.

Kirby RL, Atkinson SM, MacKay EA. Static and

dynamic forward stability of occupied wheelchairs:

influence of elevated footrests and forward

stabilizers. Arch Phys Med Rehabil 1989 Sep;

70(9):681-6.

Kirby RL, Kumbhare DA, MacLeod DA. "Bedside"

test of static rear stability of occupied wheelchairs.

Arch Phys Med Rehabil 1989 Mar;70(3):241-4.

Kirby RL, McLean AD. Preventing occupied

wheelchairs from falling down stairs. J Rehabil

Res Dev 1990 Winter;27(1):27-32.

Kirby RL, McLean AD, Eastwood BJ. Influence of

caster diameter on the static and dynamic forward

stability of occupied wheelchairs. Arch Phys Med

Rehabil 1992 Jan;73(1):73-7.

Krome RL. Electric wheelchair precautions [letter].

J Emerg Med 1991 Nov-Dec;9(6):511.

Krouskop TA, Cullen B, Garber SL. Custom selection

of support surfaces for wheelchairs and beds: one

size does not fit all. Dermatol Nurs 1992 Jun;4(3):

191-4, 204.

Lemaire ED, Lamontagne M, Barclay HW, John T,

Martel G. A technique for the determination of

center of gravity and rolling resistance for tilt-seat

wheelchairs. J Rehabil Res Dev 1991 Summer;

28(3):51-8.

Marinissen AH, Oldenkamp I. Design and

development of a powered vehicle for handicapped

people. J Med Eng Technol 1989 Jan-Apr;13(1-2):

149-55.

Masse LC, Lamontagne M, O’Riain MD.

Biomechanical analysis of wheelchair propulsion

for various seating positions. J Rehabil Res Dev

1992 Summer;29(3):12-28.

Mathews P, Wu M. Choosing a sports or sports style

wheelchair. Indep Living 1991 Autumn;7(2):10-7.

Mayi D. An intelligent database for the PSUBOT: an

autonomous wheelchair robot. In: Northcon

Conference Record; 1991 Oct 1-3; Portland, OR.

Los Angeles: Electronic Conventions Management;

1991. p. 297-302.

McEwen IR. Assistive positioning as a control

parameter of social communicative interactions between students with profound multiple disabilities

and classroom staff... including commentary by

Palisano RJ with author response. Phys Ther 1992

Sep;72(9):634-47.

McLaurin CA. Current directions in wheelchair

research. J Rehabil Res Dev Clin Suppl 1990;

(2):88-99.

McLaurin CA, Brubaker CE. Biomechanics and the

wheelchair. Prosthet Orthot Int 1991 Apr;15(1):

24-37.

McPherson JJ, Schild R, Spaulding SJ, Barsamian P,

Transon C, White SC. Analysis of upper

extremity movement in four sitting positions: a

comparison of persons with and without cerebral

palsy. Am J Occup Ther 1991 Feb;45(2):123-9.

Meijs PJM, Van Oers CAJM, Veeger HEJ, Van Der

Woude LHV. The effect of seat height on the

physiological response and propulsion technique in

wheelchair propulsion. J Rehabil Sci 1989 Dec;

2(4):104-7.

Michael SM. Advances in wheelchair cushioning.

Crit Rev Phys Rehabil Med 1991;3(1):1-12.

Moretto DF, Minkel JL, Cardi MD. Prosthetic/orthotic

management after recent hemipelvectomy for a

myelomeningocele patient. J Prosthet Orthot 1992

Winter;4(2):93-102.

Myhr U, von Wendt L. Improvement of functional

sitting position for children with cerebral palsy.

Dev Med Child Neurol 1991 Mar;33(3):246-56.

Nash RS, Davy MS, Orpwood R, Swain ID.

Development of a wheelchair-mounted folding

standing frame. J Biomed Eng 1990 May;12(3):

189-92.

Nelson VS, Leonard JA Jr, Fisher SV, Esquenazi A,

Hicks JE. Prosthetics, orthotics, and assistive

devices. 2. Specialized seating and assistive devices.

Arch Phys Med Rehabil 1989 May;70(5-S):S202-5.

Neth DC, McGovern TF, Reger SI. Computer aided

measurement and fabrication of contoured body

supports. In: Technology for the future decade.

RESNA ’89: proceedings of the 12th annual

conference; 1989 Jun 25-30; New Orleans, LA.

Washington (DC): RESNA Press; 1989. p. 234-5.

Neth DC, McGovern TF, Reger SI, Kim Y, Spelman

FA. Quantification of body shape for contoured

support fabrication. In: Kim Y, Spelman FA, eds.

Images of the twenty-first century. Proceedings of

the 11th Annual International Conference of the

IEEE Engineering in Medicine and Biology

Society; 1989 Nov 9-12; Seattle, WA. Vol. 5.

Piscataway (NJ): IEEE; 1989. p. 1534-5.

Niesing R, Eijskoot F, Kranse R, den Ouden AH,

Storm J, Veeger HE, van der Woude LH, Snijders

CJ. Computer-controlled wheelchair ergometer.

Med Biol Eng Comput 1990 Jul;28(4):329-38.

Odderson IR, Jaffe KM, Sleicher CA, Price R, Kropp

RJ. Gel wheelchair cushions: a potential cold

weather hazard. Arch Phys Med Rehabil 1991

Nov;72(12):1017-20.

Ohry A, Freidman A, Dvir Z. [A proposal: seating

and sitting clinic]. Harefuah 1989 Jun 15;116(12):

647-8. (Heb).

Ojala J, Inoue K, Sasaki K, Takamo M. Development

of an intelligent wheelchair using computer

graphics animation and simulation. Comput Graph

Forum 1991 Dec;10(4):285-95.

Park CA. Activity positioning and ischial tuberosity

pressure: a pilot study. Am J Occup Ther 1992

Oct;46(10):904-9.

Patterson R, Gilsdorf P, Fisher S, Kim Y, Spelman FA.

Seat forces as function of wheelchair back angle

and foot rest height. In: Kim Y, Spelman FA, eds.

Images of the twenty-first century. Proceedings of

the 11th Annual International Conference of the

IEEE Engineering in Medicine and Biology

Society; 1989 Nov 9-12; Seattle, WA. Vol. 5.

Piscataway (NJ): IEEE; 1989. p. 1532-3.

Penn ND, Belfield PW, Young JB, Whitley AJ, Mulley

GP, Mascie-Taylor BH. No more flat tyres: a trial

of a tyre insert for wheelchairs. Clin Rehabil 1989

May;3(2):149-50.

Perkowski MA, Sarabi A, Schafer I. Application of

orthogonal transforms in image processing. In:

Northcon Conference Record; 1991 Oct 1-3;

Portland, OR. Los Angeles: Electronic Conventions

Management; 1991. p. 303-9.

Petter S. Mobility aids: motorized mobility. Nurs

Stand 1989 Jul 8;3(41):37-8.

Plautz R, Timen B. Positioning can make the

difference. Nursing Homes 1992 Jan-Feb;41(1):

30-3.

Plesko L. Heavy on the lightweights. Rx Homecare

1989 May;11(5):41-3.

Post KM. From the field: clinical notes on cushion

prescription. Am J Occup Ther 1991 Jun;45(6):

559-62.

Powell RR. Performance comparisons among four

different arm cycling systems. Int J Rehabil Res

1992;15(4):334-40.

Prasad RK, Aylor JH, Johnson BW. Fault tolerant

motor drives for powered wheelchairs. In: The

22nd Southeastern Symposium on System Theory;

1990 Mar 11-13; Cookeville, TN. Los Alamitos

(CA): IEEE Computer Society Press; 1990.

p. 420-5.

Presperin J. Seating systems: the therapist and

rehabilitation engineering team. Phys Occup Ther

Pediatr 1990;10(2):11-45.

Prior SD. An electric wheelchair mounted robotic arm-

-a survey of potential users. J Med Eng Technol

1990 Jul-Aug;14(4):143-54.

Prior SD, Crochetiere WJ, Mahoney RM, Masanic C,

Milner M, Goldenberg AA, Apkarian J. Special

session 13: robotics invited papers. In: Capitalizing

on technology: proceedings or the RESNA 13th

annual conference; 1990 Jun 15-20; Washington,

DC. Washington (DC): RESNA Press; 1990.

p. 297-302.

Proper seating: a key to participation. Except Parent

1989 Mar;19(2):46-9.

Racz J, Wolczowski A. [Graphical simulation of

movement control of automatic wheel chair].

Pr Nauk Inst Cybernetyki Tech Politech Wroclawsk

1990;37:189-95. (Pol).

Ragnarsson KT. Prescription considerations and a

comparison of conventional and lightweight

wheelchairs. J Rehabil Res Dev Clin Suppl 1990;

(2):8-16.

Rao S, Kuc R, Buus S. INCH: an intelligent

wheelchair prototype. In: Proceedings of the 15th

Annual Northeast Bioengineering Conference; 1989

Mar 22-23; Troy, NY. New York: Pergamon Press;

1989. p. 35-6.

Rechargeable, deep-cycle, lead-acid batteries for

powered wheelchair and scooter users. Health

Devices 1991 Dec;20(12):474-94.

Reed RL, Yochum K, Schloss M. Platform motorized

wheelchairs in congregate care centers: a survey of

usage and safety. Arch Phys Med Rehabil 1993

Jan;74(1):101-3.

Rehabilitation R & D progress reports 1988. J Rehabil

Res Dev 1989 Feb;25 Suppl:1-419.

Rehabilitation R&D progress reports 1989. J Rehabil

Res Dev 1990 Feb;26 Suppl:1-509.

Rehabilitation R&D progress reports 1990. J Rehabil

Res Dev 1991 Winter;28(1):1-535.

Rohmert W, Lowenthal I, Ruckert A. Ergonomic

evaluation of a wheelchair for transfer of disabled

passengers at a large airport. Int J Rehabil Res

1990;13(3):243-9.

Scott Taplin C, Smith M, McLaughlin J, Mathews T.

The wheelchair simulator: powered wheelchair

assessment and training. Can J Rehabil 1989 Fall;

3(1):49-51.

Seeger BR. Wheelchair occupant restraints in motor

vehicles. Prosthet Orthot Int 1991 Apr;15(1):51-4.

Shafik KT, Inigo RM, Schauer J, Kelso DP,

Vanderheiden GC, Levine SP, Borenstein J, Koren

Y, Verberg G, Naumann S, et al. Session 19:

powered wheelchairs. In: Capitalizing on

technology: proceedings of the RESNA 13th annual

conference; 1990 Jun 15-20; Washington, DC.

Washington (DC): RESNA Press; 1990.

p. 189-200.

Shaw G. Wheelchair seat comfort for the

institutionalized elderly. Assist Technol 1991;3(1):

11-23.

Shaw G, Taylor SJ. A survey of wheelchair seating

problems of the institutionalized elderly. Assist

Technol 1991;3(1):5-10.

Smith D, Stanton K, Perkowski M. A distributed

processor ensemble methodology for the PSUBOT.

In: Northcon Conference Record; 1991 Oct 1-3;

Portland, OR. Los Angeles: Electronic Conventions

Management; 1991. p. 310-15.

Sprigle S, Chung KC, Brubaker CE. Factors affecting

seat contour characteristics. J Rehabil Res Dev

1990 Spring;27(2):127-34.

Sprigle S, Chung KC, Brubaker CE. Reduction of

sitting pressures with custom contoured cushions.

J Rehabil Res Dev 1990 Spring;27(2):135-40.

Sprigle SH. Biomechanical analysis of contoured

foam for use by spinal cord-injured persons

[dissertation]. Charlottesville (VA): University of

Virginia; 1989. 179 p.

Sprigle SH, Faisant TE, Chung KC. Clinical

evaluation of custom-contoured cushions for the

spinal cord injured. Arch Phys Med Rehabil 1990

Aug;71(9):655-8.

St-Georges M, Valiquette C, Drouin G. Computer-

aided design in wheelchair seating. J Rehabil Res

Dev 1989 Fall;26(4):23-30.

Stanton KB. PSUBOT: system overview and path

planning. In: Northcon Conference Record; 1991

Oct 1-3; Portland, OR. Los Angeles: Electronic

Conventions Management; 1991. p. 285-90.

Stanton KB, Sherman PR, Rohwedder ML, Fleskes CP,

Gray DR, Minh DT, Espinoza C, Mayui D, Ishaque

M, Perkowski MA, et al. PSUBOT-a voice-

controlled wheelchair for the handicapped. In:

Johnson RH, et al., eds. Proceedings of the 33rd

Midwest Symposium on Circuits and Systems; 1990

Aug 12-14; Calgary, Alberta, Canada. Vol. 2. New

York: IEEE; 1991. p. 669-72.

Stewart CP, Carus DA, Kerr G. Development of a

universal wheelchair narrower. Prosthet Orthot Int

1989 Apr;13(1):39-41.

Stewart H, Noble G, Seeger BR. Isometric joystick: a

study of control by adolescents and young adults

with cerebral palsy. Aust Occup Ther J 1992 Mar;

39(1):33-9.

Sunderlin A. 7th annual survey of the lightweights.

Sports Spokes 1989 Mar-Apr;14(6):30-2, 34-6

passim.

Sunderlin A. 8th annual survey of the lightweights.

Sports Spokes 1990 Mar-Apr;15(6):24-6, 28-38

passim.

Taplin CS. Powered wheelchair control, assessment,

and training. In: Technology for the next decade.

RESNA ’89: proceedings or the 12th annual

conference; 1989 Jun 25-30; New Orleans, LA.

Washington (DC): RESNA Press; 1989. p. 45-6.

Thornett CE. Designing special switches and control

systems for multiply handicapped young people--a

problem-led approach. J Med Eng Technol 1990

May-Jun;14(3):87-91.

Thornett CEE. Mobility for very young handicapped

children. In: IEE Colloqium of High-Tech Help for

the Handicapped; 1990 Apr 2, London (UK).

London: IEE; 1990. p. 46.

Todd BA. Finite element analysis of the stress

distribution within the seated and supine human

buttocks [dissertation]. Charlottesville (VA):

University of Virginia; 1992. 252 p.

Trail IA, Galasko CS. The Matrix seating system.

J Bone Joint Surg [Br] 1990 Jul;72(4):666-9.

Trefler E, Taylor SJ. Prescription and positioning:

evaluating the physically disabled individual for

wheelchair seating. Prosthet Orthot Int 1991 Dec;

15(3):217-24.

Treherne IM. Autonomous mobile robots: an aid for

the handicapped. In: IEE Colloqium of High-Tech

Help for the Handicapped; 1990 Apr 2; London

(UK). London: IEE; 1990. p. 46.

van der Woude L, Veeger HEJ, Rozendal RH,

Koperdraat J, Drexhage D. Seat height in hand

rim wheelchair propulsion. A follow up study.

J Rehabil Sci 1990;3(3):79-83.

van der Woude LH, Veeger DJ, Rozendal RH, Sargeant

TJ. Seat height in handrim wheelchair propulsion.

J Rehabil Res Dev 1989 Fall;26(4):31-50.

van der Woude LH, Veeger HE, Rozendal RH.

Propulsion technique in hand rim wheelchair

ambulation. J Med Eng Technol 1989 Jan-Apr;

13(1-2):136-41.

van der Woude LH, Veeger HE, Rozendal RH,

Sargeant AJ. Optimum cycle frequencies in handrim wheelchair propulsion. Wheelchair propulsion

technique. Eur J Appl Physiol 1989;58(6):625-32.

van der Woude LHV, Veeger DJEJ, Rozendal RH.

Ergonomics of wheelchair design: a prerequisite for

optimum wheeling conditions. Adapt Phys Activ Q

1989 Apr;6(2):109-32.

van der Woude LHV, Veeger HEJ, Koperdraat J,

Drexhage D. Design of a static wheelchair

ergometer: preliminary results. In: Doll-Tepper G,

Dahms C, Doll B, von Selzam H, eds. Adapted

physical activity: an interdisciplinary approach.

Proceedings of the 7th International Symposium;

1989 June; Berlin. New York: Springer-Verlag;

1990. p. 441-6.

Veeger D, van der Woude LH, Rozendal RH. The

effect of rear wheel camber in manual wheelchair

propulsion. J Rehabil Res Dev 1989 Spring;26(2):

37-46.

Veeger HE, Lute EM, Roeleveld K, van der Woude

LH. Differences in performance between trained

and untrained subjects during a 30-s sprint test in a

wheelchair ergometer. Eur J Appl Physiol 1992;

64(2):158-64.

Veeger HE, van der Woude LH, Rozendal RH. A

computerized wheelchair ergometer. Results of a

comparison study. Scand J Rehabil Med 1992;

24(1):17-23.

Veeger HE, van der Woude LH, Rozendal RH. Effect

of handrim velocity on mechanical efficiency in

wheelchair propulsion. Med Sci Sports Exerc 1992

Jan;24(1):100-7.

Veeger HE, van der Woude LH, Rozendal RH.

Wheelchair propulsion technique at different

speeds. Scand J Rehabil Med 1989;21(4):197-203.

Veeger HE, van der Woude LH, Rozendal RH.

Within-cycle characteristics of the wheelchair push

in sprinting on a wheelchair ergometer. Med Sci

Sports Exerc 1991 Feb;23(2):264-71.

Vos R, Goslett N, van Hoogstraten A, Fourie P.

Albatros: an innovative low-cost wheelchair.

Disabil Rehabil 1993 Jan-Mar;15(1):44-6.

Vosse A, Cooper R, Dhaliwal B, Ludovici A, Baldwin

JD, Thacker JG, Baber TT, Aylor JH, Cooper RA,

Kauzlarich JJ. Session 7: manual wheelchairs.

Capitalizing on technology: proceedings of the

RESNA 13th annual conference; 1990 Jun 15-20;

Washington, DC. Washington (DC): RESNA Press;

1990. p. 59-68.

Wakaumi H, Nakamura K, Matsumura T.

Development of an automated wheelchair guided by

a magnetic ferrite marker lane. J Rehabil Res Dev

1992 Winter;29(1):27-34.

Wakaumi H, Nakamura K, Matsumura T. A new

automated wheelchair guided by magnetic ferrite

marker lane. NEC Res Dev 1989 Oct;95:62-8.

Wakaumi H, Nakamura K, Matsumura T, Yamauchi F.

Automated wheelchair guided by magnetic ferrite

marker. In: Technology for the next decade.

RESNA ’89: proceedings of the 12th annual

conference; 1989 Jun 25-30; New Orleans, LA.

Washington (DC): RESNA Press; 1989. p. 47-8.

Warren CG. Powered mobility and its implications.

J Rehabil Res Dev Clin Suppl 1990;(2):74-85.

Wheelchair use and safety [videocassette]. Austin (TX):

Texas Department of Mental Health and Mental

Retardation, Richmond State School, Staff

Development; 1992. 1 videocassette: 11 min.,

sound, color, 1/2 in. Accompanied by: 1 guide.

White EA. Wheelchair stump boards and their use

with lower limb amputees. Br J Occup Ther 1992

May;55(5):174-8.

Whitmyer JJ. Dual axis positioning in space system to

reduce the effect of gravity on spinal curves. In:

Technology for the next decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 167-8.

Wilson AB Jr, McFarland SR. Types of wheelchairs.

J Rehabil Res Dev Clin Suppl 1990;(2):104-16.

Wolf LS, Massagli TL, Jaffe KM, Deitz J. Functional

assessment of the Joncare Hi Lo Master power

wheelchair for children. Phys Occup Ther Pediatr

1991;11(3):57-72.

Zimmerli F. [Cutting accurate pipe sections flexibly to

length]. Z Wirtsch Fert Autom 1991 Jun;86(6):

553-5. (Ger).

Uses

-Geriatric applications

Bryan JA 2d. Hazards of wheelchairs [letter]. N C

Med J 1990 Jan;51(1):58.

Burgio KL, Westley FP, Voss DJ. Increasing

ambulation in elderly clients of an adult day care

center. Clin Gerontol 1989;8(3):57-67.

Hartigan JD, Connolly TJ. Is "wheelchair wrist drop"

a new syndrome to watch for? Geriatrics 1990 Jun;

45(6):63-5, 68, 71.

Portnoy FL, Richards C, Roberts R. Wheelchair

karate. Geriatr Nurs (New York) 1989 Mar-Apr;

10(2):76-7.

Shaw G. Wheelchair seat comfort for the

institutionalized elderly. Assist Technol 1991;3(1):

11-23.

Shaw G, Taylor SJ. A survey of wheelchair seating

problems of the institutionalized elderly. Assist

Technol 1991;3(1):5-10.

Smithers JA. A wheelchair society: the nursing home

scene. J Aging Stud 1990 Fall;(4)3:261-75.

Specht J. Wheelchair clinic. J Gerontol Nurs 1992

May;18(5):47.

Vergauwen C, Drinka PJ, Larson P, Langer E. Lateral

chest roentgenograms in debilitated nursing home

residents. J Am Geriatr Soc 1990 Sep;38(9):

1023-4.

-Pediatric applications

Alexander MA, Demasco PW, Gilbert M, Miller LJ,

Nelson MR, Shah A. Rehabilitation technology

for disabled children. Phys Med Rehabil 1991 Jun;

5(2):365-87.

Amundson JS, Amundson SG. A joystick controlled

wheelchair. Biomed Sci Instrum 1991;27:131-3.

Ashmead S, Hunting D. Tiller steering on wheelchairs

for children and adults with unequal arm function.

Physiotherapy 1990 Apr;76(4):262-3.

Bar OO, Ward DS, Smith K, Longmuir P. The use of

rating of perceived exertion for exercise

prescription in wheelchair bound children and

young adults. Toronto: Ontario Ministry of

Tourism and Recreation; 1989. 37 p.

Butler C. Augmentative mobility: why do it? Phys

Med Rehabil Clin North Am 1991 Nov;2(4):

801-15.

Charney EB, Melchionni JB, Smith DR. Community

ambulation by children with myelomeningocele and

high-level paralysis. J Pediatr Orthop 1991

Sep-Oct;11(5):579-82.

Coelho AJ. A kinematic study of propulsive

techniques used by junior wheelchair athletes

[masters thesis]. Fresno (CA): California State

University; 1990. 55 p.

Deitz J, Jaffe KM, Wolf LS, Massagli TL, Anson D.

Pediatric power wheelchairs: evaluation of function

in the home and school environments. Assist

Technol 1991;3(1):24-31.

DiGaudio KM, Msall ME. Guidelines for safe

transportation of children in wheelchairs. Am J Dis

Child 1991 Jun;145(6):653-5.

Emmelot CH, van der Veldt J, Mengerink G.

Independent operation of electrical wheelchair by

severely disabled children. J Rehabil Sci 1992 Jun;

5(2):44-7.

Fife SE, Roxborough LA, Armstrong RW, Harris SR,

Gregson JL, Field D. Development of a clinical

measure of postural control for assessment of

adaptive seating in children with neuromotor

disabilities. Phys Ther 1991 Dec;71(12):981-93.

Published erratum appears in Phys Ther 1992 Jan;

72(1):41.

Green EM, Nelham RL. Development of sitting

ability, assessment of children with a motor

handicap and prescription of appropriate seating

systems. Prosthet Orthot Int 1991 Dec;15(3):

203-16.

Henke C. Funding to make the wheels turn round.

1990 wheelchair guide. Except Parent 1990 Mar;

20(2):8, 10-2.

Henke C. The mobility decision. 1990 wheelchair

guide. Except Parent 1990 Mar;20(2):5-8.

Herman L, Herman B. Elena and her technology.

Except Parent 1989 Oct;19(7):35-6.

Holt KS. Mobility aids and appliances for disabled

children. BMJ 1991 Jan 12;302(6768):105-7.

Jones CK. In search of power for the pediatric client.

Phys Occup Ther Pediatr 1990;10(2):47-68.

Kramer RA. Access to care for children and

adolescents with disabilities. Conn Med 1990 Aug;

54(8):428-30.

Liptak GS, Shyrtleff DB, Bloss JW, Baltus-Hebert E,

Manitta P. Mobility aids for children with high-

level myelomeningocele: parapodium versus

wheelchair. Dev Med Child Neurol 1992 Sep;

34(9):787-96.

Little J. Taking control of purchasing a wheelchair:

tips for parents about mobility equipment. Except

Parent 1991 Mar;21(2):36-8, 46, 50.

Luebben AJ, Young LJ. Retrofitting: an unnecessary

expense. In: Technology for the future decade.

RESNA ’89: proceedings of the 12th annual

conference: 1989 Jun 25-30; New Orleans, LA.

Washington (DC): RESNA Press; 1989. p. 304-5.

Mader B, Hart LA, Bergin B. Social

acknowledegments for children with disabilities:

effects of service dogs. Child Dev 1989 Dec;60(6):

1529-34.

McEwen IR. Assistive positioning as a control

parameter of social communicative interactions

between students with profound multiple disabilities

and classroom staff... including commentary by

Palisano RJ with author response. Phys Ther 1992

Sep;72(9):634-47.

McMillen, PH. A survey of transport for children in

wheelchairs. Br J Occup Ther 1992 May;55(5):

179-82.

O’Connell DG, Barnhart R, Parks L. Muscular

endurance and wheelchair propulsion in children

with cerebral palsy or myelomeningocele. Arch

Phys Med Rehabil 1992 Aug;73(8):709-11.

Thom H. [Prevention of hip dislocation in children

with spastic paralysis by using a specific

therapeutic wheelchair]. Rehabilitation (Stuttg)

1991 Aug;30(3):109-15. (Ger).

van Ross E. Pushchairs. Prosthet Orthot Int 1991

Apr;15(1):46-50.

Wilson PE, Washington RL. Pediatric wheelchair

athletics: sports injuries and prevention. Paraplegia

1993 May;31(5):330-7.

Wolf LS, Massagli TL, Jaffe KM, Deitz J. Functional

assessment of the Joncare Hi Lo Master power

wheelchair for children. Phys Occup Ther Pediatr

1991;11(3):57-72.

-Sports & recreation

Alexander MJL. Aspects of performance in

wheelchair marathon racing. CAHPER J 1989

Jan-Feb;55(1):26-32.

Apple DF Jr. Dreams [editorial]. Paraplegia 1991

Nov;29(9):569.

Arnold W, Israel S, Richter H. Sport mit

Rollstuhlfahrern. Leipzig (Germany): Barth; 1992.

207 p. (Ger).

Asken MJ. Sport psychology and the physically

disabled athlete: interview with Michael D.

Goodling, OTR/L. Sport Psychol 1989 Jun:166-76.

Axelson P, Castellano J. Take to the trails: everything

you ever wanted to know about off road

wheelchairs. Sports Spokes 1990 Jul-Aug;16(2):

20-4.

Banks LW. Heightening fan enjoyment: need a lift?

An invention helps spectators in wheelchairs follow

the action. Sports Illus 1991 Nov 25;75(23):28.

Bar OO, Ward DS, Smith K, Longmuir P. The use of

rating of perceived exertion for exercise

prescription in wheelchair bound children and

young adults. Toronto: Ontario Ministry of

Tourism and Recreation; 1989. 37 p.

Bernard PL, Chollet D, Peruchon E, Micallef JP.

Spine contraints in the paraplegic patient. Sci

Sports 1990;5(3):119-27.

Bhambhami YN, Holland LJ, Steadward RD.

Anaerobic threshold in wheelchair athletes with

cerebral palsy. Arch Phys Med Rehabil 1993 Mar;

74(3):305-11.

Bhambhani YN, Holland LJ, Steadward RD. Maximal

aerobic power in cerebral palsied wheelchair

athletes: validity and reliability. Arch Phys Med

Rehabil 1992 Mar;73(3):246-52.

Bishop P. Prevention and care of injuries in

wheelchair athletes. Palaestra 1990 Summer;6(4):

59-60.

Bishop P. Variables of wheelchair position for athletes

with cerebral palsy and amputation. Palaestra 1990

Summer;6(4):59.

Boulley G. Field events for wheelchair athletes. In:

Proceedings from the 3rd National Symposium for

Coaches of Physically Disabled Athletes; 1989;

Richmond, British Columbia, Canada. Edmonton

(Canada): Canadian Federation of Sports

Organizations for the Disabled; 1989. p. 7-9.

Brasile FM. Performance evaluation of wheelchair

athletes: more than a disability classification level

issue. Adapt Phys Activ Q 1990 Oct;7(4):289-97.

Brasile FM. Wheelchair sports: a new perspective on

integration. Adapt Phys Activ Q 1990 Jan;7(1):

3-11.

Brasile FM, Hedrick BN. A comparison of

participation incentives between adult and youth

wheelchair basketball players. Palaestra 1991

Summer;7(4):40-6.

Brasile FM, Kleiber DA, Harnisch D. Analysis of

participation incentives among athletes with and

without disabilities. Ther Recreation J 1991 1st Q;

25(1):18-33.

Burnham RS, May L, Nelson E, Steadward R, Reid

DC. Shoulder pain in wheelchair athletes. The role

of muscle imbalance. Am J Sports Med 1993

Mar-Apr;21(2):238-42.

Cardus D, McTaggart WG, Ribas-Cardus F, Donovan

WH. Energy requirements of gamefield exercises

designed for wheelchair-bound persons. Arch Phys

Med Rehabil 1989 Feb;70(2):124-7.

Carhill ME. Brad & Wendy Parks: making the dream

come true. Sports Spokes 1991 May-Jun;17(1):

42-5.

Carlson L. Promoting sports for young amputees.

Physician Sportsmed 1991 Jun;19(6):17-8.

Clark P. Special report: pushing a racing chair.

Sports Spokes 1989 Nov-Dec;15(4):18-9.

Coelho AJ. A kinematic study of propulsive

techniques used by junior wheelchair athletes

[masters thesis]. Fresno (CA): California State

University; 1990. 55 p.

Colino S. To climb every mountain: these wheelchairs

are designed to put disabled athletes on trails once

reserved for off-road vehicles. Sports Illus 1992

May 4;76(17):6, 10.

Cooper RA. Analysis of wheelchair track

performances [letter]. Med Sci Sports Exerc 1989

Apr;21(2):235-6.

Cooper RA. The contribution of selected

anthropometric and physiological variables to 10K

performance of wheelchair racers: a preliminary

study. J Rehabil Res Dev 1992 Summer;29(3):

29-34.

Cooper RA. An exploratory study of racing

wheelchair propulsion dynamics. Adapt Phys Activ

Q 1990 Jan;7(1):74-85.

Cooper RA. Force/energy optimization model for

wheelchair athletics. IEEE Trans Syst Man Cybern

1990 Mar-Apr;20(2):444-9.

Cooper RA. High-tech wheelchairs gain the

competitive edge. IEEE Eng Med Biol 1991 Dec;

10(4):49-55.

Cooper RA. An international track wheelchair with a

center of gravity directional controller. J Rehabil

Res Dev 1989 Spring;26(2):63-70.

Cooper RA. A new racing wheelchair front wheel

mounting mechanism. Palaestra 1990 Fall;6(5):

30-2.

Cooper RA. Racing wheelchair crown compensation.

J Rehabil Res Dev 1989 Winter;26(1):25-32.

Cooper RA. Racing wheelchair rear wheel alignment.

J Rehabil Res Dev 1989 Winter;26(1):47-50.

Cooper RA. System identification of human

performance models. IEEE Trans Syst Man Cybern

1991 Jan-Feb;21(1):244-52.

Cooper RA. System identification of human

performance parameters for competitive wheelchair

design [dissertation]. Santa Barbara (CA):

University of California, Santa Barbara; 1989.

261 p.

Cooper RA. A systems approach to the modeling of

racing wheelchair propulsion. J Rehabil Res Dev

1990 Spring;27(2):151-62.

Cooper RA. Technology and wheelchair sports.

Newsl Natl Wheelchair Athlet Assoc 1990 Fall:

17-8.

Cooper RA. Wheelchair racing sports science: a

review. J Rehabil Res Dev 1990 Summer;27(3):

295-312.

Cooper RA, Horvath SM, Bedi JF, Drechsler-Parks

DM, Williams RE. Maximal exercise response of

paraplegic wheelchair road racers. Paraplegia 1992

Aug;30(8):573-81.

Cooper RA, MacLeish M. Racing wheelchair roll

stability while turning: a simple model. J Rehabil

Res Dev 1992 Spring;29(2):23-30.

Coopoo Y, Du Toit SF. Endurance training of a wheel

chair athlete: a case study. S Afr J Res Sport Phys

Ed Recreat 1989;12(2):1-6.

Corbbett JJ. Principles and practices for championship

performances in wheelchair track events. In:

Grosse S, ed. Sport instruction for individuals with

disabilities: the best of practical pointers. Reston

(VA): American Alliance for Health, Physical

Education, Recreation and Dance; 1991. p. 144-65.

Corporate commitment: 10th National Veterans

Wheelchair Games. Paraplegia News 1990 May;

44(5):50-6.

Coutts KD. Dynamic characteristics of a sport

wheelchair. J Rehabil Res Dev 1991 Summer;

28(3):45-50.

Coutts KD. Dynamics of wheelchair basketball. Med

Sci Sports Exerc 1992 Feb;24(2):231-4.

Coutts KD. Kinematics of sport wheelchair

propulsion. J Rehabil Res Dev 1990 Winter;27(1):

21-6.

Coutts KD. Peak oxygen uptake of elite wheelchair

athletes. Adapt Phys Activ Q 1990 Jan;7(1):62-6.

Cox RH, Davis RW. Psychological skills of elite

wheelchair athletes. Palaestra 1992 Spring;8(3):

16-21.

Crase N. Behind the banner: PVA and S’nS work

together to promote sports and recreation for the

wheeler. Sports Spokes 1989 Mar-Apr;14(6):77-9.

Crase N. The impulse. Sports Spokes 1989 Jul-Aug;

15(2):29-30, 32-3.

Craven PL. The development from a medical

classification to a player classification in wheelchair

basketball. In: Doll-Tepper G, Dahms C, Doll B,

von Selzam H, eds. Adapted physical activity: an

interdisciplinary approach. Proceedings of the 7th

International Symposium; 1989 Jun; Berlin. New

York: Springer-Verlag; 1990. p. 81-6.

Crocker P, Bouffard M. Coping and participation of

physically disabled adults in physical activity.

CAHPER J 1990 Nov-Dec;56(6):28-33.

Curtis KA. Sport specific functional classification for

wheelchair athletes. Sports Spokes 1991 Jul-Aug:

45-8.

Davis GM, Shephard RJ. Strength training for

wheelchair users. Br J Sports Med 1990 Mar;

24(1):25-30.

Davis R, Gehlsen G, Wilkerson JD. Biomechanical

analysis of class II cerebral palsied wheelchair

athletes. Adapt Phys Activ Q 1990;7(1):52-61.

Desonai A, DePotter JC, Levarlet JH. Research on the

optimal rotation velocity by adjustment of the

tennis wheelchair. In: Doll-Tepper G, Dahms C,

Doll B, von Selzam H, eds. Adapted physical

activity: an interdisciplinary approach. Proceedings

of the 7th International Symposium; 1989 Jun;

Berlin. New York: Springer-Verlag; 1990.

p. 453-61.

Directory of national recreation organizations. Except

Parent 1991 Oct-Nov;21(7):44.

Eriksson P. Testing methods of wheelchair athletes.

In: Proceedings from a National Symposium for

Coaches of Physically Disabled Athletes,

Edmonton, Alberta. Gloucester (ON): Canadian

Federation of Sports Organizations for Disabled;

University of Alberta; 1989. p. 41-8.

Fabbri P. You just can’t keep Chuck down: paralyzed

by spina bifida, Chuck Roedelbronn is a world

champion wheelchair weightlifter. Sports Illus (SI

Sel Ed) 1991 Jul 3;74(21):12.

Factor E. The turtle: new wheelchair tracks on sand

and snow. Except Parent 1989 May-Jun;19(4):

52-3.

Fallon K. The disabled athlete. In: Bloomfield J, et

al., eds. Textbook of science and medicine in sport.

Melbourne (Australia): Blackwell; 1992.

p. 488-511.

Ferrara MS, Davis RW. Injuries to elite wheelchair

athletes. Paraplegia 1990 Jun;28(5):335-41.

Ferstle J, Stewart P. Wheelchair road racing

guidelines. Road Race Manage 1989 Oct;93:1,6-7.

Flaherty BP, Robinson CJ, Langbein WE, Kim Y,

Spelman FA. Interactive video games and real

time displays for the wheelchair aerobic fitness

trainer. In: Kim Y, Spelman FA, eds. Images of

the twenty-first century. Proceedings of the 11th

Annual International Conference of the IEEE

Engineering in Medicine and Biology Society; 1989

Nov 9-12; Seattle, WA. Vol. 6. Piscataway (NJ):

IEEE; 1989. p. 1735-6.

Forde J. Dancing on wheels. Nurs Times 1989

Aug 16-22;85(33):52-3.

Gayle GW, Pohlman RL, Glaser RM, Davis GM.

Cardiorespiratory and perceptual responses to arm

crank and wheelchair exercise using various

handrims in male paraplegics. Res Q Exerc Sport

1990 Sep;61(3):224-32.

Gehlsen GM, Karpuk J. Analysis of the NWAA

swimming classification system. Adapt Phys Activ

Q 1992 Apr;9(2):141-7.

Glaser RM. Arm exercise training for wheelchair

users. Med Sci Sports Exerc 1989 Oct;21(5 Suppl):

S149-57.

Glaser RM, Davis GM. Wheelchair dependent

individuals. In: Franklin BA, et al., eds. Exercise

in modern medicine. Baltimore: Williams &

Wilkins; 1989. p. 237-67.

Glickman S, Wachtel L. Scotball: a new game for

rehabilitation, leisure and integrated recreation.

Physiotherapy 1992 Jan;78(1):27-8.

Greenwood CM, Dzewaltowski DA. Self efficacy and

psychological well being of wheelchair tennis

participants and wheelchair nontennis participants.

Adapt Phys Activ Q 1990;7(1):12-21.

Hedrick B, Byrnes D, Shaver L. Wheelchair

basketball. Washington (DC): Paralyzed Veterans

of America; 1989. 145 p.

Hedrick B, Hedrick S. Women’s wheelchair

basketball. In: Hult JS, Trekell M, eds. A century

of women’s basketball: from frailty to final four.

Reston (VA): American Alliance for Health,

Physical Education, Recreation and Dance; 1991.

p. 367-78.

Hedrick B, Morse M. Getting the most from roller

training. Sports Spokes 1991 Mar-Apr;16(6):81-2.

Hedrick B, Morse MI. Guidelines for the

administration of a wheelchair roadrace division.

Urbana (IL): University of Illinois; 1989. 19 p.

Hedrick B, Wang YT, Moeinzadeh M, Adrian M.

Aerodynamic positioning and performance in

wheelchair racing. Adapt Phys Activ Q 1990;7(1):

41-51.

Hester R, Parks B. Teaching tennis to students with

disabilities. In: Grosse S, ed. Sport instruction for

individuals with disabilities: the best of practical

pointers. Reston (VA): American Alliance for

Health, Physical Education, Recreation and Dance;

1991. p. 202-16.

Higgs C. Wheelchair racquetball: a preliminary time

motion analysis. Adapt Phys Activ Q 1990 Oct;

7(4):370-4.

Higgs C. Wheeling in the wind: the effect of wind

velocity and direction on the aerodynamic drag of

wheelchairs. Adapt Phys Activ Q 1992 Jan;9(1):

74-87.

Higgs C, Babstock P, Buck J, Parsons C, Brewer J.

Wheelchair classification for track and field events:

a performance approach. Adapt Phys Activ Q

1990;7(1):22-40.

Hoeberigs JH, Debets-Eggen HB, Debets PM. Sports

medical experiences from the International Flower

Marathon for disabled wheelers. Am J Sports Med

1990 Jul-Aug;18(4):418-21.

Hooker SP, Wells CL. Aerobic power of competitive

paraplegic road racers. Paraplegia 1992 Jun;30(6):

428-36.

Hooper E. Quad rugby: the chance to compete.

Sports Spokes 1991 Mar-Apr;16(6):70-1.

Horvat M, Roswal G, Jacobs D, Gaunt S. Selected

psychological comparisons of able bodied and

disabled athletes. Phys Educ 1989;46:202-8.

Huber JH. Equity and safety in sport: a case study.

Palaestra 1989 Spring;5(3):64.

Huber JH. Instructing college students in use of

wheelchair and prosthetics. Palaestra 1989 Winter;

5(2):41-6.

Hunt SB. Relationships between meanings of work

and meanings of leisure among wheelchair

(basketball) athletes. Annu Ther Recreat 1991;2:

69-77.

Hunt SL, Lykins RJ. Sports editors perceptions of

their coverage and portrayal of wheelchair athletes

and wheelchair sports. Palaestra 1990 Summer;

6(4):24-6.

Hutzler Y. Motor control modalities of manually

propelled wheelchairs and their application in

wheelchair sports. In: Tenenbaum G, Eiger D, eds.

Coach education: proceedings of the Maccabiah-

Wingate International Congress; 1989; Wingate

Institute, Netanya, Israel. [Israel?]: The Emmanuel

Gill Publishing House; 1991. p. 91-102.

Ibusuki T, Kondo T, Soya H, Yagi H. Physiological

characteristics of wheelchair basketball players. In:

Kaneko M, ed. Fitness for the aged, disabled, and

industrial worker. Champaign (IL): Human Kinetics

Publishers; 1990. p. 164-8.

Jacobs D. A comparison between the psychological

profiles of wheelchair athletes, wheelchair

nonathletes, and able bodied athletes. Palaestra

1989 Spring;5(3):12.

Jacobs DP, Roswal GM, Horuat MA, Gorman DR. A

comparison between the psychological profiles of

wheelchair athletes, wheelchair nonathletes, and

able bodied athletes. In: Doll-Tepper G, Dahms C,

Doll B, von Selzam H, eds. Adapted physical

activity: an interdisciplinary approach. Proceedings

of the 7th International Symposium; 1989 Jun;

Berlin. New York: Springer-Verlag; 1990. p. 75-9.

Johnstone KS, Perrin JCS. Sports for the handicapped

child. Phys Med Rehabil 1991 Jun;5(2):331-50.

Kelley LE. Wheelchairs and assistive devices. In:

Winnick JP, ed. Adapted physical education and

sport. Champaign (IL): Human Kinetics Publ.;

1990. p. 109-20.

Knaus RL. Physiological and psychological benefits

of exercise for athletes with disabilities: an

interview with Gerorge Murray. J Osteopath Sports

Med 1989 Nov;3(4):25-7.

Knudson GA. The effect of a wheelchair sports

presentation on modifying attitudes of junior high

school students toward physically disabled persons

[master’s thesis]. Vancouver (BC): University of

British Columbia; 1990.

Kobayashi M, Hirano T, Fukunaga T. Evaluation of

physical fitness in paraplegic wheelchair basketball

players. In: Kaneko M, ed. Fitness for the aged,

disabled, and industrial worker. Champaign (IL):

Human Kinetics Publishers; 1990. p. 160-3.

Kober G. Practical experience in paraplegic

wheelchair sports. Rehabil GDR 1990;29(4):232-5.

Kuhn W, Deville A. Winter sports for wheelchair

users. In: Doll-Tepper G, Dahms C, Doll B, von

Selzam H, eds. Adapted physical activity: an

interdisciplinary approach. Proceedings of the 7th

International Symposium; 1989 Jun; Berlin. New

York: Springer-Verlag; 1990. p. 115-8.

Lasko-McCarthey P, Davis JA. Effect of work rate

increment on peak oxygen uptake during

wheelchair ergometry in men with quadriplegia.

Eur J Appl Physiol 1991;63(5):349-53.

Lasko-McCarthey P, Davis JA. Protocol dependency

of VO(2max) during arm cycle ergometry in males

with quadriplegia. Med Sci Sports Exerc 1991;

23(9):1097-1101.

Lee K. Coaching athletes in wheelchairs. Sports

Coach 1990 Jul-Sep;13(3):32-4.

Longo P. Chair golf. Good golf can be played from

any position. Some just take a little longer. Sports

Spokes 1989 Jul-Aug;15(2):35-8.

Madorsky JG, Scanlon JR, Smith B. Kung-Fu:

synthesis of wheelchair sport and self-protection.

Arch Phys Med Rehabil 1989 Jun;70(6):490-2.

Martinez SF. Medical concerns among wheelchair

road racers. Physician Sportsmed 1989 Feb;17(2):

63-6, 68.

Mathews P, Wu M. Choosing a sports or sports style

wheelchair. Indep Living 1991 Autumn;7(2):10-7.

McCormack DA, Reid DC, Steadward RD, Styrotuik

DG. Injury profiles in wheelchair athletes: results

of a retrospective survey. Clin J Sport Med 1991;

1(1):35-40.

McDonald M, Neal R, Abernethy P. Biomechanical

analysis of wheelchair propulsion. Queensland

(Australia): Sporting, Wheelies and Disabled and

Recreation Association of Queensland; 1989. 54 p.

Milner J. Wheelchair sports: Canada leading the way.

Rehabil Dig 1990 Summer;21(2):8-10.

Moore K. Hell on wheels. Craig Blanchette, the world

recorder holder in the wheelchair mile, has lifted

his demanding sport to a new level. Sports Illus

1989 Jul 17;71(3):44-6, 48, 50.

Myers S. Wheelchair tennis : pushing it to the limit.

Tennis Aust Asia Pac 1991 May;16(5):40-1, 43.

Nadeau M, Leveille P, Quessy M, Royer D. The

mechanical power output of world class wheelchair

athletes. In: Doll-Tepper G, Dahms C, Doll B, von

Selzam H, eds. Adapted physical activity: an

interdisciplinary approach. Proceedings of the 7th

International Symposium; 1989 Jun; Berlin. New

York: Springer-Verlag; 1990. p. 87-91.

Narol M. Softball coaches in wheelchairs? Yes and

no. Referee 1989 Mar;14(3):62-3.

Nause M. Getting fit is fun. Abilities 1990 Summer;

1(4):10-1.

1989 National Wheelchair Games qualifying meets and

standards. Sports Spokes 1989 Mar-Apr;14(6):

13-7.

Noden M. The athletes were on a roll in New

Orleans: the 10th National Veterans Wheelchair

Games were a display of courage and skill. Sports

Illus 1990 Sep 10;73(11):12, 15, 17.

Official rulebook of the National Wheelchair Athletic

Association. Colorado Springs (CO): National

Wheelchair Athletic Association; 1990.

Okuma H, Ogata H, Hatada K. Transition of physical

fitness in wheelchair marathon competitors over

several years. Paraplegia 1989 Jun;27(3):237-43.

Parmelly C. Wheelchair tennis. In: Proceedings from

the 3rd National Symposium for Coaches of

Physically Disabled Athletes, Richmond, B.C.,

1989. Edmonton (Canada): Canadian Federation of

Sports Organizations for Disabled; University of

Alberta; 1989. p. 1-6.

Paulsen P, French R, Sherrill C. Comparison of mood

states of college able-bodied and wheelchair

basketball players. Percept Mot Skills 1991 Oct;

73(2):396-8.

Paulsen P, French R, Sherrill C. Comparison of

wheelchair athletes and nonathletes on selected

mood states. Percept Mot Skills 1990 Dec;

71(3 Pt 2):1160-2.

Platt R. Wait until dark? Considerations on how long

the race course should remain open. Road Race

Manage 1990 Sep;104:4-6.

Pohlman RL, Gayle GW, Davis GM, Glaser RM.

Metabolic responses to maximal arm crank and

wheelchair ergometry in male paraplegics. Clin

Kinesiol 1989;43(4):89-95.

Porretta DL. Cerebral palsy, amputations, and other

orthopedic impairments. In: Winnick JP, ed.

Adapted physical education and sport. Champaign

(IL): Human Kinetics Publ.; 1990. p. 229-50.

Portnoy FL, Richards C, Roberts R. Wheelchair

karate. Geriatr Nurs (New York) 1989 Mar-Apr;

10(2):76-7.

Principles and practices for championship performances

in wheelchair field events. In: Grosse S, ed. Sport

instruction for individuals with disabilities: the best

of practical pointers. Reston (VA): American

Alliance for Health, Physical Education, Recreation

and Dance; 1991. p. 124-43.

Proceedings from a National Wheelchair Basketball

Symposium for Coaches, Athletes and Officials.

Edmonton (Canada): University of Alberta, Rick

Hansen Centre; 1990. 97 p.

Reach for the stars [videocassette]. Alder D, producer.

Vancouver (Canada): Mad Max Music; 1989.

1 videocassette: 22 min., sound, color, 1/2 in.

Reid M, Lawrie AT, Hunter J, Warren PM. The effect

of steering on the physiological energy cost of

wheelchair propulsion. Scand J Rehabil Med

1990;22(3):139-43.

Responses to maximal exercise in male paraplegics.

Palaestra 1990 Fall;6(4):57-8.

Robbins S. The Edge. Sports Spokes 1990 Jul-Aug;

16(2):16-9.

Robbins S. 9th annual survey of the lightweights... or,

how to solve the puzzle and find the right chair for

you. Sports Spokes 1991 Mar-Apr;16(6):22-50.

Robbins S. Video roundup. A guide to the latest

videotapes on wheelchair sports, recreation, and

fitness. Sports Spokes 1990 Nov-Dec;16(4):30-4,

36-7.

Ross CT. Illinois: court orders more study on

handicapped athlete’s ability to compete. Sports

Courts 1990;11(1):4-5.

Schaefer RS, Proffer DS. Sports medicine for

wheelchair athletes. Am Fam Physician 1989 May;

39(5):239-45.

Shake, rattle & roll: wheelchair dancing [videocassette].

Greenville (NC): East Carolina University, Center

for Health Sciences Audiovisual Communication;

1989. 1 videocassette: sound, color, 1/2 in.

Shephard RJ. Fitness in special populations.

Champaign (IL): Human Kinetics Publishers; 1990.

350 p.

Sherrill C, Hinson M, Gench B, Kennedy SO, et al.

Self concepts of disabled youth athletes. Percept

Mot Skills 1990 Jun;70(3 Pt 2):1093-8.

Sherrill C, Silliman L, Gench B, Hinson M. Self-

actualisation of elite wheelchair athletes. Paraplegia

1990 May;28(4):252-60.

Shuster DB, Britell CW. Disabling pain and injury in

road racers who use wheelchairs. In: Tenenbaum

G, Eiger D, eds. Coach education. Proceedings of

the Maccabiah-Wingate International Congress on

Sport & Coaching; Wingate Institute, Netanya,

Israel; 1989. Netanya (Israel): The Emmanuel Gill

Publishing House; 1991. p. 103-13.

Silliman LM, Sherrill C. Self actualization of

wheelchair athletes. Clin Kinesiol 1989 Jul-Sep;

43(3):77-82.

Smith R, Owen E. Wheelchair basketball: individual

skills and drills. In: Grosse S, ed. Sport instruction

for individuals with disabilities: the best of practical

pointers. Reston (VA): American Alliance for

Health, Physical Education, Recreation and Dance;

1991. p. 34-56.

Sport instruction for individuals with disabilities. The

best of practical pointers. Reston (VA): American

Alliance for Health, Physical Education, Recreation

and Dance; 1991. 321 p.

Steadward RD, Walsh CM, Gervais P. A kinematic

analysis of wheelchair propulsion. In: Doll-Tepper

G, Dahms C, Doll B, von Selzam H, eds. Adapted

physical activity: an interdisciplinary approach.

Proceedings of the 7th International Symposium;

1989 Jun; Berlin. New York: Springer-Verlag;

1990. p. 93-9.

Stombaugh B, Miller BB. Assisting the wheelchair

swimmer to enjoy the wave pool experience. Natl

Aquat J 1990 Spring;6(1):6-8.

Strohkendl H. Classification for wheelchair table

tennis. Palaestra 1989 Spring;5(3):49-52.

Sunderlin A. 7th annual survey of the lightweights.

Sports Spokes 1989 Mar-Apr;14(6):30-2, 34-6

passim.

Sunderlin A. 8th annual survey of the lightweights.

Sports Spokes 1990 Mar-Apr;15(6):24-6, 28-38

passim.

Thevenin Lemoine E, Le Nouvel P, Silber J. Le

marathon en fauteuil [Wheelchair marathon].

Cinesiologie (Paris) 1989 Nov-Dec;128:350-2

(Fre).

Thiboutot T, Curtis K. NWBA classification: the

player, coach, and classifier perspectives. Sports

Spokes 1990 May-Jun;16(1):46-7.

Vanlerberghe JOC, Gysemans L. Table tennis for

wheelchair users. In: Doll-Tepper G, Dahms C,

Doll B, von Selzam H, eds. Adapted physical

activity: an interdisciplinary approach. Proceedings

of the 7th International Symposium; 1989 Jun

25-30; Berlin. New York: Springer-Verlag; 1990.

p. 109-14.

Veeger HE, Hadj Yahmed M, van der Woude LH,

Charpentier P. Peak oxygen uptake and maximal

power output of Olympic wheelchair-dependent

athletes. Med Sci Sports Exerc 1991 Oct;23(10):

1201-9.

Veeger HE, van der Woude LH, Rozendal RH. Effect

of handrim velocity on mechanical efficiency in

wheelchair propulsion. Med Sci Sports Exerc 1992

Jan;24(1):100-7.

Veeger HE, van der Woude LH, Rozendal RH.

Wheelchair propulsion technique at different

speeds. Scand J Rehabil Med 1989;21(4):197-203.

Veeger HE, van der Woude LH, Rozendal RH.

Within-cycle characteristics of the wheelchair push

in sprinting on a wheelchair ergometer. Med Sci

Sports Exerc 1991 Feb;23(2):264-71.

Viger A. Wheelchair track & road racing. In:

Proceedings from the 3rd National Symposium for

Coaches of Physically Disabled Athletes; 1989;

Richmond, British Columbia, Canada. Edmonton

(Canada): Canadian Federation of Sports

Organizations for Disabled: University of Alberta;

1989. p. 87-9.

Wang YT. Relationship between kinematic factors and

muscle activity during wheelchair propulsion

[dissertation]. Champaign (IL): University of

Illinois at Urbana-Champaign; 1991. 238 p.

Watanabe KT, Cooper RA, Vosse AJ, Baldwin FD,

Robertson RN. Training practices of athletes who

participated in the National Wheelchair Athletic

Association training camps. Adapt Phys Activ Q

1992 Jul;9(3):249-60.

Weege RD. Technical and physical aspects as a

prerequisite for successful wheelchair sports. In:

Doll-Tepper G, Dahms C, Doll B, von Selzam H,

eds. Adapted physical activity: an interdisciplinary

approach. Proceedings of the 7th International

Symposium; 1989 Jun; Berlin. New York: Springer-

Verlag; 1990. p. 447-51.

Wells CL, Hooker SP. The spinal injured athlete.

Adapt Phys Activ Q 1990 Jul;7(3):265-85.

Wheelchair propulsion by class II athletes with cerebral

palsy: a quantitative look. Palaestra 1991 Spring;

7(3):12.

Wilbee B. People in sports: Jim Martinson. What it’s

all about. Sports Spokes 1991 Mar-Apr;16(6):16-9.

Williams R. Pulling no punches. Memory of an

incident with a wheelchair reveals just how much

we’ve changed in our perceptions of the disabled.

Running Times 1990 Sep;164:28-9.

Wilson PE, Washington RL. Pediatric wheelchair

athletics: sports injuries and prevention. Paraplegia

1993 May;31(5):330-7.

Zoerink DA. Exploring sport socialization

environments of persons with orthopedic

disabilities. Palaestra 1992 Spring;8(3):38-44.

Clinical Assessment & Effectiveness

Abdel-Moty E, Khalil TM. Computer-aided design

and analysis of the sitting workplace for the

disabled. Int Disabil Stud 1991 Oct-Dec;13(4):

121-4.

Arnold ME, Penn B. Expert systems and occupational

therapy. Br J Occup Ther 1990 Sep;53(9):365-8.

Bailey DM, DeFelice T. Evaluating movement for

switch use in an adult with severe physical and

cognitive impairments. Am J Occup Ther 1991

Jan;45(1):76-9.

Barbenel JC. Pressure management. Prosthet Orthot

Int 1991 Dec;15(3):225-31.

Bergen AF. The prescriptive wheelchair: an orthotic

device. In: O’Sullivan SB, Schmitz TJ. Physical

rehabilitation: assessment and treatment. 2nd ed.

Philadelphia: F.A. Davis; 1988. p. 615-28.

Blocker WP Jr. How to help your patient choose the

right wheelchair. Postgrad Med 1990 Oct;88(5):

243, 246, 251-2.

Britell CW. Wheelchair prescription. In: Kottke FJ,

Lehman JF. Krusen’s handbook of physical

medicine and rehabilitation. 4th ed. Philadelphia:

Saunders; 1990. p. 548-63.

Canale I, Felici F, Marchetti M, Ricci B. Ramp

length/grade prescriptions for wheelchair dependent

individuals. Paraplegia 1991 Sep;29(7):479-85.

Choosing a wheelchair system. J Rehabil Res Dev Clin

Suppl 1990;(2):1-116.

Cornall C. Self propelling wheelchairs: The effects on

spasticity in hemiplegic patients. Physiother

Theory Pract 1991;7(1):13-21.

Crenshaw RP, Vistnes LM. A decade of pressure sore

research: 1977-1987. J Rehabil Res Dev 1989

Winter;26(1):63-74.

Cupo M. Application of rehabilitation engineering for

a bilateral hemipelvectomy amputee with chronic

sacral decubitus ulcers. Clin Kinesiol 1991 Spring;

45(1):22-5.

Davis GM, Shephard RJ. Strength training for

wheelchair users. Br J Sports Med 1990 Mar;

24(1):25-30.

Franklin BA, Swantek KI, Grais SL, Johnstone KS,

Gordon S, Timmis GC. Field test estimation of

maximal oxygen consumption in wheelchair users.

Arch Phys Med Rehabil 1990 Jul;71(8):574-8.

Gordon J, Kauzlarich JJ, Thacker JG. Tests of two

new polyurethane foam wheelchair tires. J Rehabil

Res Dev 1989 Winter;26(1):33-46.

Krome RL. Electric wheelchair precautions [letter].

J Emerg Med 1991 Nov-Dec;9(6):511.

Martin GM, Gamble GL. Prescription writing in

physical medicine and rehabilitation. In: Kottke FJ,

Lehman JF. Krusen’s handbook of physical

medicine and rehabilitation. 4th ed. Philadelphia:

Saunders; 1990. p. 647-55.

McMahon M, Dudley NJ. General practitioners and

wheelchair prescribing. Br J Occup Ther 1992

May;55(5):183-5.

Norrgard L, Crimaldi E, Wylde M. AARP product

report on manual wheelchairs. Washington (DC):

American Association of Retired Persons; 1992.

Paquet JB. Wheelchair prescription. Clin Manage

1991 May-Jun;11(3):32-6.

Prosthetics Research and Development Center (US).

Office of Technology Transfer. Choosing a

wheelchair system. Washington (DC): Dept. of

Veterans Affairs, Veterans Health Services and

Research Administration, Rehabilitation Research

and Development Service, Prosthetics Research and

Development Center, Office of Technology

Transfer; 1990 Mar. 118 p. (Journal of rehabiliation

research and development; clinical supplement no.

2).

Todd BA. Finite element analysis of the stress

distribution within the seated and supine human

buttocks [dissertation]. Charlottesville (VA):

University of Virginia; 1992. 252 p.

Trefler E, Taylor SJ. Prescription and positioning:

evaluating the physically disabled individual for

wheelchair seating. Prosthet Orthot Int 1991 Dec;

15(3):217-24.

van Oers CAJM, van der Woude LHV, Roebroeck ME,

Rozendal RH. A failure diary for hand-propelled

wheelchairs. J Rehabil Sci 1991 Dec;4(4):123-33.

Webster JS, Cottam G, Gouvier WD, Blanton P, Beissel

GF, Wofford J. Wheelchair obstacle course

performance in right cerebral vascular accident

victims. J Clin Exp Neuropsychol 1989

Mar;11(2):295-310.

Werner R, Waring W, Davidoff G. Risk factors for

median mononeuropathy of the wrist in

postpoliomyelitis patients. Arch Phys Med Rehabil

1989 Jun;70(6):464-7.

White GW, Mathews RM, Fawcett SB. Reducing risk

of pressure sores: effects of watch prompts and

alarm avoidance on wheelchair push-ups. J Appl

Behav Anal 1989 Fall;22(3):287-95.

Wilson AB Jr. How to select and use manual

wheelchairs. Topping (VA): Rehabilitation Press;

1992. 67 p.

Wilson AB Jr. Wheelchairs: a prescription guide. 2nd

ed. New York: Demos Publications; 1992. 96 p.

Wolf LS, Massagli TL, Jaffe KM, Deitz J. Functional

assessment of the Joncare Hi Lo Master power

wheelchair for children. Phys Occup Ther Pediatr

1991;11(3):57-72.

Adverse Effects

Barbenel JC. Pressure management. Prosthet Orthot

Int 1991 Dec;15(3):225-31.

Bryan JA 2d. Hazards of wheelchairs [letter]. N C

Med J 1990 Jan;51(1):58.

Calder CJ, Kirby RL. Fatal wheelchair-related

accidents in the United States. Am J Phys Med

Rehabil 1990 Aug;69(4):184-90.

Chariots of fear: wheelchair-related accidents [editorial].

Lancet 1992 Nov 21;340(8830):1263.

Crenshaw RP, Vistnes LM. A decade of pressure sore

research: 1977-1987. J Rehabil Res Dev 1989

Winter;26(1):63-74.

Ernest M. Avoidable injuries [letter]. Can Med Assoc

J 1993 Mar 1;148(5):716.

Gray B, Hsu JD, Furumasu J. Fractures caused by

falling from a wheelchair in patients with

neuromuscular disease. Dev Med Child Neurol

1992 Jul;34(7):589-92.

Hartigan JD, Connolly TJ. Is "wheelchair wrist

drop" a new syndrome to watch for? Geriatrics

1990 Jun;45(6):63-5, 68, 71.

Krome RL. Electric wheelchair precautions [letter].

J Emerg Med 1991 Nov-Dec;9(6):511.

Odderson IR, Jaffe KM, Sleicher CA, Price R, Kropp

RJ. Gel wheelchair cushions: a potential cold

weather hazard. Arch Phys Med Rehabil 1991

Nov;72(12):1017-20.

van Oers CAJM, van der Woude LHV, Roebroeck ME,

Rozendal RH. A failure diary for hand-propelled

wheelchairs. J Rehabil Sci 1991 Dec;4(4):123-33.

White GW, Mathews RM, Fawcett SB. Reducing risk

of pressure sores: effects of watch prompts and

alarm avoidance on wheelchair push-ups. J Appl

Behav Anal 1989 Fall;22(3):287-95.

WALKERS

Ambulation aids. Health Devices 1991 Jan;20(1):5-22.

Ball NA, Stempien LM, Pasupuleti DV, Wertsch JJ.

Radial nerve palsy: a complication of walker usage.

Arch Phys Med Rehabil 1989 Mar;70(3):236-8.

Banta JV, Bell KJ, Muik EA, Fezio J. Parawalker:

energy cost of walking. Eur J Pediatr Surg 1991

Dec;1 Suppl 1:7-10.

Berko VG, Tomchuk VN, Shevchuk VI, Kisil’ IIu. [A

device used in early rehabilitation of invalids with

amputation defects of 4 extremities]. Ortop

Travmatol Protez 1989 Feb;(2):59-60. (Rus).

Cahan LD, Adams JM, Perry J, Beeler LM.

Instrumented gait analysis after selective dorsal

rhizotomy. Dev Med Child Neurol 1990

Dec;32(12):1037-43.

Caring for people at home. Aids to walking. Aust Fam

Physician 1989 Jul;18(7):860.

Deathe AB. Canes, crutches, walkers and wheelchairs:

a review of metabolic energy expenditure. Can J

Rehabil 1992 Summer;5(4):217-30.

Deathe AB, Hayes KC, Winter DA. The biomechanics

of canes, crutches, and walkers. Curr Rev Phys

Rehabil Med 1993;5(1):15-30.

Diaz Llopid I, Bea Munoz M, Martinez Agullo E,

Lopez Martinez A, Garcia Aymerich V, Forner

Valero JC. Ambulation in patients with

myelomeningocele: a study of 1500 patients.

Paraplegia 1993 Jan;31(1):28-32.

Dickstein R, Smolinski Z, Pillar T. Self-propelled

weight-relieving walker for gait rehabilitation.

J Biomed Eng 1992 Jul;14(4):351-5.

Dobrin L. Origin and evolution of the walkerette. Mt

Sinai J Med 1980 Mar-Apr;47(2):172-4.

Eblen C. An evaluation program examining two

experimental walkers. In: Technology for the future

decade. RESNA ’89: proceedings of the 12th

annual conference; 1989 Jun 25-30; New Orleans,

LA. Washington (DC): RESNA Press; 1989. p.

266-7.

Eblen C, Koeneman J. A multidimensional evaluation

of a four-wheeled walker. Assist Technol 1991;

3(1):32-7.

Franks CA, Palisano RJ, Darbee JC. The effect of

walking with an assistive device and using a

wheelchair on school performance in students with

myelomeningocele. Phys Ther 1991 Aug;71(8):

570-7; discussion 577-9.

Granat M, Keating JF, Smith AC, Delargy M, Andrews

BJ. The use of functional electrical stimulation to

assist gait in patients with incomplete spinal cord

injury. Disabil Rehabil 1992 Apr-Jun;14(2):93-7.

Graupe D. EMG pattern analysis for patient-

responsive control of FES in paraplegics for

walker-supported walking. IEEE Trans Biomed

Eng 1989 Jul;36(7):711-9.

Greiner BM, Czerniecki JM, Deitz JC. Gait

parameters of children with spastic diplegia: a

comparison of posterior and anterior walkers. Arch

Phys Med Rehabil 1993 Apr;74(4):381-5.

Hall J, Clarke AK. Walking frames [letter]. BMJ

1990 May 5;300(6733):1199.

Isakov E, Douglas R, Berns P. Ambulation using the

reciprocating gait orthosis and functional electrical

stimulation. Paraplegia 1992 Apr;30(4):239-45.

Johnson CF, Ericson AK, Caniano D. Walker related

burns in infants and toddlers. Pediatr Emerg Care

1990;6(1):58-61.

Joyce BM, Kirby RL. Canes, crutches and walkers.

Am Fam Physician 1991 Feb;43(2):535-42.

Kirshblum SC, Bach JR. Walker modification for

ventilator-assisted individuals. Case report. Am J

Phys Med Rehabil 1992 Oct;71(5):304-6.

Levangie PK, Guihan MF, Meyer P, Stuhr K. Effect

of altering handle position of a rolling walker on

gait in children with cerebral palsy. Phys Ther

1989 Feb;69(2):130-4.

Logan L, Byers-Hinkley K, Ciccone CD. Anterior

versus posterior walkers: a gait analysis study. Dev

Med Child Neurol 1990 Dec;32(12):1044-8.

Mahoney J, Euhardy R, Carnes M. A comparison of a

two-wheeled walker and a three-wheeled walker in

a geriatric population. J Am Geriatr Soc 1992

Mar;40(3):208-12.

McConnell EA. Using a stationary walker. Nursing

1992 Oct;22(10):75.

Moore P, Stallard J. A clinical review of adult

paraplegic patients with complete lesions using the

Orlau Parawalker. Paraplegia 1991 Mar;29(3):

191-6.

Mossberg KA, Linton KA, Friske K. Ankle-foot

orthoses: effect on energy expenditure of gait in

spastic diplegic children. Arch Phys Med Rehabil

1990 Jun;71(7):490-4.

Mulley G. Walking frames. BMJ 1990 Apr 7;

300(6729):925-7.

Nabizadeh SA, Hardee TB, TOwler MA, CHen VT,

Edlich RF. Technical considerations in the

selection and performance of walkers. J Burn Care

Rehabil 1993 Mar-Apr;14(2 Pt 1):182-8.

Nene AV, Jennings SJ. Hybrid paraplegic locomotion

with the ParaWalker using intramuscular

stimulation: a single subject study. Paraplegia 1989

Apr;27(2):125-32.

Nene AV, Jennings SJ. Physiological cost index of

paraplegic locomotion using the ORLAU

ParaWalker. Paraplegia 1992 Apr;30(4):246-52.

Nene AV, Kim Y, Spelman FA. An assessment of the

ORLAU ParaWalker-electrical stimulation hybrid

orthosis. In: Kim Y, Spelman FA, eds. Images of

the twenty-first century. Proceedings of the 11th

Annual International Conference of the IEEE

Engineering in Medicine and Biology Society; 1989

Nov 9-12; Seattle, WA. Vol 3. Piscataway (NJ):

IEEE; 1989. p. 1016-7.

Nene AV, Patrick JH. Energy cost of paraplegic

locomotion using the ParaWalker--electrical

stimulation "hybrid" orthosis. Arch Phys Med

Rehabil 1990 Feb;71(2):116-20.

Nene AV, Patrick JH. Energy cost of paraplegic

locomotion with the ORLAU ParaWalker.

Paraplegia 1989 Feb;27(1):5-18.

Ogilvie C, Bowker P, Rowley DI. The physiological

benefits of paraplegia orthotically aided walking.

Paraplegia 1993 Feb;31(2):111-5.

Phillips CA, Hendershot DM. Functional electrical

stimulation and reciprocating gait orthosis for

ambulation exercise in a tetraplegic patient: a case

study. Paraplegia 1991 May;29(4):268-76.

Phillips DP, Lindseth RE. Ambulation after transfer of

adductors, external oblique, and tensor fascia lata in

myelomeningocele. J Pediatr Orthop 1992

Nov-Dec;12(6):712-7.

Product comparison and evaluation: canes, crutches,

and walkers. Washington (DC): National

Rehabilitation Hospital, Rehabilitation Engineering

Center; 1990 Jun.

Richard JR. Gracias, Doctor. Am Fam Physician

1990 Dec;42(6):1520.

Sorock GS, Labiner DM. Peripheral neuromuscular

dysfunction and falls in an elderly cohort. Am J

Epidemiol 1992 Sep 1;136(5):584-91.

Stallard J, Henshaw JH, Lomas B, Poiner R. The

ORLAU VCG (variable centre of gravity) swivel

walker for muscular dystrophy patients. Prosthet

Orthot Int 1992 Apr;16(1):46-8.

Stallard J, Major R, Butler PB. The orthotic

ambulation performance of paraplegic

myelomeningocele children using the orlau

parawalker treatment system. Clin Rehabil 1991

May;5(2):111-4.

Stallard J, Major RE, Patrick JH. A review of the

fundamental design problems of providing

ambulation for paraplegic patients. Paraplegia 1989

Feb;27(1):70-5.

Thompson NP. Three-wheeled walkers [letter]. J Am

Geriatr Soc 1992 Jul;40(7):735-6.

Thompson-Rangel T, Smith S, Griner D. Customized

walker adations for a child with cerebral palsy.

J Assoc Child Prosthet Orthot Clin 1992 Winter;

27(3):97-103.

Toms J. Mobility and ambulatory aids. In: Scully RM,

Barnes MR, Canfield JS, et al., eds. Physical

therapy. Philadelphia: Lippincott; 1989. p. 1052-72.

Wright DL, Kemp TL. The dual-task methodology

and assessing the attentional demands of ambulation

with walking devices. Phys Ther 1992 Apr;72(4):

306-12; discussion 313-5.

Yuge M, Kanda T, Yamori Y, Fukase H. [The

comparison of motor developmental processes

between spastic diplegic children and athetotic

children who have been treated since infancy]. No

To Hattatsu 1991 Jul;23(4):342-7. (Jpn).

CANES

Basmajian JV. Crutch and cane exercises and use. In:

Basmajian JV, Wolf SL, eds. Therapeutic exercise.

Baltimore: Williams & Wilkins; 1990. p. 125-38.

Berg KO, Maki BE, Willaims JI, Hilliday PJ, Wood-

Dauphinee SL. Clinical and laboratory measures

of postural balance in an elderly population. Arch

Phys Med Rehabil 1992 Nov;73(11):1073-80.

Cheng CL, Lau S, Hui PW, Chow SP, Pun WK, Ng J,

Leong JC. Prognostic factors and progress for

ambulation in elderly patients after hip fracture.

Am J Phys Med Rehabil 1989 Oct;68(5):230-3.

Crosbie WJ, Nicol AC. Aided gait in rheumatoid

arthritis following knee arthroplasty. Arch Phys

Med Rehabil 1990 Apr;71(5):299-303.

Deathe AB. Canes, crutches, walkers and wheelchairs: a

review of metabolic energy expenditure. Can J

Rehabil 1992 Summer;5(4):217-30.

Deathe AB, Hayes KC, Winter DA. The biomechanics

of canes, crutches, and walkers. Curr Rev Phys

Rehabil Med 1993;5(1):15-30.

Dudley NJ. Aids for visual impairment. BMJ 1990

Nov 17;301(6761):1151-3.

Gerasimov AI. [A cane with a sliding-prevention

device]. Ortop Travmatol Protez 1991 Dec;(12):

47-9. (Rus).

Jantra P, Monga TN, Press JM, Gervais BJ.

Management of apraxic gait in a stroke patient.

Arch Phys Med Rehabil 1992 Jan;73(1):95-7.

McConnell EA. Teaching a patient to use a cane

correctly. Nursing 1991 Sep;21(9):83.

Milczarek JJ, Kirby RL, Harrison ER, MacLeod DA.

Standard and four-footed canes: their effect on the

standing balance of patients with hemiparesis.

Arch Phys Med Rehabil 1993 Mar;74(3):281-5.

Mossberg KA, Linton KA, Friske K. Ankle-foot

orthoses: effect on energy expenditure of gait in

spastic diplegic children. Arch Phys Med Rehabil

1990 Jun;71(7):490-4.

Neumann DA. Biomechanical analysis of selected

principles of hip joint protection. Arthritis Care

Res 1989 Dec;2(4):146-55.

Podsiadlo D, Richardson S. The timed "Up & Go": a

test of basic functional mobility for frail elderly

persons. J Am Geriatr Soc 1991 Feb;39(2):142-8.

Ragnarsson B, Mjoberg B. Arthrosis after surgically

treated acetabular fractures. A retrospective study of

60 cases. Acta Orthop Scand 1992 Oct;63(5):

511-4.

Reding MJ, McDowell FH. Focused stroke

rehabilitation programs improve outcome. Arch

Neurol 1989 Jun;46(6):700-1.

Saito S, Saito M, Nishina T, Ohzono K, Ono K.

Long-term results of total hip arthroplasty for

osteonecrosis of the femoral head. A comparison

with osteoarthritis. Clin Orthop 1989 Jul;(244):

198-207.

Sorock GS, Labiner DM. Peripheral neuromuscular

dysfunction and falls in an elderly cohort. Am J

Epidemiol 1992 Sep 1;136(5):584-91.

Tanton JH. Falls in elderly patients with glaucoma

[letter]. Arch Ophthalmol 1992 Feb;110(2):169-70.

Vargo MM, Robinson LR, Nicholas JJ. Contralateral

v ipsilateral cane use. Effects on muscles crossing

the knee joint. Am J Phys Med Rehabil 1992 Jun;

71(3):170-6.

CRUTCHES

Ambulation aids. Health Devices 1991 Jan;20(1):5-22.

Anderson LS, Davis RJ, Simonet M, Jewell ER,

Persson AV. New mechanism for disruption of

axillofemoral bypass [letter]. J Vasc Surg 1992

Jan;15(1):255-6.

Annesley AL, Almada-Norfleet M, Arnall DA,

Cornwall MW. Energy expenditure of ambulation

using the Sure-Gait crutch and the standard axillary

crutch. Phys Ther 1990 Jan;70(1):18-23.

Basford JR, Rhetta HL, Schleusner MP. Clinical

evaluation of the rocker bottom crutch.

Orthopedics 1990 Apr;13(4):457-60.

Basmajian JV. Crutch and cane exercises and use. In:

Basmajian JV, Wolf SL, eds. Therapeutic exercise.

Baltimore: Williams & Wilkins; 1990. p. 125-38.

Bauer DM, Finch DC, McGough KP, Benson CJ,

Finstuen K, Allison SC. A comparative analysis

of several crutch-length-estimation techniques.

Phys Ther 1991 Apr;71(4):294-300.

Bhambani Y, Clarkson H. Acute physiologic and

perceptual responses during three modes of

ambulation: walking, axillary crutch walking, and

running. Arch Phys Med Rehabil 1989 Jun;70(6):

445-50.

Bhambhani YN, Clarkson HM, Gomes PS. Axillary

crutch walking: effects of three training programs.

Arch Phys Med Rehabil 1990 Jun;71(7):484-9.

Cahan LD, Adams JM, Perry J, Beeler LM.

Instrumented gait analysis after selective dorsal

rhizotomy. Dev Med Child Neurol 1990 Dec;

32(12):1037-43.

Cavlak Y, Wylutzki G. [The use and advantages of

walking aids with shock absorbers]. Aktuel

Traumatol 1990 Apr;20(2):110-1. (Ger).

Cooley WC, Melkonian G, Moses C, Moeschler JB.

Autosomal dominant familial spastic paraplegia:

description of a large New England family and a

study of management. Dev Med Child Neurol

1990 Dec;32(12):1098-104.

Corwin D, Miller CA. Get your patient off on the

right foot. RN 1990 Nov;53(11):44-6.

Cowart J. Sport adaptations for students with crutches:

badminton, golf, archery, tennis. In: Grosse S, ed.

Sport instruction for individuals with disabilities:

the best of practical pointers. Reston (VA):

American Alliance for Health, Physical Education,

Recreation and Dance; 1991. p. 166-74.

Crosbie WJ, Nicol AC. Aided gait in rheumatoid

arthritis following knee arthroplasty. Arch Phys

Med Rehabil 1990 Apr;71(5):299-303.

Crosbie WJ, Nicol AC. Reciprocal aided gait in

paraplegia. Paraplegia 1990 Jul;28(6):353-63.

Crutchwalking: an overview for nurses [videocassette].

[Spokane (WA)]: I.C.N.E., Learning Resources

Unit; 1989. 1 videocassette: sound, color, 1/2 in.

Deathe AB. Canes, crutches, walkers and wheelchairs: a

review of metabolic energy expenditure. Can J

Rehabil 1992 Summer;5(4):217-30.

Deathe AB, Hayes KC, Winter DA. The biomechanics

of canes, crutches, and walkers. Curr Rev Phys

Rehabil Med 1993;5(1):15-30.

DeValles JH. Crutch walking and discharge

instructions [letter]. J Emerg Nurs 1989 Mar-Apr;

15(2 Pt 1):74-5.

Engebretsen L, Tegnander A. Short-term results of the

nonoperated isolated anterior cruciate ligament tear.

J Orthop Trauma 1990;4(4):406-10.

Franks CA, Palisano RJ, Darbee JC. The effect of

walking with an assistive device and using a

wheelchair on school performance in students with

myelomeningocele. Phys Ther 1991 Aug;71(8):

570-7; discussion 577-9.

Hall J, Clarke AC. Open-cuff crutches. Physiotherapy

1990 May;76(5):271.

Hall J, Elvins DM, Burke SJ, Ring EF, Clarke AK.

Heart rate evaluation of axillary and elbow

crutches. J Med Eng Technol 1991 Nov-Dec;

15(6):232-8.

Hjeltnes N, Lannem A. Functional neuromuscular

stimulation in 4 patients with complete paraplegia.

Paraplegia 1990 May;28(4):235-43.

Indelicato PA, Hermansdorfer J, Huegel M.

Nonoperative management of complete tears of the

medial collateral ligament of the knee in

intercollegiate football players. Clin Orthop 1990

Jul;(256):174-7.

Joyce BM, Kirby RL. Canes, crutches and walkers.

Am Fam Physician 1991 Feb;43(2):535-42.

Kirkwood CA, Granat MH, Andrews BJ.

Measurement of sway when using hand supports.

Med Biol Eng Comput 1991 Nov;29(6):601-2.

Lane PL, LeBlanc R. Crutch walking. Orthop Nurs

1990 Sep-Oct;9(5):31-8.

Liptak GS, Shyrtleff DB, Bloss JW, Baltus-Hebert E,

Manitta P. Mobility aids for children with high-

level myelomeningocele: parapodium versus

wheelchair. Dev Med Child Neurol 1992 Sep;

34(9):787-96.

Nielsen DH, Harris JM, Minton YM, Motley NS,

Rowley JL, Wadsworth CT. Energy cost, exercise

intensity, and gait efficiency of standard versus

rocker-bottom axillary crutch walking. Phys Ther

1990 Aug;70(8):487-93.

Ogilvie C, Bowker P, Rowley DI. The physiological

benefits of paraplegia orthotically aided walking.

Paraplegia 1993 Feb;31(2):111-5.

Okawa A, Kajiura I, Hiroshima K. Physical

therapeutic and surgical management in spastic

diplegia. A Japanese experience. Clin Orthop 1990

Apr;(253):38-44.

Parziale JR, Daniels JD. The mechanical performance

of ambulation using spring-loaded axillary crutches.

A preliminary report. Am J Phys Med Rehabil

1989 Aug;68(4):192-5.

Phillips DP, Lindseth RE. Ambulation after transfer of

adductors, external oblique, and tensor fascia lata in

myelomeningocele. J Pediatr Orthop 1992

Nov-Dec;12(6):712-7.

Potter BE, Wallace WA. Crutches. BMJ 1990 Nov 3;

301(6759):1037-9.

Pryor SR. Getting back on your feet: how to recover

mobility and fitness after injury or surgery to your

foot, leg, hip, or knee. Post Mills (VT): Chelsea

Green Pub. Co.; 1990. 215 p.

Roberts P, Carnes S. The orthopaedic scooter. An

energy-saving aid for assisted ambulation. J Bone

Joint Surg [Br] 1990 Jul;72(4):620-1.

Roberts P, Grimer RJ. Crutches [letter]. BMJ 1990

Dec 1;301(6763):1278.

Savvidis E, Loer F. [The magnitude of forces acting

on the proximal femur in various weight alleviating

gait forms with reduced ground reaction forces].

Z Orthop 1989 Jan-Feb;127(1):111-7. (Ger).

Street SA, Curl WW. Using standard crutches for

persons over seven feet tall. Athl Train 1991 Fall;

26(3):268-9.

Yrjonen T. Prognosis in Perthes disease after

noncontainment treatment. 106 hips followed for

28-47 years. Acta Orthop Scand 1992 Oct;63(5):

523-6.

FUNCTIONAL ELECTRICAL

STIMULATION & DEVICES

Abbas JJ, Chizeck HJ. Feedback control of coronal

plane hip angle in paraplegic subjects using

functional neuromuscular stimulation. IEEE Trans

Biomed Eng 1991 Jul;38(7):687-98.

Akazawa K, Makikawa M, Kawamura J, Aoki H.

Functional neuromuscular stimulation system using

an implantable hydroxyapatite connector and a

microprocessor-based portable stimulator. IEEE

Trans Biomed Eng 1989 Jul;36(7):746-53.

Alm AC, Triolo RJ, Kobetic R, Smith B, Buckett JR,

Borges G, Kim Y, Spelman FA. The design of

output stage circuitry for constant current

neuromuscular stimulation. In: Kim Y, Spelman

FA, eds. Images of the twenty-first century.

Proceedings of the 11th Annual International

Conference of the IEEE Engineering in Medicine

and Biology Society; 1989 Nov 9-12; Seattle, WA.

Vol. 3. Piscataway (NJ): IEEE; 1989. p. 1051-2.

Anciaux M, Lenaert A, Van Beneden ML, Blonde W,

Vercauteren M. Transcutaneous electrical

stimulation (TCES) for the treatment of adolescent

idiopathic scoliosis: preliminary results. Acta

Orthop Belg 1991;57(4):399-405.

Andrews BJ, Barnett RW, Phillips GF, Kirkwood CA,

Donaldson N, Rushton DN, Perkins TA. Rule-

based control of a hybrid FES orthosis for assisting

paraplegic locomotion. Automedica 1989;11:

175-99.

Andrews BJ, Cobelli C, Mariani L. Rule based control

of hybrid FES orthoses. In: Cobelli C, Mariani L,

eds. Modelling and control in biomedical systems:

selected papers from the 1st IFAC Symposium;

1988 Apr 6-8; Venice, Italy. Oxford: Pergamon

Press; 1989. p. 287-94.

Andrews BJ, Kirkwood CA, Kim Y, Spelman FA.

Control of hybrid FES orthoses. In: Kim Y,

Spelman FA, eds. Images of the twenty-first

century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Vol. 5. Piscataway (NJ): IEEE; 1989.

p. 1473-4.

Arnold PB, McVey PP, Farrell WJ, Deurloo TM,

Grasso AR. Functional electric stimulation: its

efficacy and safety in improving pulmonary

function and musculoskeletal fitness. Arch Phys

Med Rehabil 1992 Jul;73(7):665-8.

Bajd T, Kralj A, Turk R, Benko H. Symmetry of FES

responses in the lower extremities of paraplegic

patients. J Biomed Eng 1990 Sep;12(5):415-8.

Bajd T, Kralj A, Turk R, Benko H, Sega J. Use of

functional electrical stimulation in the rehabilitation

of patients with incomplete spinal cord injuries.

J Biomed Eng 1989 Mar;11(2):96-102.

Barbenel JC, Paul JP. Bioengineering developments

for paraplegic patients. Paraplegia 1992 Jan;30(1):

61-4.

Barnett RW. Paraplegic standing and reciprocal gait

using a floor reaction hybrid F.E.S. orthosis

[dissertation]. Glasgow (UK): University of

Strathclyde; 1990. 174 p.

Block JE, Steinbach LS, Friedlander AL, Steiger P,

Ellis W, Morris JM, Genant HK. Electrically-

stimulated muscle hypertrophy in paraplegia:

assessment by quantitative CT. J Comput Assist

Tomogr 1989 Sep-Oct;13(5):852-4.

Bogataj U, Gros N, Malezic M, Kelih B, Kljajic M,

Acimovic R. Restoration of gait during two to

three weeks of therapy with multichannel electrical

stimulation. Phys Ther 1989 May;69(5):319-27.

Borges G, Ferguson K, Kobetic R. Development and

operation of portable and laboratory electrical

stimulation systems for walking in paraplegic

subjects. IEEE Trans Biomed Eng 1989 Jul;36(7):

798-801.

Bremner LA, Sloan KE, Day RE, Scull ER, Ackland T.

A clinical exercise system for paraplegics using

functional electrical stimulation. Paraplegia 1992

Sep;30(9):647-55.

Carroll SG, Bird SF, Brown DJ. Electrical stimulation

of the lumbrical muscles in an incomplete

quadriplegic patient: case report. Paraplegia 1992

Mar;30(3):223-6.

Carroll SG, Triolo RJ, Chizeck HJ, Kobetic R,

Marsolais EB. Tetanic responses of electrically

stimulated paralyzed muscle at varying interpulse

intervals. IEEE Trans Biomed Eng 1989 Jul;

36(7):644-53. Published erratum appears in IEEE

Trans Biomed Eng 1989 Nov;36(11):1143.

Chizeck HJ, Lan N, Palmieri LS, Crago PE. Feedback

control of electrically stimulated muscle using

simultaneous pulse width and stimulus period

modulation. IEEE Trans Biomed Eng 1991 Dec;

38(12):1224-34.

Cioni B, Meglio M, Prezioso A, Talamonti G, Tirendi

M. Spinal cord stimulation (SCS) in spastic

hemiparesis. PACE Pacing Clin Electrophysiol

1989 Apr;12(4 Pt 2):739-42.

Cioni B, Meglio M, Zamponi A. Effect of spinal cord

stimulation on motor performances in hemiplegics.

Stereotact Funct Neurosurg 1989;52(1):42-52.

A compendium of rehabilitation technology research

supported by NIDRR: national workshop on

rehabilitation technology; 1990 Oct 3-4;

Washington, DC. Washington (DC): Electronic

Industries Foundation, Rehabilitation Center; 1990.

278 p.

Crago PE, Nakai RJ, Chizeck HJ. Feedback regulation

of hand grasp opening and contact force during

stimulation of paralyzed muscle. IEEE Trans

Biomed Eng 1991 Jan;38(1):17-28.

Debnath N, Anand A, Guha SK. Electrical current

distribution analysis for functional electrical

stimulation (FES) of paraplegics. Automedica 1989;

11(1-3):5-13.

Delitto A, Snyder-Mackler L. Two theories of muscle

strength augmentation using percutaneous electrical

stimulation. Phys Ther 1990 Mar;70(3):158-64.

Durfee WK, Hausdorff JM. Regulating knee joint

position by combining electrical stimulation with a

controllable friction brake. Ann Biomed Eng 1990;

18(6):575-96.

Durfee WK, Mariano TR, Zahradnik JL. Simulator for

evaluating shoulder motion as a command source

for FES grasp restoration systems. Arch Phys Med

Rehabil 1991 Dec;72(13):1088-94.

Durham JW, Moskowitz A, Whitney J. Surface

electrical stimulation versus brace in treatment of

idiopathic scoliosis. Spine 1990 Sep;15(9):888-92.

Edwards BG, Marsolais EB. Energy costs of

ambulation with reciprocal gait orthosis, electrical

stimulation, long leg braces and hybrids: A case

study. Clin Kinesiol 1990;44(2):43-7.

Edwards BG, Marsolais EB. Metabolic responses to

arm ergometry and functional neuromuscular

stimulation. J Rehabil Res Dev 1990 Spring;27(2):

107-13; discussion 113-4.

Ewins DJ. Investigation into the restoration of simple

standing and walking function for mid-low thoracic

paraplegics through the use of electrical stimulation

[dissertation]. Claverton Down (UK): University of

Bath; 1990. 447 p.

Ezenwa BN, Glaser RM, Couch W, Figoni SF, Rodgers

MM. Adaptive control of functional

neuromuscular stimulation-induced knee extension

exercise. J Rehabil Res Dev 1991 Fall;28(4):1-8.

Ezenwa BN, Reynolds DB, Rowley BA.

Characterization of the lower limb of quadriplegics

for the design of a controller for funtional electrical

stimulation. Automedica 1989;11(1-3):43-52.

Ferguson ACB, Granat MH. Evaluation of functional

electrical stimulation for an incomplete spinal cord

injured patient. Physiotherapy 1992

Apr;78(4):253-6.

Figoni SF. Exercise responses and quadriplegia. Med

Sci Sports Exerc 1993 Apr;25(4):433-41.

Fujita K, Noguchi T, Minamitani H, Tomatsu T.

[Feedback control method for paraplegic standing

by functional electrical stimulation]. Trans Inst

Electr Inf Commun Eng;1992 Apr;J75D-II(4):

791-8. (Jpn).

Granat M, Keating JF, Smith AC, Delargy M, Andrews

BJ. The use of functional electrical stimulation to

assist gait in patients with incomplete spinal cord

injury. Disabil Rehabil 1992 Apr-Jun;14(2):93-7.

Granat MH, Heller BW, Nicol DJ, Baxendale RH,

Andrews BJ. Improving limb flexion in FES gait

using the flexion withdrawal response for the spinal

cord injured person. J Biomed Eng 1993 Jan;15(1):

51-6.

Graupe D. EMG pattern analysis for patient-

responsive control of FES in paraplegics for

walker-supported walking. IEEE Trans Biomed

Eng 1989 Jul;36(7):711-9.

Handa Y, Handa T, Ichie M, Murakami H, Hoshimiya

N, Ishikawa S, Ohkubo K. Functional electrical

stimulation (FES) systems for restoration of motor

function of paralyzed muscles--versatile systems

and a portable system. Front Med Biol Eng

1992;4(4):241-55.

Handa Y, Hoshimiya N, Kim Y, Spelman FA.

Multichannel FES for motor control of the disabled.

In: Kim Y, Spelman FA, eds. Images of the twenty-

first century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Vol. 3. Piscataway (NJ): IEEE; 1989.

p. 1002-3.

Handa Y, Ohkubo K, Hoshimiya N. A portable multi-

channel FES system for restoration of motor

function of the paralyzed extremities. Automedica

1989;11:221-31.

Hatwell MS, Oderkerk BJ, Sacher CA, Inbar GF. The

development of a model reference adaptive

controller to control the knee joint of paraplegics.

IEEE Trans Automat Control 1991 Jun;36(6):

683-91.

Hausdorff JM, Durfee WK. Open-loop position

control of the knee joint using electrical stimulation

of the quadriceps and hamstrings. Med Biol Eng

Comput 1991 May;29(3):269-80.

Hirokawa S. [Energy consumption of paraplegics-

ambulation-relation between the application of

functional electrical stimulation and energy

consumption]. Jpn J Med Electr Biol Eng 1991

Mar;29(1):1-8. (Jpn).

Hirokawa S, Grimm M, Le T, Solomonow M, Baratta

RV, Shoji H, D’Ambrosia RD. Energy

consumption in paraplegic ambulation using the

reciprocating gait orthosis and electric stimulation

of the thigh muscles. Arch Phys Med Rehabil 1990

Aug;71(9):687-94.

Hjeltnes N, Lannem A. Functional neuromuscular

stimulation in 4 patients with complete paraplegia.

Paraplegia 1990 May;28(4):235-43.

Hooker SP, Figoni SF, Glaser RM, Rodgers MM,

Ezenwa BN, Faghri PD. Physiologic responses to

prolonged electrically stimulated leg-cycle exercise

in the spinal cord injured. Arch Phys Med Rehabil

1990 Oct;71(11):863-9.

Hooker SP, Figoni SF, Rodgers MM, Glaser RM,

Mathews T, Suryaprasad AG, Gupta SC.

Physiologic effects of electrical stimulation leg

cycle exercise training in spinal cord injured

patients. Arch Phys Med Rehabil 1992 May;73(5):

470-6.

Hoshimiya N, Handa Y. A master-slave type multi-

channel functional electrical stimulation (FES)

system for the control of the parlyzed extremities.

Automedica 1989;11:209-20.

Hoshimiya N, Naito A, Yajima M, Handa Y. A

multichannel FES system for the restoration of

motor functions in high spinal cord injury patients:

a respiration-controlled system for multijoint upper

extremity. IEEE Trans Biomed Eng 1989 Jul;

36(7):754-60.

Ichie M, Handa T, Handa Y, Hoshimiya N, Naito A,

Ushikoshi K, Fukamachi H, Yajima M, Ito T, Kim

Y, Spelman FA. Control of locomotion by multi-

channel portable FES system. In: Kim Y, Spelman

FA, eds. Images of the twenty-first century.

Proceedings of the 11th Annual International

Conference of the IEEE Engineering in Medicine

and Biology Society; 1989 Nov 9-12, Seattle, WA.

Vol. 3. Piscataway (NJ): IEEE; 1989. p. 1018-9.

Iguchi Y, Fujita K, Minamitani H. [Closed-loop

control of FES joint movement with feed-forward

element]. Trans Inst Electr Inf Commun Eng 1990

Oct;J73D-II(10):1813-6. (Jpn).

Isakov E, Douglas R, Berns P. Ambulation using the

reciprocating gait orthosis and functional electrical

stimulation. Paraplegia 1992 Apr;30(4):239-45.

Ishal VA. [Possibilities of conservative treatment of

scoliosis]. Ortop Travmatol Protez 1990 Mar;(3):

74-7. (Rus).

Jaeger RJ, Yarkony GM, Roth EJ, Lovell L.

Estimating the user population of a simple electrical

stimulation system for standing. Paraplegia 1990

Oct;28(8):505-11.

Jaeger RJ, Yarkony GM, Smith RM. Standing the

spinal cord injured patient by electrical stimulation:

refinement of a protocol for clinical use. IEEE

Trans Biomed Eng 1989 Jul;36(7):720-8.

Javidan M, Elek J, Prochazka A. Attenuation of

pathological tremors by functional electrical

stimulation. II: Clinical evaluation. Ann Biomed

Eng 1992;20(2):225-36.

Karmel-Ross K, Cooperman DR, Van Doren CL. The

effect of electrical stimulation on quadriceps

femoris muscle torque in children with spina bifida.

Phys Ther 1992 Oct;72(10):723-30.

Kazmin AI, Belenkii VE, Cherkashov AM. [Electric

stimulation of spinal muscles during walking as a

method of the treatment of scoliosis]. Ortop

Travmatol Protez 1990 Nov;(11):1-5. (Rus).

Keith MW, Peckham PH, Thrope GB, Buckett JR,

Stroh KC, Menger V. Functional neuromuscular

stimulation neuroprostheses for the tetraplegic hand.

Clin Orthop 1988 Aug;(233):25-33.

Keith MW, Peckham PH, Thrope GB, Stroh KC, Smith

B, Buckett JR, Kilgore KL, Jatich JW.

Implantable functional neuromuscular stimulation in

the tetraplegic hand. J Hand Surg [Am] 1989 May;

14(3):524-30.

Khang G, Zajac FE. Paraplegic standing controlled by

functional neuromuscular stimulation: Part I--

computer model and control-system design. IEEE

Trans Biomed Eng 1989 Sep;36(9):873-84.

Khang G, Zajac FE. Paraplegic standing controlled by

functional neuromuscular stimulation: Part II--

Computer simulation studies. IEEE Trans Biomed

Eng 1989 Sep;36(9):885-94.

Kilgore KL, Peckham PH, Keith MW, Thrope GB.

Electrode characterization for functional application

to upper extremity FNS. IEEE Trans Biomed Eng

1990 Jan;37(1):12-21.

Kilgore KL, Peckham PH, Thrope GB, Keith MW,

Gallaher-Stone KA. Synthesis of hand grasp using

functional neuromuscular stimulation. IEEE Trans

Biomed Eng 1989 Jul;36(7):761-70.

Kim Y, Spelman FA, eds. Images of the twenty-first

century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Piscataway (NJ): IEEE; 1989. 6 vols.

Kirkwood CA, Andrews BJ, Kim Y, Spelman FA.

Finite state control of FES systems: application of

AI inductive learning techniques. In: Kim Y,

Spelman FA, eds. Images of the twenty-first

century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Vol. 3. Piscataway (NJ): IEEE; 1989.

p. 1020-1.

Kirtley C. Control of functional electrical stimulation

with extended physiological proprioception

[dissertation]. Glasgow (UK): University of

Strathclyde; 1989. 167 p.

Kirtley C, Andrews BJ. Control of functional

electrical stimulation with extended physiological

proprioception. J Biomed Eng 1990 May;12(3):

183-8.

Koubek RJ, Phillips CA, Allread WG, Barnaba JE,

McClain JE, Kim Y, Spelman FA. The effects of

training on a vibrotacticle cognitive feedback

system. In: Kim Y, Spelman FA, eds. Images of

the twenty-first century. Proceedings of the 11th

Annual International Conference of the IEEE

Engineering in Medicine and Biology Society; 1989

Nov 9-12; Seattle, WA. Vol. 5. Piscataway (NJ):

IEEE; 1989. p. 1518-9.

Kraft GH, Fitts SS, Hammond MC. Techniques to

improve function of the arm and hand in chronic

hemiplegia. Arch Phys Med Rehabil 1992 Mar;

73(3):220-7.

Kubo K, Itakura N, Iguchi Y, Fujita K. Disturbance

suppression on two joints controller using FES with

antagonist muscle stiffness control. Syst Comput

Jpn 1992;23(7):56-65.

Malezic M, Bogataj U, Gros N, Decman I, Vrtacnik P,

Kljajic M, Acimovic-Janezic R. Application of a

programmable dual-channel adaptive electrical

stimulation system for the control and analysis of

gait. J Rehabil Res Dev 1992 Fall;29(4):41-53.

Marsolais EB, Kim Y, Spelman FA. FNS application

for restoring function in stroke patients. In: Kim Y,

Spelman FA, eds. Images of the twenty-first

century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Vol. 3. New York: IEEE; 1989.

p. 829-30.

McDowell CL, Rago TA, Gonzalez SM. Tetraplegia.

Hand Clin 1989 Aug;5(3):343-8.

Merletti R, Knaflitz M, DeLuca CJ. Electrically

evoked myoelectric signals. Crit Rev Biomed Eng

1992;19(4):293-340.

Miller LJ, Peckham PH, Keith MW. Elbow extension

in the C5 quadriplegic using functional

neuromuscular stimulation. IEEE Trans Biomed

Eng 1989 Jul;36(7):771-80.

Mulder AJ, Hermens HJ, Janssen F, Zilvold G. A

low-cost FES exercise bicycle for training

paraplegics at home. J Med Eng Technol 1989

Jan-Apr;13(1-2):90-2.

Mulder AJ, Veltink PH, Boom HB. On/off control in

FES-induced standing up: a model study and

experiments. Med Biol Eng Comput 1992 Mar;

30(2):205-12.

Mulder AJ, Veltink PH, Boom HB, Zilvold G. Low-

level finite state control of knee joint in paraplegic

standing. J Biomed Eng 1992 Jan;14(1):3-8.

Nash RS, Davy MS, Orpwood R, Swain ID.

Development of a wheelchair-mounted folding

standing frame. J Biomed Eng 1990 May;12(3):

189-92.

Nathan RH. FNS of the upper limb: targeting the

forearm muscles for surface stimulation. Med Biol

Eng Comput 1990 May;28(3):249-56.

Nathan RH. An FNS-based system for generating

upper limb function in the C4 quadriplegic. Med

Biol Eng Comput 1989 Nov;27(6):549-56.

Nathan RH, Ohry A. Upper limb functions regained

in quadriplegia: a hybrid computerized

neuromuscular stimulation system. Arch Phys Med

Rehabil 1990 May;71(6):415-21.

Nene AV, Jennings SJ. Hybrid paraplegic locomotion

with the ParaWalker using intramuscular

stimulation: a single subject study. Paraplegia 1989

Apr;27(2):125-32.

Nene AV, Kim Y, Spelman FA. An assessment of the

ORLAU ParaWalker-electrical stimulation hybrid

orthosis. In: Kim Y, Spelman FA, eds. Images of

the twenty-first century. Proceedings of the 11th

Annual International Conference of the IEEE

Engineering in Medicine and Biology Society; 1989

Nov 9-12; Seattle, WA. Vol 3. Piscataway (NJ):

IEEE; 1989. p. 1016-7.

Nene AV, Patrick JH. Energy cost of paraplegic

locomotion using the ParaWalker--electrical

stimulation "hybrid" orthosis. Arch Phys Med

Rehabil 1990 Feb;71(2):116-20.

Oderkerk BJ, Inbar GF. Walking cycle recording and

analysis for FNS-assisted paraplegic walking. Med

Biol Eng Comput 1991 Jan;29(1):79-83.

Patterson RP, Lockwood JS, Dykstra DD. A

functional electric stimulation system using an

electrode garment. Arch Phys Med Rehabil 1990

Apr;71(5):340-2.

Peckham PH, Creasey GH. Neural prostheses: clinical

applications of functional electrical stimulation in

spinal cord injury. Paraplegia 1992 Feb;30(2):

96-101.

Petrofsky JS, Smith J. A combined computer-

controlled walking and exercise system. J Clin Eng

1991 May-Jun;16(3):223-35.

Petrofsky JS, Smith JB. Physiologic costs of

computer-controlled walking in persons with

paraplegia using a reciprocating-gait orthosis. Arch

Phys Med Rehabil 1991 Oct;72(11):890-6.

Pettine KA, Salib RM, Walker SG. External electrical

stimylation and bracing for treatment of

spondylolysis. A case report. Spine 1993 Mar 15;

18(4):436-9.

Philips CA, Hendershot D, Elzayat S, Granek H,

Granek M, Kim Y, Spelman FA. A systems

approach to physician prescribed FES ambulation.

In: Kim Y, Spelman FA, eds. Images of the twenty-

first century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; Nov 9-12;

Seattle, WA. Vol. 5. Piscataway (NJ): IEEE; 1989.

p. 1492-3.

Philips CA, Koubek RJ, Hendershot DM. Walking

while using a sensory tactile feedback system:

potential use with a functional electrical

stimulation orthosis. J Biomed Eng 1991

Mar;13(2):91-6.

Phillips CA. Electrical muscle stimulation in

combination with a reciprocating gait orthosis for

ambulation by paraplegics. J Biomed Eng 1989

Jul;11(4):338-44.

Phillips CA. Functional electrical rehabilitation:

technological restoration after spinal cord injury.

New York: Springer-Verlag; 1991. 209 p.

Phillips CA. Functional electrical stimulation and

lower extremity bracing for ambulation exercise of

the spinal cord injured individual: a medically

prescribed system. Phys Ther 1989 Oct;69(10):

842-9.

Phillips CA. An interactive system of electronic

stimulators and gait orthosis for walking in the

spinal cord injured. Automedica 1989;11:247-61.

Phillips CA, Hendershot DM. Functional electrical

stimulation and reciprocating gait orthosis for

ambulation exercise in a tetraplegic patient: a case

study. Paraplegia 1991 May;29(4):268-76.

Phillips CA, Hendershot DM. A systems approach to

medically prescribed functional electrical

stimulation. Ambulation after spinal cord injury.

Paraplegia 1991 Oct;29(8):505-13.

Phillips CA, Hendershot DM, Koubek RJ. Technology

transfer of a system for medically prescribed FES

walking exercise. J Clin Eng 1992 Jan-

Feb;17(1):69-77.

Pollack SF, Axen K, Spielholz N, Levin N, Haas F,

Ragnarsson KT. Aerobic training effects of

electrically induced lower extremity exercises in

spinal cord injured people. Arch Phys Med Rehabil

1989 Mar;70(3):214-9.

Popovic DJ, ed. Advances in external control of human

extremities. Belgrade: Nauka; 1990. 616 p.

Popovic D, Tomovic R, Schwirtlich L. Hybrid

assistive system--the motor neuroprosthesis. IEEE

Trans Biomed Eng 1989 Jul;36(7):729-37.

Prochazka A, Davis LA. Clinical experience with

reinforced, anchored intramuscular electrodes for

functional neuromuscular stimulation. J Neurosc

Meth 1992 May;42(3):175-84.

Quintern J, Minwegen P, Mauritz KH. Control

mechanisms for restoring posture and movements in

paraplegics. Prog Brain Res 1989;80:489-502;

discussion 479-80.

Rabischong E, Sgarbi F, Rabischong P, Detriche JM,

Pinguet N, Riwan A. Control and command of a

six degrees of freedom active electrical orthosis for

paraplegic patient. In: Towards a new frontier of

applications: IROS ’90: proceedings of the IEEE

International Workshop on Intelligent Robots and

Systems ’90; 1990 Jul 3-6; Ibaraki, Japan. Vol. 2.

New York: IEEE; 1990. p. 987-91.

Rabischong P, Weber JL, Rabischong E, Micallef JP,

Peruchon E, Gilbert B, Jullian JM, Kim Y, Spelman

FA. Computer-aided locomotion by implanted

electrical stimulation (CALIES project). In: Kim

Y, Spelman FA, eds. Images of the twenty-first

century. Proceedings of the 11th Annual

International Conference of the IEEE Engineering

in Medicine and Biology Society; 1989 Nov 9-12;

Seattle, WA. Vol. 3. Piscataway (NJ): IEEE; 1989.

p. 985.

Ragnarsson KT. Functional electrical stimulation and

suppression of spasticity following spinal cord

injury. Bull N Y Acad Med 1992 Mar-Apr;68(2):

351-64.

Riso RR, Ignagni AR, Keith MW. Cognitive feedback

for use with FES upper extremity neuroprostheses.

IEEE Trans Biomed Eng 1991 Jan;38(1):29-38.

Schlenzka D, Ylikoski M, Poussa M. [Experiences

with lateral electric surface stimulation in the

treatment of idiopathic scoliosis]. Beitr Orthop

Traumatol 1990 Jul;37(7):373-8. (Ger).

Schupp W, Jund R. [Spastic movement disorders:

non-medicamentous therapies based on

neurophysiologic principles]. Nervenarzt 1991

Dec;62(12):711-21. (Ger).

Seeger BR, Law D, Creswell JE, Stern LM, Potter G.

Functional electrical stimulation for upper limb

strengthening in traumatic quadriplegia. Arch Phys

Med Rehabil 1989 Sep;70(9):663-7.

Smith LE. Restoration of volitional limb movement of

hemiplegics following patterned functional electrical

stimulation. Percept Mot Skills 1990 Dec;

71(3 Pt 1):851-61.

Solomonow M, Baratta R, Hirokawa S, Rightor N,

Walker W, Beaudette P, Shoji H, D’Ambrosia R.

The RGO Generation II: muscle stimulation

powered orthosis as a practical walking system for

thoracic paraplegics. Orthopedics 1989

Oct;12(10):1309-15. Published erratum appears in

Orthopedics 1989 Dec;12(12):1522.

Stallard J, Major RE, Patrick JH. A review of the

fundamental design problems of providing

ambulation for paraplegic patients. Paraplegia 1989

Feb;27(1):70-5.

Stefanovska A, Vodovnik L, Gros N, Rebersek S,

Acimovic-Janezic R. FES and spasticity. IEEE

Trans Biomed Eng 1989 Jul;36(7):738-45.

Stein RB, Capaday C. [Improvement of prostheses

and orthotic aids for the handicapped using electric

stimulation and the registration of bioelectric

signals]. Union Med Can 1990 May-Jun;119(3):

102-8. (Fre).

Stein RB, Peckham PH, Popovic DB, eds. Neural

prostheses: replacing motor function after disease or

disability. New York: Oxford University Press;

1992. 345 p.

Thrope G, Stroh K, Baco A (Case Western Reserve

University, Veterans Administration Medical

Center). Standardized object test for quantitative

assessment of hand grasp function using the

C.W.R.U. upper extremity neuroprosthesis. In:

Technology for the next decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 181-2.

Vossius G. [Possibilities of functional

electrostimulation in clinical use]. Biomed Tech

(Berlin) 1990;35 Suppl 3:115-7. (Ger).

Vossius G, Hollander HJ, Frech R. [Functional

electrostimulation in spasticity]. Biomed Tech

(Berlin) 1990;35 Suppl 3:118-9. (Ger).

Willemsen AT, Frigo C, Boom HB. Lower extremity

angle measurement with accelerometers--error and

sensitivity analysis. IEEE Trans Biomed Eng 1991

Dec;38(12):1186-93.

Willemsen ATM, Bloemhof F, Boom HBK.

Automatic stance-swing phase detection from

accelerometer data for peroneal nerve stimulation.

IEEE Trans Biomed Eng 1990 Dec;37(12):1201-8.

Winter DA. CNS stategies in human gait: implications

for FES control. Automedica 1989;11:163-74.

Yamaguchi GT. Feasibility and conceptual design of

functional neuromuscular stimulation systems for

the restoration of natural gait to paraplegics based

on dynamic musculoskeletal models [dissertation].

Palo Alto (CA): Stanford University; 1989. 264 p.

Yamaguchi GT, Zajac FE. Restoring unassisted

natural gait to paraplegics via functional

neuromuscular stimulation: a computer simulation

study. IEEE Trans Biomed Eng 1990 Sep;37(9):

886-902.

Yarkony GM, Jaeger RJ, Roth E, Kralj AR, Quintern J.

Functional neuromuscular stimulation for standing

after spinal cord injury. Arch Phys Med Rehabil

1990 Mar;71(3):201-6.

Yarkony GM, Roth EJ, Cybulski GR, Jaeger RJ.

Neuromuscular stimulation in spinal cord injury. II:

Prevention of secondary complications. Arch Phys

Med Rehabil 1992 Feb;73(2):195-200.

COMPUTERS & COMMUNICATIONS

DEVICES

Angelo J. Comparison of three computer scanning

modes as an interface method for persons with

cerebral palsy. Am J Occup Ther 1992 Mar;46(3):

217-22.

Anschutz JR. Chairsim: a power wheelchair simulator.

In: Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 353.

Antczak JM, Snell E. Quad comparator circuit. In:

Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 9-10.

Arnold ME, Penn B. Expert systems and occupational

therapy. Br J Occup Ther 1990 Sep;53(9):365-8.

Augmentative and alternative communication: 1989.

Presentations at the RESNA 12th annual conference

and USSAAC 1st national conference; 1989 Jun

26-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. 120 p.

Blackstien-Adler S, Ryan S, Naumann S, Parnes P.

Development of an integrated wheelchair tray

system for augmentative communication. Assist

Technol 1990;2(4):142-50.

Borges G, Ferguson K, Kobetic R. Development and

operation of portable and laboratory electrical

stimulation systems for walking in paraplegic

subjects. IEEE Trans Biomed Eng 1989 Jul;

36(7):798-801.

Bresler MI. The tamara system: integrated control of

mobility, communication, and environment. In:

Technology for the future decade. RESNA ’89:

proceedings of the 12th annual conference; 1989

Jun 25-30; New Orleans, LA. Washington (DC):

RESNA Press; 1989. p. 300-1.

Carrico F. Rapid anthropometry for cad/cam design in

prosthetics and orthotics. In: Technology for the

future decade. RESNA ’89: proceedings of the 12th

annual conference; 1989 Jun 25-30; New Orleans,

LA. Washington (DC): RESNA Press; 1989.

p. 157-8.

Clemmons NW. ABLEDATA: a database of products

for the disabled. Med Ref Serv Q 1991 Fall;10(3):

1-15.

Daley TL, Scott RN, Parker PA, Lovely DF. Operator

performance in myoelectric control of a

multifunction prosthesis stimulator. J Rehabil Res

Dev 1990 Winter;27(1):9-20.

Durfee WK, Mariano TR, Zahradnik JL. Simulator for

evaluating shoulder motion as a command source

for FES grasp restoration systems. Arch Phys Med

Rehabil 1991 Dec;72(13):1088-94.

Edwards BG, Marsolais EB. Metabolic responses to

arm ergometry and functional neuromuscular

stimulation. J Rehabil Res Dev 1990 Spring;

27(2):107-13; discussion 113-4.

El-Shanawany MM. Operation of a car alternator as a

three-phase traction motor using microprocessor.

In: UPEC’89. Proceedings of the 24th University

Power Engineers Conference; 1989 Sep 19-20;

Belfast, Northern Ireland, U.K. Belfast (UK):

Queen’s University; 1989. p. 327-30.

Engsberg JR, Clynch GS, Lee AG, Allan JS, Harder

JA. A CAD CAM method for custom below-knee

sockets. Prosthet Orthot Int 1992 Dec;16(3):183-8.

Handa Y, Handa T, Ichie M, Murakami H, Hoshimiya

N, Ishikawa S, Ohkubo K. Functional electrical

stimulation (FES) systems for restoration of motor

function of paralyzed muscles--versatile systems

and a portable system. Front Med Biol Eng

1992;4(4):241-55.

Hawley MS, Cudd PA, Wells JH, Wilson AJ, Judd PL.

Wheelchair-mounted integrated control systems for

multiply handicapped people. J Biomed Eng 1992

May;14(3):193-8.

Herman L, Herman B. Elena and her technology.

Except Parent 1989 Oct;19(7):35-6.

Hillman M, Jepson J. Evaluation of a robotic

workstation for the disabled. J Biomed Eng 1992

May;14(3):187-92.

Hillman MR, Pullin GM, Gammie AR, Stammers CW,

Orpwood RD. Clinical experience in rehabilitation

robotics. J Biomed Eng 1991 May;13(3):239-43.

Hillman MR, Pullin GM, Gammie AR, Stammers CW,

Orpwood RD. Development of a robot arm and

workstation for the disabled. J Biomed Eng 1990

May;12(3):199-204.

Kitzenmaier P, Boenick U. [Possibilities of

myoelectric control of artificial limb prostheses].

Biomed Tech (Berlin) 1992 Jul-

Aug;37(7-8):170-80. (Ger).

Klinger C, Boenick U. [A new procedure for

simulation of wheelchair operation]. Biomed Tech

(Berlin) 1990;35 Suppl 3:303-4. (Ger).

Krouskop TA, Malinauskas M, Williams J, Barry PA,

Muilenburg AL, Winningham DJ. A computerized

method for the design above-knee prosthetic

sockets. J Prosthet Orthot 1989 Apr;1(3):131-8.

Lasudry N, Warzee G, Van Rolleghem J. [Image

processing and use of CAD in prosthesis

manufacturing]. Onde Electr 1991 Jul-Aug;

71(4):45-8 (Fre).

Lin JH, Chou YL, Ju MS, Sung YT. [Application and

evaluation of the VICON system in gait analysis].

Kao Hsiung I Hsueh Ko Hsueh Tsa Chih 1990 Jan;

6(1):6-11. (Chi).

Lord M, Foulston J. Clinical trial of a computer-aided

system for orthopaedic shoe upper design. Prosthet

Orthot Int 1991 Apr;15(1):11-7.

McAllister DF, Carver D, Devarajan R, Harrison L,

Pietenpol JL, Yang SH. An interactive computer

graphics system for the design of molded and

orthopedic shoe lasts. J Rehabil Res Dev 1991

Fall;28(4):39-46.

McEwen IR. Assistive positioning as a control

parameter of social communicative interactions

between students with profound multiple disabilities

and classroom staff... including commentary by

Palisano RJ with author response. Phys Ther 1992

Sep;72(9):634-47.

Michael JW. Reflections on CAD/CAM in prosthetics

and orthotics. J Prosthet Orthot 1989 Apr;1(3):

116-21.

NERAC, Inc. (Tolland, CT). Multifunctional artificial

limbs (latest citations from the INSPEC:

Information Services for the Physics and

Engineering Communities Database. December

1985 - April 1992) [bibliography]. Springfield

(VA): NTIS; 1992 Jun. 188 citations.

PB92855428XSP.

Neth DC, McGovern TF, Reger SI. Computer aided

measurement and fabrication of contoured body

supports. In: Technology for the future decade.

RESNA ’89: proceedings of the 12th annual

conference; 1989 Jun 25-30; New Orleans, LA.

Washington (DC): RESNA Press; 1989. p. 234-5.

Neth DC, McGovern TF, Reger SI, Kim Y, Spelman

FA. Quantification of body shape for contoured

support fabrication. In: Kim Y, Spelman FA, eds.

Images of the twenty-first century. Proceedings of

the 11th Annual International Conference of the

IEEE Engineering in Medicine and Biology

Society; 1989 Nov 9-12; Seattle, WA. Vol. 5.

Piscataway (NJ): IEEE; 1989. p. 1534-5.

Niesing R, Eijskoot F, Kranse R, den Ouden AH,

Storm J, Veeger HE, van der Woude LH, Snijders

CJ. Computer-controlled wheelchair ergometer.

Med Biol Eng Comput 1990 Jul;28(4):329-38.

Oberg K, Kofman J, Karisson A, Lindstrom B, Sigblad

G. The capod system - a scandinavian CAD/CAM

system for prosthetic sockets. J Prosthet Orthot

1989 Apr;1(3):139-48.

Officer TM. A microprocessor controlled page turner.

Biomed Sci Instrum 1991;27:141-4.

Ojala J, Inoue K, Sasaki K, Takamo M. Development

of an intelligent wheelchair using computer

graphics animation and simulation. Comput Graph

Forum 1991 Dec;10(4):285-95.

Peeraer L, Aeyels B, Van der Perre G. Development

of EMG-based mode and intent recognition

algorithms for a computer-controlled above-knee

prosthesis. J Biomed Eng 1990 May;12(3):178-82.

Peeraer L, Tilley K, Van der Perre G. A computer-

controlled knee prosthesis: a preliminary report.

J Med Eng Technol 1989 Jan-Apr;13(1-2):134-5.

Pelisse F, Marie F, Richard P. The use of a

microprocessor for the partial assistance of a

prosthesis for above knee amputees. J Microcomp

Appl 1990 Apr;13(2):145-53.

Petrillo DK, Wooden VM, Kraft-Fine C, Siegal SG,

Cioschi HM. How to equip the quadriplegic

patient. Contin Care 1990 Nov;9(11):24-28, 35.

Petrofsky JS, Smith J. A combined computer-

controlled walking and exercise system. J Clin Eng

1991 May-Jun;16(3):223-35.

Petrofsky JS, Smith JB. Physiologic costs of

computer-controlled walking in persons with

paraplegia using a reciprocating-gait orthosis. Arch

Phys Med Rehabil 1991 Oct;72(11):890-6.

Phillippe-Auguste JS, Gibbons DT. Simulation and

modelling of a microcomputer controlled above-

elbow prosthesis. Automedica 1989;11(1-3):

99-109.

Pho RW, Lim SY, Pereira BP. Computer applications

in orthopaedics. Ann Acad Med Singapore 1990

Sep;19(5):691-8.

Popovic D, Tomovic R, Tepavac D, Schwirtlich L.

Control aspects of active above-knee prosthesis. Int

J Man Mach Stud 1991 Dec;35(6):751-67.

Radwin RG, Vanderheiden GC, Lin ML. A method

for evaluating head-controlled computer input

devices using Fitts’ law. Hum Factors 1990 Aug;

32(4):423-38.

Rao S, Kuc R, Buus S. INCH: an intelligent

wheelchair prototype. In: Proceedings of the 15th

Annual Northeast Bioengineering Conference; 1989

Mar 22-23; Troy, NY. New York: Pergamon Press;

1989. p. 35-6.

Rovetta A. A new technology with an old face and a

proud heritage. Mechatron 1991;1(2):117-26.

Rovetta A, Xia W, Cosmi F. Realization of a

prosthesis of the lower limb: development of

kinematics. Robot Comput Integr Manuf 1991;

8(3):137-42.

Ruder GK. CAD CAM trans-tibial temporary

prosthesis: analysis and comparison with an

established technique. Prosthet Orthot Int 1992

Dec;16(3):185-95.

Scharer C. A learning man-machine interface for an

artificial arm. In: Intelligence for Mechanical

Systems. Proceedings IROS ’91: IEEE/RSJ

International Workshop on Intelligent Robots and

Systems ’91; 1991 Nov 3-5; Osaka, Japan. Vol. 1.

New York: IEEE; 1991. p. 227-30.

Scott Taplin C, Smith M, McLaughlin J, Mathews T.

The wheelchair simulator: powered wheelchair

assessment and training. Can J Rehabil 1989 Fall;

3(1):49-51.

Sidles JA, Boone DA, Harlan JS, Burgess EM.

Rectification maps: a new method for describing

residual limb and socket shapes. J Prosthet Orthot

1989 Apr;1(3):149-53.

Snell F. Bringing prosthetics into the 21st century.

J Ark Med Soc 1992 Dec;89(7):337-8.

Soh AK, Soh CK, Lau WS. Method for the design

and analysis of a non-linear anisotropic lower limb

prosthetic socket. J Biomed Eng 1990 Nov;12(6):

470-6.

Sposato BA. Computer-aided shape sensing for

prescribing custom contoured seat cushions

[master’s thesis]. Charlottesville (VA): University

of Virginia Press; 1990.

St-Georges M, Valiquette C, Drouin G. Computer-

aided design in wheelchair seating. J Rehabil Res

Dev 1989 Fall;26(4):23-30.

Stezala D. Application of computer method in

motorial stimulation of children with cerebral palsy.

Biomed Tech (Berlin) 1990;35 Suppl 2:84-5.

Thornett CE. Designing special switches and control

systems for multiply handicapped young people--a

problem-led approach. J Med Eng Technol 1990

May-Jun;14(3):87-91.

Thornett CEE. Mobility for very young handicapped

children. In: IEE Colloquim on High-Tech Help

for the Handicapped 1990 Apr 2; London (UK).

London: IEE; 1990. p. 46.

Topper AK, Fernie GR. An evaluation of computer

aided design of below-knee prosthetic sockets.

Prosthet Orthot Int 1990 Dec;14(3):136-42.

Torres-Moreno R, Morrison JB, Cooper D, Saunders

CG, Foort J. A computer-aided socket design

procedure for above-knee prostheses. J Rehabil

Res Dev 1992 Summer;29(3):35-44.

Torres-Moreno R, Saunders CG, Foort J, Morrison JB.

Computer-aided design and manufacture of an

above-knee amputee socket. J Biomed Eng 1991

Jan;13(1):3-9.

Tscheuschner R, Rosenberger H. [Computer-assisted

optimization of gait assessment--biocybernetic

approach for an expert system for designing

prostheses]. Biomed Tech (Berlin) 1990;

35 Suppl 3:56-8. (Ger).

Walsh NE, Lancaster JL, Faulkner VW, Rogers WE.

A computerized system to manufacture prostheses

for amputees in developing countries. J Prosthet

Orthot 1989 Apr;1(3):165-81.

Wang TK, Ju MS, Tsuei YG. Adaptative control of

above knee electro-hydraulic prosthesis. J Biomech

Eng 1992 Aug;114(3):421-4.

Wertsch JJ, Webster JG, Tompkins WJ. A portable

insole plantar pressure measurement system.

J Rehabil Res Dev 1992 Winter;29(1):13-8.

Wheelchair navigation: a computer-aided primer.

Health Care (Don Mills) 1989 Nov-Dec;31(9):11-2,

14.

Wood JE, Meek SG, Jacobsen SC. Quantitation of

human shoulder anatomy for prosthetic arm control.

I. surface modelling. J Biomech 1989;22(3):

273-92.

Wood JE, Meek SG, Jacobsen SC. Quantitation of

human shoulder anatomy for prosthetic arm control-

-II. anatomy matrices. J Biomech 1989;22(4):

309-25.

Wynarsky GT, Schultz AB. Optimization of skeletal

configuration: studies of scoliosis correction

biomechanics. J Biomech 1991;24(8):721-32.

Yamaguchi GT. Feasibility and conceptual design of

functional neuromuscular stimulation systems for

the restoration of natural gait to paraplegics based

on dynamic musculoskeletal models [dissertation].

Palo Alto (CA): Stanford University; 1989. 264 p.

Yamaguchi GT, Zajac FE. Restoring unassisted

natural gait to paraplegics via functional

neuromuscular stimulation: a computer simulation

study. IEEE Trans Biomed Eng 1990 Sep;37(9):

886-902.

Zarii KM, Motamedy A, Hashemi RM, Zajc B, Solina

F. An approach to redundancy cancelling in order

to use a single chip processor for IAV evaluation

in cybernetic arm. In: 6th Mediterranean

Electrotechnical Conference Proceedings; 1991 May

22-24; Ljublijana, Slovenia. Vol. 1. New York:

IEEE; 1991. p. 744-7.

AUDIOVISUALS

Artificial body parts [videocassette]. Princeton (NJ):

Films for the Humanities; 1989. 1 videocassette: 26

min., sound, color, 1/2 in.

Assessment and care of the patient with a neck

immobilizer [videocassette]. Houston: University of

Texas Health Science Center at Houston, UT/TV;

1992. 1 videocassette: 7 min., sound, color; 1/2 in.

(Orthopedic nursing series; 1). Credits: Presenter,

Lecretia Irrera; content advisor, Velma Fleming;

program coordinator, Madeline Bowers.

Accompanied by: 1 guide.

Crutchwalking: an overview for nurses [videocassette].

[Spokane (WA)]: I.C.N.E., Learning Resources

Unit; 1989. 1 videocassette: sound, color, 1/2 in.

Credits: Dena Corwin, Carol Miller, Meryl R.

Gersh, project coordinators.

Energy cost of ambulation in paraplegia: comparison of

various orthotic management strategies

[videocassette]. Washington (DC): Veterans

Administration; 1988. 1 videocassette: 46 min.,

sound, color, 1/2 in. Credits: John L. Merritt.

Produced for Seattle VA Medical Center and the

Paralyzed Veterans of America.

Evolution of the modern above knee socket

[videocassette]. Atlanta: Emory University, Emory

Medical Television Network; 1991. 1 videocassette:

46 min., sound, color, 1/2 in. Credits: J. Robin

DeAndrade.

Funding of assistive technology for individuals with

disabilities [audiocassette]. Washington (DC):

RESNA Press; 1990. 6 sound cassettes: 630 min.

Credits: Colleen Wieck, Marvin Fifield, Bob Griss,

Don Galvin, Karen Vlasch, Allan Bergman, Lewis

Golinker, Steven White, J. Plotnik, Ronald Loften,

June Kailes, Brenda Carson, et al.

Halo vest orthosis: application & maintenance of the

halo vest orthosis [videocassette]. Regional Spinal

Cord Injury Center of Delaware Valley. United

States: [publisher unknown]; 1991. 1 videocassette:

15 min., sound, color, 1/2 in. Credits: Steve

Rizzolo.

Hand splinting for arthritis health professionals

[audiocassette]. Atlanta: Arthritis Health

Professions Association; 1988. 1 audiocassette:

Sides A & B [unknown time]. Recorded at the

association’s concurrent session, May 23-28, 1988,

Houston, TX.

The Henry Ford Hospital cosmetic foot prosthesis

[videocassette]. Park Ridge (IL): American

Academy of Orthopedic Surgeons; [1991].

1 videocassette: 8 min., 18 sec., sound, color,

1/2 in. Credits: Kent K. Wu.

Idiopathic scoliosis. Mubarak SJ. Audio Dig Orthop

[audiocassette] 1992 Jan;15(1):Side A [presentation

1, 21 min.]. Accompanied by: 1 guide.

Interacting with people in wheelchairs [videocassette].

[Los Angeles]: Medical Electronic Educational

Services, Vantage Point Productions; Hospital

Satellite Network; 1987. 1 videocassette: 29 min.,

sound, color with black & white, 1/2 in. Credits:

Carol Gill, Richard Mailman, co-hosts.

Knee braces. Drez D Jr. Video J Orthop Surg

[videocassette]. 1989;3(5 Pt 2):[presentation 2, 23

min.]. 1 videocassette: sound, color, 1/2 in.

Managing hip dysplasia. Staheli LT. Audio Dig

Orthop [audiocassette] 1990 Nov;13(11):Side A

[presentation 1, 17 min.]. Accompanied by: 1

guide.

New developments in prosthetics for children Lester

EL. Audio Dig Orthop [audiocassette] 1990 Nov;

13(11):Sides A & B [presentation 3, 18 min.].

Accompanied by: 1 guide.

Orthopaedic treatment of spastic diplegia: role of early

postoperative mobilization. Sussman M. Audio

Dig Orthop [audiocassette] 1989 Feb;12(2):Sides A

& B [presentation 1, 40 min.]. Accompanied by: 1

guide.

Orthotic devices for running. D’Ambrosia RD. Audio

Dig Orthop [audiocassette] 1991 Nov;14(11):Side B

[presentation 2, 18 min.]. Accompanied by: 1

guide.

PTB cast, long-leg cast-braces, and hip spica casts

[videocassette]. [United States: American Academy

of Orthopedic Surgeons; 1990]. 1 videocassette: 16

min., sound, color, 1/2 in. Credits: Kent K. Wu.

Reach for the stars [videocassette]. Alder D, producer.

Vancouver (Canada): Mad Max Music; 1989. 1

videocassette: 22 min., sound, color, 1/2 in.

Rehabilitation: the diabetic amputee [videocassette].

Pechman K. Secaucus (NJ): Network for

Continuing Medical Education; 1991. 1

videocassette: 32 min., sound, color, 1/2 in.

(NCME telecourse; no. 607). Accompanied by: 1

guide. Issued with: Battered women in your

practice?

Rehabilitation technology education for prosthetics,

orthotics, and PTA students [computer program +

videodisc]. Memphis (TN): Shelby State

Community College, Allied Health Department;

1989. Computer disk(s); 1 videodisc: sound, color,

12 in. System requirements: IBM PC, AT, XT, or

PS/2 or compatible; IBM InfoWindow and

compatible systems.

Sabolich Prosthetic and Research Center documentary

[videocassette]. Sabolich J. Oklahoma City: The

Center; 1992. 1 videocassette: 120 min., sound,

color, 1/2 in.

Shake, rattle & roll: wheelchair dancing [videocassette].

Greenville (NC): East Carolina University, Center

for Health Sciences Audiovisual Communication;

1989. 1 videocassette: sound, color, 1/2 in.

Shoes and their modifications [videocassette]. [United

States: American Academy of Orthopedic Surgeons;

1991]. 1 videocassette: 15 min., 38 sec., sound,

color, 1/2 in. Credits: Kent K. Wu.

Transfer techniques [videocassette]. Garden Grove

(CA): Medcom/Trainex; 1990. 2 videocassettes:

sound, color, 1/2 in. (Professional skills for the new

nursing assistant). Credits: Judith Eighmy, Muriel

Greensaft, et al., consultants.

Turning and transferring the patient: good body

mechanics are essential [videocassette]. Grisell J.

[Houston]: University of Texas Health Science

Center at Houston, School of Nursing; 1991.

1 videocassette: 13 min., 30 sec., sound, color,

1/2 in. Credits: Lisa Greenbaum, content expert.

The use of upper extremity prostheses [videocassette].

[United States]: Art Heinze; 1988. 1 videocassette:

49 min., sound, color, 1/2 in.

Wheelchair inspection and cleaning [videocassette].

Austin (TX): Texas Department of Mental Health

and Mental Retardation, Richmond State School,

Staff Development; 1992. 1 videocassette: 7 min.,

sound, color, 1/2 in. Accompanied by: 1 guide.

Wheelchair use and safety [videocassette]. Austin

(TX): Texas Department of Mental Health and

Mental Retardation, Richmond State School, Staff

Development; 1992. 1 videocassette: 11 min.,

sound, color, 1/2 in. Accompanied by: 1 guide.

APPENDIX OF ORGANIZATIONS

AFTER Rehabilitation and Training Center for Limb Birth

Deficiencies/Amputations

8408 W. McNab Rd.

Tamarac, FL 33321

Tel. (301) 721-1140

American Academy of Neurological and Orthopaedic Medicine and Surgery

737 N. Michigan Ave., Suite 108

Las Vegas, NV 89102-4592

Tel. (702) 385-6886

American Academy of Orthotists and Prosthetists

1650 King St., Suite 500

Alexandria, VA 22314

Tel. (703) 836-7118

American Academy of Physical Medicine and Rehabilitation

122 South Michigan Ave., Suite 1300

Chicago, IL 60603 (publishes Archives of Physical Medicine and Rehabilitation)

Tel. (312) 922-9366

American Academy of Podiatric Sports Medicine (AAPSM)

1729 Glastonberry Rd.

Potomac, MD 20854

Tel. (301) 424-7440

American Amputee Foundation (AAF)

Box 250218, Hillcrest Station

Little Rock, AR 72225

Tel. (501) 666-2523

American Association for Hand Surgery (AAHS)

2934 Fish Hatchery Rd., Suite 210

Madison, WI 53713

Tel. (608) 273-8940

American Board for Certification in Orthotics and Prosthetics (ABC)

1650 King St., Suite 500

Alexandria, VA 22314

Tel. (703) 836-7114

American Board of Orthopaedic Surgery

737 N. Michigan Ave., Suite 1150

Chicago, IL 60611

Tel. (312) 664-9444

American Board of Physical Medicine and Rehabilitation

c/o Dr. Gordon M. Martin

Norwest Center, Suite 674

21 First St., SW

Rochester, MN 55902

Tel. (507) 282-1776

American Burn Association (ABA)

c/o Andrew M. Munster, M.D.

Baltimore Regional Burn Center

Francis Scott Key Hospital

4940 Eastern Ave.

Baltimore, MD 21224

Tel. (800) 548-2876

American College of Foot Surgeons (ACFS)

444 N. Northwest Hwy., Suite 155

Park Ridge, IL 60068

Tel. (708) 292-2237

American Diabetes Association

1660 Duke St.

Alexandria, VA 22314 (publishes Diabetes)

Tel. (703) 549-1500, (800) 232-3472

American Occupational Therapy Association (AOTA)

1383 Piccard Dr., P.O. Box 172

Rockville, MD 20849-1725 (publishes American Journal of Occupational Therapy)

Tel. (301) 948-9633

American Orthotic and Prosthetic Association (AOPA)

1650 King St., Suite 500

Alexandria, VA 22314 (publishes Journal of Prosthetics and Orthotics)

Tel. (703) 836-7116

American Paralysis Association

500 Morris Ave.

Springfield, NJ 07081

Tel. (201) 379-2690, (800) 526-3456

American Physical Therapy Association

1111 North Fairfax St.

Alexandria, VA 22314 (publishes Physical Therapy and Clinical Management in

Physical Therapy)

Tel. (703) 684-2782, ext. 3212

American Podiatric Medical Association

9312 Old Georgetown Rd.

Bethesda, MD 20814 (publishes Journal of the American Podiatric Association)

Tel. (301) 571-9200

American Society for Hand Therapists (ASHT)

1002 Vandora Springs Rd., Suite 101

Garner, NC 27529

Tel. (919) 779-ASHT

American Society for Surgery of the Hand (ASSH)

3025 S. Parker Rd., Suite 65

Aurora, CO 80014

Tel. (303) 755-4588

American State of the Art Prosthetic Association

1156 15th St., NW, Suite 1100

Washington, DC 20005

Tel. (202) 659-2909

American Wheelchair Bowling Association (AWBA)

N54 WI5858 Larkspur Ln.

Menomonee Falls, WI 53051

Tel. (414) 781-6876

Amputee Coalition

6300 N. River Rd.

Rosemont, IL 60018

Tel. (708) 698-1628

Amputee Shoe and Glove Exchange (ASGE)

P.O. Box 27067

Houston, TX 77227

Amputee Sports Association, Inc.

P.O. Box 60129

Savannah, GA 31420-0129

Tel. (912) 927-5406

Amputees in Motion (AIM)

P.O. Box 2703

Escondido, CA 92033

Tel. (619) 454-9300

Association of Academic Physiatrists (AAP)

7100 Lakewood Bldg., Suite 112

5987 E. 71st St.

Indianapolis, IN 46220 (publishes American Journal of Physical Medicine and

Rehabilitation)

Tel. (317) 845-4200

Association of Children’s Prosthetic-Orthotic Clinics (ACPOC)

222 S. Prospect Ave.

Park Ridge, IL 60068 (publishes Journal of the Association of Childrens Prosthetic-

Orthotic Clinics, which includes their annual proceedings)

Tel. (708) 698-1694

Association of Rehabilitation Nurses

5700 Old Orchard Rd., 1st Floor

Skokie, IL 60077 (publishes Rehabilitation Nursing)

Tel. (708) 966-0050

Biomedical Engineering Society (BMES)

P.O. Box 2399

Culver City, CA 90231

Tel. (213) 618-9322

Foundation for Hand Research (FHR)

310 E. 30th St.

New York, NY 10016

Tel. (212) 685-3834

Institute of Electrical and Electronics Engineers (IEEE)

345 E. 47th St.

New York, NY 10017

Tel. (212) 705-7900

Institute of Rehabilitation and Research

Information Service Center

1333 Moursund

Houston, TX 77030

Tel. (713) 797-5947

International Association of Orthotists and Prosthetists

108, rue Prince Baudouin

B-1080 Brussels, BELGIUM

Tel. 2 4269966

International Federation of Societies for Surgery of the Hand (IFSSH)

c/o Miguel Vargas Busquest, M.D.

165 E. Mendez Vigo St.

Mayaguez, PR 00680

Tel. (809) 833-3248

International Society for Prosthetics and Orthotics (ISPO)

Borgervaenget 5 (publishes Prosthetics and Orthotics International)

DK-2100 Copenhagen, DENMARK

International Stoke Mandeville Wheelchair Sports Federation

Hayward House

Barnard Crescent

Aylesbury, Bucks. HP21 9PP, ENGLAND

Tel. 844 436179

International Wheelchair Aviators (IWA)

c/o Bill Blackwood, Sec.

1117 Rising Hill Way

Escondido, CA 92029

Tel. (619) 746-5018

International Wheelchair Road Racers Club (IWRRC)

c/o Joseph M. Dowling, Pres.

30 Myano Ln., Box 3

Stamford, CT 06902

Tel. (203) 967-2231

March of Dimes Birth Defects Foundation

1275 Mamaroneck Ave.

White Plains, NY 10605

Tel. (914) 428-7100

National Amputation Foundation (NAF)

12-45 150th St.

Whitestone, NY 11357

Tel. (718) 767-0596

National Association of Orthopaedic Nurses (NAON)

North Woodbury Rd., Box 56

Pitman, NJ 08071 (publishes Orthopaedic Nursing)

Tel. (609) 582-0111

National Center for Medical Rehabilitation Research

National Institute of Child Health and Human Development

Executive Plaza South, Room 450

Bethesda, MD 20892-9904

Tel. (301) 402-2242

National Diabetes Information Clearinghouse

Box NDIC

Bethesda, MD 20892

Tel. (301) 468-2162

National Foundation of Wheelchair Tennis (NFWT)

940 Calle Amanecer, Suite B

San Clemente, CA 92672

Tel. (714) 361-6811

National Handicapped Sports (NHS)

4405 East-West Hwy., Suite 603

Bethesda, MD 20814

Tel. (301) 652-7505

National Institute for Burn Medicine (NIBM)

909 E. Ann St.

Ann Arbor, MI 48104

Tel. (313) 769-9000

National Institute of Arthritis and Musculoskeletal and Skin Diseases

Information Office

Building 31, Room 4C05

9000 Rockville Pike

Bethesda, MD 20892

Tel. (301) 496-8188

National Institute on Aging

Information Office

Building 31, Room 5C27

9000 Rockville Pike

Bethesda, MD 20892

Tel. (301) 496-1752

National Institute on Disability and Rehabilitation Research

Department of Education

Mary E. Switzer Building

Washington, DC 20202-2572

Tel. (202) 205-9151

National Rehabilitation Association

633 South Washington St.

Alexandria, VA 22314-4193 (publishes Journal of Rehabilitation Administration)

Tel. (703) 836-0850

National Rehabilitation Information Center (NARIC)

8455 Colesville Rd., Suite 935

Silver Spring, MD 20910 (produces NARIC database)

Tel. (301) 588-9284, (800) 34-NARIC

National Scoliosis Foundation

72 Mt. Auburn St.

Springfield, NJ 07081

Tel. (617) 926-0397

National Spinal Cord Injury Association

600 W. Cummings Park, Suite 2000

Woburn, MA 01801

Tel. (617) 935-2722

National Wheelchair Athletic Association (NWAA)

3595 E. Fountain Blvd., Suite L-1

Colorado Springs, CO 80910

Tel. (719) 574-1150

National Wheelchair Basketball Association (NWBA)

Univ. of Kentucky

110 Seaton Bldg.

Lexington, KY 40506-0219

Tel. (606) 257-1623

National Wheelchair Softball Association (NWSA)

1616 Todd Ct.

Hastings, MN 55033

Tel. (612) 437-1792

Osteogenesis Imperfecta Foundation

c/o Vonnie H. Coleman

5005 W. Laurel, Suite 210

Tampa, FL 33607-3836

Tel. (813) 855-7077

Paralyzed Veterans of America (PVA)

801 18th St. NW

Washington, DC 20006

Tel. (202) 872-1300

Prosthetics Research Study

720 Broadway, 3rd Floor

Seattle, WA 98122

Tel. (206) 328-3116

Rehabilitation Engineering Society of North America (RESNA)

1101 Connecticut Ave., NW, Suite 700

Washington, DC 20036 (publishes Assistive Technology Journal and RESNA

Proceedings)

Tel. (202) 857-1199

Rehabilitation Research and Development Service

Office of Technology Transfer (110A1)

Veterans Administration Prosthetics Research and Development Center

103 South Gay St.

Baltimore, MD 21202 (publishes Journal of Rehabilitation Research and

Development, its Supplements, and annual Rehabilitation R&D Research Progress

Reports)

Tel. (410) 962-1800

Scoliosis Research Society

222 South Prospect

Park Ridge, IL 60068

Tel. (312) 698-1627

United Cerebral Palsy Associations

Seven Penn Plaza, Suite 804

New York, NY 10001

Tel. (212) 268-5962, (800) USA-1UCP

Wheelchair Motorcycle Association (WMA)

101 Torrey St.

Brockton, MA 02401

Tel. (508) 583-8614

Wheelchair Tennis Players Association (WTPA)

940 Calle Amanecer, Suite B

San Clemente, CA 92672

Tel. (714) 361-6811