CBM 92-14

Practice Guidelines

January 1985 through December 1992

533 Citations

Prepared by

Kristine M. Scannell, M.S.L.S.

Naomi Miller, M.L.S.

Martha Glock, M.L.S.

U.S. DEPARTMENT OF HEALTH

AND HUMAN SERVICES

Public Health Service

National Institutes of Health

National Library of Medicine

Reference Section

8600 Rockville Pike

Bethesda, Maryland 20894

1992

SERIES NOTE

Current Bibliographies in Medicine (CBM) is a continuation in part of the National Library of Medicine’s

Literature Search Series, which ceased in 1987 with No. 87-15. In 1989 it also subsumed the Specialized

Bibliography Series. Each bibliography in the new series covers a distinct subject area of biomedicine and

is intended to fulfill a current awareness function. Citations are usually derived from searching a variety

of online databases. NLM databases utilized include MEDLINE

�

, AVLINE

�

, BIOETHICSLINE

�

,

CANCERLIT

�

, CATLINE

�

, HEALTH, POPLINE

�

and TOXLINE

�

. The only criterion for the inclusion

of a particular published work is its relevance to the topic being presented; the format, ownership, or

location of the material is not considered.

Comments and suggestions on this series may be addressed to:

Karen Patrias, Editor

Current Bibliographies in Medicine

Reference Section

National Library of Medicine

Bethesda, MD 20894

Phone: 301-496-6097

Fax: 301-402-1384

Internet: patrias@nlm.nih.gov

Ordering Information:

Current Bibliographies in Medicine is sold by the Superintendent of Documents, U.S. Government Printing

Office, Washington, D.C. 20402. To order the entire CBM series for the calendar year 1992 (14

bibliographies), send $41.00 ($51.25 foreign) to the Superintendent of Documents citing GPO List ID:

CBM92. To order the series for 1993 (approximately 7 bibliographies), send $24.00 ($30.00 foreign) citing

GPO list ID: CBM93. For your convenience an order blank is given inside the back cover. Orders for

individual bibliographies in the series ($3.25, $4.06 foreign) should be sent to the Superintendent of

Documents citing the title, CBM number, and the GPO List ID given above.

Use of funds for printing this periodical has been approved by the Director

of the Office of Management and Budget through September 30, 1993.

PRACTICE GUIDELINES

The 1989 amendments to the Public Health Service Act called for the National Library of Medicine (NLM)

and the Agency for Health Care Policy and Research (AHCPR) to work together to develop and enhance

information services in health services research. In response to this mandate, NLM established its Health

Services Research Information Program. NLM’s highest priorities for this program are to 1) enhance

NLM’s basic collection development, organization, and dissemination services to provide better coverage

of the results of health services research, and 2) promote the use of these services by the health services

research community. One area specifically targeted in this program is the development and dissemination

of information on practice guidelines.

Practice guidelines have been known by a number of different names including practice standards, practice

recommendations, policies, practice parameters, practice options, clinical indicators, and many more. All

have the basic premise of being a set statement, direction, or principle to assist the health care practitioner

with patient care decisions about the appropriate diagnostic, therapeutic, or other clinical procedure for

specific clinical circumstances. They may be developed by government agencies at any level, institutions,

organizations such as professional societies or governing boards, or by the convening of experts on a panel.

"There is growing interest in the use of practice guidelines for physicians as a means of reducing

inappropriate care, controlling geographic variations in practice patterns, and making more effective use of

health care resources. Recent developments at the national health policy level suggest that practice

guidelines will play an increasingly prominent role in the practice of medicine."* For the physician trying

to locate published practice guidelines, the task is made difficult by the variety of publication routes

employed. Some government agencies and medical societies publish their practice guidelines as monographs

and technical reports, while others feel the best avenue to disseminate their guidelines is through the

professional journals. Textbooks in the various clinical medical fields are also excellent sources of practice

guidelines. The most difficult ones for the physician to locate are those published in the professional journal

literature due to the variation in names used to describe them.

This bibliography contains selected references to articles containing practice guidelines published in the

professional journal literature for the years 1985 through 1992. The actual articles were reviewed to

determine if they contained a practice guideline. Citations cover all aspects of practice guidelines and are

arranged by 26 broad subject categories. Each reference is cited only once under the heading which best

describes the main topic of the article. The emphasis is on English language articles but non-English

references indexed to the publication type "practice guideline," which started in 1992, are included. All

citations in this bibliography have been updated in MEDLINE� with the publication type "practice

guideline."

*Woolf SH. Practice guidelines: a new reality in medicine. I. Recent developments. Arch Intern Med 1990

Sep;150(9):1811-8.

SEARCH STRATEGY

MEDLINE� was the online database searched in preparing this bibliography in the CBM series. To assist

you in updating or otherwise manipulating the materials in this search, the various synonyms for practice

guidelines used through out the medical literature are given below. Please note irrelevant citations retrieved

were edited out prior to printing.

PRACTICE GUIDELINE

CLINICAL PRACTICE GUIDELINE

APPROPRIATENESS EVALUATION PROTOCOL

APPROPRIATENESS OF HEALTH CARE

CARE GUIDELINE

CLINICAL CRITERIA

CLINICAL EFFICACY PROJECT

CLINICAL EFFICACY ASSESSMENT PROJECT

CLINICAL GUIDELINE

CLINICAL INDICATOR

CLINICAL INTERVENTION

CLINICAL POLICY

CLINICAL PROTOCOL

DATTA

DIAGNOSTIC AND THERAPEUTIC TECHNOLOGY

ASSESSMENT

GUIDELINE CRITERIA PROJECT

MANAGEMENT PLAN

MEDICAL CRITERIA

MEDICAL NECESSITY PROJECT

MEDICAL NECESSITY GUIDELINE

MEDICAL REVIEW CRITERIA

MEDICAL TREATMENT EFFECTIVENESS

PERFORMANCE CRITERIA

PERFORMANCE MEASURES OR MEASUREMENTS

PLANNING GUIDELINE

POLICY STATEMENT

POSITION PAPER

PRACTICE CRITERIA

PRACTICE INTERVENTION

PRACTICE OPTION

PRACTICE PARAMETER

PRACTICE POLICY

PRACTICE STANDARD

PREFERRED PRACTICE

PREFERRED PRACTICE PATTERN

RECOMMENDED PRACTICE

STANDARD OF CARE

STANDARD OF HEALTH CARE

STANDARD OF QUALITY

GRATEFUL MED

�

To make online searching easier and more efficient, the Library offers GRATEFUL MED, microcomputer-

based software that provides a user-friendly interface to most NLM databases. This software was

specifically developed for health professionals and features multiple choice menus and "fill in the blank"

screens for easy search preparation. GRATEFUL MED runs on an IBM PC (or IBM-compatible) with DOS

2.0 or a Macintosh, and requires a Hayes (or Hayes-compatible) modem. It may be purchased from the

National Technical Information Service in Springfield, Virginia, for $29.95 (plus $3.00 per order for

shipping). For your convenience, an order blank has been enclosed at the back of this bibliography.

SAMPLE CITATIONS

Citations in this bibliographic series are formatted according to the rules established for Index Medicus

�

*.

A sample journal citation appears below. For journal articles written in a foreign language, the English

translation of the title is placed in brackets and the language of publication is shown by a three letter

abbreviation appearing at the end of the citation. Note also that a colon (:) may appear within an author’s

name or article title. The NLM computer system automatically inserts this symbol in the place of a

diacritical mark.

Journal Article:

Authors Article Title

Assmann G, Schulte H. European lipid guidelines: therapeutic recommendations.

Am J Cardiol 1989 May 2;63(16):53H-55H.

Abbreviated Journal Date Volume Issue Pages

Title

_________________________________

*For details of the formats used for references, see the following publication:

Patrias, Karen. National Library of Medicine recommended formats for bibliographic citation.

Bethesda (MD): The Library; 1991 Apr. Available from: NTIS, Springfield, VA; PB91-182030.

TABLE OF CONTENTS

Cardiovascular System 1

Dentistry 2

Dermatology 3

Endocrine System 4

Gastrointestinal System 5

Genetics 6

Geriatrics 6

Hemic and Lymphatic Systems 7

Hospitals 8

Infectious and Communicable Diseases 8

Metabolic and Immunologic Diseases 10

Musculoskeletal System 11

Nervous System 12

Obstetrics and Gynecology 14

Oncology 16

Ophthalmology 16

Otorhinolaryngology 17

Pathology 17

Pediatrics 18

Pharmacology 19

Practice of Medicine 20

Psychiatry 21

Radiology 22

Respiratory System 22

Surgery 23

Urogenital System 25

CARDIOVASCULAR SYSTEM

ACC/AHA guidelines for the clinical application of

echocardiography. A report of the American College

of Cardiology/American Heart Association Task

Force on Assessment of Diagnostic and Therapeutic

Cardiovascular Procedures (Subcommittee to

Develop Guidelines for the Clinical Application of

Echocardiography). Circulation 1990

Dec;82(6):2323-45.

Angioplasty standard of practice. Standards of Practice

Committee of the Society of Cardiovascular and

Interventional Radiology. J Vasc Interv Radiol 1992

May;3(2):269-71.

Brubakk O, Bruun JN, Hovig B, Andrew M, Eskerud J,

Skoglund LA. [Antibiotic prevention of bacterial

endocarditis]. Tidsskr Nor Laegeforen 1992 Feb;

112(4):466-71. (Nor).

Cobb LA, Eliastam M, Kerber RE, Melker R, Moss AJ,

Newell L, Paraskos JA, Weaver WD, Weil M,

Weisfeldt ML. Report of the American Heart

Association Task Force on the Future of

Cardiopulmonary Resuscitation. Circulation 1992

Jun;85(6):2346- 55.

de Feyter PJ, Serruys PW. Coronary angioplasty for

unstable angina. Herz 1992 Feb;17(1):40-9.

Diagnostic and therapeutic technology assessment.

Coronary rehabilitation services. JAMA 1987

Oct 9;258(14):1959-62.

Fitzpatrick A, Sutton R. A guide to temporary pacing.

BMJ 1992 Feb 8;304(6823):365-9.

Fletcher GF, Froelicher VF, Hartley LH, Haskell WL,

Pollock ML. Exercise standards. A statement for

health professionals from the American Heart

Association. Circulation 1990 Dec;82(6):2286-322.

Gutschik E, Wennevold A, Jacobsen JR, Hjelms E.

[Antibiotic prevention of endocarditis. A reference

program for physicians and dentists]. Ugeskr Laeger

1992 Jul 6;154(28):1979-81. (Dan).

Hay DR, Chambers ST, Ellis Pegler RB, Jones MR,

Leslie PN, Neutze JM. Prevention of infective

endocarditis associated with dental treatment and

other medical interventions. NZ Med J 1992

May 27;105(934):192-4.

Heupler FA Jr, Heisler M, Keys TF, Serkey J. Infection

prevention guidelines for cardiac catheterization

laboratories. Society for Cardiac Angiography and

Interventions Laboratory Performance Standards

Committee. Cathet Cardiovasc Diagn 1992

Mar;25(3):260-3.

Hollier LH, Taylor LM, Ochsner J. Recommended

indications for operative treatment of abdominal

aortic aneurysms. Report of a Subcommittee of the

Joint Council of the Society for Vascular Surgery and the North American Chapter of the International

Society for Cardiovascular Surgery. J Vasc Surg

1992 Jun;15(6):1046-56.

Hravnak M, George E. Nursing considerations for the

patient with a total artificial heart. Crit Care Nurs

Clin North Am 1989 Sep;1(3):495-513.

Hyperlipidaemia and coronary risk. The Scottish Lipid

Consensus Group. Scott Med J 1991 Aug;36(4):

99-103.

Lindesmith GG. Practice guidelines in cardiothoracic

surgery. Ann Thorac Surg 1992 May;53(5):930-9.

Mirvis DM, Berson AS, Goldberger AL, Green LS,

Heger JJ, Hinohara T, Insel J, Krucoff MW,

Moncrief A, Selvester RH, et al. Instrumentation

and practice standards for electrocardiographic

monitoring in special care units. A report for health

professionals by a Task Force of the Council on

Clinical Cardiology, American Heart Association.

Circulation 1989 Feb;79(2):464-71. Published

erratum appears in Circulation 1989 Aug;80(2):

A85.

Moller M, Pindborg T, Sandoe E, Simonsen EH,

Thomsen PE. [Cardiac arrhythmias. Diagnosis and

treatment]. Ugeskr Laeger 1992 Mar 9;154(11):

700-14. (Dan).

Moore WS, Mohr JP, Najafi H, Robertson JT, Stoney

RJ, Toole JF. Carotid endarterectomy: practice

guidelines. Report of the Ad Hoc Committee to the

Joint Council of the Society for Vascular Surgery

and the North American Chapter of the International

Society for Cardiovascular Surgery. J Vasc Surg

1992 Mar;15(3):469-79.

Pilote L, Thomas RJ, Dennis C, Goins P, Houston

Miller N, Kraemer H, Leong C, Berger WE, Lew H,

Heller RS, et al. Return to work after uncomplicated

myocardial infarction: a trial of practice guidelines

in the community. Ann Intern Med 1992 Sep

1;117(5):383-9.

Practice guidelines in cardiothoracic surgery. Ann

Thorac Surg 1992 Jun;53(6):1138-46.

Practice guidelines in cardiothoracic surgery. Ann

Thorac Surg 1992 Apr;53(4):729-37.

[Prevention and treatment protocols of thromboembolic

disease]. Sangre (Barc) 1991 Aug;36(4):335-62.

(Spa).

The recognition and management of hyperlipidaemia in

adults: a policy statement of the European

Atherosclerosis Society. Eur Heart J 1988 May;

9(5):571-600.

[Recommendations from a meeting of experts: treatment

of atrial fibrillation]. Lakartidningen 1992 Mar 18;

89(12):979-82. (Swe).

Recommended guidelines for in-hospital cardiac

monitoring of adults for detection of arrhythmia.

Emergency Cardiac Care Committee Members.

J Am Coll Cardiol 1991 Nov 15;18(6):1431-3.

Risk assessment in the prevention of coronary heart

disease: a policy statement. Coronary Prevention

Group. Br J Gen Pract 1990 Nov;40(340):467-9.

Rosequist CC. Current standards and guidelines for

cardiopulmonary resuscitation and emergency

cardiac care. Heart Lung 1987 Jul;16(4):408-18.

Schlant RC, Adolph RJ, DiMarco JP, Dreifus LS, Dunn

MI, Fisch C, Garson A Jr, Haywood LJ, Levine HJ,

Murray JA, et al. Guidelines for

electrocardiography. A report of the College of

Cardiology/American Heart Association Task Force

on Assessment of Diagnostic and Therapeutic

Cardiovascular Procedures (Committee on

Electrocardiography). J Am Coll Cardiol 1992

Mar 1;19(3):473-81.

Smith GB, Hirsch NP, Ehrenwerth J. Proceedings of the

1985 National Conference on Standards and

Guidelines for Cardiopulmonary Resuscitation and

Emergency Cardiac Care. July 11-13, Dallas, Texas.

Placement of double-lumen endobronchial tubes.

Correlation between clinical impressions and

bronchoscopic findings. Circulation 1986 Dec;74

(6 Pt 2):I51-153.

Standards and guidelines for Cardiopulmonary

Resuscitaton (CPR) and Emergency Cardiac Care

(ECC). JAMA 1986 Jun 6;255(21):2905-89.

Published erratum appears in JAMA 1986 Oct 3;

256(13):1727.

Strandness DE Jr, Andros G, Baker JD, Bernstein EF.

Vascular laboratory utilization and payment: report

of the Ad Hoc Committee of the Western Vascular

Society. J Vasc Surg 1992 Aug;16(2):163-70.

Strategies for the prevention of coronary heart disease: a

policy statement of the European Atherosclerosis

Society. Eur Heart J 1987 Jan;8(1):77-88.

Strawn J, Kugler JD. Revised recommendations for the

prevention of aterial endocarditis. Nebr Med J 1991

Nov;76(11):350-2.

Thiele BL, Jones AM, Hobson RW, Bandyk DF, Baker

WH, Sumner DS, Rutherford RB. Standards in

noninvasive cerebrovascular testing. Report from the

Committee on Standards for Noninvasive Vascular

Testing of the Joint Council of the Society for

Vascular Surgery and the North American Chapter

of the International Society for Cardiovascular

Surgery. J Vasc Surg 1992 Mar; 15(3):495-503.

van Crevel H. [Consensus cerebrovascular accident].

Ned Tijdschr Geneeskd 1991 Nov 30;135(48):

2280-8. (Dut).

DENTISTRY

AAOMS position statement on impacted and unerupted

teeth. VA Dent J 1991 Oct-Dec;68(4):23-4.

Brokaw WC. The third molar question: when and why

should we recommend removal? VA Dent J 1991

Oct-Dec;68(4):18-21.

Cost-effectiveness of sealants in private practice and

standards for use in prepaid dental care. Council on

Dental Research. J Am Dent Assoc 1985 Jan;

110(1):103-7.

Creighton JM. Dental care for the pediatric cardiac

patient. J Can Dent Assoc 1992 Mar;58(3):201-2,

206-7.

Graehn G. [Acid erosions of tooth surface. 3. Prevention

and therapy]. Dtsch Stomatol 1991; 41(12):505-7.

(Ger).

James DW. General anaesthesia, sedation and

resuscitation in dentistry. Br Dent J 1991 Dec 7-21;

171(11-12):345-7.

Little JW, Rhodus NL. Dental management of the heart

transplant patient. Gen Dent 1992 Mar-Apr;40(2):

126-31.

Matteson SR, Joseph LP, Bottomley W, Finger HW,

Frommer HH, Koch RW, Matranga LF, Nowak AJ,

Rachlin JA, Schoenfeld CM, et al. The report of the

panel to develop radiographic selection criteria for

dental patients. Gen Dent 1991 Jul-Aug;

39(4):264-70.

Melrose RJ. Do’s and don’ts of oral soft tissue biopsy in

dental practice. J Calif Dent Assoc 1991 Oct;

19(10):39-42.

Owens BM, Hart GT, Schuman NJ. Prophylactic

antibiotic management of dental patients with

prosthetic joints. J Tenn Dent Assoc 1992 Jan;

72(1):16-8.

RACDS and ANZCA policy on sedation for dental

procedures. Aust Dent J 1992 Jun;37(3):234-6.

Rateitschak-Pluss EM, Rateitschak KH. [What is

periodontal therapy? Guidelines for practice]. Phillip

J Restaur Zahnmed 1991 Dec;8(6):349-53. (Ger).

Truelove EL, Sommers EE, LeResche L, Dworkin SF,

Von Korff M. Clinical diagnostic criteria for TMJ.

New classification permits multiple diagnoses. J Am

Dent Assoc 1992 Apr;123(4):47-54.

van Waas MA, Denissen HW, de Koomen HA, de

Lange GL, van Oort RP, Wismeyer D, Wolf JW.

Dutch consensus on guidelines for superstructures

on endosseous implants in the edentulous mandible.

J Oral Implantol 1991;17(4):390-2.

DERMATOLOGY

Drake LA, Ceilley RI, Cornelison RL, Dobes WL,

Dorner W, Goltz RW, Lewis CW, Salasche SJ,

Turner ML, Coskey RJ, et al. Guidelines of care for

alopecia areata. J Am Acad Dermatol 1992 Feb;

26(2 Pt 1):247-50.

Green E, Katz J. Practice guidelines for management of

pressure ulcers. Decubitus 1991 Feb;4(1):36, 38, 40,

42.

Guideline released on pressure ulcers. Am Nurse 1992

Jul-Aug;24(7):17.

Guidelines for management of patients with psoriasis.

Workshop of the Research Unit of the Royal

College of Physicians of London; Department of

Dermatology, University of Glasgow; British

Association of Dermatologists. BMJ 1991 Oct 5;

303(6806):829-35.

Guidelines of care for atopic dermatitis. American

Academy of Dermatology. J Am Acad Dermatol

1992 Mar;26(3 Pt 2):485-8.

Hoffman R, Lile JL, Mace K, Pase M. Standards of care

for hospice patients with pressure ulcers. Decubitus

1991 Nov;4(4):19-20, 22, 24.

How to predict and prevent pressure ulcers. Am J Nurs

1992 Jul;92(7):52-60.

Lindberg P, Gunnarsson L, Tokics L, Secher E,

Lundquist H, Brismar B, Hedenstierna G. Pressure

ulcers in adults: prediction and prevention. Agency

for Health Care Policy and Research. Atelectasis

and lung function in the postoperative period. Am

Fam Physician 1992 Sep;46(3):787-94.

Nyfors A. [Control of cutaneous melanoma]. Tidsskr

Nor Laegeforen 1992 Jun 30;112(17):2225. (Nor).

Pochi PE, Ceilley RI, Coskey RJ, Drake LA, Jansen GT,

Rodman OG Jr, Turner MC, Webster SB.

Guidelines for prescribing isotretinoin (Aaccutane)

in the treatment of female acne patients of

childbearing potential. Acne Subgroup, Task Force

on Standards of Care. J Am Acad Dermatol 1988

Nov;19(5 Pt 1):920.

Pressure ulcers in adults: prediction and prevention. Clin

Pract Guidel 1992 May;(3):1-63.

Proposed recommended practices. Skin preparation of

patients. AORN J 1992 Feb;55(2):555-62.

Verschuur AC, van Everdingen JJ, Cohen EB,

Chamuleau RA. Liver biopsy versus ultrasound in

methotrexate-treated psoriasis: a decision analysis.

Int J Dermatol 1992 Jun;31(6):404-9.

West BJ, Brockman SJ, Scott A. Action research and

standards of care. The prevention and treatment of

pressure sores in elderly patients. Health Bull

(Edinb) 1991 Nov;49(6):356-61.

Young JB, Dobrzanski S. Pressure sores. Epidemiology

and current management concepts. Drugs Aging

1992 Jan-Feb;2(1):42-57.

ENDOCRINE SYSTEM

Clinical practice guidelines for treatment of diabetes

mellitus. Expert Committee of the Canadian

Diabetes Advisory Board. Can Med Assoc J 1992

Sep 1;147(5):697-712.

Connor H, Marks V. Alcohol and diabetes. A position

paper prepared by the Nutrition Subcommittee of the

British Diabetic Association’s Medical Advisory

Committee and approved by the Executive Council

of the British Diabetic Association. Hum Nutr Appl

Nutr 1985 Dec;39(6):393-9.

Diagnostic and therapeutic technology assessment.

Continuous subcutaneous insulin infusion. JAMA

1989 Sep 1;262(9):1239-43.

Franz MJ. Practice guidelines for nutrition care by

dietetics practitioners for outpatients with

non-insulin-dependent diabetes mellitus: consensus

statement. J Am Diet Assoc 1992 Sep;92(9):

1136-9.

Hanssen KF, Jenssen T. [Treatment of non-insulin

dependent diabetes (type 2 diabetes mellitus)].

Tidsskr Nor Laegeforen 1992 Mar 10;112(7):912-4.

(Nor).

Hemgren B, Sundman L, Tibblin G. [Medical practice

as a basis of quality assurance in the care of

diabetics in Gavleborg]. Lakartidningen 1992

Apr 8;89(15):1280-1. (Swe).

Mazze RS, Franz MJ, Monk A, Cooper N, Barry B,

Weaver T, McClain K, Upham P, Haugen D,

Bergenstal R. Practice guidelines for nutrition care

by dietetics practitioners for outpatients with

non-insulin-dependent diabetes mellitus:

methodologies for field-testing and

cost-effectiveness analysis. J Am Diet Assoc

1992 Sep;92(9):1139-42.

Metzger BE. Summary and recommendations of the

Third International Workshop-Conference on

Gestational Diabetes Mellitus. Diabetes 1991 Dec;

40 Suppl 2:197-201.

National standards and review criteria for diabetes

patient education programs: quality assurance for

diabetes patient education. Diabetes Educ 1986

Summer;12(3):286-91.

Pedersen O, Hermansen K, Palmvig B, Pedersen SE,

Sondergaard K. [Recommendations for diabetic

diet]. Ugeskr Laeger 1992 Mar 30;154(14):940-1.

(Dan).

Policy statement. Self-monitoring of blood glucose.

American Diabetes Association. Diabetes 1985 Sep;

34(9):945.

Rames I. [Dietary recommendations of the Czech

Diabetology Society for Adults with Diabetes

Mellitus]. Vnitr Lek 1992 Feb;38(2):204-8. (Cze).

The scope of practice for diabetes educators and the

standards of practice for diabetes educators.

American Association of Diabetes Educators.

Diabetes Educ 1992 Jan-Feb;18(1):52-6.

Standards of medical care for patients with diabetes

mellitus. Diabetes Care 1989 May;12(5):365-8.

Standards of medical care for patients with diabetes

mellitus. American Diabetes Association. Pa Med

1990 Jan;93(1):24-6, 28, 30.

Standards of medical care for patients with diabetes

mellitus. Diabetes care. Conn Med 1991 Nov;

55(11):630-3.

GASTROINTESTINAL SYSTEM

Bottrill P. Gastrointestinal endoscopy--guidelines for

safe clinical practice: a British perspective.

Gastroenterol Nurs 1991 Spring;13(4):234-8.

Bremner CG. South African Gastro-Enterology Society

guidelines for oesophageal endoscopy. S Afr Med J

1992 Apr 4;81(7):370-2.

Danan G. Causality assessment of drug-induced liver

injury. J Hepatol 1988 Aug;7(1):132-6.

Diagnostic and therapeutic technology assessment.

Angelchik antireflux prosthesis. JAMA 1986

Sep 12;256(10):1358-60.

Diagnostic and therapeutic technology assessment.

Continuous arteriovenous hemofiltration. JAMA

1985 Mar 1;253(9):1325-6.

Diagnostic and therapeutic technology assessment.

Endoscopic electrocoagulation of gastrointestinal

tract hemorrhage. JAMA 1985 May 10;253(18):

2733-4.

Diagnostic and therapeutic technology assessment.

Endoscopic laser photocoagulation of

gastrointestinal tract hemorrhage. JAMA 1985

May 10;253(18):2732-3.

Diagnostic and therapeutic technology assessment.

Endoscopic thermal coagulation of gastrointestinal

tract hemorrhage. JAMA 1985 May 10;253(18):

2733.

Diagnostic and therapeutic technology assessment.

Endoscopic topical therapy of gastrointestinal tract

hemorrhage. JAMA 1985 May 10;253(18):2734-5.

Diagnostic and therapeutic technology assessment.

Garren gastric bubble. JAMA 1986 Dec 19;

256(23):3282-4.

Diagnostic and therapeutic technology assessment.

Gastric restrictive surgery. JAMA 1989 Mar 10;

261(10):1491-4.

Diagnostic and therapeutic technology assessment.

Pancreatic transplantations. JAMA 1991 Jan 23-30;

265(4):510-4.

Diagnostic and therapeutic technology assessment. Rigid

and flexible sigmoidoscopies. JAMA 1990 Jul 4;

264(1):89-92.

Laparoscopic cholecystectomy. JAMA 1991 Mar 27;

265(12):1585-7.

[Laparoscopic cholecystectomy. Recommendations of

the Professional College of Surgeons]. Orv Hetil

1991 Oct 13;132(41):2281. (Hun).

Madden MV. South African Gastro-Enterology Society

guidelines for colonoscopy in premalignant

conditions and after resection of large-bowel cancer.

S Afr Med J 1992 Apr 4;81(7):369-70.

Ramsey BW, Farrell PM, Pencharz P. Nutritional

assessment and management in cystic fibrosis: a

consensus report. The Consensus committee. Am J

Clin Nutr 1992 Jan;55(1):108-16.

Rosch T, Classen M. [Guidelines for endoscopic studies

in gastroenterology. Endosonography in tumor of the

gastrointestinal tract]. Z Gastroenterol 1992

Feb;30(2):167-70. (Ger).

Sitzmann JV, Pitt HA. Statement on guidelines for total

parenteral nutrition. The Patient Care Committee of

the American Gastroenterological Association. Dig

Dis Sci 1989 Apr;34(4):489-96.

A standardized protocol for the methodology of

esophageal pH monitoring and interpretation of the

data for the diagnosis of gastroesophageal reflux.

Working Group of the European Society of Pediatric

Gastroenterology and Nutrition. J Pediatr

Gastroenterol Nutr 1992 May;14(4):467-71.

Standards of care. Patient with colostomy. Part II.

J Enterostomal Ther 1989 Nov-Dec;16(6):256-63.

GENETICS

American Society of Human Genetics policy statement

for maternal serum alpha-fetoprotein screening

programs and quality control for laboratories

performing maternal serum and amniotic fluid

alpha-fetoprotein assays. Am J Hum Genet 1987

Feb;40(2):75-82.

Garver KL. Update on MSAFP policy statement from

the American Society of Human Genetics. Am J

Hum Genet 1989 Aug;45(2):332-4.

Hall J, Hamerton J, Hoar D, Korneluk R, Ray P,

Rosenblatt D, Wood S. Policy statement concerning

DNA banking and molecular genetic diagnosis.

Canadian College of Medical Geneticists. Clin

Invest Med 1991 Aug;14(4):363-5.

Maternal serum alpha-fetoprotein screening programs

and quality control for laboratories performing

maternal serum and amniotic fluid alpha-fetoprotein

assays: policy statement. American Society of

Human Genetics. Can Med Assoc J 1987 Jun 15;

136(12):1253-6.

Olsthoorn-Heim ET. [What is allowable and what is

compulsory in heredity studies? Guidelines of the

Society for Health Legislation]. Ned Tijdschr

Geneeskd 1992 Mar 28;136(13):616-8. (Dut).

Prenatal diagnosis and genetic screening. Community

and service implications. Summary and

recommendations of a report of the Royal College

of Physicians. J R Coll Physicians Lond 1989 Oct;

23(4):215-20.

Went L. Ethical issues policy statement on Huntington’s

disease molecular genetics predictive test. J Med

Genet 1990 Jan;27(1):34-8.

GERIATRICS

Davis BA, Lee PL. Standards of gerontological/long

term care nursing practice. QRB Qual Rev Bull

1987 Nov;13(11):377-9.

Jagenburg R, Landahl S, Lindstedt G, Ljunghall S,

Nilsson Ehle H. [How to differentiate between

health and disease in diagnosing the elderly?]

Lakartidningen 1992 Apr 22;89(17):1467-73.

(Swe).

Psychotherapeutic medications in the nursing home.

Board of Directors of the American Association for

Geriatric Psychiatry, Clinical Practice Committee of

the American Geriatrics Society, and Committee on

Long-Term Care and Treatment for the Elderly,

American Psychiatric Association. J Am Geriatr Soc

1992 Sep;40(9):946-9.

HEMIC AND LYMPHATIC SYSTEMS

Asano S. [Guideline for bone marrow transplantation].

Nippon Naika Gakkai Zasshi 1992 Mar 10;81(3):

435. (Jpn).

Assmann G, Schulte H. European lipid guidelines:

therapeutic recommendations. Am J Cardiol 1989

May 2;63(16):53H-55H.

Asymptomatic hypercholesterolemia: a clinical policy

review. The Toronto Working Group on Cholesterol

Policy. J Clin Epidemiol 1990;43(10): 1028-121.

[Autotransfusion. Recommendations of the Professional

College of Transfusiology]. Orv Hetil 1992 Aug 30;

133(35):2239-42. (Hun).

Diagnostic and therapeutic technology assessment.

Allogeneic bone marrow transplantation for chronic

myelogenous leukemia. JAMA 1990 Dec 26;

264(24):3208-11.

Diagnostic and therapeutic technology assessment.

Autologous bone marrow transplantation. JAMA

1986 Jul 4;256(1):98-101.

Diagnostic and therapeutic technology assessment.

Autologous bone marrow transplantation--

reassessment. JAMA 1990 Feb 9;263(6):881-7.

Published erratum appears in JAMA 1990 Jul 18;

264(3):338.

Dinkelaar RB, Holdrinet RS. [Protocol in

paraproteinemias]. Ned Tijdschr Geneeskd 1991

Nov 23;135(47):2223-6. (Dut).

Eden OB, Lilleyman JS. Guidelines for management of

idiopathic thrombocytopenic purpura. The British

Paediatric Haematology Group. Arch Dis Child

1992 Aug;67(8):1056-8.

Eklund J, Jorgensen J, Hogman C, Jensson O, Kornstad

L. [Scandinavian recommendations for transfusion

medicine]. Nord Med 1991;106(11):299-300. (Swe).

From ASCO: recommended criteria for the performance

of bone marrow transplantation. Oncology

(Williston-Park) 1992 Jul;6(7):114.

Graff Iversen S, Holm HA, Istad H, Ose L, Rom AK,

Kristiansen IS, Thelle D, Torsvik H, Urdal P, Wiik

J. [Treatment of hypercholesterolemia in adults. A

treatment program 1991]. Tidsskr Nor Laegeforen

1991 Nov 20;111(28):3407-11. (Nor).

Guidelines for compatibility testing in hospital blood

banks. A joint publication of the British Society for

Haematology and the British Blood Transfusion

Society. Clin Lab Haematol 1987;9(3):333-41.

Guidelines for haemoglobinopathy screening. The

British Society for Haematology. Clin Lab Haematol

1988;10(1):87-94.

Jensen BA. [Emergency blood supplies and their use in

elective surgery. Background and directives for

rational blood reservation and transfusion strategy].

Ugeskr Laeger 1992 Mar 23;154(13):846-9. (Dan).

Practice strategies for elective red blood cell transfusion.

American College of Physicians. Ann Intern Med

1992 Mar 1;116(5):403-6.

Recommendations on choice of therapeutic products for

the treatment of patients with haemophilia A,

haemophilia B and von Willebrand’s. UK Regional

Haemophilia Centre Directors Committee. Blood

Coagul Fibrinolysis 1992 Apr;3(2):205-14.

HOSPITALS

"Adopted standards for the regulation of medical waste"

in health care facilities licensed by the Mississippi

State Department of Health. J Miss State Med Assoc

1990 Oct;31(10):335-8.

Dummler W. Standardization of diagnostic laboratory

methods-- results, experiences and future goals.

Przegl Lek 1989;46(7):574- 7.

Hospital and prehospital resources for optimal care of

patients with burn injury: guidelines for

development and operation of burn centers.

American Burn Association. J Burn Care Rehabil

1990 Mar-Apr;11(2):98-104.

Minimum practice standards for clinical pharmacy

specialists with interpretation for organized

health-care settings. Clinical Practice Affairs

Committee of the American College of Clinical

Pharmacy, 1985-86. Drug Intell Clin Pharm 1987

Jul-Aug;21(7-8):645-7.

Strom I. [Drug handling. Standard routines in

institutions]. Fag Tidsskr Sykepleien 1992 Jun 15;

80(3):34-5. (Nor).

INFECTIOUS AND COMMUNICABLE

DISEASES

Aavitsland P, Lystad A. [Contact tracing in genital

chlamydia infections]. Tidsskr Nor Laegeforen 1992

May 20;112(13):1719-22. (Nor).

Adcock LM, Bissey JD, Feigin RD. A new look at

measles. Infect Dis Clin North Am 1992 Mar;6(1):

133-48.

American Academy of Pediatrics Committee on

Infectious Disease: acellular pertussis vaccines:

recommendations for use as the fourth and fifth

doses. Pediatrics 1992 Jul;90(1 Pt 1):121-3.

American College of Chest Physicians/Society of

Critical Care Medicine Consensus Conference:

definitions for sepsis and organ failure and

guidelines for the use of innovative therapies in

sepsis. Crit Care Med 1992 Jun;20(6):864-74.

Bohnen JM, Solomkin JS, Dellinger EP, Bjornson HS,

Page CP. Guidelines for clinical care: anti-infective

agents for intra-abdominal infection. A Surgical

Infection Society policy statement. Arch Surg 1992

Jan;127(1):83-9; discussion 89.

CDC recommends a comprehensive strategy to eliminate

HBV. Am Fam Physician 1992 Apr; 45(4):1912-4,

1917.

Fluconazole: a position statement by the Society of

Infectious Diseases Pharmacists. Ann Pharmacother

1992 Jun;26(6):809-11.

Garner JS, Jarvis WR, Emori TG, Horan TC, Hughes

JM. [CDC definitions for nosocomial infections

1988]. Z Arztl Fortbild (JENA) 1991 Sep 10;

85(17):818-27. (Ger).

Guidelines for the care of patients with hemodynamic

instability associated with sepsis. Guidelines

Committee; Society of Critical Care Medicine. Crit

Care Med 1992 Jul;20(7):1057-9.

Guidelines on the management of tuberculosis and HIV

infection in the United Kingdom. Subcommittee of

the Joint Tuberculosis Committee of the British

Thoracic Society. BMJ 1992 May 9;304(6836):

1231-3.

Hardie J. A 1992 update on hepatitis B vaccination.

J Can Dent Assoc 1992 Jul;58(7):569-70.

Hoppe JE, Helwig H, Isenberg H, Noack R. [Guidelines

for the chemoprophylaxis of meningitis caused by

Haemophilus influenzae type B]. Monatsschr

Kinderheilkd 1991 Dec;139(12):849-50. (Ger).

Interim guidelines for the treatment of uncomplicated

gonococcal infection. Can Med Assoc J 1992

May 1;146(9):1587-8, 1591-2.

Larson E, Horan T, Cooper B, Kotilainen HR, Landry S,

Terry B. Study of the definition of nosocomial

infections (SDNI). Research Committee of the

Association for Practitioners in Infection Control.

Am J Infect Control 1991 Dec;19(6):259-67.

Matsumoto K, Omori A, Amano H, Mitarai S. [A guide

to prevent infectious disease due to MRSA]. Nippon

Rinsho 1992 May;50(5):945-51. (Jpn).

McGowan JE Jr, Chesney PJ, Crossley KB, LaForce

FM. Guidelines for the use of systemic

glucocorticosteroids in the management of selected

infections. Working Group on Steroid Use,

Antimicrobial Agents Committee, Infectious

Diseases Society of America. J Infect Dis 1992 Jan;

165(1):1-13.

Ohman L, Fryden A. [Prevention and treatment of

whooping cough. Follow the recommendations of

the National Board of Health and Welfare].

Lakartidningen 1992 Mar 4;89(10):760. (Swe).

Peel AL, Taylor EW. Proposed definitions for the audit

of postoperative infection: a discussion paper.

Surgical Infection Study Group. Ann R Coll Surg

Engl 1991 Nov;73(6):385-8.

Pertussis vaccination: acellular pertussis vaccine for

reinforcing and booster use--supplementary ACIP

statement. Recommendations of the Immunization

Practices Advisory Committee (ACIP). MMWR

Morb Mortal Wkly Rep 1992 Feb 7;41(RR 1):1-10.

Prevention and control of influenza. Recommendations

of the Immunization Practices Advisory Committee

(ACIP). MMWR Morb Mortal Wkly Rep 1992 May

15;41(RR-9):1-17.

Prevention and control of tuberculosis among homeless

persons. Recommendations of the Advisory Council

for the Elimination of Tuberculosis. MMWR Morb

Mortal Wkly Rep 1992;41(RR 5):13-23.

Prevention and control of tuberculosis in facilities

providing long-term care to the elderly.

Recommendations of the Advisory Committee for

Elimination of Tuberculosis. MMWR Morb Mortal

Wkly Rep 1990 Jul 13;39(RR 10):7-13.

Prevention and control of tuberculosis in U.S.

communities with at-risk minority populations.

Recommendations of the Advisory Council for the

Elimination of Tuberculosis. MMWR Morb Mortal

Wkly Rep 1992 Apr 17;41(RR 5):1-11.

Recommendations for preventing transmission of human

immunodeficiency virus and hepatitis B virus to

patients during exposure-prone invasive procedures.

MMWR Morb Mortal Wkly Rep 1991 Jul 12;40

(RR 8):1-9.

Recommended practices. Aseptic technique. AORN J

1991 Oct;54(4):819-24.

Rhinehart E, Goldmann DA, O’Rourke EJ. Adaptation

of the Centers for Disease Control guidelines for the

prevention of nosocomial infection in a pediatric

intensive care unit in Jakarta, Indonesia. Am J Med

1991 Sep 16;91(3B):213S-220S.

Stability of vaccines. Philipp J Nurs 1991 Jul-Dec;

61(3-4):36-7.

Swerdlow DL, Ries AA. Cholera in the Americas.

Guidelines for the clinician. JAMA 1992 Mar 18;

267(11):1495-9.

Toward the rational management of herpes infection in

pregnant women and their newborn infants.

Infectious Diseases and Immunization Committee,

Canadian Paediatric Society. Can Med Assoc J 1992

May 1;146(9):1557-60, 1563-6.

Typhoid immunization. Recommendations of the

Immunization Practices Advisory Committee

(ACIP). MMWR Morb Mortal Wkly Rep 1990

Jul 13;39(RR 10):1-5.

Update on adult immunization. Recommendations of the

Immunization Practices Advisory Committee

(ACIP). MMWR Morb Mortal Wkly Rep 1991

Nov 15;40(RR 12):1-94.

Vaccinia (smallpox) vaccine. Recommendations of the

Immunization Practices Advisory Committee

(ACIP). MMWR Morb Mortal Wkly Rep 1991

Dec 13;40(RR 14):1-10.

Wenzel RP, Andriole VT, Bartlett JG, Batt MD, Bullock

WE, Cobbs CG, Light B, Martin MA, Sanford J,

Sande MA. Antiendotoxin monoclonal antibodies for

gram-negative sepsis: guidelines from the IDSA.

Clin Infect Dis 1992 Apr;14(4):973-6.

METABOLIC AND IMMUNOLOGIC

DISEASES

ACOG (American College of Obstetricians and

Gynecologists) issues report on HIV infection in

women. Am Fam Physician 1992 Aug;46(2):

579-82, 585.

AIDS: recommendations & guidelines (Nov 1982-Nov

1986). Health-care workers and laboratory

personnel. Ohio Med 1987 Oct;83(10):698-9, 701.

ASHP therapeutic guidelines for intravenous immune

globulin. ASHP Commission on Therapeutics. Clin

Pharm 1992 Feb;11(2):117-36.

Association of Nurses in AIDS Care. Position paper:

duty to care. J Assoc Nurses AIDS Care 1991;

2(4):44.

Bousquet J, Muller UR, Dreborg S, Jarisch R, Malling

HJ, Mosbech H, Urbanek R, Youlten L.

Immunotherapy with Hymenoptera venoms. Position

paper of the Working Group on Immunotherapy of

the European Academy of Allergy and Clinical

Immunology. Allergy 1987 Aug;42(6):401-13.

Butters N, Grant I, Haxby J, Judd LL, Martin A,

McClelland J, Pequegnat W, Schacter D, Stover E.

Assessment of AIDS-related cognitive changes:

recommendations of the NIMH Workshop on

Neuropsychological Assessment Approaches. J Clin

Exp Neuropsychol 1990 Dec;12(6):963-78.

Calabrese LH, Condoluci D. Simple guidelines for HIV

testing in the physician’s practice. J Am Osteopath

Assoc 1992 Apr;92(4):499-500.

CDC releases recommendations for prophylaxis against

Pneumocystis carinii pneumonia. Am Fam Physician

1992 Jul;46(1):284-6.

Davis JM, Demling RH, Lewis FR, Hoover E,

Waymack JP. The Surgical Infection Society’s

policy on human immunodeficiency virus and

hepatitis B and C infection. The Ad Hoc Committee

on Acquired Immunodeficiency Syndrome and

Hepatitis. Arch Surg 1992 Feb;127(2):218-21.

DeHovitz JA, Sadovsky R. Initial clinical assessment

and management of HIV infection. Prim Care 1992

Mar;19(1):35-56.

Diagnostic and therapeutic technology assessment.

Prophylactic treatment for opportunistic infections in

HIV-positive patients: aerosolized pentamidine.

JAMA 1990 May 9;263(18):2510-4.

Diagnostic and therapeutic technology assessment.

Surrogate markers of progressive HIV disease.

JAMA 1992 Jun 3;267(21):2948-52.

From the Centers for Disease Control.

Recommendations for prophylaxis against

Pneumocystis carinii pneumonia for adults and

adolescents infected with HIV. JAMA 1992 May 6;

267(17):2294-6, 2298-9.

Goodwin SD, Shipp KW. Criteria for use of zidovudine

in adult and pediatric inpatients and outpatients. Clin

Pharm 1992 Jan;11(1):63-8.

Guidelines for nursing management of people infected

with human immunodeficiency virus (HIV)--

W.H.O. Ir Nurs News 1991 Autumn;12(1):2, 5.

Guidelines for the care of HIV-infected persons in

hospitals. Nurs RSA 1992 Jan;7(1):43.

Halloran J, Hughes A, Mayer DK. Oncology Nursing

Society-- position paper on HIV-related issues.

Oncol Nurs Forum 1988 Mar-Apr;15(2):206-17.

Iwarson S. [The new USA-guidelines on transmission of

infections via blood from health personnel should be

followed even in Sweden]. Lakartidningen 1991

Oct 23;88(43):3541-2. (Swe).

Jackson MM, Stanley SR, Nelson P, Richardson DR,

White GB. Compendium of HIV/AIDS positions,

policies and documents. April 1992. ANA Publ

1992 May;(PR-8.6M):i, 1-17, A1-M1.

Medical Association of Georgia’s 1987 report on human

immunodeficiency virus. AIDS related complex and

acquired immunodeficiency syndrome. J Med Assoc

Ga 1988 Jan;77(1):41-9.

Mycobacterioses and the acquired immunodeficiency

syndrome. Joint position paper of the American

Thoracic Society and the Centers for Disease

Control. Am Rev Respir Dis 1987 Aug;136(2):

492-6.

Norberg B, Almay B, Ernerudh J, Fehling C, Johansson

B, Link H, Lundberg PO, Persson L, Tegner R.

[Neurological institutes agree: they suggest new

guidelines for handling of suspected vitamin B12

deficiency]. Lakartidningen 1992 May

27;89(22):2011-2. (Swe).

Northfelt DW. Evaluation and treatment of later

manifestations of HIV infection. Prim Care 1992

Mar;19(1):57-85.

O’Brien TR, George JR, Epstein JS, Holmberg SD,

Schochetman G. Testing for antibodies to human

immunodeficiency virus type 2 in the United States.

MMWR Morb Mortal Wkly Rep 1992 Jul 17;41

(RR 12):1-9.

PAHO guidelines for AIDS. Bull Pan Am Health Organ

1989;23(1-2):158-61.

Periodic health examination, 1992 update: 3. HIV

antibody screening. Canadian Task Force on the

Periodic Health Examination. Can Med Assoc J

1992 Sep 15;147(6):867-76.

Position paper: the HIV-infected health care worker. The

Association for Practitioners in Infection Control.

The Society of Hospital Epidemiologists of

America. Am J Infect Control 1990 Dec;18(6):

371-82.

Position paper: the HIV-infected healthcare worker. The

Association for Practitioners in Infection Control;

the Society of Hospital Epidemiologists of America.

Infect Control Hosp Epidemiol 1990 Dec;11(12):

647-56.

Position paper on AIDS/HIV infection. Pennsylvania

Public Health Association. Pa Med 1990 Oct;

93(10):52-4.

Prevention and control of AIDS--an interim report from

the AMA Board of Trustees. Hawaii Med J 1987

Aug;46(8):293-6, 299-300.

Proposed recommended practices. Universal precautions.

AORN J 1992 Jul;56(1):115-9.

Recommendations: HIV/HBV infected health care

workers. Connecticut Department of Health

Services. Conn Med 1992 Apr;56(4):213-6.

Recommendations for preventing transmission of human

immunodeficiency virus and hepatitis B virus to

patients during exposure-prone invasive procedures.

AORN J 1991 Sep;54(3):576-82.

Recommendations for prevention of HIV transmission in

health-care settings. NY State J Med 1988 Jan;

88(1):25-31.

Recommendations for prophylaxis against Pneumocystis

carinii pneumonia for adults and adolescents

infected with human immunodeficiency virus.

MMWR Morb Mortal Wkly Rep 1992 Apr 10;41

(RR 4):1-11.

Skin tests used in type I allergy testing position paper.

Sub-Committee on Skin Tests of the European

Academy of Allergology and Clinical Immunology.

Allergy 1989;44 Suppl 10:1-59.

SMS Board of Directors adopts new guidelines on

HIV-infected health care workers. Wis Med J 1992

Feb;91(2):95-6.

Sullivan LW. "Exposure-prone" procedures. J Intraven

Nurs 1992 Jan-Feb;15(1):58-9.

The use of in vitro tests for IgE antibody in the specific

diagnosis of IgE-mediated disorders and in the

formulation of allergen immunotherapy. American

Academy of Allergy and Immunology. J Allergy

Clin Immunol 1992 Aug;90(2):263-7.

Wiesenthal AM, Ressman M, Caston SA, Todd JK.

Toxic shock syndrome. I. Clinical exclusion of other

syndromes by strict and screening definitions. Am J

Epidemiol 1985 Nov;122(5):847-56.

Witt RC, Silvestre AJ, Rinaldo CR Jr, Lyter DW.

Guidelines for disclosing HIV-antibody test results

to clients. Nurse Pract 1992 Jan;17(1):55, 59, 63.

MUSCULOSKELETAL SYSTEM

Altman R, Alarcon G, Appelrouth D, Bloch D,

Borenstein D, Brandt K, Brown C, Cooke TD,

Daniel W, Gray R, et al. The American College of

Rheumatology criteria for the classification and

reporting of osteoarthritis of the hand. Arthritis

Rheum 1990 Nov;33(11):1601-10.

Altman R, Asch E, Bloch D, Bole G, Borenstein D,

Brandt K, Christy W, Cooke TD, Greenwald R,

Hochberg M, et al. Development of criteria for the

classification and reporting of osteoarthritis.

Classification of osteoarthritis of the knee. Arthritis

Rheum 1986 Aug;29(8):1039-49.

Bonnaire F, Schlickewei W, Kner EH. [Current

guidelines for fracture treatment. 6: Follow-up care,

removal of metal implants]. Fortschr Med 1992 May

20;110(14):263-4. (Ger).

Diagnostic and therapeutic technology assessment.

Chemonucleolysis for herniated lumbar disk. JAMA

1989 Aug 18;262(7):953-6.

Diagnostic and therapeutic technology assessment

(DATTA). Noninvasive electrical stimulation for

nonunited bone fracture. JAMA 1989 Feb 10;

261(6):917-9. Published erratum appears in JAMA

1989 Jun 9;261(22):3246.

Diagnostic and therapeutic technology assessment.

Laminectomy and microlaminectomy for treatment

of lumbar disk herniation. JAMA 1990 Sep 19;

264(11):1469-72.

Diagnostic and therapeutic technology assessment.

Percutaneous lumbar diskectomy for herniated disks.

JAMA 1989 Jan 6;261(1):105-9. Published erratum

appears in JAMA 1989 May 26;261(20): 2958.

Diagnostic and therapeutic technology assessment.

Reassessment of automated percutaneous lumbar

diskectomy for herniated disks. JAMA 1991

Apr 24;265(16):2122-3, 2125.

Duruz H. [Traumatology of the cervical spine at the

general practitioner’s office]. Rev Med Suisse

Romande 1992 Jul;112(7):653-9. (Fre).

Guidelines and a proposed audit protocol for the initial

management of an acute hot joint. Report of a Joint

Working Group of the British Society for

Rheumatology and the Research Unit of the Royal

College of Physicians. J R Coll Physicians Lond

1992 Jan;26(1):83-5.

Guidelines and audit measures for the specialist

supervision of patients with rheumatoid arthritis.

Report of a Joint Working Group of the British

Society for Rheumatology and the Research Unit of

the Royal College of Physicians. J R Coll

Physicians Lond 1992 Jan;26(1):76-82.

Gunta K, Jauernig PR, Weidman J, Weinel D,

Whittington C, Salmond S, Dean Baar S. Orthopedic

nursing practice guidelines. The NAON Standards

Task Force. Orthop Nurs 1992 Jul-Aug; 11(4):8-10.

Kanis JA, Geusens P, Christiansen C. Guidelines for

clinical trials in osteoporosis. A position paper of

the European Foundation for Osteoporosis and Bone

Disease. Osteoporos Int 1991 Jun;1(3):182-8.

Mangine RE, Noyes FR, DeMaio M. Minimal protection

program: advanced weight bearing and range of

motion after ACL reconstruction--weeks 1 to 5.

Orthopedics 1992 Apr;15(4):504-15.

[Recommendations from an expert group: drug therapy

of rheumatoid arthritis). Lakartidningen 1992

May 20;89(21):1923-6. (Swe).

Rush D, Rosenberg IH. Folate supplements and neural

tube defects. Nutr Rev 1992 Jan;50(1):25-6.

Stromsoe K. [Unstable spinal injuries. Guidelines for

treatment]. Tidsskr Nor Laegeforen 1992 Apr 10;

112(10):1282-6. (Nor).

NERVOUS SYSTEM

Acute pain management: operative or medical

procedures and trauma. Agency for Health Care

Policy and Research. Clin Pract Guidel 1992

Feb;(1):1-145.

Acute pain management: operative or medical

procedures and trauma, Part 1. Agency for Health

Care Policy and Research. Clin Pharm 1992 Apr;

11(4):309-31.

Acute pain management: operative or medical

procedures and trauma, Part 2. Agency for Health

Care Policy and Research. Clin Pharm 1992 May;

11(5):391-414.

Acute pain management in adults: operative procedures.

Agency for Health Care Policy and Research. Am

Fam Physician 1992 Jul;46(1):128-38.

Acute pain management in infants, children and

adolescents: operative and medical procedures.

Agency for Health Care Policy and Research. Am

Fam Physician 1992 Aug;46(2):469-79.

ANA statements focus on pain. Am Nurse 1992 Feb;

24(2):7-8.

Cahill C, Panzarella C, Spross JA. Oncology Nursing

Society position paper on cancer pain. Pediatric

cancer pain. Oncol Nurs Forum 1990 Nov-Dec;

17(6):948-51.

Chui HC, Victoroff JI, Margolin D, Jagust W, Shankle

R, Katzman R. Criteria for the diagnosis of ischemic

vascular dementia proposed by the State of

California Alzheimer’s Disease Diagnostic and

Treatment Centers. Neurology 1992 Mar;42

(3 Pt 1):473-80.

Clinicians’ quick reference guide to acute pain

management in infants, children, and adolescents:

operative and medical procedures. Pain Management

Guideline Panel. Agency for Health Care Policy and

Research, US Department of Health and Human

Services. J Pain Symptom Manage 1992

May;7(4):229-42.

Clinicians’ quick reference guide to postoperative pain

management in adults. Pain Management Guideline

Panel. Agency for Health Care Policy and Research,

US Department of Health and Human Services. J

Pain Symptom Manage 1992 May;7(4): 214-28.

Diagnostic and therapeutic technology assessment.

Ablation of accessory pathways in the

Wolff-Parkinson-White Syndrome. JAMA 1987

Jul 17;258(3):384-6.

Diagnostic and therapeutic technology assessment.

Ablation of accessory pathways in the

Wolff-Parkinson-White Syndrome. JAMA 1987

Jul 24-31;258(4):542-4.

Diagnostic and therapeutic technology assessment.

Dorsal rhizotomy. JAMA 1990 Nov 21;264(19):

2569-70, 2572, 2574.

Diagnostic and therapeutic technology assessment.

Enhanced computed tomography in head trauma.

JAMA 1985 Dec 20;254(23):3370-1.

Diagnostic and therapeutic technology assessment.

Stereotactic cingulotomy. JAMA 1985 Nov 15;

254(19):2817-8.

Diagnostic and therapeutic technology assessment.

Vasoactive intracavernous pharmacotherapy for

impotence: papaverine and phentolamine. JAMA

1990 Aug 8;264(6):752-4.

Drake LA, Ceilley RI, Cornelison RL, Dobes WA,

Dorner W, Goltz RW, Lewis CW, Salasche SJ,

Turner ML, Arrowsmith DR, et al. Guidelines of

care for nevi I (nevocellular nevi and seborrheic

keratoses). Committee on Guidelines of Care. Task

Force on Nevocellular Nevi. J Am Acad Dermatol

1992 Apr;26(4):629-31.

Graham O, Naveau I, Cummings C. A model for

ambulatory care of patients with epilepsy and other

neurological disorders. J Neurosci Nurs 1989 Apr;

21(2):108-12.

Guidelines for the management of concussion in sports.

The School Health and Sports Medicine Committee,

Colorado Medical Society. Colo Med 1990 Aug;

87(8):4.

Hockenberg SJ. American Nurses Association position

statement on promotion of comfort and relief of pain

in dying patients. Plast Surg Nurs 1992

Spring;12(1):32, 36.

Jacox A, Ferrell B, Heidrich G, Hester N, Miaskowski

C. A guideline for the nation: managing acute pain.

Am J Nurs 1992 May;92(5):49-55.

James MF. Sedation and safety: South African Society

of Anaesthetist. S Afr Med J 1992 Apr 18;81(8):

394-5.

McCaffery M. Pain control. Barriers to the use of

available information. World Health Organization

Expert Committee on Cancer Pain Relief and Active

Supportive Care. Cancer 1992 Sep 1;70(5 Suppl):

1438-49.

Menges K. Proof of efficacy of nootropics for the

indication "dementia" (phase III)--recommendations.

Pharmacopsychiatry 1992 May;25(3):126-35.

Miaskowski C, Donovan M. Implementation of the

American Pain Society quality assurance standards

for relief of acute pain and cancer pain in oncology

nursing practice. Oncol Nurs Forum 1992 Apr;

19(3):411-5.

Miller DH, Barkhof F, Berry I, Kappos L, Scotti G,

Thompson AJ. Magnetic resonance imaging in

monitoring the treatment of multiple sclerosis:

concerted action guidelines. J Neurol Neurosurg

Psychiatry 1991 Aug;54(8):683-8.

National Multiple Sclerosis Society Working Group on

Neuroimaging for the Medical Advisory Board.

Policy statement. Use of magnetic resonance

imaging in the diagnosis of multiple sclerosis.

Neuroradiology 1987;29(2):119.

Neff JA. Patient care guidelines. Conscious sedation.

J Emerg Nurs 1992 Apr;18(2):170-3.

[The periodical medical examination update 1991: 1.

Screening for cognitive deficiencies in elderly

persons. Canadian Study Group on the Periodical

Medical Examination]. Union Med Can 1991 Nov-

Dec;120(6):425, 427, 430-2. (Fre).

Position statement on the role of the registered nurse

(RN) in the management of patients receiving i.v.

conscious sedation for short-term therapeutic,

diagnostic, or surgical procedures. Plast Surg Nurs

1992 Spring;12(1):31.

Position statement on the role of the RN in the

management of analgesia by catheter techniques

(epidural, intrathecal, intrapleural, or peripheral

nerve catheters). AORN J 1992 Jan;55(1):209-10.

Position statement on the role of the RN in the

management of patients receiving i.v. conscious

sedation for short-term therapeutic, diagnostic, or

surgical procedures. AORN J 1992 Jan;55(1):207-8.

Rayport M, Feka R, Fogelson MH, Lacey DJ, Lane K,

Quilty JF Jr, Rothner AD, Timmons GD, Wright FS.

Minimum care standards for epilepsy for Ohio. Ohio

Med 1990 Nov;86(11):796-801.

Recommendations for the use of folic acid to reduce the

number of cases of spina bifida and other neural

tube defects. MMWR Morb Mortal Wkly Rep 1992

Sep 11;41(RR-14):1-7.

Schwarz P, van der Kooij CH. [Nursing guidelines for

acutely occurring confusion. From the Nursing

Scientific Council]. TVZ 1992 Jan 9(1):9-12. (Dut).

Spross JA, McGuire DB, Schmitt RM. Oncology

Nursing Society position paper on cancer pain

[editorial]. Oncol Nurs Forum 1990 Nov-Dec;

17(6):825.

Spross JA, McGuire DB, Schmitt RM. Oncology

Nursing Society position paper on cancer pain. Part

II. Oncol Nurs Forum 1990 Sep-Oct;17(5):751-60.

Standards for monitoring quality of analgesic treatment

of acute pain and cancer pain. American Pain

Society Subcommittee on Quality Assurance

Standards. Oncol Nurs Forum 1990 Nov-Dec;17(6):

952-4.

Standards of care for patients with neurological disease.

A consensus. Report of a Working Group, Research

Unit, Royal College of Physicians, London. J R Coll

Physicians Lond 1990 Apr;24(2):90-7.

Swash M, Leigh N. Criteria for diagnosis of familial

amyotrophic lateral sclerosis. European FALS

Collaborative Group. Neuromuscul Disord 1992;

2(1):7-9.

Tierney MC, Fisher RH, Lewis AJ, Zorzitto ML, Snow

WG, Reid DW, Nieuwstraten P. The NINCDS-

ADRDA clinical diagnosis of probable alzheimer’s

disease: a clinicopathologic study of 57 cases.

Neurology 1988 Mar;38(3):359-64.

World Federation of Neurology: Research Committee.

Research Group on Huntington’s chorea. Ethical

issues policy statement on Huntington’s disease

molecular genetics predictive test. J Neurol Sci 1989

Dec;94(1-3):327-32.

OBSTETRICS AND GYNECOLOGY

ACOG issues report on carcinoma of the breast. Am

Fam Physician 1992 Mar;45(3):1355-6, 1361-4.

Avery MD. Advanced nurse-midwifery practice.

J Nurse Midwifery 1992 Mar-Apr;37(2):150-4.

Cancer of the ovary. ACOG technical bulletin number

141--May 1990 (replaces #73, October 1983). Int J

Gynaecol Obstet 1991 Aug;35(4):359-66.

Delgado Escueta AV, Janz D. Consensus guidelines:

preconception counseling, management, and care of

the pregnant woman with epilepsy. Neurology 1992

Apr;42(4 Suppl 5):149-60.

[Diagnostic and therapeutic technology assessment].

Servir 1991 Mar-Apr;39(2):66-71. (Por).

Diagnostic and therapeutic technology assessment.

Chorionic villus sampling. JAMA 1987 Dec 25;

258(24):3560-3.

Diagnostic and therapeutic technology assessment.

Chorionic villus sampling: a reassessment. JAMA

1990 Jan 12;263(2):305-6.

Diagnostic and therapeutic technology assessment.

Home monitoring of uterine activity. JAMA 1989

May 26;261(20):3027-9.

Diagnostic and therapeutic technology assessment.

Intrauterine devices. JAMA 1989 Apr 14;261(14):

2127-30. Published erratum appears in JAMA 1990

Jan 12;263(2):238.

Diagnostic and therapeutic technology assessment.

Mammographic screening for breast cancer. JAMA

1987 Sep 11;258(10):1387-9.

Diagnostic and therapeutic technology assessment.

Maternal serum alpha-fetoprotein testing and

Down’s syndrome. JAMA 1988 Sep 23-30;260(12):

1779-82.

1Dodd GD. American Cancer Society guidelines on

screening for breast cancer. An overview. Cancer

1992 Apr 1;69(7 Suppl):1885-7.

Ectopic pregnancy. ACOG technical bulletin number

150--December 1990 [replaces no. 126, March

1989]. Int J Gynaecol Obstet 1992 Mar;37(3):

213-9.

Emans SJ, Brown RT, Davis A, Felice M, Hein K.

Society for Adolescent Medicine position paper on

reproductive health care for adolescents. J Adolesc

Health 1991 Dec;12(8):649-61.

Guidelines for breast cancer screening. The European

Group for Breast Cancer Screening. Clin Radiol

1987 May;38(3):217.

Guidelines for hepatitis B virus screening and

vaccination during pregnancy. ACOG committee

opinion: Committee on Obstetrics: Maternal and

Fetal Medicine Number 78--. Int J Gynaecol Obstet

1991 Aug;35(4):367-9.

Horiot JC. Rationale for a quality assurance programme

in clinical trials of conservative management of

breast carcinoma. Radiother Oncol 1991 Dec;22(4):

222-5.

Klock SC, Maier D. Guidelines for the provision of

psychological evaluations for infertile patients at the

University of Connecticut Health Center. Fertil

Steril 1991 Oct;56(4):680-5.

Lynge E, Arffmann E, Hansen KC, Henriksen B, Holten

IW, Holund B, Jespersen NB, Lindso R, Olesen F,

Poll P, et al. [Status of preventive examinations

against uterine cervix cancer in Denmark]. Ugeskr

Laeger 1992 May 4;154(19): 1339-42. (Dan).

Management of isoimmunization in pregnancy. ACOG

Technical Bulletin number 148--October 1990. Int J

Gynaecol Obstet 1992 Jan;37(1):57-62.

McKenna RJ Sr, Greene P, Winchester DP, Baines CJ,

Foster RS, Champion V, O’Malley MS. Breast

self-examination and breast physical examination.

Cancer 1992 Apr 1;69(7 Suppl):2003-4.

Operative vaginal delivery. ACOG Technical Bulletin

number 152-- February 1991. Int J Gynaecol Obstet

1992 May;38(1):55-60.

Parker JD, Abrams B. Prenatal weight gain advice: an

examination of the recent prenatal weight gain

recommendations of the Institute of Medicine.

Obstet Gynecol 1992 May;79(5 Pt 1):664-9.

Patterson R, Greenberger PA, Frederiksen MC. Asthma

and pregnancy: responsibility of physicians and

patients. Ann Allergy 1990 Dec;65(6):469-72.

Prevention of D isoimmunization. ACOG Technical

Bulletin number 147-- October 1990. Int J Gynaecol

Obstet 1992 Jan;37(1):53-6.

Recommendations on the use of ultrasound and Doppler

technology in clinical obstetrics and gynecology.

FIGO Study Group on the Assessment of New

Technology. Int J Gynaecol Obstet 1992 Mar;37(3):

221-7. Published erratum appears in Int J Gynaecol

Obstet 1992 Jun;38(2):144.

Safety of oral contraceptives for teenagers. ACOG

Committee opinion: Committee on Adolescent

Health Care number 90--February 1991. Int J

Gynaecol Obstet 1992 Apr;37(4):309-12.

Shapiro S, Smart CR, Costanza ME, Henson DE, Holleb

AI, Hutter RV, Krammer B, Kushner HD,

McLelland R, Moskowitz M, et al. Guidelines for

breast cancer screening. Cancer 1992 Apr 1;69

(7 Suppl):2001-2.

Skouby SO, Jespersen J. Metabolic aspects of oral

contraceptives of relevance for cardiovascular

disease. First European conference on sex steroids

and metabolism. Adv Contracept 1990 Dec;6 Suppl:

7-13.

Standards of care: the hormonal and surgical sex

reassignment of gender dysphoric persons. Arch Sex

Behav 1985 Feb;14(1):79-90.

Summers L. The genesis of the ACNM 1971 statement

on abortion. J Nurse Midwifery 1992 May-Jun;

37(3):168-74.

Woolf SH. United States Preventive Services Task Force

recommendations on breast cancer screening. Cancer

1992 Apr 1;69(7 Suppl):1913-8.

ONCOLOGY

Boyle DM, Engelking C, Blesch KS, Dodge J, Sarna L,

Weinrich S. Oncology Nursing Society position

paper on cancer and aging: the mandate for

oncology nursing. Oncol Nurs Forum 1992 Jul;

19(6):913-33.

Cheson BD, Bennett JM, Rai KR, Grever MR, Kay NE,

Schiffer CA, Oken MM, Keating MJ, Boldt DH,

Kempin SJ, et al. Guidelines for clinical protocols

for chronic lymphocytic leukemia: recommendations

of the National Cancer Institute-sponsored working

group. Am J Hematol 1988 Nov;29(3):152-63.

Inouye SK, Sox HC Jr. Standard and computed

tomography in the evaluation of neoplasms of the

chest. A comparative efficacy assessment. Ann

Intern Med 1986 Dec;105(6):906-24.

Karr RA, Kramer DC. You can treat the chemotherapy

patient. Tex Dent J 1992 Jun;109(6):15-20.

Manley M, Epps RP, Husten C, Glynn T, Shopland D.

Clinical interventions in tobacco control. A National

Cancer Institute training program for physicians.

JAMA 1991 Dec 11;266(22):3172-3.

National guidelines for the early detection of cancer.

J Pract Nurs 1991 Dec;41(4):11-2.

NCI initiates program to promote early detection of

cancer. Am Fam Physician 1991 Nov;44(5):1884,

1886.

Nixon DW. Nutrition and cancer: American Cancer

Society guidelines, programs, and initiatives. Bol

Asoc Med P R 1991 Jun;83(6):267-71.

Rutherford C. INS position statement. Administration of

antineoplastic agents. J Intraven Nurs 1992 Jan-Feb;

15(1):8-9.

Weinhouse S, Bal DG, Adamson R, Dwyer J, Kleinman

RE, Kritchevsky D, Mettlin CJ, Newell GR, Rivlin

R, Wattenberg L, et al. American Cancer Society

guidelines on diet, nutrition, and cancer. The Work

Study Group on Diet, Nutrition, and Cancer. CA

Cancer J Clin 1991 Nov-Dec;41(6):334-8. Comment

in: CA Cancer J Clin 1991 Nov-Dec;

41(6):325-7.

OPHTHALMOLOGY

AIDS Task Force policy statement. Section on Public

Health and Occupational Vision of the American

Academy of Optometry. Am J Optom Physiol Opt

1988 Jul;65(7):599-601.

Contact lens care: new guidelines. CLAO policy

statement issued April 1987. CLAO J 1988

Jan-Mar;14(1):55-6.

Diagnostic and therapeutic technology assessment.

Radial keratotomy for simple myopia. JAMA 1988

Jul 8;260(2):264-7.

Eye care guidelines for patients with diabetes mellitus.

American Diabetes Association. Diabetes Care 1988

Oct;11(9):745-6.

Functional indications for upper and lower eyelid

blepharoplasty. American Academy of

Ophthalmology. Ophthalmology 1991 Sep;98(9):

1461-3.

Nussenblatt RB, Palestine AG. Ciclosporin

(Sandimmun) therapy: experience in the treatment of

pars planitis and present therapeutic guidelines. Dev

Ophthalmol 1992;23:177-84.

Ocular effects of topical and systemic steroids. Dermatol

Clin 1992 Jul;10(3):505-12.

Policy statement: learning disabilities, dyslexia, and

vision. American Academy of Ophthalmology.

J Learn Disabil 1987 Aug-Sep;20(7):412-3.

Position paper. Position statement on the ophthalmic

R.N. first assistant. Insight 1991 Dec;16(6):7.

Punctual occlusion for the dry eye. American Academy

of Ophthalmology. Ophthalmology 1992 Apr;99(4):

639-40.

Screening guidelines for diabetic retinopathy. American

College of Physicians, American Diabetes

Association, and American Academy of

Ophthalmology. Ann Intern Med 1992 Apr 15;

116(8):683-5.

Subfoveal neovascular lesions in age-related macular

degeneration. Guidelines for evaluation and

treatment in the macular photocoagulation study.

Macular Photocoagulation Study Group. Arch

Ophthalmol 1991 Sep;109(9):1242-57.

Treatment techniques and clinical guidelines for

photocoagulation of diabetic macular edema. Early

treatment diabetic retinopathy study report number

2. Early Treatment Diabetic Retinopathy Study

Research Group. Ophthalmology 1987 Jul;94(7):

761-74.

OTORHINOLARYNGOLOGY

Clark GT, Seligman DA, Solberg WK, Pullinger AG.

Guidelines for the treatment of temporomandibular

disorders. J Craniomandib Disord 1990 Spring;4(2):

80-8.

Guidelines for diagnosis and treatment of disorders of

the temporomandibular joint and related

musculoskeletal disorders. Todays FDA 1991 Nov;

3(11):2C-3C.

Pertes RA, Cohen HV. Guidelines for clinical

management of temporomandibular disorders: part 1.

Compendium 1992 Apr;13(4):268, 270, 272 passim.

Pertes RA, Cohen HV. Guidelines for clinical

management of temporomandibular disorders: part 2.

Compendium 1992 May;13(5):400, 402, 404 passim.

Talley RL, Murphy GJ, Smith SD, Baylin MA, Haden

JL. Standards for the history, examination,

diagnosis, and treatment of temporomandibular

disorders (TMD): a position paper. Cranio 1990

Jan;8(1):60-77.

TMJ implant advisory. J Oral Maxillofac Surg 1992

Oct;50(10):1148-9.

Yelland M. Otitis externa in general practice. Med J

Aust 1992 Mar 2;156(5):325-6, 330.

Zingg M, Laedrach K, Chen J, Chowdhury K, Vuillemin

T, Sutter F, Raveh J. Classification and treatment of

zygomatic fractures: a review of 1,025 cases. J Oral

Maxillofac Surg 1992 Aug;50(8):778- 90.

PATHOLOGY

Banks PM. Incorporation of immunostaining data in

anatomic pathology reports. Am J Surg Pathol 1992

Aug;16(8):808.

Eckhardt S, Jellinek H. [Aspiration-cytological

examinations. Guidelines of the professional

colleges of the National Institute of Pathology and

the National Institute of Oncology]. Orv Hetil 1991

Oct 13;132(41):2281-2. (Hun).

PEDIATRICS

AAFP age charts for periodic health examinations: birth

to 18 months. Commission on Public Health and

Scientific Affairs. Am Fam Physician 1991 Nov;

44(5):1882-4.

AAFP age charts for periodic health examinations:

seven to 12 years. The Commission on Public

Health and Scientific Affairs. Am Fam Physician

1992 Jan;45(1):267-8.

Akerblom HK, Chandra RK, Franklin FA, Giovannini

M, Grobbee DE, Innis SM, Jacques H, Kersting M,

Kunze D, Lifshitz F, et al. Conclusions, guidelines

and recommendations from the IUNS/WHO

workshop: nutrition in the pediatric age group and

later cardiovascular disease. J Am Coll Nutr 1992

Jun;11 Suppl:1S-2S.

American Academy of Pediatrics Committee on Drugs:

retinoid therapy for severe dermatological disorders.

Pediatrics 1992 Jul;90(1 Pt 1):119-20.

American Academy of Pediatrics Committee on

Infectious Diseases: chemotherapy for tuberculosis

in infants and children. Pediatrics 1992 Jan;89(1):

161-5.

American Academy of Pediatrics Committee on Sports

Medicine and Fitness: horseback riding and head

injuries. Pediatrics 1992 Mar;89(3):512.

Ashwal S, Schneider S. Pediatric brain death: current

perspectives. Adv Pediatr 1991;38:181-202.

The Australian College of Paediatrics. Policy statement.

AIDS. Aust Paediatr J 1988 Dec;24(6):326-9.

Australian College of Paediatrics. Policy statement.

AIDS. Aust Paediatr J 1986 Nov;22(4):261-3.

The Australian College of Paediatrics. Policy statement.

Report of the Immunization Subcommittee on

Pertussis Immunization. J Paediatr Child Health

1991 Feb;27(1):16-20.

Australian College of Paediatrics. Policy statement.

Screening for cystic fibrosis. Aust Paediatr J 1986

Nov;22(4):264.

Australian College of Paediatrics. Policy statement:

smoking. Aust Paediatr J 1985 Nov;21(4):235.

Australian College of Paediatrics. Policy statement. Soy

protein formula. Aust Paediatr J 1987 Apr;23(2):

83-4.

Benjamin B. Guidelines on tonsillectomy and

adenoidectomy. J Paediatr Child Health 1992 Apr;

28(2):136-40.

Carroll P, Caplinger KJ, France GL. Guidelines for

counseling parents of young children with food

sensitivities. J Am Diet Assoc 1992 May;92(5):

602-3.

Epstein D, Storlazzi JJ. American Academy of

Pediatrics. Position paper on consultations. Del Med

J 1991 Apr;63(4):229-31.

Graven SN, Bowen FW Jr, Brooten D, Eaton A, Graven

MN, Hack M, Hall LA, Hansen N, Hurt H,

Kavalhuna R, et al. The high-risk infant

environment. Part 1. The role of the neonatal

intensive care unit in the outcome of high-risk

infants. J Perinatol 1992 Jun;12(2):164-72.

Guidelines for the management of convulsions with

fever. Joint Working Group of the Research Unit of

the Royal College of Physicians and the British

Paediatric Association. BMJ 1991 Sep 14;303

(6803):634-6.

Hepatitis B virus: a comprehensive strategy for

eliminating transmission in the United States

through universal childhood vaccination.

Recommendations of the Immunization Practices

Advisory Committee (ACIP). MMWR Morb Mortal

Wkly Rep 1991 Nov 22;40(RR 13):1-25.

Intravenous immune globulin use in children. Infectious

Diseases and Immunization Committee, Canadian

Paediatric Society. Can Med Assoc J 1992 Jan 15;

146(2):121-4.

Kerr DL. Pediatric guidelines for infection control of

HIV (AIDS virus) in schools and day care settings.

J Sch Health 1988 Dec;58(10):419-20.

Kersting M, Schoch G. Achievable guidelines for food

consumption to reach a balanced fat and nutrient

intake in childhood and adolescence. J Am Coll

Nutr 1992 Jun;11 Suppl:74S-8S.

Lane S. The paediatric asthma management plan. Qld

Nurse 1991 Nov-Dec;10(6):21.

Lopez Samblas AM, Torres CL, Wang H, Feuer WJ,

Goldberg RN. Effectiveness of a gentamicin dosing

protocol based on postconceptional age: comparison

to published neonatal guidelines. Ann Pharmacother

1992 Apr;26(4):534-8.

NAPNAP position statements. J Pediatr Health Care

1992 Jul-Aug;6(4):226.

National Cholesterol Education Program (NCEP):

highlights of the report of the expert panel on blood

cholesterol levels in children and adolescents.

Pediatrics 1992 Mar;89(3):495-501.

Neonatal surfactant replacement therapy. Fetus and

Newborn Committee, Canadian Paediatric Society.

Can Med Assoc J 1992 Apr 15;146(8):1309-12.

[The periodic medical examination, update 1990: 4.

Pediatric consultations during the first two years of

a baby’s life. Canadian Study Group on the Periodic

Medical Examination]. Union Med Can 1991

Sep-Oct;120(5):327-32. (Fre).

Position of the American Dietetic Association: nutrition

standards in day-care programs for children. J Am

Diet Assoc 1987 Apr;87(4):503-6.

Recommendations for composition of oral rehydration

solutions for the children of Europe. Report of an

ESPGAN Working Group. J Pediatr Gastroenterol

Nutr 1992 Jan;14(1):113-5.

Report of special Task Force. Guidelines for the

determination of brain death in children. American

Academy of Pediatrics Task Force on Brain Death

in Children. Pediatrics 1987 Aug;80(2):298-300.

Report of working group of the British Association of

Perinatal Medicine and Neonatal Nurses Association

on categories of babies requiring neonatal care. Arch

Dis Child 1992 Jul;67(7 Spec No):868-9.

Santeiro ML, Stromquist C, Coppola L. Guidelines for

continuous infusion medications in the neonatal

intensive care unit. Ann Pharmacother 1992 May;

26(5):671-4.

Steinherz LJ, Graham T, Hurwitz R, Sondheimer HM,

Schwartz RG, Shaffer EM, Sandor G, Benson L,

Williams R. Guidelines for cardiac monitoring of

children during and after anthracycline therapy:

Report of the Cardiology Committee of the

Childrens Cancer Study Group. Pediatrics 1992

May;89(5 Pt 1):942-9.

Strong WB, Deckelbaum RJ, Gidding SS, Kavey RE,

Washington R, Wilmore JH, Perry CL. Integrated

cardiovascular health promotion in childhood. A

statement for health professionals from the

Subcommittee on Atherosclerosis and Hypertension

in Childhood of the Council on Cardiovascular

Disease in the Young, American Heart Association.

Circulation 1992 Apr;85(4):1638-50.

Sutherns S, Rebgetz P, Smith S. The paediatric asthma

management plan: a guide for nursing children with

asthma. Aust Nurses J 1992 Mar;21(8):14-7.

Tetanus immunization recommendations for persons less

than seven years old. American College of

Emergency Physicians. Ann Emerg Med 1987 Oct;

16(10):1181-3. Published erratum appears in Ann

Emerg Med 1987 Dec;16(12):1380.

van der Laag J, van Aalderen WM, Duiverman EJ, van

Essen Zandvliet EE, Nagelkerke AF, van Nierop JC.

[Asthma in children; consensus by pediatric

pulmonologists on long-term treatment. I.

Diagnosis]. Ned Tijdschr Geneeskd 1991 Dec 7;

135(49):2316-9. (Dut).

van der Laag J, van Aalderen WM, Duiverman EJ, van

Essen Zandvliet EE, Nagelkerke AF, van Nierop JC.

[Asthma in children; consensus by pediatric

pulmonologists on long-term treatment. II.

Treatment]. Ned Tijdschr Geneeskd 1991 Dec 7;

135(49):2319-23. (Dut).

Vince JD. Convulsions in children. P N G Med J 1992

Jun;35(2):144-51.

PHARMACOLOGY

Beers MH, Ouslander JG, Rollingher I, Reuben DB,

Brooks J, Beck JC. Explicit criteria for determining

inappropriate medication use in nursing home

residents. Arch Intern Med 1991 Sep;151(9):

1825-32.

Draft guidelines on quality assurance for

pharmacy-prepared sterile products. Am J Hosp

Pharm 1992 Feb;49(2):407-17.

Jolicoeur LM, Jones Grizzle AJ, Boye JG. Guidelines

for performing a pharmacoeconomic analysis. Am J

Hosp Pharm 1992 Jul;49(7):1741-7.

Kintzel PE, Smith GH. Practical guidelines for preparing

and administering amphotericin B. Am J Hosp

Pharm 1992 May;49(5):1156-64.

Summary of the ASHP therapeutic guidelines for

intravenous immune globulin. ASHP Commission

on Therapeutics. Am J Hosp Pharm 1992 Mar;

49(3):652-4.

PRACTICE OF MEDICINE

Aabakken L, Sandstad O, Enger E. [Use of the

R-concept in a medical department]. Tidsskr Nor

Laegeforen 1992 May 20;112(13):1693-5. (Nor).

AAFP age charts for periodic health examinations: 19 to

39 years. The Commission on Public Health and

Scientific Affairs. Am Fam Physician 1992 Mar;

45(3):1367-70.

Australian Society of Critical Care Nurses. WA Branch.

Position paper on defibrillation by registered nurses.

Confed Aust Crit Care Nurses J 1991 Mar; 4(1):16.

Bang L. [Expert witness in cases of rape]. Tidsskr Nor

Laegeforen 1992 Jun 10;112(15):1967-70. (Nor).

Belsky JL. Care of irreversibly ill patients: policy

statement of the Connecticut Chapter of the

American College of Physicians. Conn Med 1989

May;53(5):279.

Burkhart C. Guidelines for rapid assessment of

abdominal pain indicative of acute surgical

abdomen. Nurse Pract 1992 Jun;17(6):39, 43-6, 49.

Cantrill SV. Clinical standards. Emerg Med Clin North

Am 1992 Aug;10(3):507-22.

Castledine G. New code of professional conduct: how it

affects you. Br J Nurs 1992 Jul 9-22;1(6):296-7,

299-300.

Crepaldi G, Belfiore F, Bosello O, Caviezel F, Contaldo

F, Enzi G, Melchionda N. Italian consensus

conference--overweight, obesity and health. Int J

Obes 1991 Nov;15(11):781-90.

Doenges ME, Moorhouse MF. [Nursing diagnosis and

interventions. Practical guide]. Soins 1991 Jun;

(549):59-61. (Fre).

Eagle KA, Mulley AG, Skates SJ, Reder VA, Nicholson

BW, Sexton JO, Barnett GO, Thibault GE. Length

of stay in the intensive care unit. Effects of practice

guidelines and feedback. JAMA 1990 Aug

22-29;264(8):992-7.

Emergency care guidelines. American College of

Emergency Physicians. Ann Emerg Med 1991 Dec;

20(12):1389-95.

Famine-affected, refugee, and displaced populations:

recommendations for public health issues. MMWR

Morb Mortal Wkly Rep 1992 Jul 24;41(RR 13):

1-76.

Fluss SS. Commerce in human organs: the international

response. World Health Forum 1991;12(3):307-10.

Go GW, Baraff LJ, Schriger DL. Management

guidelines for health care workers exposed to blood

and body fluids. Ann Emerg Med 1991 Dec;20(12):

1341-50.

Gordon NF, Kohl HW, Scott CB, Gibbons LW, Blair

SN. Reassessment of the guidelines for exercise

testing. What alterations to current recommendations

are required? Sports Med 1992 May;13(5):293-302.

Greene JM, Feldman EB. Physician’s office guide to a

lipid-lowering diet. J Am Coll Nutr 1991 Oct;

10(5):443-52.

Guidelines for appropriate treatment of managed care

plan subscribers requiring emergency medical care.

Emergency Medical Care Physician Advisory

Committee of the Colorado Medical Society. Colo

Med 1991 Aug;88(8):242-4.

Guidelines for medical technology in critical care.

Technology Subcommittee of the Working Group on

Critical Care, Ontario Ministry of Health. Can Med

Assoc J 1991 Jun 15;144(12):1617-22.

Guidelines for meeting the communication needs of

persons with severe disabilities. National Joint

Committee for the Communicative Needs of Persons

with Severe Disabilities. ASHA 1992 Mar; 34(3

Suppl 7):1-8.

Guidelines for the definition of an intensivist and the

practice of critical care medicine. Guidelines

Committee; Society of Critical Care Medicine. Crit

Care Med 1992 Apr;20(4):540-2.

Hayward RS, Steinberg EP, Ford DE, Roizen MF,

Roach KW. Preventive care guidelines: 1991. Ann

Intern Med 1991 May 1;114(9):758-83. Published

erratum appears in Ann Intern Med 1991 Aug 15;

115(4):332.

Jezierski M. Guidelines for intervention by ED nurses in

cases of domestic abuse. J Emerg Nurs 1992

Feb;18(1):28A-30A.

Kiss A. [Patients with functional symptoms--what

should be done?] Schweiz Med Wochenschr 1992

Mar 28;122(13):470-4. (Ger).

Laitinen A. [Standards in quality assurance in nursing].

Hoitotiede 1992;4(1):17-23. (Fin).

Maloof M. The 1989 CARF nursing standards: guide-

lines for implementation. Rehabil Nurs 1989

May-June;14(3):134-6.

Monitoring and evaluation of the quality and

appropriateness of care: an ambulatory health care

example. Staff of the Division of Education and the

Division of Accreditation, Joint Commission on

Accreditation of Hospitals. QRB Qual Rev Bull

1987 Jan;13(1):26-30.

Petersmarck KA. The Michigan approach: building

consensus for safe weight loss. J Am Diet Assoc

1992 Jun;92(6):679-80.

Pillar B, Perry S. Evaluating total parenteral nutrition:

final report and statement of the technology

assessment and practice guidelines forum. Nutrition

1990 Jul-Aug;6(4):314-8.

Ralph C. The UKCC on proposals for the future of

community education and practice. Occup Health

(Lond) 1992 Jul;44(7):213.

Recommendations for routine blood pressure

measurement by indirect cuff sphygmomanometry.

American Society of Hypertension. Am J Hypertens

1992 Apr;5(4 Pt 1):207-9.

Reith P. Adapting the selective periodic health exam to

a college-aged population. J Am Coll Health 1989

Nov;38(3):109-13.

Reith P. The periodic health examination in college

students revisited. J Am Coll Health 1991 Nov;

40(3):119-23.

Rogers LR, Orlowski JP, Meehan MJ, Vinicky JK.

Policy statements: do not resuscitate, care of the

hopelessly ill, and brain death. Cleve Clin J Med

1990 Jan-Feb;57(1):29-34.

Standards for nutrition support for residents of long-term

care facilities. American Society for Parenteral and

Enteral Nutrition. Nutr Clin Pract 1989

Aug;4(4):148-53.

Standards of care. ET nursing practice. J Enterostomal

Ther 1989 Jul-Aug;16(4):171-5.

Stormark M, Kjellsberg AB. [Everyday routines. Advice

about hand hygiene for health personnel]. Fag

Tidsskr Sykepleien 1991 Sep 16:79(7):2-4, 27.

(Nor).

Violence against women. Relevance for medical

practitioners. Council on Scientific Affairs,

American Medical Association. JAMA 1992

Jun 17;267(23):3184-9.

[When should physicians refrain from treatment?] Nord

Med 1991;106(8-9):239-40; discussion 240-1.

(Swe).

White JV, Dwyer JT, Posner BM, Ham RJ, Lipschitz

DA, Wellman NS. Nutrition screening initiative:

development and implementation of the public

awareness checklist and screening tools. J Am Diet

Assoc 1992 Feb;92(2):163-7.

PSYCHIATRY

AIDS policy: guidelines for inpatient psychiatric units.

American Psychiatric Association. Am J Psychiatry

1992 May;149(5):722.

AIDS policy: guidelines for outpatient psychiatric

services. American Psychiatric Association. Am J

Psychiatry 1992 May;149(5):721.

Anfinson TJ, Kathol RG. Screening laboratory

evaluation in psychiatric patients: a review. Gen

Hosp Psychiatry 1992 Jul;14(4):248-57.

Hengeveld MW, Kerkhof AJ, van Rooijen E.

[Intervention for suicide attempters in general

hospitals]. Ned Tijdschr Geneeskd 1992 Feb 22;

136(8):376-81. (Dut).

Katon W, Schulberg H. Epidemiology of depression in

primary care. Gen Hosp Psychiatry 1992 Jul;14(4):

237-47.

Petty F. The depressed alcoholic. Clinical features and

medical management. Gen Hosp Psychiatry 1992

Jul;14(4):258-64.

Rush AJ, Trivedi M, Schriger D, Petty F. The

development of clinical practice guidelines for the

diagnosis and treatment of depression. Gen Hosp

Psychiatry 1992 Jul;14(4):230-6.

Smith GR. The epidemiology and treatment of

depression when it coexists with somatoform

disorders, somatization, or pain. Gen Hosp

Psychiatry 1992 Jul;14(4):265-72.

Substance abuse disorders: a psychiatric priority. Group

for the Advancement of Psychiatry Committee on

Alcoholism and the Addictions. Am J Psychiatry

1991 Oct;148(10):1291-300.

RADIOLOGY

Diagnostic and therapeutic technology assessment.

Diagnostic intraoperative ultrasound. JAMA 1985

Jul 12;254(2):285-7.

Diagnostic and therapeutic technology assessment.

Transrectal ultrasonography--reassessment. JAMA

1990 Mar 16;263(11):1563-8.

Fowkes FG, Davies ER, Evans KT, Green G, Hugh AE,

Nolan DJ, Power AL, Roberts CJ, Roylance J.

Compliance with the Royal College of Radiologists’

guidelines on the use of pre-operative chest

radiographs. Clin Radiol 1987 Jan;38(1):45-8.

Kanal E, Shellock FG. Policies, guidelines, and

recommendations for MR imaging safety and patient

management. SMRI Safety Committee. J Magn

Reson Imaging 1992 Mar-Apr;2(2):247-8.

Proposed recommended practices. Radiological safety in

the operating room. AORN J 1989 Feb;49(2):630,

632-3, 635 passim.

Protection of the patient undergoing a magnetic

resonance examination. International Non-Ionizing

Radiation Committee of the International Radiation

Protection Association. Health Phys 1991 Dec;

61(6):923-8.

Recommended practices. Radiological safety in the

practice setting. AORN J 1989 Oct;50(4):838-41,

845-8.

Spies JB, Bakal CW, Burke DR, Husted JW, McLean G,

Palestrant AM, Pentecost MJ, Schwarten DE,

Spencer MC, Tate CP, et al. Standards for

interventional radiology. Standards of Practice

Committee of the Society of Cardiovascular and

Interventional Radiology. J Vasc Interv Radiol 1991

Feb;2(1):59-65.

RESPIRATORY SYSTEM

The asthma management plan: a nursing perspective

(prepared for the National Asthma Campaign

Committee). Qld Nurse 1990 Jul-Aug;9(4):19-20.

The asthma management plan: a nursing perspective.

The National Asthma Campaign Committee. Aust

Nurses J 1990 Oct;20(3):17-9.

Clinical guidelines and indications for bronchoalveolar

lavage (BAL): Report of the European Society of

Pneumology Task Group on BAL. Eur Respir J

1990 Sep;3(8):937-76.

[Drug therapy in asthma--guidelines from a group of

experts]. Lakartidningen 1992 Aug 5;89(32-33):

2608-11. (Swe).

Expert panel report to provide clinical guidelines for

diagnosis and treatment of asthma. J Sch Health

1991 Aug;61(6):249-50.

Fitzgerald ST. National Asthma Education Program

Expert Panel: guidelines for the diagnosis and

management of asthma. AAOHN J 1992 Aug;40(8):

376-82.

Guidelines for standards of care for patients with acute

respiratory failure on mechanical ventilatory support.

Task Force on Guidelines; Society of Critical Care

Medicine. Crit Care Med 1991 Feb; 19(2):275-8.

Guidelines for the assessment and management of

chronic obstructive pulmonary disease. Canadian

Thoracic Society Workshop Group. Can Med Assoc

J 1992 Aug 15;147(4):420-8.

Guidelines for the management of asthma in adults in

South Africa. Part I. Chronic persistent asthma.

Statement by a Working Group of the South African

Pulmonology Society. S Afr Med J 1992 Mar 21;

81(6):319-8.

Harrison BD, Farr BM, Connolly CK, Macfarlane JT,

Selkon JB, Bartlett CL. The hospital management of

community-acquired pneumonia. Recommendations

of the British Thoracic Society. J R Coll

Physicians Lond 1987 Oct;21(4):267-9.

International consensus report on diagnosis and

treatment of asthma. Clin Exp Allergy 1992 May;

22 Suppl 1:1-72.

International consensus report on diagnosis and

treatment of asthma. National Heart, Lung, and

Blood Institute, National Institutes of Health.

Bethesda, Maryland 20892. Publication no. 92-3091,

March 1992. Eur Respir J 1992 May; 5(5):601-41.

Investigative use of bronchoscopy, lavage and bronchial

biopsies in asthma and other airways diseases. Eur

Respir J 1992 Jan;5(1):115-21.

Klein-Tebbe J, Kunkel G. [Current status of specific

hyposensitization in the treatment of bronchial

asthma]. Pneumologie 1991 Aug;45(8):630-2.

(Ger).

Larsson K, Hjemdahl P. [Unclear recommendations from

the National Board of Drug and Narcotic Control on

the Treatment of Asthma]. Lakartidningen 1991 Oct

30;88(44):3651. (Swe).

Mathews PJ, Mathews LM, Mitchell RR. Artificial

airways. Resuscitation guidelines you can follow.

Nursing 1992 Jan;22(1):53-9.

McKneally MF, Lewis RJ, Anderson RJ, Fosburg RG,

Gay WA Jr, Jones RH, Orringer MB. Statement of

the AATS/STS Joint Committee on Thoracoscopy

and Video Assisted Thoracic Surgery. J Thorac

Cardiovasc Surg 1992 Jul;104(1):1.

Recommendations for the conduct of acute inhalation

limit tests. Prepared by the Technical Committee of

the Inhalation Specialty Section, Society of

Toxicology. Fundam Appl Toxicol 1992 Apr;

18(3):321-7.

Sokolowski JW Jr, Burgher LW, Jones FL Jr, Patterson

JR, Selecky PA. Guidelines for percutaneous

transthoracic needle biopsy. This position paper of

the American Thoracic Society was adopted by the

ATS Board of Directors, June 1988. Am Rev Respir

Dis 1989 Jul;140(1):255-6.

Sokolowski JW Jr, Burgher LW, Jones FL Jr, Patterson

JR, Selecky PA. Guidelines for thoracentesis and

needle biopsy of the pleura. This position paper of

the American Thoracic Society was adopted by the

ATS Board of Directors, June 1988. Am Rev Respir

Dis 1989 Jul;140(1):257-8.

[Standardization of inhalant provocation tests for the

measurement of aspecific bronchial provocation

using a reservoir method. Practice guidelines--results

of a workshop "Aspecific Inhalant Provocation"].

Pneumologie 1991 Aug; 45 Suppl 2:647-50.

(Ger).

Standards for the diagnosis and care of patients with

chronic obstructive pulmonary disease (COPD) and

asthma. This official statement of the American

Thoracic Society was adopted by the ATS Board of

Directors, November 1986. Am Rev Respir Dis

1987 Jul;136(1):225-44.

Standards of nursing care for adult patients with

pulmonary dysfunction. American Thoracic Society.

Medical section of the American Lung Association.

Am Rev Respir Dis 1991 Jul;144(1):231-6.

SURGERY

ANA position statements. The role of the registered

nurse in the management of analgesia by catheter

techniques (epidural, intrathecal, intrapleural, or

peripheral nerve catheters). SCI Nurs 1992 Jun;

9(2):54-5.

ANA position statements. The role of the registered

nurse in the management of patients receiving IV

conscious sedation for short-term therapeutic,

diagnostic, or surgical procedures. SCI Nurs 1992

Jun;9(2):55-6.

AORN quality improvement standards for perioperative

nursing. AORN J 1992 Jan:55(1):212-3, 216-7,

220-1 passim.

AORN revised statement on the patient and health care

workers with human immunodeficiency virus (HIV)

and other bloodborne diseases. AORN J 1992 Jan;

55(1):52-3.

ASHP therapeutic guidelines on antimicrobial

prophylaxis in surgery. ASHP Commission on

Therapeutics. Clin Pharm 1992 Jun;11(6):483-513.

Basic aseptic technic. AORN Recommended Practices

Subcommittee. AORN J 1987 Mar;45(3):784-9.

Booth K. Pre-operative visiting. A step by step

guide--part 2. Br J Theatre Nurs 1991 Nov; 1(8):6-7.

Cullen DJ, Eichhorn JH, Cooper JB, Maier WR, Philip

JH, Holzma, RS, Gessner JS. Postanesthesia care

unit standards for anesthesiologists. J Post Anesth

Nurs 1989 Jun;4(3):141-6.

Documentation of perioperative nursing care. AORN

Recommended Practices Subcommittee. AORN J

1987 Mar;45(3):777-83.

Fluss SS. [Principle WHO guidelines on human organ

transplantation]. Rev Med Suisse Romande 1992

Feb;112(2):103-5. (Fre).

Gut AB. [Anaphylactic reactions during general

anesthesia]. Tidsskr Nor Laegeforen 1992 May 20;

112(13):1762-3. (Nor).

Hamers J, van der Bruggen H, Halfens R.

[Tracheotomy--guidelines for nursing technology

(1)]. TVZ 1991 Aug 29(16):570-1. (Dut).

Hamers J, van der Bruggen H, Halfens R.

[Tracheotomy--guidelines for nursing technology

(2)]. TVZ 1991 Aug 29(16):572-4. (Dut).

Moore PA. Preventing local anesthesia toxicity. J Am

Dent Assoc 1992 Sep;123(9):60-4.

Proposed recommended ethylene oxide (EO)

sterilization. AORN J 1992 Jan;55(1):228-30, 232-3,

235-7.

Proposed recommended practices. Aseptic technique.

AORN J 1991 Feb;53(2):480, 482-3, 485-9.

Proposed recommended practices. Care of instruments,

scopes, and powered surgical instruments. AORN J

1991 Aug;54(2):316-20, 322- 4, 326-8.

Proposed recommended practices. Cleaning and

processing anesthesia equipment. AORN J 1990

Jul;52(1):90-1, 94.

Proposed recommended pratices. Disinfection. AORN J

1991 Jul;54(1):75-80.

Proposed recommended practices. Documentation of

perioperative nursing care. AORN J 1991 Jan;

53(1):119-21, 124-5.

Proposed recommended practices. Documentation of

perioperative nursing care. AORN J 1985 Oct;

42(4):579-84.

Proposed recommended practices. Monitoring the patient

receiving I.V. conscious sedation. AORN J 1992

Aug;56(2):316-24.

Proposed recommended practices. Monitoring the patient

receiving local anesthesia. AORN J 1989

Feb;49(2):623, 625-6, 628.

Proposed recommended practices. Operating room

environmental sanitation. AORN J 1988 Aug;

48(2):332-6, 340.

Proposed recommended practices. Positioning the

surgical patient. AORN J 1990 Jan;51(1):216-8,

220-4.

Proposed recommended practices. Preoperative skin

preparation. AORN J 1987 Oct;46(4):719-24.

Proposed recommended practices. Protective barrier

materials for surgical gowns and drapes. AORN J

1991 Aug;54(2):330-4.

Proposed recommended practices. Safe care through

identification of potential hazards in the surgical

environment. AORN J 1989 Aug;50(2):396-7,

401-4.

Proposed recommended practices. Sanitation in the

surgical practice setting. AORN J 1991 Dec;

54(6):1251-7.

Proposed recommended practices. Sponge, sharp, and

instrument counts. AORN J 1989 Jun;49(6):

1638-43.

Proposed recommended practices. Sterilization. AORN J

1991 Jul;54(1):82-9, 92-6.

Proposed recommended practices. Surgical scrubs.

AORN J 1990 Jan;51(1):226-8, 230-4.

Proposed recommended practices: surgical tissue

banking. Association of Operating Room Nurses.

AORN J 1990 Aug;52(2):375-81.

Proposed recommended practices. Traffic patterns in the

surgical suite. AORN J 1988 Apr;47(4):1002-5.

Proposed recommended practices. Use of the pneumatic

tourniquet. AORN J 1990 Feb;51(2):581-3, 586-7.

Proposed standards of perioperative nursing. Clinical

practice/professional performance. AORN J 1991

Oct;54(4):809, 812-8.

Recommended practices. Cleaning and processing

anesthesia equipment. AORN J 1991 Mar;53(3):

775-7.

Recommended practices. Cleaning and processing

anesthesia equipment. AORN J 1985 Mar;41(3):

625, 627, 629 passim.

Recommended practices. Documentation of perioperative

nursing care. AORN J 1991 Sep; 54(3):592-6.

Recommended practices. Electrosurgery. AORN J 1991

Apr;53(4):1022-3, 1026-8.

Recommended practices. Electrosurgery. AORN J 1985

Mar;41(3):633, 635, 637 passim.

Recommended practices. Laser safety in the practice

setting. AORN J 1989 Nov;50(5):1015, 1016-20.

Recommended practices. Monitoring the patient

receiving local anesthesia. AORN J 1989 Sep;

50(3):624-6.

Recommended practices. Operating room environmental

sanitation. AORN J 1989 Mar;49(3):856-7, 860,

862-3.

Recommended practices. Positioning the surgical patient.

AORN J 1990 Nov;52(5):1035-9.

Recommended practices. Radiation safety in the

operating room (including lasers). AORN J 1985

Dec;42(6):920-1, 924, 926 passim.

Recommended practices. Safe care through identification

of potential hazards in the surgical environment.

AORN J 1990 Apr;51(4):1051-2, 1054-5.

Recommended practices. Sponge, sharp, and instrument

counts. AORN J 1990 Mar;51(3):838, 840-2, 844.

Recommended practices. Surgical attire. AORN J 1990

Mar;51(3):828, 830, 832 passim.

Recommended practices. Surgical hand scrubs. AORN J

1990 Oct;52(4):830-6.

Recommended practices. Surgical tissue banking. AORN

J 1991 Mar;53(3):768-71, 774.

Recommended practices. Traffic patterns in the surgical

suite. AORN J 1989 Mar;49(3):865-6, 870.

Recommended practices. Use of the pneumatic

tourniquet. AORN J 1990 Nov;52(5):1041-4.

Trauma care systems quality improvement guidelines.

American College of Emergency Physician. Ann

Emerg Med 1992 Jun;21(6):736-9.

Vaughan GG, Grycko RJ, Montgomery MT. The

prevention and treatment of aspiration of vomitus

during pharmacosedation and general anesthesia.

J Oral Maxillofac Surg 1992 Aug;50(8):874-9.

UROGENITAL SYSTEM

Diagnostic and therapeutic technology assessment.

Bacillus Calmette-Guerin immunotherapy in bladder

cancer. JAMA 1987 Mar 6;257(9):1238-40.

Diagnostic and therapeutic technology assessment. BCG

immunotherapy in bladder cancer: a reassessment.

JAMA 1988 Apr 8;259(14):2153-5.

Diagnostic and therapeutic technology assessment.

Endoscopic balloon dilation of the prostate. JAMA

1992 Feb 26;267(8):1123-4.

Diagnostic and therapeutic technology assessment.

Penile implants for erectile impotence. JAMA 1988

Aug 19;260(7):997-1000.

Diagnostic and therapeutic technology assessment.

Transrectal ultrasonography in prostatic cancer.

JAMA 1988 May 13;259(18):2757-9. Published

erratum appears in JAMA 1988 Aug 12;260(6): 792.

Diagnostic and therapeutic technology assessment.

Ureteral stone management: the use of ureteroscopy

with extracorporeal shockwave lithotripsy or

ultrasonic lithotripsy. JAMA 1988 Mar 4;259(9):

1382-4. Published erratum appears in JAMA 1988

Jul 15;260(3):343.

Diagnostic and therapeutic technology assessment.

Ureteral stone management: II. Ureteroscopy and

ultrasonic lithotripsy. JAMA 1988 Mar 11;259(10):

1557-9.

Hadorn DC, McCormick K, Diokno A. An annotated

algorithm approach to clinical guideline

development. JAMA 1992 Jun 24;267(24):3311-4.

Hohenberger P, Schlag P, Herfarth C. [Reoperation in

colorectal carcinoma with curative intention].

Schweiz Med Wochenschr 1992 Jul 18;122(29):

1079-86. (Ger).

Iturrigui Pagan JR. [Cancer of the prostate. Methods of

initial diagnosis]. Bol Asoc Med P R 1991 May;

83(5):196-8. (Spa).

McCormick KA, Newman DK, Colling J, Pearson BD.

A practice guideline for urinary incontinence: the

challenge to nurses. Urol Nurs 1992 Jun;12(2): 40-5.

National Kidney Foundation report on dialyzer reuse.

Am J Kidney Dis 1988 Jan;11(1):1-6.

Practice parameters for antibiotic prophylaxis--

supporting documentation. The Standards Task

Force. American Society of Colon and Rectal

Surgeons. Dis Colon Rectum 1992 Mar;35(3):278-

85.

Practice parameters for antibiotic prophylaxis to prevent

infective endocarditis or infected prosthesis during

colon and rectal endoscopy. The American Society

of Colon and Rectal Surgeons. Dis Colon Rectum

1992 Mar;35(3):277.

Practice parameters for the detection of colorectal

neoplasms. The American Society of Colon and

Rectal Surgeons. Dis Colon Rectum 1992 Apr;

35(4):389-90.

Rosen L, Abel ME, Gordon PH, Denstman FJ, Fleshman

JW, Hicks TC, Huber PJ, Kennedy HL, Levin SE,

Nicholson JD, et al. Practice parameters for the

detection of colorectal neoplasms-- supporting

documentation. The Standards Task Force, American

Society of Colon and Rectal Surgeons. Dis Colon

Rectum 1992 Apr;35(4): 391-4.

Rosen L, Abel ME, Gordon PH, Denstman FJ, Fleshman

JW, Hicks TC, Huber PJ, Kennedy HL, Levin SE,

Nicholson JD, et al. Practice parameters for the

management of anal fissure. The Standards Task

Force American Society of Colon and Rectal

Surgeons. Dis Colon Rectum 1992 Feb;35(2):206-8.

Swan SK, Bennett WM. Drug dosing guidelines in

patients with renal failure. West J Med 1992 Jun;

156(6):633-8.

Urinary incontinence. Standards of care. J Enterostomal

Ther 1988 Mar-Apr;15(2):68-80.

Urinary incontinence in adults. Clin Pract Guidel 1992

Mar;(2):1-125.

Van Rijswijk L. AHCPR update. The guidelines for

urinary incontinence in adults. Ostomy Wound

Manage 1992 May;38(4):8, 10.