                            Mode of Monitor

The escape sequences

       $e[=#h          (set mode)
       $e[=#l          (remove mode)

are used to set (remove) the mode of the monitor. On some systems, a "?"
can be used instead of an "=" character with all the modes, or at least
the 7 (wrap) mode. Possible values of #, and their effect are as follows:

	0	40 x 25 black and white 
	1	40 x 25 color
	2	80 x 25 black and white
	3	80 x 25 color
	4	320 x 200 pixels color (no cursor)
	5	320 x 200 pixels black and white (no cursor)
	6	640 x 200 pixels black and white (no cursor)
	7	turns on wrap at end of line

The MODE command can also be used to set the mode of the monitor.
