SAMPLE command	       | Comments about the output

  TYPE LISTING.FIL|MORE The file LISTING.FIL is displayed, one screen at a
			time.  Each time the screen is full the following
			prompt appears:
					-- More --
			Pressing any key at this point will cause the next
			screen of data to appear. Pressing Ctrl-Break will
			cause the MORE command to terminate.

  MORE < LISTING.FIL	This is another way to display the file LISTING.FIL
			on the screen, one screen at a time.

  DIR \BIGONE | MORE	The directory entries would be displayed one screen
			screen at a time, similar to the DIR /P command.

  DIR | SORT | MORE	The directory entries would be displayed one screen
			at a time, in alphabetical order.
