                           device-name CP                       [new DOS 3.3]

This option of the external MODE command allows you to select the code page
for a specific device. The CHCP command selects the code page for all devices.
CODE and CODEPAGE are equivalent to CP. [Not supported in OS/2]

    MODE device-name CP PREP[ARE]=[(cplist) [d:][pathname]filename[.ext]]
    MODE device-name CP SEL[ECT]=nnn
    MODE device-name CP [REF[RESH]] 
    MODE device-name CP [/STA[TUS]]

	PREPARE a list of code pages for a device. 
	SELECT one of them to use, until another one gets SELECTed.
	If a code page is lost (by turning the device off and on, say), 
		the last one SELECTed can be REFRESHed. 

device-name is any device (such as CON: or PRN:) that uses code-pages.

cplist specifies one or more code pages, separated by commas.

filename is a file (probably with a .CPI extension) containing the code 
    pages.

nnn specifies a code page.

/STA will display the code page last SELECTed.
