GRAFTABL 
  or
GRAFTABL [nnn] [?] [/STATUS]                                    [new DOS 3.3]

Enables support for languages outside the USA. This external command is 
effective only in graphics mode. Not all systems have (or need) this command.

nnn specifies the code page to be used. See the NEW_TERMS CODE_PAGE CODES
    topic for a list of possible code page values.

/STATUS or /STA displays the current code page.

? displays the current code page and lists the available choices.

Normally, only a limited set of text characters (ASCII 032-127) can be 
displayed. See the NEW_TERMS ASCII topic for a list. GRAFTABL will allow
graphics characters (ASCII 128-255) to be displayed, as well. If used, the 
GRAFTABL command should be executed just once, preferably in the AUTOEXEC.BAT
file. 
