1. In CONFIG.SYS, in this order:

	DEVICE=ANSI.SYS (optional, but first if used)
	DEVICE=DISPLAY.SYS (if your monitor supports code pages)
	DEVICE=PRINTER.SYS (for each printer that supports code pages)
	COUNTRY  (optional, use if a specific default code page
		  needed for the desired country code)
	INSTALL=NLSFUNC.EXE (if you ever use CHCP to change code pages
			     while running your system)
	INSTALL=KEYB.EXE   (if the default code page on COUNTRY
			    is not appropriate or you have a 101-key 
			    keyboard)
2. In AUTOEXEC.BAT: 

	MODE CON: CP PREP=	(for each DISPLAY.SYS in CONFIG.SYS)
	MODE PRN: CP PREP=	(for each PRINTER.SYS in CONFIG.SYS)

Either 
	CHCP nnn
or one 
	MODE devicename CP SELECT=
for each device named on a DEVICE line in CONFIG.SYS.

	GRAFTABL	(optional, if the default code page on
			 COUNTRY is not appropriate)

3. Normal system operation:

Either
	CHCP to change code pages used by all devices
or 
	MODE to change code page used by a specific device.

To temporarily switch the code page used for the keyboard from the one
defined by COUNTRY or KEYB in CONFIG.SYS to the default USA page (437),
	Ctrl-Alt-F1
and to switch back
	Ctrl-Alt-F2.
