BREAK

To break, interrupt, or terminate something. The keys Ctrl-C and 
Ctrl-Break are used to enter a break from the keyboard. How often 
DOS checks for an attempt to break is controlled by the BREAK 
command, and also by the BREAK line in the CONFIG.SYS file.
