DEVICE=[d:][pathname]DISPLAY.SYS CON[:]=(type[,[hwcp][,[n,m]]]) [new DOS 3.3]

This device driver supports code page character display on enhanced graphics
adapters and some others. If DEVICE=ANSI.SYS in also in the CONFIG.SYS file,
it must appear before any DEVICE=DISPLAY.SYS lines.

type is MONO, CGA, EGA, or LCD.

hwcp is the code page built into your monitor.

n is the number of code pages DOS should support for the monitor, up to 12. n
    must be zero (0) if type=MONO or CGA.

m is the number of sub-fonts to support. The maximum value is 2 for EGA, and
    1 for LCD.
