SAMPLE command and resulting output   | Comments about the output

  SET
PATH=					This is the display for the default
COMSPEC=A:\COMMAND.COM			DOS environment variables.


  PATH C:\SYS				We are setting a new PATH and one
  SET VAR1=7				environment variable VAR1. 
  SET					Note that the display has changed 
PATH=C:\SYS				to reflect the new settings.
COMSPEC=A:/COMMAND.COM
VAR1=7

  SET NAME=Johnnie Boy			After setting this environment 
					variable, the command
					    ECHO %NAME% is home
					in a BATCH file would display 
					    Johnnie Boy is home
					on the screen. 

  @ECHO OFF				If this were the contents of a BATCH
  SET %1=				file called UNSET.BAT, 
  EXIT					    UNSET NAME
					would remove the variable NAME from
					the environment space.
