       SYSTEM WORK DIRECTORY

     The  system   generates
intermediate work files during the
translation process.  This parameter
defines the directory in which the
work files will be created.  These
files will automatically be removed
after each conversion session.
The speed of the translations can
be increased by directing the work
files to a ramdisk.

Type a complete directory path,
including drive letter if appro-
priate, and press RETURN.

Original Entry: none (files are
saved into the	current  DOS
directory)

