	KEYBOARD TYPE

This parameter has three possible
values: US/Group1, Norwegian/Danish
and Hebrew, and is determined by the
type of keyboard layout included in
your system.
Unless an alternate keyboard layout
is being used, this parameter should
not be of concern.

Default: US/Group1.
