201

202

203

204

205

206

207 208 209 210 21 1 212 213

214

215

216

217

218

219

220

221

222

223

224

225 226

227 228 229 230

231

232

233

234

235

236

Y ork Blvd.

Bay St.

Upper Level

106 107 108 109 1 10

1 1 1

1 19 120 121 122 123 124

Y ork Blvd.

Bay St.

Lower Level

Stage

Stage

1 12

1 13

1 14

1 15

1 16

1 17

1 18

125

105

104

103

102

101

128

127

126

Copps Coliseum

Created by W m

P. Madden, Jr.