Maximum Accelerations and Velocities of the 1995 Hyogo-ken Nambu Earthquake

Note: Most values have not been checked by using waveforms.

Epicenter (JMA) active fault

532cm/s/s

532cm/s/s (inexact station location)

27cm/s

>40over 40cm/s (scaled out)

135E

35N818 81833792266251240263224177169149601561616481323245229113113149163195 84 5955>40>403127222516 7499206199485110020km