Hyogo 1995/01/17 1 3.00

6.00

0.3269 0 20 40 60 Time,sec

Mo= 0.213E+27 Mw = 6.8

7.0 0 0 120.0 1 20 40 60 PAS SH EW 52.9

64.00 P UD 7.96

CTAO P 167.2

19.28

75.58