GMT Feb 7 15:57 T.Yoshii

134˚ 30'

134˚ 30'

135˚ 00'

135˚ 00'

135˚ 30'

135˚ 30'

34˚ 00'

34˚ 00'

34˚ 30'

34˚ 30'

35˚ 00'

35˚ 00'

Seismograph O B S G P S