;module-definition file for generic -- used by link4.exe

LIBRARY	Icons	   ; application's module name

STUB	'WINSTUB.EXE' ; Generates error message if application
		  ; is run without Windows

CODE	MOVEABLE DISCARDABLE	  ; code can be moved in memory

;DATA must be MULTIPLE if program can be invoked more than once

DATA	SINGLE MULTIPLE

HEAPSIZE  1024

EXETYPE WINDOWS
