;-----------------------------------------------------------------------;
;
; LOGITECH Mouse Menu Program ;
;
; LOGIMENU File definition for Relational Stock Analyzer ;
;
; LOGIMENU is a product of LOGITECH, Inc. ;
;
;-----------------------------------------------------------------------;
BEGIN LeftB, MidB, RightB, LeftM, RightM, UpM, DownM, 200, 50
CHORDS LMB, LRB, MRB, ALLB
;-----------------------------------------------------------------------;
;
LeftB:  TYPE ENTER;       Enter Key
MidB:   TYPE "+";         Plus Key
RightB: TYPE ESC;         Escape Key
;
LMB:    TYPE 0,59;        F1 Key
LRB:    TYPE 0,60;        F2 Key
MRB:    TYPE 0,61;        F3 Key
;
ALLB:   TYPE "-";         Minus Key
;
LeftM:  TYPE 0,75;        0, 75 is Left Arrow Key
RightM: TYPE 0,77;        0, 77 is Right Arrow Key
UpM:    TYPE 0,72;        0, 72 is Up Arrow Key
DownM:  TYPE 0,80;        0, 80 is Down Arrow Key
;
;-----------------------------------------------------------------------;
