"QUIT RECORD HELP"

"When the quit option is used the screen clears and you are returned to"
"the browse screen.  If you have changed data on the screen it WILL NOT"
"be written to disk.   If you wish to record your changes, use write to"
"record the data into the same record from whence it came, or create to"
"write the data on the screen into a new record."
