"DATAFILE BROWSE HELP"

"The source and target files can be  displayed.   You can  also display"
"the source records finding no matches in the target file.   BROWSE  is"
"limited in this program to the display functions only."

"When you opt to browse the source records you will see only the records"
"you selected as the source of the operation.   If you  loaded a marker"
"file only the records in it will appear on the screen."

"Navigation is accomplished in the normal  manner with the up/down arrow"
"keys, the page up/down keys and the home/end keys.  You may enter a new"
"position in the display by pressing F16."

"Pressing return displays the flashing record. Records may not be edited"
"from this program.   There is no flasher on the record display  screen."
"I/O groups are not supported, but you can change the record  display in"
"the normal manner."

"Pressing escape  displays the function key assignments for all screens."

"When you're done press BACKSPACE to return to the record pairing screen"