"BROWSE FUNCTION HELP"

"The BROWSE function provides graphic display  of  the records  in  the"
"file. When the file is loaded the BROWSE screen details the first nine"
"records.  The user can change the screen  to  see whatever  contiguous"
"nine-record screen he wishes to display."

"The  current  datafile  is listed in the first line of the dialog  box"
"with the number of records  now active  in  the file or group and your"
"current position in the display.   To see the next nine  records press"
"PgDn.  To see the last screen press End. To return to the first screen"
"press Home.  The up/down arrow keys move the flasher up or down by one"
"record.  Pressing return displays the record whose number is flashing."

"If the dialog box says GROUP IS: some of the records in the file  have"
"been rejected,  and you are working with a group comprised of the rec-"
"ords that have  passed the tests made on them  during the execution of"
"the select records by alpha and numeric comparison functions.  Records"
"may also be rejected due to errors during calculations."

"Once a record has been rejected it is ignored by the program.   If you"
"total a data in the file the rejected records will not be  added  into"
"it. If you make a printout the rejected records will not appear in it."
"F11 restores all records to the current group."

"Twenty-two functions are accessible through the F-keys.   Pressing ESC"
"from the BROWSE screen displays the function key assignments.   To get"
"F11, press Alt + F1.  If your keyboard has F11 & F12 ignore them."

"F17 (Alt + F7) re-assigns the primary display segment, and F18 assigns"
"the secondary display on the blank line beneath it. To move large dis-"
"tances in the display press F16, then enter the desired position."

"Each F-key based function has its' own help screen.  To see it,  press"
"the key, then the H key. To dump the screen to the printer press Shift"
" + PrtSc.  Be certain to reset the printer to a fresh page after dump."

