"SECONDARY DISPLAY SEGMENT HELP"

"The secondary display segment  is  inactive when the program  starts."
"If you use the select records, calculate or sort functions the secon-"
"dary display segment is assigned for you by the  routine,  and,  when"
"you return to browse, the data you targeted  will be displayed in it."

"Unlike the primary display segment, the secondary will  allow  you to"
"enter zero as the number of the data  segment to display;  turning it"
"off.  You may also display the counters."

"The routine asks whether to  display data or the  counters.   If data"
"is chosen you will also specify the number of the segment to display."
"When you return to browse the secondary will be reset."
