

▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓   SPEED MENU   ▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓


The clock will not start timing your responses until you type the first
character.

At the end of the real test (as opposed to the warm up) your results will be
written to a file called RESULTS.TTX.  The results of the speed test are
stored in the file RESULTS.  This file is overwritten after every completed
speed test.  It provides a copy of the results for reference purposes after
the test has been completed.

While typing you can optionally switch the beeper ON or OFF with the ! key.

You may abort a session early by hitting the ESC key at any time but if you
do this your speed will not be calculated.





▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓   SPEED MENU   ▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓▓


GENERAL ........... general style of text on which your speed can be tested.

LEGAL   ........... legal style of text on which your speed can be tested.

MEDICAL ........... medical style of text on which your speed can be tested.

TECHNO  ........... computer style of text on which your speed can be tested.

CUSTOM ............ by editing this file you can add a totally new style of
                    text to the list.  To edit this speed test file use either
                    the EDLIN command which is described in your MS-DOS manual,
                    or use any editor or word processor you may have on your
                    system.  Remember to save as ASCII if you are using a word
                    processor and remember NOT to use special word processing
                    commands.
