copying
Installation complete
Installation aborted
Path not found
Source and Destination are the same !
Install ERROR
abort installation ?
Debug Mode - Trace Step
can''t find INSTALL.INF
Cannot establish DDE link to Program Manager
Program Manager DDE execute failed
Please select the filegroups that will be installed on your harddisk:
kb free space needed for the complete installation.
This program will install:
in the following directory. If you want to change the directory use backspace and
type the new directory. Accept the directory by pressing RETURN
Install needs the following disk:
If the files can be found in a different directory enter the new path and press RETURN
The following changes are needed in the file {FILE}
Is it OK that install makes these changes for you ?
File not found
The original File has been saved as:
You can select/deselect a group by highliting the entry and pressing RETURN.
If you have selected all groups select <> and press RETURN
continue
To abord press ESC and then RETURN
