   ╔═══════════════════════════════════════════════════════════════╗
   ║    Please consider the following when downloading files:      ║
   ╚═══════════════════════════════════════════════════════════════╝

1)  The operator of this system is not responsible for the
    contents of the files downloaded from this system.
2)  The operator of this system is not responsible for any damage
    arising from the use of software/files downloaded from this system.
3)  Though we try to test each file for virii, it is recommended
    that the user also scan files when downloaded.

