  SETUP COMPUTER CONFIGURATION


  The Setup Computer Configuration Screen allows you to change the Default
  Path Names to the Archive of Files directory, the Help Files directory,
  and the Serial Port used for the RIB.  The Default Path Names may be
  edited or rewritten. A drive letter followed by a colon is encouraged.
  If no drive letter is given, your files may not be located where you expect
  them to be. The Serial Port (COM1 or COM2) may be selected with the
  spacebar.

                                                                <Page Down> 
.P
  Archive Pathname  - Leads to the directory of the Personality files.

  Help Pathname     - Leads to the directory of the Help Files.

  Software Password - To protect your NEXCARD Pager Programming
                      Software from unauthorized use, you may put password
                      protection on the software. Just as you selected to
                      use password protection while running the SETUP
                      program, you can now remove the need for a password to
                      run this program or you can change the password to
                      something new. If you leave this area blank, you will
                      not need to enter a password to execute this program.
                      Be sure to save the new configuration before exiting.

                                                  <Page Down>    <Page Up> 
.p

  F8 (SAVE) - To save the current setup, press the F8 key.  If the Computer
  Configuration is not saved, the current setup will only be valid for the
  current execution.





                                                                  <Page Up> 
