
  Sequential Lockout

  For wide area coverage, some systems use multiple transmitters located
  throughout the coverage area. By transmitting the pager information
  sequentially from one station to the next and so on, the likelihood
  that the pager will receive the information is high. In such a system,
  a pager may receive the same information more than once and alert for
  each time. By setting a sequential lockout time, the pager will ignore
  duplicate transmissions within that time period.

  Available sequential lockout times are:

         None        1 minute        2.5 minutes        6.5 minutes
  
