
  MEM Reminder Alert

  This option specifies what type of reminder alert will be given when the
  pager is in 'MEM' (Silent) mode.  Choices are:

        Flash/Vib
        Chirp

  This reminder will continue to alert the user while there are unread 
  messages in the pager. 
 
  Reminder Alert must be selected in conjunction with this option.  

