
  Phone Number Screen 

  Selecting this option will allow the pager to display its phone number
  so that the user will never forget it.

  The phone number can consist of digits 0 - 9, SPACES, and DASHES. NOTE: 
  The Pager Phone # can not consist of the pager's address either Code A or 
  Code B.
 
  The phone number will be displayed only when the pager is turned on, as a
  part of the power-up sequence.
