
  Out of Range 

  When the pager is located beyond the coverage area of the paging system
  continuously for this amount of time, the 'Out-of-Range' icon is displayed.
  This option easily allows the user to tell if they have left the coverage
  area.  Available Out of Range intervals are:

                None
                1 minute                5 minutes
                2 minutes               6 minutes
                3 minutes               7 minutes
                4 minutes               8 minutes

