
  RF Programming Password

  If you have selected an "O" - OTA for one of your functions, then you
  must enter a password. The default value is "SPEEDYPAGE". 

  For security purposes you may assign a unique password to each of your
  pagers. Activation of this password will require that this password be
  entered whenever you want to program this pager Over The Air. This re-
  stricts programming of this pager to the person who knows this pager's
  password.

                                                                <Page Down> 
.P

  For optimum pager security, each pager should be assigned its
  own unique password. This minimizes the possibility of someone tampering
  with your pagers. Assigning a common password to all your pagers should be
  discouraged since someone who wants to tamper with your pagers would only
  have to know a single password to do so.

  The Pager Password is 10 characters long and may consist of any
  combination of A-Z, 0-9 and space.
  
                                                                  <Page Up> 
