
  F4 - Depending on which menu you are now located, you may execute the
       function listed next to the key description. You may choose to program
       a pager, save the pager configuration file to disk or print the pager
       configuration.

  F7 - Pressing this key will take you back to the previous menu.

  F8 - Pressing this key will advance you to the next menu.
