
  Frequency

  Non-synthesized Pager:
  This option stores the carrier frequency which the pager is to 
  use.  Every time it is changed, a screen will appear during the 
  actual programming that will explain your options at that time.

  278.0000 MHz - 284.0000 MHz is the valid frequency range. 
  
                                                                <Page Down> 
.p

  Synthesized Pager:
  If a pager is synthesized, one, two, or three frequencies may be
  programmed.

  278.0000 MHz - 284.0000 MHz is the valid frequency range 
  (multiples of 12.5 KHz).

  Some Frequencies in these ranges may not be synthesized.  Please refer to
  the Motorola NEXCARD/NEXCASE Service Manual.
                       
                                                                  <Page Up> 

