
  Frequency

  Non-synthesized Pager:
  This option stores the carrier frequency which the pager is to 
  use.  Every time it is changed, a screen will appear during the 
  actual programming that will explain your options at that time.

  Valid frequency ranges are: 
   
  33.0000 MHz - 36.9999 MHz,       406.0000 MHz - 420.0000 MHz,
  40.0000 MHz - 49.9999 MHz,       435.0000 MHz - 512.0000 MHz,
  138.0000 MHz - 173.9999 MHz,     929.0000 MHz - 932.0000 MHz.
  278.0000 MHz - 284.0000 MHz,
                                                                <Page Down> 
.p

  Synthesized Pager:
  If a pager is synthesized, one, two, or three frequencies may be
  programmed.

  Valid frequency ranges are:

  152.0000 MHz - 159.9950 MHz (multiples of 5.0 KHz),
  160.0000 MHz - 167.9950 MHz (multiples of 5.0 KHz),
  278.0000 MHz - 284.0000 MHz (multiples of 12.5 KHz),
  929.0000 MHz - 932.0000 MHz (multiples of 12.5 KHz.  Also, frequencies in 
                              the range 929.0025 MHz - 931.9625 MHz which 
                              are multiples of 40 KHz may be synthesized).
                       
                                                                  <Page Up> 


