
  Active Frequency

  If you are programming a synthesized pager, this field specifies
  which frequency the pager will operate on initially. The user
  may change the current active frequency, if more than one
  frequency is valid, through the operational sequence of the pager.
  If only one synthesized frequency is valid, then this field will 
  default to 1.
 
   

