
  Code B Type

  The pager's first code can only be assigned as Individual. The pager's
  second code can be assigned as Individual or Group Call. 

  Pagers equipped with the same group call code can all receive the same
  messages at the same time.  

  This option is representative of all of the programmed frequencies.

